STAATSCOURANT
Officiële uitgave van het Koninkrijk der Nederlanden sinds 1814.
Regeling van de Minister van Volksgezondheid, Welzijn en Sport van 23 januari 2025, kenmerk 4043251-1078023-GMT, houdende wijziging van het GVS februari 2025
De Minister van Volksgezondheid, Welzijn en Sport,
Gelet op artikel 2.8 van het Besluit zorgverzekering;
Besluit:
ARTIKEL
I
De Regeling zorgverzekering wordt als volgt gewijzigd:
A
Bijlage 1 wordt gewijzigd als volgt:
1.
Aan onderdeel A worden de volgende regels toegevoegd:
0A07AABO V | 133707//11984 | VANCOMYCINE ERC CAPSULE 250MG | 8,00 | STUK | 9,46132 |
0A07ECCO V | 133708//31379 | PENTASA GRANULAAT MVA 2G IN SACHET | 0,75 | STUK | 2,50233 |
0A09AAAO V | 132346//10656 | CREON 10000 CAPSULE MSR | 6,00 | STUK | 0,40319 |
0A09AAAO V | 132390//16055 | CREON 25000 CAPSULE MSR | 2,40 | STUK | 1,00796 |
0A09AAAO V | 132347//120929 | CREON 35000 CAPSULE MSR | 1,71 | STUK | 1,41115 |
0A12BAAO V | 133536//6050 | KALIUMCHLORIDE ERC TABLET MGA 600MG | 5,00 | STUK | 0,03548 |
0B01ABAP V | 133991//120702 | ENOXAPARINE ERC INJVLST 4.000IE (40MG)/0,4ML WW | 0,20 | ML | 8,89410 |
0B01ABAP V | 133993//120701 | ENOXAPARINE ERC INJVLST 6.000IE (60MG)/0,6ML WW | 0,20 | ML | 8,89410 |
0B01ABAP V | 133992//120700 | ENOXAPARINE ERC INJVLST 8.000IE (80MG)/0,8ML WW | 0,20 | ML | 8,89410 |
0B01ABAP V | 133997//120700 | ENOXAPARINE ERC INJVLST 8.000IE (80MG)/0,8ML WW | 0,20 | ML | 8,89410 |
0B01AXBO V | EU/1/22/1665/009 | DABIGATRAN ETEXILAAT ACCORD CAPSULE 110MG | 2,73 | STUK | 2,27500 |
0B01AXBO V | EU/1/22/1665/019 | DABIGATRAN ETEXILAAT ACCORD CAPSULE 150MG | 2,00 | STUK | 3,10227 |
0C02KXAO V | EU/1/13/893/004 | OPSUMIT 2,5 MG DISPERGEERBARE TABLETTEN | 4,00 | STUK | 43,98571 |
0D11AHAO V | 121503 | ALIPALMTIN CAPSULE 10MG | 2,00 | STUK | 5,89333 |
0D11AHAO V | 121504 | ALIPALMTIN CAPSULE 30MG | 0,67 | STUK | 17,68000 |
0G03ACAO V | 127386 | SLINDA 4 MG FILMOMHULDE TABLETTEN | 1,00 | STUK | 0,08071 |
YG04CABO V | 133743//111622 | VESOMNI TABLET MGA 6/0,4MG | 1,00 | STUK | 1,95779 |
0J01GBAP V | 128938//22424 | AMIKACINE EURECO-PHARMA INJVLST 250MG/ML FL 2ML | 4,00 | ML | 5,24117 |
0J01XAAP V | 114472 | VANCOMYCINE MIP INFUSIEPOEDER FLACON 1000MG | 2000,00 | MG | 0,02389 |
0J01XAAP V | 114471 | VANCOMYCINE MIP INFUSIEPOEDER FLACON 500MG | 2000,00 | MG | 0,02389 |
0L01BBCO V | 124840 | FINGOLIMOD ROCKMED PHARMA CAPSULE 0,5MG | 1,00 | STUK | 61,60714 |
0L02AEADI V | 133352//12277 | ZOLADEX IMPLANTATIESTIFT 3,6MG IN WWSP SAFESYSTEM | 1,00 | STUK | 184,07590 |
0L04AADO V | 134075//18107 | PROGRAFT CAPSULE 1MG | 5,00 | STUK | 2,84925 |
0L04AFAO V | EU/1/16/1170/001 | OLUMIANT 2 MG FILMOMHULDE TABLETTEN | 1,50 | STUK | 18,32321 |
0L04AFAO V | EU/1/16/1170/003 | OLUMIANT 2 MG FILMOMHULDE TABLETTEN | 1,50 | STUK | 18,32321 |
0L04AFAO V | EU/1/16/1170/004 | OLUMIANT 2 MG FILMOMHULDE TABLETTEN | 1,50 | STUK | 18,32321 |
0L04AFAO V | EU/1/16/1170/005 | OLUMIANT 2 MG FILMOMHULDE TABLETTEN | 1,50 | STUK | 18,32321 |
0L04AFAO V | EU/1/16/1170/007 | OLUMIANT 2 MG FILMOMHULDE TABLETTEN | 1,50 | STUK | 18,32321 |
0L04AFAO V | EU/1/16/1170/008 | OLUMIANT 2 MG FILMOMHULDE TABLETTEN | 1,50 | STUK | 18,32321 |
0L04AFAO V | EU/1/16/1170/009 | OLUMIANT 4 MG FILMOMHULDE TABLETTEN | 0,75 | STUK | 36,64643 |
0L04AFAO V | EU/1/16/1170/011 | OLUMIANT 4 MG FILMOMHULDE TABLETTEN | 0,75 | STUK | 36,64643 |
0L04AFAO V | EU/1/16/1170/012 | OLUMIANT 4 MG FILMOMHULDE TABLETTEN | 0,75 | STUK | 36,64643 |
0L04AFAO V | EU/1/16/1170/013 | OLUMIANT 4 MG FILMOMHULDE TABLETTEN | 0,75 | STUK | 36,64643 |
0L04AFAO V | EU/1/16/1170/015 | OLUMIANT 4 MG FILMOMHULDE TABLETTEN | 0,75 | STUK | 36,64643 |
0L04AFAO V | EU/1/16/1170/016 | OLUMIANT 4 MG FILMOMHULDE TABLETTEN | 0,75 | STUK | 36,64643 |
0L04AFAO V | EU/1/16/1170/002 | OLUMIANT TABLET FILMOMHULD 2MG | 1,50 | STUK | 18,32321 |
0L04AFAO V | EU/1/16/1170/006 | OLUMIANT TABLET FILMOMHULD 2MG | 1,50 | STUK | 18,32321 |
0L04AFAO V | EU/1/16/1170/010 | OLUMIANT TABLET FILMOMHULD 4MG | 0,75 | STUK | 36,64643 |
0L04AFAO V | EU/1/16/1170/014 | OLUMIANT TABLET FILMOMHULD 4MG | 0,75 | STUK | 36,64643 |
0R03ACCIDCV | 134230//112058 | STRIVERDI RESPIMAT INHOPL 2,5MCG/DO PATR 60DO+INH | 2,00 | DO | 0,61011 |
0R03BBCID V | 130614 | SCINORUS INHALPDR 7MCG MET VERTICAL-HALER | 1,00 | STUK | 1,49000 |
2R06AEAO V | 133995//13010 | ZYRTEC TABLET FILMOMHULD 10MG | 1,00 | STUK | 0,50499 |
2R06AEAO V | 134024//13010 | ZYRTEC TABLET FILMOMHULD 10MG | 1,00 | STUK | 0,50499 |
2R06AXAO V | 131240 | FEXOFENADINE HCL VIATRIS TABLET OMHULD 120MG | 1,00 | STUK | 0,50499 |
2R06AXAO V | 131241 | FEXOFENADINE HCL VIATRIS TABLET OMHULD 180MG | 0,67 | STUK | 0,75748 |
0V01AABO V | 134287//118889 | ACARIZAX LYOPHILISAAT V SUBL GEBRUIK 12 SQ-HDM | 1,00 | STUK | 3,30000 |
2.
In onderdeel A worden de volgende regels vervangen door de daarbij vermelde teksten:
"0C08CAAO V | 102333 | LERCANIDIPINE HCL MYLAN TABLET OMHULD 20MG | 0,50 | STUK | 1,30901 | ":
0C08CAAO V | 102333 | LERCANIDIPINE HCL VIATRIS TABLET OMHULD 20MG | 0,50 | STUK | 1,30901 | ;
"0G04BDBO V | 115975 | SOLIFENACINESUCCINAAT MYLAN TABLET FILMOMHULD 5MG | 1,00 | STUK | 0,82981 | ":
0G04BDBO V | 115975 | SOLIFENACINESUCCINAAT VIATRIS TABL FILMOMHULD 5MG | 1,00 | STUK | 0,82981 | ;
"0J01XAAP V | 124055 | TEICOPLANINE BRADEX INJ/INFPDR FL 200MG + SOLV 3ML | 200,00 | MG | 0,23895 | ":
0J01XAAP V | 124055 | TEICOPLANINE DEMO INJ/INFPDR FL 200MG + SOLV 3ML | 200,00 | MG | 0,23895 | ;
"0J01XAAP V | 124056 | TEICOPLANINE BRADEX INJ/INFPDR FL 400MG + SOLV 3ML | 200,00 | MG | 0,23895 | ":
0J01XAAP V | 124056 | TEICOPLANINE DEMO INJ/INFPDR FL 400MG + SOLV 3ML | 200,00 | MG | 0,23895 | ;
"0L02AEADI V | EU/1/23/1753/003 | DEGARELIX ACCORD 120 MG PDR EN OPLMID V INJECTIE | 0,67 | STUK | 276,11385 | ":
0L02AEADI V | EU/1/23/1753/003 | DEGARELIX ACCORD INJPDR FLACON 120MG + SOLV 3ML+TB | 0,67 | STUK | 276,11385 | ;
"0L02AEADI V | EU/1/23/1753/001 | DEGARELIX ACCORD 80 MG PDR EN OPLMID V INJECTIE | 1,00 | STUK | 184,07590 | ":
0L02AEADI V | EU/1/23/1753/001 | DEGARELIX ACCORD INJPDR FLACON 80MG +SOLV 4,2ML+TB | 1,00 | STUK | 184,07590 | ;
"4N05AXAO V | 104457 | QUETIAPINE MYLAN TABLET FILMOMHULD 200MG | 1,50 | STUK | 2,64201 | ":
4N05AXAO V | 104457 | QUETIAPINE VIATRIS TABLET FILMOMHULD 200MG | 1,50 | STUK | 2,64201 | ;
"0S01ECAG V | 101854 | DORZOLAMIDE MYLAN OOGDRUPPELS 20MG/ML FLACON 5ML | 0,30 | ML | 2,19630 | ":
0S01ECAG V | 101854 | DORZOLAMIDE VIATRIS OOGDRUPPELS 20MG/ML FLACON 5ML | 0,30 | ML | 2,19630 | ;
"0S01EEAG V | EU/1/23/1763/001 | CATIOLANZE, 50 MCG/ML OOGDRUPPELS EMULSIE | 1,00 | STUK | 0,85267 | ":
0S01EEAG V | EU/1/23/1763/001 | CATIOLANZE OOGDR EMULSIE 50MCG/ML FLACON 0,3ML | 1,00 | STUK | 0,85267 | ;
"0V01AABO V | 125527//118889 | ACARIZAX LYOPHILISAAT V ORAAL GEBRUIK 12 SQ-HDM | 1,00 | STUK | 3,30000 | ":
0V01AABO V | 125527//118889 | ACARIZAX LYOPHILISAAT V SUBL GEBRUIK 12 SQ-HDM | 1,00 | STUK | 3,30000 |
3.
In onderdeel A worden de volgende regels verwijderd:
0A09AAAO V | 18311 | PANZYTRAT 10000 CAPSULE MSR | 6,00 | STUK | 0,40319 |
0A09AAAO V | 13760 | PANZYTRAT 25000 CAPSULE MSR | 2,40 | STUK | 1,00796 |
0A09AAAO V | 108240 | PANZYTRAT GRANULAAT MSR | 1,15 | GRAM | 2,09656 |
1C01DAAO V | 100635 | ISOSORBIDEMONONITRAAT TEVA RETARD TABLET MGA 60MG | 1,00 | STUK | 0,54454 |
YC07CBAO V | 15842 | ATENOLOL/CHLOORTALIDON SANDOZ TABLET 50/12,5MG | 1,00 | STUK | 0,32248 |
YC07CBAO V | 15843 | ATENOLOL/CHLOORTALIDON SANDOZ TABLET 100/25MG | 1,00 | STUK | 0,64497 |
0C10AAAO V | 35300 | FLUVASTATINE AUROBINDO CAPSULE 20MG | 3,00 | STUK | 0,55361 |
0C10AAAO V | 35301 | FLUVASTATINE AUROBINDO CAPSULE 40MG | 1,50 | STUK | 0,92269 |
0G04ACBO V | 52232 | NITROFURANTOINE MC APOTEX CAPSULE 100MG | 2,00 | STUK | 0,28588 |
0H01CBBP V | 35046 | OCTREOTIDE HOSPIRA INJVLST 0,05MG/ML FLACON 1ML | 14,00 | ML | 8,68027 |
0H01CBBP V | 35047 | OCTREOTIDE HOSPIRA INJVLST 0,1MG/ML FLACON 1ML | 7,00 | ML | 10,85034 |
0H01CBBP V | 35049 | OCTREOTIDE HOSPIRA INJVLST 0,2MG/ML FLACON 5ML | 3,50 | ML | 21,70068 |
0H01CBBP V | 35048 | OCTREOTIDE HOSPIRA INJVLST 0,5MG/ML FLACON 1ML | 1,40 | ML | 54,25170 |
0J01DABP V | 15264 | CEFUROXIM PCH INJECTIEPOEDER FLACON 250MG | 12,00 | STUK | 4,84941 |
0J01DABP V | 15264 | CEFUROXIM PCH INJECTIEPOEDER FLACON 1500MG | 2,00 | STUK | 20,78320 |
0J01DABP V | 15264 | CEFUROXIM TEVA INJECTIEPOEDER FLACON 750MG | 4,00 | STUK | 10,39160 |
0J01DHAP V | 17864 | MERONEM INJECTIEPOEDER FLACON 250MG | 8,00 | STUK | 9,15956 |
0J01DHAP V | 17864 | MERONEM INJECTIEPOEDER FLACON 500MG | 4,00 | STUK | 18,31911 |
0J01DHAP V | 17864 | MERONEM INJECTIEPOEDER FLACON 1000MG | 2,00 | STUK | 36,63822 |
0J01XAAP V | 105369 | VANCOMYCINE PFIZER INFUSIEPOEDER FLACON 500MG | 2000,00 | MG | 0,02389 |
0J01XAAP V | 105372 | VANCOMYCINE PFIZER INFUSIEPOEDER FLACON 1000MG | 2000,00 | MG | 0,02389 |
0L02ABAO V | 6166 | PROVERA TABLET 100MG | 2,00 | STUK | 0,64408 |
0L02ABAO V | 12120 | PROVERA TABLET 500MG | 0,40 | STUK | 2,68366 |
0L02BGAO V | 100806 | LETROZOL ACTAVIS TABLET FILMOMHULD 2,5MG | 1,00 | STUK | 4,71931 |
0M03BXAO V | 23864=12153 | BACLOFEN SANDOZ TABLET 10MG | 5,00 | STUK | 0,14657 |
0M03BXAO V | 23865=12154 | BACLOFEN SANDOZ TABLET 25MG | 2,00 | STUK | 0,36643 |
0N02AXAO V | 22031 | TRAMADOL HCL PCH CAPSULE 50MG | 6,00 | STUK | 0,20647 |
0N02CCAO V | 112367 | FROVATRIPTAN SANDOZ TABLET FILMOMHULD 2,5MG | 1,00 | STUK | 6,21227 |
3N05CGAO V | 25109 | ZOLPIDEMTARTRAAT SANDOZ TABLET FILMOMHULD 10MG | 1,00 | STUK | 0,19558 |
2R06AXAO V | 34134 | DA HOOIKOORTS LORATADINE TABLET 10MG | 1,00 | STUK | 0,50499 |
4.
Aan onderdeel B worden de volgende regels toegevoegd:
| 130811//52323 | GLUCOSE MEDCOR INJVLST 400MG/ML AMPUL 10ML | | | |
| 131427//129963 | HUMAAN HEP B-IMMUNOGL EUR-PH INJVL 180IE/ML FL 1ML | | | |
| 133866//3714 | SYNTOCINON INJVLST 5IE/ML AMPUL 1ML | | | |
| 129963 | UMAN BIG INJVLST 180IE/ML FLACON | | | |
5.
In onderdeel B worden de volgende regels vervangen door de daarbij vermelde teksten:
" | 131433 | MARAVIROC WAYMADE 150 MG FILMOMHULDE TABLETTEN | | | | ":
| 131433 | MARAVIROC WAYMADE TABLET FILMOMHULD 150MG | | | | ;
" | 131434 | MARAVIROC WAYMADE 300 MG FILMOMHULDE TABLETTEN | | | | ":
| 131434 | MARAVIROC WAYMADE TABLET FILMOMHULD 300MG | | | |
6.
In onderdeel B worden de volgende regels verwijderd:
| 2697 | BETNESOL LAVEMENT 0,05MG/ML FLACON 100ML | | | |
| 11509 | CATHEJELL-S CATHETERSLIJM | | | |
| 107278 | CISATRACURIUM FRES KABI INJVLST 2MG/ML | | | |
| 121204 | DARUNAVIR XIROMED TABLET FILMOMHULD 400MG | | | |
| EU/1/96/026/001 | INVIRASE CAPSULE 200MG | | | |
| EU/1/96/026/002 | INVIRASE TABLET FILMOMHULD 500MG | | | |
| EU/1/16/1170/001 | OLUMIANT 2 MG FILMOMHULDE TABLETTEN | | | |
| EU/1/16/1170/003 | OLUMIANT 2 MG FILMOMHULDE TABLETTEN | | | |
| EU/1/16/1170/004 | OLUMIANT 2 MG FILMOMHULDE TABLETTEN | | | |
| EU/1/16/1170/005 | OLUMIANT 2 MG FILMOMHULDE TABLETTEN | | | |
| EU/1/16/1170/007 | OLUMIANT 2 MG FILMOMHULDE TABLETTEN | | | |
| EU/1/16/1170/008 | OLUMIANT 2 MG FILMOMHULDE TABLETTEN | | | |
| EU/1/16/1170/009 | OLUMIANT 4 MG FILMOMHULDE TABLETTEN | | | |
| EU/1/16/1170/011 | OLUMIANT 4 MG FILMOMHULDE TABLETTEN | | | |
| EU/1/16/1170/012 | OLUMIANT 4 MG FILMOMHULDE TABLETTEN | | | |
| EU/1/16/1170/013 | OLUMIANT 4 MG FILMOMHULDE TABLETTEN | | | |
| EU/1/16/1170/015 | OLUMIANT 4 MG FILMOMHULDE TABLETTEN | | | |
| EU/1/16/1170/016 | OLUMIANT 4 MG FILMOMHULDE TABLETTEN | | | |
| EU/1/16/1170/002 | OLUMIANT TABLET FILMOMHULD 2MG | | | |
| EU/1/16/1170/006 | OLUMIANT TABLET FILMOMHULD 2MG | | | |
| EU/1/16/1170/010 | OLUMIANT TABLET FILMOMHULD 4MG | | | |
| EU/1/16/1170/014 | OLUMIANT TABLET FILMOMHULD 4MG | | | |
ARTIKEL
II
Deze regeling treedt in werking met ingang van 1 februari 2025. Indien de Staatscourant waarin deze regeling wordt geplaatst, wordt uitgegeven na 1 februari 2025, treedt zij in werking met ingang van de dag na de datum van uitgifte van de Staatscourant waarin zij wordt geplaatst en werkt terug tot en met 1 februari 2025. Deze regeling zal in de Staatscourant worden geplaatst.
De Minister van Volksgezondheid, Welzijn en Sport,
M.
Agema