STAATSCOURANT
Officiële uitgave van het Koninkrijk der Nederlanden sinds 1814.

Regeling van de Minister van Volksgezondheid, Welzijn en Sport van 24 september 2024, kenmerk 3972393-1070939-GMT, houdende GVS regeling oktober 2024
De Minister van Volksgezondheid, Welzijn en Sport,
Gelet op artikel 2.8 van het Besluit zorgverzekering;
Besluit:
ARTIKEL
I
De Regeling zorgverzekering wordt gewijzigd als volgt:
A
Bijlage 1 wordt gewijzigd als volgt:
1.
In onderdeel A worden de volgende regels opgenomen:
0A02BCAO V | 133423 | APPIZMIT 10MG/15ML CONC EN OPLMID V DRANK 2 MG/ML | 10,00 | ML | 0,16811
0A02BCAO V | 133426 | APPIZMIT 20MG/15ML CONC EN OPLMID V DRANK 4 MG/ML | 5,00 | ML | 0,33622
0A06AHAO V | EU/1/14/962/001 | MOVENTIG TABLET FILMOMHULD 12,5MG | 2,00 | STUK | 2,97000
0A06AHAO V | EU/1/14/962/008 | MOVENTIG TABLET FILMOMHULD 12,5MG | 2,00 | STUK | 2,97000
0A06AHAO V | EU/1/14/962/004 | MOVENTIG 25 MG FILMOMHULDE TABLETTEN | 1,00 | STUK | 4,95000
0A06AHAO V | EU/1/14/962/005 | MOVENTIG TABLET FILMOMHULD 25MG | 1,00 | STUK | 4,95000
0A06AHAO V | EU/1/14/962/007 | MOVENTIG TABLET FILMOMHULD 25MG | 1,00 | STUK | 4,95000
0A06AHAO V | EU/1/14/962/010 | MOVENTIG TABLET FILMOMHULD 25MG | 1,00 | STUK | 4,95000
0A09AAAO V | 133387//16055 | CREON 25000 CAPSULE MSR | 2,40 | STUK | 1,00796
0A10BHAO V | 124509 | VILDAGLIPTINE AMAROX TABLET 50MG | 2,00 | STUK | 1,61000
0A10BHAO V | 127274 | VILDAGLIPTINE MACLEODS TABLET 50MG | 2,00 | STUK | 1,61000
0A16AXAO V | EU/1/13/822/006 | PHEBURANE OPLOSSING V ORAAL GEBRUIK 350MG/ML +TOEB | 57,14 | ML | 2,18365
0B01ABAP V | 133717//23794 | FRAXIPARINE FORTE INJV 11400IE/0,6ML(19000IE/ML)WW | 0,15 | ML | 11,85880
0B01ABAP V | 133718//23795 | FRAXIPARINE FORTE INJV 15200IE/0,8ML(19000IE/ML)WW | 0,15 | ML | 11,85880
0B01ABAP V | 133719//23796 | FRAXIPARINE FORTE INJV 19000IE/1,0ML(19000IE/ML)WW | 0,15 | ML | 11,85880
0B01AXBO V | 128248 | RIVAROXABAN CF TABLET FILMOMHULD 2,5MG | 8,00 | STUK | 1,24091
0C08CAAO V | 131097 | AMLODIPINE AURO TABLET 5MG | 1,00 | STUK | 0,65450
0C08CAAO V | 131098 | AMLODIPINE AURO TABLET 10MG | 0,50 | STUK | 1,30901
YC09BXAO V | 132895//112148 | TRIPLIXAM TABLET FILMOMHULD 10/2,5/10MG | 1,00 | STUK | 2,87266
1G01AFBV V | 133575//8935 | CANESTEN GYNO 3 VAGINAALCREME 20MG/G + 3 APPLIC | 15,00 | GRAM | 0,39310
0G02BAAV V | 129637//16681 | MIRENA I.U.D. | 1,00 | STUK | 121,15930
0G03BABO V | 133642//120624 | TESTAVAN GEL TRANSDERMAAL 20MG/G + APPLICATOR | 2,50 | GRAM | 0,72605
0H01CBBP V | 133635//112911 | SIROCTID INJVLST 0,5MG/ML WWSP 1ML | 1,40 | ML | 54,25170
0H02ABCO V | 129639 | HYDROCORTISON HUALAN 2,5MG TABLETTEN | 12,00 | STUK | 0,30067
0J02ACBP V | 129602 | VORICONAZOL HAMELN INFUSIEPOEDER FLACON 200MG | 2,00 | STUK | 143,00000
0L02AEADI V | 130779//33849 | TRIPTORELINE ERC INJPDR FLACON 3,75MG + SOLV 2ML | 1,00 | STUK | 184,07590
0N03AFCO K | 133106//6346 | TEGRETOL SUSPENSIE 20MG/ML | 50,00 | ML | 0,02367
0N03AGAO V | 133508//7055 | DEPAKINE ENTERIC TABLET MSR 300MG | 5,00 | STUK | 0,15928
0N03AGAO V | 133417//17569 | DEPAKINE VLOEISTOF VOOR KINDEREN 300MG/ML | 5,00 | ML | 0,15928
0N03AXEO V | 133736//25836 | TOPAMAX SPRINKLE CAPSULE 15MG | 20,00 | STUK | 0,50842
0N03AXEO V | 133735//25838 | TOPAMAX SPRINKLE CAPSULE 50MG | 6,00 | STUK | 0,79440
0N06AAAO V | 129785 | AMITRIPTYLINE HCL AMAROX TABLET FILMOMHULD 10MG | 7,50 | STUK | 0,07666
0N06AAAO V | 129786 | AMITRIPTYLINE HCL AMAROX TABLET FILMOMHULD 25MG | 3,00 | STUK | 0,14743
0N06AAAO V | 129787 | AMITRIPTYLINE HCL AMAROX TABLET FILMOMHULD 50MG | 1,50 | STUK | 0,29485
0N07XXCO V | 128849 | TERIFLUNOMIDE CF TABLET FILMOMHULD 14MG | 1,00 | STUK | 33,92857
0N07XXCO V | 129403 | TERIFLUNOMIDE GLENMARK TABLET FILMOMHULD 14MG | 1,00 | STUK | 33,92857
0N07XXDO V | 130731 | DIMETHYLFUMARAAT VIVANTA CAPSULE MSR 120MG | 4,00 | STUK | 12,22254
0N07XXDO V | 130732 | DIMETHYLFUMARAAT VIVANTA CAPSULE MSR 240MG | 2,00 | STUK | 20,37089
0R03BABID V | 129122 | CICLESONIDE ACE AEROSOL 160MCG/DO SPBS 120DO + INH | 1,00 | DO | 0,70100
0R03BABID V | 129120 | CICLESONIDE ACE AEROSOL 80MCG/DO SPBS 120DO + INH | 2,00 | DO | 0,42060
0R03BABID V | 133709//16213 | FLIXOTIDE AER CFKVR 125MCG/DO SPBS 120 DO + INHAL | 4,80 | DO | 0,14604
0R03BADID V | 132960//18193 | FLIXOTIDE DISKUS INHPDR 100MCG 60DO | 6,00 | DO | 0,15440
0R03DXAP V | EU/1/05/319/021 | XOLAIR 75 INJECTIEVLOEISTOF 150MG/ML PEN 0,5ML | 0,11 | ML | 389,00000
0R03DXAP V | EU/1/05/319/005 | XOLAIR 75 INJECTIEVLOEISTOF 150MG/ML WWSP 0,5ML | 0,11 | ML | 389,00000
0R03DXAP V | EU/1/05/319/018 | XOLAIR 75 INJECTIEVLOEISTOF 150MG/ML WWSP 0,5ML | 0,11 | ML | 389,00000
0R03DXAP V | EU/1/05/319/027 | XOLAIR 150 INJECTIEVLOEISTOF 150MG/ML PEN 1ML | 0,11 | ML | 389,00000
0R03DXAP V | EU/1/05/319/008 | XOLAIR 150 INJECTIEVLOEISTOF 150MG/ML WWSP 1ML | 0,11 | ML | 389,00000
0R03DXAP V | EU/1/05/319/024 | XOLAIR 150 INJECTIEVLOEISTOF 150MG/ML WWSP 1ML | 0,11 | ML | 389,00000
0R03DXAP V | EU/1/05/319/028 | XOLAIR 150 MG OPL V INJECTIE PEN 3X1ML | 0,11 | ML | 389,00000
0R03DXAP V | EU/1/05/319/029 | XOLAIR 150 MG OPL V INJECTIE PEN 6X1ML | 0,11 | ML | 389,00000
0R03DXAP V | EU/1/05/319/010 | XOLAIR 150 MG OPL V INJECTIE SPUIT 10X1ML | 0,11 | ML | 389,00000
0R03DXAP V | EU/1/05/319/025 | XOLAIR 150 MG OPL V INJECTIE SPUIT 3X1ML | 0,11 | ML | 389,00000
0R03DXAP V | EU/1/05/319/009 | XOLAIR 150 MG OPL V INJECTIE SPUIT 4X1ML | 0,11 | ML | 389,00000
0R03DXAP V | EU/1/05/319/011 | XOLAIR 150 MG OPL V INJECTIE SPUIT 6X1ML | 0,11 | ML | 389,00000
0R03DXAP V | EU/1/05/319/026 | XOLAIR 150 MG OPL V INJECTIE SPUIT 6X1ML | 0,11 | ML | 389,00000
0R03DXAP V | EU/1/05/319/015 | XOLAIR 300 INJECTIEVLOEISTOF 150MG/ML PEN 2ML | 0,11 | ML | 389,00000
0R03DXAP V | EU/1/05/319/016 | XOLAIR 300 MG OPL V INJECTIE PEN 3X2ML | 0,11 | ML | 389,00000
0R03DXAP V | EU/1/05/319/017 | XOLAIR 300 MG OPL V INJECTIE PEN 6X2ML | 0,11 | ML | 389,00000
0R03DXAP V | EU/1/05/319/012 | XOLAIR 300 MG OPL V INJECTIE SPUIT 1X2ML | 0,11 | ML | 389,00000
0R03DXAP V | EU/1/05/319/013 | XOLAIR 300 MG OPL V INJECTIE SPUIT 3X2ML | 0,11 | ML | 389,00000
0R03DXAP V | EU/1/05/319/014 | XOLAIR 300 MG OPL V INJECTIE SPUIT 6X2ML | 0,11 | ML | 389,00000
0R03DXAP V | EU/1/05/319/022 | XOLAIR 75 MG OPL V INJECTIE PEN 3X0,5ML | 0,11 | ML | 389,00000
0R03DXAP V | EU/1/05/319/007 | XOLAIR 75 MG OPL V INJECTIE SPUIT 10X0,5ML | 0,11 | ML | 389,00000
0R03DXAP V | EU/1/05/319/019 | XOLAIR 75 MG OPL V INJECTIE SPUIT 3X0,5ML | 0,11 | ML | 389,00000
0R03DXAP V | EU/1/05/319/006 | XOLAIR 75 MG OPL V INJECTIE SPUIT 4X0,5ML | 0,11 | ML | 389,00000
0R03DXAP V | EU/1/05/319/020 | XOLAIR 75 MG OPL V INJECTIE SPUIT 6X0,5ML | 0,11 | ML | 389,00000
0R03DXAP V | EU/1/05/319/023 | XOLAIR 75 MG OPL V INJECTIE SPUIT 6X0,5ML | 0,11 | ML | 389,00000
0S01EEAG V | 129743 | ELYMBUS 0,1 MG/G OOGGEL IN VERP VOOR ÉÉNMALIG GEBR | 1,00 | STUK | 0,85267
2.
In onderdeel A worden de volgende regels vervangen door de daarbij vermelde teksten:
‘0N04BCAO V | 104991 | PRAMIPEXOL MYLAN TABLET 0,125MG (0,088MG BASE) | 20,00 | STUK | 0,46983 | ’:
0N04BCAO V | 104991 | PRAMIPEXOL VIATRIS TABLET 0,125MG (0,088MG BASE) | 20,00 | STUK | 0,46983 | ;
‘4N05AXAO V | 104455 | QUETIAPINE MYLAN TABLET FILMOMHULD 100MG | 3,00 | STUK | 1,32101 | ’:
4N05AXAO V | 104455 | QUETIAPINE VIATRIS TABLET FILMOMHULD 100MG | 3,00 | STUK | 1,32101 | ;
‘0R03DXAP V | EU/1/17/1252/002 | FASENRA INJVLST 30MG/ML PEN 1ML | 0,02 | ML | 2384,00000 | ’:
0R03DXAP V | EU/1/17/1252/002 | FASENRA INJVLST 30MG/ML PEN 1ML | 0,02 | ML | 2305,18518 | ;
‘0R03DXAP V | EU/1/17/1252/001 | FASENRA INJVLST 30MG/ML WWSP 1ML | 0,02 | ML | 2384,00000 | ’:
0R03DXAP V | EU/1/17/1252/001 | FASENRA INJVLST 30MG/ML WWSP 1ML | 0,02 | ML | 2305,18518 | ;
‘0R03DXAP V | EU/1/22/1677/003 | TEZSPIRE INJVLST 110MG/ML PEN 1,91ML | 0,07 | ML | 629,37600 | ’:
0R03DXAP V | EU/1/22/1677/003 | TEZSPIRE INJVLST 110MG/ML PEN 1,91ML | 0,07 | ML | 608,56889 | ;
‘0R03DXAP V | EU/1/22/1677/001 | TEZSPIRE INJVLST 110MG/ML WWSP 1,91ML | 0,07 | ML | 629,37600 | ’:
0R03DXAP V | EU/1/22/1677/001 | TEZSPIRE INJVLST 110MG/ML WWSP 1,91ML | 0,07 | ML | 608,56889 |
3.
In onderdeel B worden de volgende regels opgenomen:
133197//121514 | ALUTARD SQ 108 BERK VERVOLG 1FLX5ML+ 5SP
133206//121518 | ALUTARD SQ 510 HUISSTOFMIJT-2 VERVOLG 1FLX5ML+5SP
131319//11154 | LARIAM TABLET 250MG
EU/1/16/1170/001 | OLUMIANT 2 MG FILMOMHULDE TABLETTEN
EU/1/16/1170/003 | OLUMIANT 2 MG FILMOMHULDE TABLETTEN
EU/1/16/1170/004 | OLUMIANT 2 MG FILMOMHULDE TABLETTEN
EU/1/16/1170/005 | OLUMIANT 2 MG FILMOMHULDE TABLETTEN
EU/1/16/1170/007 | OLUMIANT 2 MG FILMOMHULDE TABLETTEN
EU/1/16/1170/008 | OLUMIANT 2 MG FILMOMHULDE TABLETTEN
EU/1/16/1170/009 | OLUMIANT 4 MG FILMOMHULDE TABLETTEN
EU/1/16/1170/011 | OLUMIANT 4 MG FILMOMHULDE TABLETTEN
EU/1/16/1170/012 | OLUMIANT 4 MG FILMOMHULDE TABLETTEN
EU/1/16/1170/013 | OLUMIANT 4 MG FILMOMHULDE TABLETTEN
EU/1/16/1170/015 | OLUMIANT 4 MG FILMOMHULDE TABLETTEN
EU/1/16/1170/016 | OLUMIANT 4 MG FILMOMHULDE TABLETTEN
EU/1/16/1170/002 | OLUMIANT TABLET FILMOMHULD 2MG
EU/1/16/1170/006 | OLUMIANT TABLET FILMOMHULD 2MG
EU/1/16/1170/010 | OLUMIANT TABLET FILMOMHULD 4MG
EU/1/16/1170/014 | OLUMIANT TABLET FILMOMHULD 4MG
130305//51924 | THIAMINE HCL MEDCOR INJVLST 100MG/ML AMPUL 1ML
132852//8461 | UROMITEXAN INJVLST 100MG/ML AMPUL 4ML
4.
In onderdeel B worden de volgende regels verwijderd:
EU/1/14/962/001 | MOVENTIG TABLET FILMOMHULD 12,5MG
EU/1/14/962/008 | MOVENTIG TABLET FILMOMHULD 12,5MG
EU/1/14/962/004 | MOVENTIG 25 MG FILMOMHULDE TABLETTEN
EU/1/14/962/005 | MOVENTIG TABLET FILMOMHULD 25MG
EU/1/14/962/007 | MOVENTIG TABLET FILMOMHULD 25MG
EU/1/14/962/010 | MOVENTIG TABLET FILMOMHULD 25MG
B
Aan bijlage 2 wordt een onderdeel toegevoegd, luidende:
180.

Omalizumab
Voorwaarde:
uitsluitend voor een verzekerde van zes jaar en ouder als aanvullende onderhoudsbehandeling bij patiënten met ernstig allergisch (IgE-gemedieerd) astma dat onvoldoende onder controle is, ondanks hooggedoseerde inhalatiecorticosteroïden en langwerkende β-agonisten.
De behandeling dient tenminste de eerste 6 maanden te worden uitgevoerd in het ziekenhuis.
181.

Baricitinib
Voorwaarde:
uitsluitend op voorschrift van een dermatoloog voor een verzekerde met als hoofdindicatie de behandeling van ernstige alopecia areata (AA) bij wie:
- a.
sprake is van een SALT (Severity of Alopicia Tool) score ≥ 50 én
- b.
huidige episode en ziekte-ernst van AA korter is dan 8 jaar én
- c.
de hergroei van haar onvoldoende is, ondanks de inzet van lokale middelen en ten minste één systemisch immunosuppressivum (methotrexaat, ciclosporine, prednison oraal of i.m.) in een adequate dosis voor een passende behandelduur, tenzij er aangetoonde contra-indicaties zijn voor of bijwerkingen zijn van deze middelen.
De behandeling dient na 6 maanden te worden geëvalueerd en bij onvoldoende werkzaamheid gestaakt te worden overeenkomstig de richtlijnen die in Nederland door de desbetreffende beroepsgroepen zijn aanvaard.
ARTIKEL
II
Deze regeling treedt in werking met ingang van 1 oktober 2024. Indien de Staatscourant waarin deze regeling wordt geplaatst, wordt uitgegeven na 1 oktober 2024, treedt zij in werking met ingang van de dag na de datum van uitgifte van de Staatscourant waarin zij wordt geplaatst en werkt terug tot en met 1 oktober 2024. Deze regeling zal in de Staatscourant worden geplaatst.
De Minister van Volksgezondheid, Welzijn en Sport,
M.
Agema