STAATSCOURANT
Officiële uitgave van het Koninkrijk der Nederlanden sinds 1814.
Regeling van de Staatssecretaris van Volksgezondheid, Welzijn en Sport van 25 augustus 2021, kenmerk 3231615-1012979-GMT, houdende wijziging van de bijlage bij de Regeling maximumprijzen geneesmiddelen in verband met het actualiseren van de maximumprijzen voor geneesmiddelen
De Staatssecretaris van Volksgezondheid, Welzijn en Sport,
Gelet op artikel 2 van de Wet geneesmiddelenprijzen;
Besluit:
ARTIKEL
I
De bijlage bij de Regeling maximumprijzen geneesmiddelen wordt vervangen door de bijlage bij deze regeling.
ARTIKEL
II
Deze regeling treedt in werking met ingang van 1 oktober 2021.
Deze regeling zal met de toelichting in de Staatscourant worden geplaatst.
De Staatssecretaris van Volksgezondheid, Welzijn en Sport,
P.
Blokhuis

BIJLAGE BEHORENDE BIJ ARTIKEL I

Bijlage behorende bij artikel 1 van de Regeling maximumprijzen geneesmiddelen
Registratienummer | Artikelnaam | Productgroep | Maximumprijs | Eenheid
EU/1/99/112/002 | ZIAGEN DRANK 20MG/ML | ABACAVIR-20-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,304817 | ML
117142 | ABACAVIR SANDOZ TABLET FILMOMHULD 300MG | ABACAVIR-300-MG-TABLET | 3,674371 | STUK
EU/1/99/112/001 | ZIAGEN TABLET 300MG | ABACAVIR-300-MG-TABLET | 3,674371 | STUK
EU/1/07/389/011 | ORENCIA INJVLST 125MG/ML PEN 1ML | ABATACEPT-125-MG/ML-INJ.VLOEISTOF, WWSP | 268,261220 | ML
EU/1/07/389/013 | ORENCIA INJVLST 125MG/ML WWSP 0,4ML | ABATACEPT-125-MG/ML-INJ.VLOEISTOF, WWSP | 268,261220 | ML
EU/1/07/389/014 | ORENCIA INJVLST 125MG/ML WWSP 0,7ML | ABATACEPT-125-MG/ML-INJ.VLOEISTOF, WWSP | 268,261220 | ML
EU/1/07/389/008 | ORENCIA INJVLST 125MG/ML WWSP 1ML | ABATACEPT-125-MG/ML-INJ.VLOEISTOF, WWSP | 268,261220 | ML
EU/1/07/389/001 | ORENCIA INFPDR FLACON 250MG | ABATACEPT-250-MG-POED. V. INFUSIE,FLACON | 367,740541 | STUK
EU/1/11/714/001 | ZYTIGA TABLET 250MG | ABIRATERONE-250-MG-TABLET | 22,494052 | STUK
EU/1/11/714/002 | ZYTIGA TABLET FILMOMHULD 500MG | ABIRATERONE-500-MG-TABLET | 52,096993 | STUK
EU/1/11/714/003 | ZYTIGA TABLET FILMOMHULD 500MG | ABIRATERONE-500-MG-TABLET | 52,096993 | STUK
117793//18220 | CAMPRAL TABLET MSR 333MG | ACAMPROSATE-333-MG-TABLET, MAAGSAPRESISTENT | 0,173778 | STUK
117180//18220 | CAMPRAL TABLET MSR 333MG | ACAMPROSATE-333-MG-TABLET, MAAGSAPRESISTENT | 0,177305 | STUK
114554//18220 | CAMPRAL TABLET MSR 333MG | ACAMPROSATE-333-MG-TABLET, MAAGSAPRESISTENT | 0,197005 | STUK
18220 | CAMPRAL TABLET MSR 333MG | ACAMPROSATE-333-MG-TABLET, MAAGSAPRESISTENT | 0,197005 | STUK
117339//12604 | GLUCOBAY 50 TABLET 50MG | ACARBOSE-50-MG-TABLET | 0,151626 | STUK
12604 | GLUCOBAY 50 TABLET 50MG | ACARBOSE-50-MG-TABLET | 0,151626 | STUK
24096=14225 | ACEBUTOLOL SANDOZ TABLET 200MG | ACEBUTOLOL-200-MG-TABLET | 0,124255 | STUK
14225 | ACEBUTOLOL TEVA TABLET 200MG | ACEBUTOLOL-200-MG-TABLET | 0,124255 | STUK
24097=14226 | ACEBUTOLOL SANDOZ TABLET 400MG | ACEBUTOLOL-400-MG-TABLET | 0,398701 | STUK
14226 | ACEBUTOLOL TEVA TABLET 400MG | ACEBUTOLOL-400-MG-TABLET | 0,406045 | STUK
114793 | ACECLOFENAC DOUBLE-E PHARMA TABLET FILMOMH 100MG | ACECLOFENAC-100-MG-TABLET | 0,145441 | STUK
19207 | BIOFENAC TABLET OMHULD 100MG | ACECLOFENAC-100-MG-TABLET | 0,124108 | STUK
50674 | ACENOCOUMAROL CF TABLET 1MG | ACENOCOUMAROL-1-MG-TABLET | 0,046236 | STUK
4464 | ACENOCOUMAROL SANDOZ TABLET 1MG | ACENOCOUMAROL-1-MG-TABLET | 0,053126 | STUK
4464 | ACENOCOUMAROL SANDOZ TABLET 1MG POT | ACENOCOUMAROL-1-MG-TABLET | 0,053126 | STUK
113318 | ACENOCOUMAROL TEVA TABLET 1MG | ACENOCOUMAROL-1-MG-TABLET | 0,053126 | STUK
113318 | ACENOCOUMAROL TEVA TABLET 1MG POT | ACENOCOUMAROL-1-MG-TABLET | 0,053126 | STUK
9291 | ACETAZOLAMIDE SANDOZ TABLET 250MG | ACETAZOLAMIDE-250-MG-TABLET | 0,256348 | STUK
643 | DIAMOX TABLET 250MG | ACETAZOLAMIDE-250-MG-TABLET | 0,208466 | STUK
20952 | ASPIRINE PROTECT EC TABLET MSR 100MG | ACETYLSALICYLIC ACID-100-MG-TABLET, MAAGSAPRESISTENT | 0,054996 | STUK
18843 | ACICLOVIR CF TABLET 200MG | ACICLOVIR-200-MG-TABLET | 0,229372 | STUK
19803 | ACICLOVIR SANDOZ TABLET 200MG | ACICLOVIR-200-MG-TABLET | 0,229372 | STUK
9696 | ZOVIRAX INFUSIEPOEDER FLACON 250MG | ACICLOVIR-250-MG-POED. V. INFUSIE,FLACON | 7,741812 | STUK
110589 | ACICLOVIR CLARIS INFVLST CONC 25MG/ML FL 10ML | ACICLOVIR-25-MG/ML-INFUUSVLOEISTOF, FLACON | 0,577153 | ML
110589 | ACICLOVIR CLARIS INFVLST CONC 25MG/ML FL 20ML | ACICLOVIR-25-MG/ML-INFUUSVLOEISTOF, FLACON | 0,577153 | ML
23412 | ACICLOVIR HOSPIRA INFVLST CONC 25MG/ML FL 10ML | ACICLOVIR-25-MG/ML-INFUUSVLOEISTOF, FLACON | 0,604383 | ML
23412 | ACICLOVIR HOSPIRA INFVLST CONC 25MG/ML FL 20ML | ACICLOVIR-25-MG/ML-INFUUSVLOEISTOF, FLACON | 0,604383 | ML
123780 | ACICLOVIR AGEPHA OOGZALF 30MG/G TUBE 4,5G | ACICLOVIR-30-MG/G-OOGZALF | 5,507153 | G
22477 | ACICLOVIR TEVA OOGZALF 30MG/G TUBE 4,5G | ACICLOVIR-30-MG/G-OOGZALF | 5,507153 | G
18844 | ACICLOVIR CF TABLET 400MG | ACICLOVIR-400-MG-TABLET | 0,253751 | STUK
19804 | ACICLOVIR SANDOZ TABLET 400MG | ACICLOVIR-400-MG-TABLET | 0,253751 | STUK
12162 | ZOVIRAX SUSPENSIE 40MG/ML | ACICLOVIR-40-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,256684 | ML
18845 | ACICLOVIR CF TABLET 800MG | ACICLOVIR-800-MG-TABLET | 0,495939 | STUK
19805 | ACICLOVIR SANDOZ TABLET 800MG | ACICLOVIR-800-MG-TABLET | 0,495939 | STUK
119124//13103 | NEOTIGASON CAPSULE 10MG | ACITRETIN-10-MG-CAPSULE | 0,569828 | STUK
24561//13103 | NEOTIGASON CAPSULE 10MG | ACITRETIN-10-MG-CAPSULE | 0,619809 | STUK
13103 | NEOTIGASON CAPSULE 10MG | ACITRETIN-10-MG-CAPSULE | 0,688677 | STUK
119123//13104 | NEOTIGASON CAPSULE 25MG | ACITRETIN-25-MG-CAPSULE | 1,174707 | STUK
126730//13104 | NEOTIGASON CAPSULE 25MG | ACITRETIN-25-MG-CAPSULE | 1,174707 | STUK
24562//13104 | NEOTIGASON CAPSULE 25MG | ACITRETIN-25-MG-CAPSULE | 1,336100 | STUK
13104 | NEOTIGASON CAPSULE 25MG | ACITRETIN-25-MG-CAPSULE | 1,484555 | STUK
EU/1/12/781/002 | BRETARIS GENUAIR INHALPDR 322MCG 60DO | ACLIDINIUM-0.322-MG-INHALATIEPOEDER INCL INHALER | 0,614206 | DOSIS
EU/1/12/778/002 | EKLIRA GENUAIR INHALPDR 322MCG 60DO | ACLIDINIUM-0.322-MG-INHALATIEPOEDER INCL INHALER | 0,614206 | DOSIS
EU/1/03/256/022 | HUMIRA 20 KIND INJVLST 100MG/ML WWSP 0,2ML | ADALIMUMAB-100-MG/ML-INJ.VLOEISTOF, WWSP | 1089,075274 | ML
EU/1/03/256/017 | HUMIRA 40 INJVLST 100MG/ML PEN 0,4ML | ADALIMUMAB-100-MG/ML-INJ.VLOEISTOF, WWSP | 875,033821 | ML
EU/1/03/256/013 | HUMIRA 40 INJVLST 100MG/ML WWSP 0,4ML | ADALIMUMAB-100-MG/ML-INJ.VLOEISTOF, WWSP | 875,033821 | ML
EU/1/03/256/021 | HUMIRA 80 INJVLST 100MG/ML PEN 0,8ML | ADALIMUMAB-100-MG/ML-INJ.VLOEISTOF, WWSP | 875,033821 | ML
EU/1/16/1164/001 | AMGEVITA 20 INJVLST 50MG/ML WWSP 0,4ML | ADALIMUMAB-50-MG/ML-INJ.VLOEISTOF, WWSP | 405,980080 | ML
EU/1/16/1164/003 | AMGEVITA 40 INJVLST 50MG/ML WWSP 0,8ML | ADALIMUMAB-50-MG/ML-INJ.VLOEISTOF, WWSP | 381,780784 | ML
EU/1/16/1164/007 | AMGEVITA SURECLICK 40 INJVLST 50MG/ML PEN 0,8ML | ADALIMUMAB-50-MG/ML-INJ.VLOEISTOF, WWSP | 381,780784 | ML
EU/1/18/1319/005 | HULIO 40 INJVLST 50MG/ML PEN 0,8ML | ADALIMUMAB-50-MG/ML-INJ.VLOEISTOF, WWSP | 381,780784 | ML
EU/1/18/1319/002 | HULIO 40 INJVLST 50MG/ML WWSP 0,8ML | ADALIMUMAB-50-MG/ML-INJ.VLOEISTOF, WWSP | 381,780784 | ML
EU/1/18/1286/002 | HYRIMOZ 40MG INJVLST 50MG/ML WWSP 0,8ML | ADALIMUMAB-50-MG/ML-INJ.VLOEISTOF, WWSP | 381,780784 | ML
EU/1/18/1286/005 | HYRIMOZ 40MG SENSOREADY INJVLST 50MG/ML PEN 0,8ML | ADALIMUMAB-50-MG/ML-INJ.VLOEISTOF, WWSP | 381,780784 | ML
EU/1/19/1356/003 | IDACIO 40 INJVLST 50MG/ML PEN 0,8ML | ADALIMUMAB-50-MG/ML-INJ.VLOEISTOF, WWSP | 381,780784 | ML
EU/1/19/1356/002 | IDACIO 40 INJVLST 50MG/ML WWSP 0,8ML | ADALIMUMAB-50-MG/ML-INJ.VLOEISTOF, WWSP | 381,780784 | ML
EU/1/17/1216/006 | IMRALDI 40 INJVLST 50MG/ML PEN 0,8ML | ADALIMUMAB-50-MG/ML-INJ.VLOEISTOF, WWSP | 381,780784 | ML
EU/1/17/1216/002 | IMRALDI 40 INJVLST 50MG/ML WWSP 0,8ML | ADALIMUMAB-50-MG/ML-INJ.VLOEISTOF, WWSP | 381,780784 | ML
EU/1/19/1356/001 | IDACIO 40 KIND INJVLST 50MG/ML FLACON 0,8ML+TOEBEH | ADALIMUMAB-50-MG/ML-INJECTIEVLOEISTOF, FLAC | 386,175432 | ML
110300//32496 | DIFFERIN GEL 1MG/G | ADAPALENE-1-MG/G-HUIDGEL | 0,260839 | G
32496 | DIFFERIN GEL 1MG/G | ADAPALENE-1-MG/G-HUIDGEL | 0,260839 | G
EU/1/03/251/001 | HEPSERA TABLET 10MG | ADEFOVIR-10-MG-TABLET | 12,660826 | STUK
16617 | ADENOCOR INJVLST 3MG/ML FLACON 2ML | ADENOSINE-3-MG/ML-INJECTIEVLOEISTOF, FLAC | 1,703788 | ML
EU/1/13/879/003 | GIOTRIF TABLET FILMOMHULD 20MG | AFATINIB-20-MG-TABLET | 69,784484 | STUK
EU/1/13/879/006 | GIOTRIF TABLET FILMOMHULD 30MG | AFATINIB-30-MG-TABLET | 69,784484 | STUK
EU/1/13/879/009 | GIOTRIF TABLET FILMOMHULD 40MG | AFATINIB-40-MG-TABLET | 69,784484 | STUK
EU/1/13/879/012 | GIOTRIF TABLET FILMOMHULD 50MG | AFATINIB-50-MG-TABLET | 71,721502 | STUK
EU/1/12/814/001 | ZALTRAP INFVLST CONC 25MG/ML FLACON 4ML | AFLIBERCEPT-25-MG/ML-INFUUSVLOEISTOF, FLACON | 88,890585 | ML
EU/1/12/814/003 | ZALTRAP INFVLST CONC 25MG/ML FLACON 8ML | AFLIBERCEPT-25-MG/ML-INFUUSVLOEISTOF, FLACON | 88,890585 | ML
EU/1/12/797/002 | EYLEA INJECTIEVLOEISTOF 40MG/ML FLACON 0,1ML | AFLIBERCEPT-4-MG-INJECTIEVLOEISTOF, FLAC | 762,039908 | STUK
EU/1/01/189/001 | REPLAGAL INFVLST CONC 1MG/ML FLACON 3,5ML | AGALSIDASE ALFA-1-MG/ML-INFUUSVLOEISTOF, FLACON | 415,281185 | ML
EU/1/01/189/003 | REPLAGAL INFVLST CONC 1MG/ML FLACON 3,5ML | AGALSIDASE ALFA-1-MG/ML-INFUUSVLOEISTOF, FLACON | 415,281185 | ML
EU/1/01/188/001 | FABRAZYME INFUSIEPOEDER FLACON 35MG | AGALSIDASE BETA-35-MG-POED. V. INFUSIE,FLACON | 2886,340775 | STUK
EU/1/01/188/004 | FABRAZYME INFUSIEPOEDER FLACON 5MG | AGALSIDASE BETA-5-MG-POED. V. INFUSIE,FLACON | 402,692457 | STUK
121107 | AGOMELATINE GLENMARK TABLET FILMOMHULD 25MG | AGOMELATINE-25-MG-TABLET | 1,077863 | STUK
EU/1/08/499/003 | VALDOXAN TABLET FILMOMHULD 25MG | AGOMELATINE-25-MG-TABLET | 1,077863 | STUK
EU/1/16/1169/001 | ALECENSA CAPSULE 150MG | ALECTINIB-150-MG-CAPSULE | 24,282068 | STUK
EU/1/16/1169/002 | ALECENSA CAPSULE 150MG | ALECTINIB-150-MG-CAPSULE | 24,282068 | STUK
EU/1/13/869/001 | LEMTRADA INFVLST CONC 10MG/ML FLACON 1,2ML | ALEMTUZUMAB-10-MG/ML-INFUUSVLOEISTOF, FLACON | 6168,287895 | ML
105077 | BONASOL EENMAAL PER WEEK DR 70MG/100ML(0,7MG/ML)FL | ALENDRONIC ACID-0.7-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,056420 | ML
122701//105077 | BONASOL EENMAAL PER WEEK DR 70MG/100ML(0,7MG/ML)FL | ALENDRONIC ACID-0.7-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,056420 | ML
125018//105077 | BONASOL EENMAAL PER WEEK DR 70MG/100ML(0,7MG/ML)FL | ALENDRONIC ACID-0.7-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,056420 | ML
126614//105077 | BONASOL EENMAAL PER WEEK DR 70MG/100ML(0,7MG/ML)FL | ALENDRONIC ACID-0.7-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,056420 | ML
100473 | ALENDRONINEZUUR ACCORD TABLET 10MG | ALENDRONIC ACID-10-MG-TABLET | 0,412694 | STUK
31768 | ALENDRONINEZUUR PCH TABLET 10MG | ALENDRONIC ACID-10-MG-TABLET | 0,412694 | STUK
30270 | ALENDRONINEZUUR MYLAN TABLET 70MG | ALENDRONIC ACID-70-MG-TABLET | 1,740457 | STUK
32960 | ALENDRONINEZUUR PCH TABLET 70MG | ALENDRONIC ACID-70-MG-TABLET | 1,935579 | STUK
26202 | FOSAMAX TABLET 70MG | ALENDRONIC ACID-70-MG-TABLET | 1,935579 | STUK
EU/1/15/1006/001 | RESPREEZA INFPDR FLACON 1000MG +SOLV 20ML +TOEBEH | ALFA-1-PROTEINASEREMMER, HUMAAN-1000-MG-POED. V. INFUSIE,FLACON | 305,830636 | STUK
8318 | ETALPHA LEO CAPSULE 0,25MCG | ALFACALCIDOL-.00025-MG-CAPSULE | 0,164738 | STUK
22263 | ETALPHA LEO CAPSULE 0,5MCG | ALFACALCIDOL-.0005-MG-CAPSULE | 0,292196 | STUK
7603 | ETALPHA LEO CAPSULE 1MCG | ALFACALCIDOL-.001-MG-CAPSULE | 0,471170 | STUK
115592//14698 | ETALPHA INJVLST 2MCG/ML AMPUL 0,5ML | ALFACALCIDOL-.002-MG/ML-INJ.VLOEISTOF AMPUL | 6,632648 | ML
14698 | ETALPHA INJVLST 2MCG/ML AMPUL 0,5ML | ALFACALCIDOL-.002-MG/ML-INJ.VLOEISTOF AMPUL | 7,761932 | ML
9284 | ETALPHA LEO DRUPPELS 2MCG/ML | ALFACALCIDOL-.002-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 1,568989 | ML
123698 | ALFENTANIL KALCEKS INJ/INFVLST 0,5MG/ML AMPUL 10ML | ALFENTANIL-.5-MG/ML-INJ.VLOEISTOF AMPUL | 0,305242 | ML
123698 | ALFENTANIL KALCEKS INJ/INFVLST 0,5MG/ML AMPUL 2ML | ALFENTANIL-.5-MG/ML-INJ.VLOEISTOF AMPUL | 0,305242 | ML
9860 | RAPIFEN INJVLST 0,5MG/ML AMPUL 2ML | ALFENTANIL-.5-MG/ML-INJ.VLOEISTOF AMPUL | 0,350188 | ML
9860 | RAPIFEN INJVLST 0,5MG/ML AMPUL 10ML | ALFENTANIL-.5-MG/ML-INJ.VLOEISTOF AMPUL | 0,350188 | ML
31128 | ALFUZOSINE HCL CF TABLET MVA 10MG | ALFUZOSIN-10-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,477859 | STUK
33407 | ALFUZOSINE HCL MYLAN RETARD TABLET MVA 10MG | ALFUZOSIN-10-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,502794 | STUK
33134 | ALFUZOSINE HCL SANDOZ RETARD TABLET MVA 10MG | ALFUZOSIN-10-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,502794 | STUK
125753//23923 | XATRAL XR TABLET MVA 10MG | ALFUZOSIN-10-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,470791 | STUK
23923 | XATRAL XR TABLET MVA 10MG | ALFUZOSIN-10-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,502794 | STUK
31635 | ALFUZOSINE HCL PCH TABLET 2,5MG | ALFUZOSIN-2.5-MG-TABLET | 0,291858 | STUK
EU/1/06/333/002 | MYOZYME INFUSIEPOEDER FLACON 50MG | ALGLUCOSIDASE ALFA-50-MG-POED. V. INFUSIE,FLACON | 432,397488 | STUK
EU/1/15/1031/007 | PRALUENT INJVLST 150MG/ML PEN 1ML | ALIROCUMAB-150-MG-INJ.VLOEISTOF, WWSP | 210,102126 | STUK
EU/1/15/1031/008 | PRALUENT INJVLST 150MG/ML PEN 1ML | ALIROCUMAB-150-MG-INJ.VLOEISTOF, WWSP | 210,102126 | STUK
EU/1/15/1031/001 | PRALUENT INJVLST 75MG/ML PEN 1ML | ALIROCUMAB-75-MG-INJ.VLOEISTOF, WWSP | 210,102126 | STUK
EU/1/15/1031/002 | PRALUENT INJVLST 75MG/ML PEN 1ML | ALIROCUMAB-75-MG-INJ.VLOEISTOF, WWSP | 210,102126 | STUK
EU/1/07/405/021 | RASILEZ TABLET FILMOMHULD 150MG | ALISKIREN-150-MG-TABLET | 0,962404 | STUK
EU/1/07/405/022 | RASILEZ TABLET FILMOMHULD 150MG | ALISKIREN-150-MG-TABLET | 0,962404 | STUK
EU/1/07/405/023 | RASILEZ TABLET FILMOMHULD 150MG | ALISKIREN-150-MG-TABLET | 0,962404 | STUK
100957 | TOCTINO CAPSULE 10MG | ALITRETINOIN-10-MG-CAPSULE | 14,577568 | STUK
119812//100957 | TOCTINO CAPSULE 10MG | ALITRETINOIN-10-MG-CAPSULE | 14,577568 | STUK
125621//100957 | TOCTINO CAPSULE 10MG | ALITRETINOIN-10-MG-CAPSULE | 14,577568 | STUK
121498 | ALIZEM CAPSULE 30MG | ALITRETINOIN-30-MG-CAPSULE | 14,577568 | STUK
100962 | TOCTINO CAPSULE 30MG | ALITRETINOIN-30-MG-CAPSULE | 14,577568 | STUK
119813//100962 | TOCTINO CAPSULE 30MG | ALITRETINOIN-30-MG-CAPSULE | 14,577568 | STUK
125617//100962 | TOCTINO CAPSULE 30MG | ALITRETINOIN-30-MG-CAPSULE | 14,577568 | STUK
52185 | ALLOPURINOL APOTEX TABLET 100MG | ALLOPURINOL-100-MG-TABLET | 0,054593 | STUK
20406 | ALLOPURINOL AUROBINDO TABLET 100MG | ALLOPURINOL-100-MG-TABLET | 0,054593 | STUK
104252 | ALLOPURINOL PCH TABLET 100MG | ALLOPURINOL-100-MG-TABLET | 0,054593 | STUK
6846 | ALLOPURINOL SANDOZ TABLET 100MG | ALLOPURINOL-100-MG-TABLET | 0,054593 | STUK
5431 | ZYLORIC TABLET 100MG | ALLOPURINOL-100-MG-TABLET | 0,054593 | STUK
57732 | ALLOPURINOL APOTEX TABLET 300MG | ALLOPURINOL-300-MG-TABLET | 0,098126 | STUK
20407 | ALLOPURINOL AUROBINDO TABLET 300MG | ALLOPURINOL-300-MG-TABLET | 0,098126 | STUK
28894=57732 | ALLOPURINOL MYLAN TABLET 300MG | ALLOPURINOL-300-MG-TABLET | 0,083061 | STUK
104257 | ALLOPURINOL PCH TABLET 300MG | ALLOPURINOL-300-MG-TABLET | 0,098126 | STUK
7210 | ALLOPURINOL SANDOZ TABLET 300MG | ALLOPURINOL-300-MG-TABLET | 0,098126 | STUK
7238 | ZYLORIC TABLET 300MG | ALLOPURINOL-300-MG-TABLET | 0,098126 | STUK
123675//25415 | ALMOGRAN TABLET OMHULD 12,5MG | ALMOTRIPTAN-12.5-MG-TABLET | 3,126421 | STUK
25415 | ALMOGRAN TABLET OMHULD 12,5MG | ALMOTRIPTAN-12.5-MG-TABLET | 3,126421 | STUK
111429 | ALMOTRIPTAN SANDOZ TABLET FILMOMHULD 12,5MG | ALMOTRIPTAN-12.5-MG-TABLET | 3,126421 | STUK
21619 | ALPRAZOLAM AUROBINDO TABLET 0,25MG | ALPRAZOLAM-.25-MG-TABLET | 0,063671 | STUK
31119 | ALPRAZOLAM CF TABLET 0,25MG | ALPRAZOLAM-.25-MG-TABLET | 0,062614 | STUK
20953 | ALPRAZOLAM MYLAN TABLET 0,25MG | ALPRAZOLAM-.25-MG-TABLET | 0,063671 | STUK
21819 | ALPRAZOLAM PCH TABLET 0,25MG | ALPRAZOLAM-.25-MG-TABLET | 0,063671 | STUK
21620 | ALPRAZOLAM AUROBINDO TABLET 0,5MG | ALPRAZOLAM-.5-MG-TABLET | 0,103099 | STUK
31120 | ALPRAZOLAM CF TABLET 0,5MG | ALPRAZOLAM-.5-MG-TABLET | 0,092537 | STUK
20954 | ALPRAZOLAM MYLAN TABLET 0,5MG | ALPRAZOLAM-.5-MG-TABLET | 0,103099 | STUK
21820 | ALPRAZOLAM PCH TABLET 0,5MG | ALPRAZOLAM-.5-MG-TABLET | 0,103099 | STUK
10041 | PROSTIN E1 VR INFVLST CONC 0,5MG/ML AMPUL 1ML | ALPROSTADIL-0.5-MG/ML-INFUUSVLOEISTOF, PATROON | 84,197036 | ML
12247 | ACTILYSE INFUSIEPOEDER FLACON 20MG + SOLVENS 20ML | ALTEPLASE-20-MG-POED. V. INJECTIE, FLACON | 262,983804 | STUK
113773//12248 | ACTILYSE INFUSIEPOEDER FLACON 50MG + SOLVENS 50ML | ALTEPLASE-50-MG-POED. V. INJECTIE, FLACON | 500,126112 | STUK
117014//12248 | ACTILYSE INFUSIEPOEDER FLACON 50MG + SOLVENS 50ML | ALTEPLASE-50-MG-POED. V. INJECTIE, FLACON | 500,126112 | STUK
117015//12248 | ACTILYSE INFUSIEPOEDER FLACON 50MG + SOLVENS 50ML | ALTEPLASE-50-MG-POED. V. INJECTIE, FLACON | 500,126112 | STUK
118738//12248 | ACTILYSE INFUSIEPOEDER FLACON 50MG + SOLVENS 50ML | ALTEPLASE-50-MG-POED. V. INJECTIE, FLACON | 500,126112 | STUK
12248 | ACTILYSE INFUSIEPOEDER FLACON 50MG + SOLVENS 50ML | ALTEPLASE-50-MG-POED. V. INJECTIE, FLACON | 500,126112 | STUK
122903//12248 | ACTILYSE INFUSIEPOEDER FLACON 50MG + SOLVENS 50ML | ALTEPLASE-50-MG-POED. V. INJECTIE, FLACON | 500,126112 | STUK
123324//12248 | ACTILYSE INFUSIEPOEDER FLACON 50MG + SOLVENS 50ML | ALTEPLASE-50-MG-POED. V. INJECTIE, FLACON | 500,126112 | STUK
124545//12248 | ACTILYSE INFUSIEPOEDER FLACON 50MG + SOLVENS 50ML | ALTEPLASE-50-MG-POED. V. INJECTIE, FLACON | 500,126112 | STUK
125844//12248 | ACTILYSE INFUSIEPOEDER FLACON 50MG + SOLVENS 50ML | ALTEPLASE-50-MG-POED. V. INJECTIE, FLACON | 500,126112 | STUK
119789//5352 | SYMMETREL CAPSULE 100MG | AMANTADINE-100-MG-CAPSULE | 0,595062 | STUK
126809//5352 | SYMMETREL CAPSULE 100MG | AMANTADINE-100-MG-CAPSULE | 0,595062 | STUK
27528//5352 | SYMMETREL CAPSULE 100MG | AMANTADINE-100-MG-CAPSULE | 0,595062 | STUK
5352 | SYMMETREL CAPSULE 100MG | AMANTADINE-100-MG-CAPSULE | 0,595062 | STUK
123327 | AMBRISENTAN CF TABLET FILMOMHULD 10MG | AMBRISENTAN-10-MG-TABLET | 53,797803 | STUK
EU/1/08/451/004 | VOLIBRIS TABLET FILMOMHULD 10MG | AMBRISENTAN-10-MG-TABLET | 76,785329 | STUK
123326 | AMBRISENTAN CF TABLET FILMOMHULD 5MG | AMBRISENTAN-5-MG-TABLET | 53,387398 | STUK
EU/1/19/1368/002 | AMBRISENTAN MYLAN TABLET FILMOMHULD 5MG | AMBRISENTAN-5-MG-TABLET | 53,387398 | STUK
EU/1/08/451/002 | VOLIBRIS TABLET FILMOMHULD 5MG | AMBRISENTAN-5-MG-TABLET | 48,000624 | STUK
EU/1/09/601/001 | FIRDAPSE TABLET 10MG | AMIFAMPRIDINE-10-MG-TABLET | 21,394983 | STUK
22424 | AMIKACINE HOSPIRA INJVLST 250MG/ML FL 2ML | AMIKACIN-250-MG/ML-INJECTIEVLOEISTOF, FLAC | 23,879508 | ML
EU/1/07/413/001 | GLIOLAN POEDER VOOR DRANK FLACON 1500MG | AMINOLEVULINIC ACID-30-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 22,276908 | ML
113539 | ALACARE PLEISTER 8MG | AMINOLEVULINIC ACID-8-MG-PLEISTER, DERMAAL | 40,839528 | STUK
24101=57505 | AMIODARON HCL MYLAN TABLET 200MG | AMIODARONE-200-MG-TABLET | 0,168753 | STUK
21966 | AMIODARON HCL SANDOZ TABLET 200MG | AMIODARONE-200-MG-TABLET | 0,244594 | STUK
57505 | AMIODARON HCL TEVA TABLET 200MG | AMIODARONE-200-MG-TABLET | 0,244594 | STUK
32850 | AMIODARON HCL HIKMA INJVLST 50MG/ML AMPUL 3ML | AMIODARONE-50-MG/ML-INJ.VLOEISTOF AMPUL | 0,385017 | ML
107084 | AMITRIPTYLINE BB TABLET FILMOMHULD 10MG | AMITRIPTYLINE-10-MG-TABLET | 0,032569 | STUK
52186 | AMITRIPTYLINE HCL APOTEX TABLET 10MG | AMITRIPTYLINE-10-MG-TABLET | 0,042070 | STUK
52947 | AMITRIPTYLINE HCL CF TABLET 10MG | AMITRIPTYLINE-10-MG-TABLET | 0,040165 | STUK
110148 | AMITRIPTYLINE HCL TEVA TABLET 10MG | AMITRIPTYLINE-10-MG-TABLET | 0,042070 | STUK
107092 | AMITRIPTYLINE BB TABLET FILMOMHULD 25MG | AMITRIPTYLINE-25-MG-TABLET | 0,045288 | STUK
117611 | AMITRIPTYLINE EXPHARMA TABLET FILMOMHULD 25MG | AMITRIPTYLINE-25-MG-TABLET | 0,045288 | STUK
52187 | AMITRIPTYLINE HCL APOTEX TABLET 25MG | AMITRIPTYLINE-25-MG-TABLET | 0,055749 | STUK
52948 | AMITRIPTYLINE HCL CF TABLET 25MG | AMITRIPTYLINE-25-MG-TABLET | 0,055749 | STUK
110150 | AMITRIPTYLINE HCL TEVA TABLET 25MG | AMITRIPTYLINE-25-MG-TABLET | 0,055749 | STUK
30076 | AMLODIPINE AUROBINDO TABLET 10MG | AMLODIPINE-10-MG-TABLET | 0,157740 | STUK
101560 | AMLODIPINE PCH TABLET 10MG (ALS BESILAAT) | AMLODIPINE-10-MG-TABLET | 0,157740 | STUK
34065 | AMLODIPINE SANDOZ TABLET 10MG (ALS BESILAAT) | AMLODIPINE-10-MG-TABLET | 0,157740 | STUK
13349 | NORVASC TABLET 10MG | AMLODIPINE-10-MG-TABLET | 0,157090 | STUK
119897 | OLMESARTANMEDOXOMIL/AMLODIPINE TEVA TAB FO 40/10MG | AMLODIPINE-10-MG-TABLET-OLMESARTAN-40-MG-TABLET | 0,601883 | STUK
100987 | SEVIKAR TABLET FILMOMHULD 40/10MG | AMLODIPINE-10-MG-TABLET-OLMESARTAN-40-MG-TABLET | 0,592265 | STUK
100142 | COVERAM ARG TABLET 10MG/10MG | AMLODIPINE-10-MG-TABLET-PERINDOPRIL-10-MG-TABLET | 0,474446 | STUK
113219 | PERINDOPRIL TOSILAAT/AMLODIPINE TEVA TABL 10/10MG | AMLODIPINE-10-MG-TABLET-PERINDOPRIL-10-MG-TABLET | 0,474446 | STUK
100140 | COVERAM ARG TABLET 5MG/10MG | AMLODIPINE-10-MG-TABLET-PERINDOPRIL-5-MG-TABLET | 0,339218 | STUK
113217 | PERINDOPRIL TOSILAAT/AMLODIPINE TEVA TABL 5/10MG | AMLODIPINE-10-MG-TABLET-PERINDOPRIL-5-MG-TABLET | 0,339218 | STUK
116949 | AMLODIPINE/VALSARTAN SANDOZ TABL FILMOMH 10/160MG | AMLODIPINE-10-MG-TABLET-VALSARTAN-160-MG-TABLET | 0,836061 | STUK
EU/1/06/372/019 | COPALIA TABLET FILMOMHULD 10/160MG | AMLODIPINE-10-MG-TABLET-VALSARTAN-160-MG-TABLET | 0,836061 | STUK
EU/1/06/370/018 | EXFORGE TABLET FILMOMHULD 10/160MG | AMLODIPINE-10-MG-TABLET-VALSARTAN-160-MG-TABLET | 0,836061 | STUK
EU/1/06/370/019 | EXFORGE TABLET FILMOMHULD 10/160MG | AMLODIPINE-10-MG-TABLET-VALSARTAN-160-MG-TABLET | 0,836061 | STUK
30075 | AMLODIPINE AUROBINDO TABLET 5MG | AMLODIPINE-5-MG-TABLET | 0,092100 | STUK
101557 | AMLODIPINE PCH TABLET 5MG (ALS BESILAAT) | AMLODIPINE-5-MG-TABLET | 0,092100 | STUK
34063 | AMLODIPINE SANDOZ TABLET 5MG (ALS BESILAAT) | AMLODIPINE-5-MG-TABLET | 0,092100 | STUK
13348 | NORVASC TABLET 5MG | AMLODIPINE-5-MG-TABLET | 0,092100 | STUK
119893 | OLMESARTANMEDOXOMIL/AMLODIPINE TEVA TAB FO 20/5MG | AMLODIPINE-5-MG-TABLET-OLMESARTAN-20-MG-TABLET | 0,543148 | STUK
100984 | SEVIKAR TABLET FILMOMHULD 20/ 5MG | AMLODIPINE-5-MG-TABLET-OLMESARTAN-20-MG-TABLET | 0,541561 | STUK
119896 | OLMESARTANMEDOXOMIL/AMLODIPINE TEVA TAB FO 40/5MG | AMLODIPINE-5-MG-TABLET-OLMESARTAN-40-MG-TABLET | 0,567665 | STUK
100986 | SEVIKAR TABLET FILMOMHULD 40/ 5MG | AMLODIPINE-5-MG-TABLET-OLMESARTAN-40-MG-TABLET | 0,562350 | STUK
100141 | COVERAM ARG TABLET 10MG/ 5MG | AMLODIPINE-5-MG-TABLET-PERINDOPRIL-10-MG-TABLET | 0,419958 | STUK
113218 | PERINDOPRIL TOSILAAT/AMLODIPINE TEVA TABL 10/ 5MG | AMLODIPINE-5-MG-TABLET-PERINDOPRIL-10-MG-TABLET | 0,419958 | STUK
100139 | COVERAM ARG TABLET 5MG/ 5MG | AMLODIPINE-5-MG-TABLET-PERINDOPRIL-5-MG-TABLET | 0,405745 | STUK
113216 | PERINDOPRIL TOSILAAT/AMLODIPINE TEVA TABL 5/ 5MG | AMLODIPINE-5-MG-TABLET-PERINDOPRIL-5-MG-TABLET | 0,405745 | STUK
116948 | AMLODIPINE/VALSARTAN SANDOZ TABL FILMOMH 5/160MG | AMLODIPINE-5-MG-TABLET-VALSARTAN-160-MG-TABLET | 0,809656 | STUK
EU/1/06/372/011 | COPALIA TABLET FILMOMHULD 5/160MG | AMLODIPINE-5-MG-TABLET-VALSARTAN-160-MG-TABLET | 0,809656 | STUK
EU/1/06/372/013 | COPALIA TABLET FILMOMHULD 5/160MG | AMLODIPINE-5-MG-TABLET-VALSARTAN-160-MG-TABLET | 0,809656 | STUK
EU/1/06/370/010 | EXFORGE TABLET FILMOMHULD 5/160MG | AMLODIPINE-5-MG-TABLET-VALSARTAN-160-MG-TABLET | 0,809656 | STUK
EU/1/06/370/011 | EXFORGE TABLET FILMOMHULD 5/160MG | AMLODIPINE-5-MG-TABLET-VALSARTAN-160-MG-TABLET | 0,809656 | STUK
EU/1/06/370/012 | EXFORGE TABLET FILMOMHULD 5/160MG | AMLODIPINE-5-MG-TABLET-VALSARTAN-160-MG-TABLET | 0,809656 | STUK
116945 | AMLODIPINE/VALSARTAN SANDOZ TABL FILMOMH 5/ 80MG | AMLODIPINE-5-MG-TABLET-VALSARTAN-80-MG-TABLET | 0,647730 | STUK
EU/1/06/372/005 | COPALIA TABLET FILMOMHULD 5/ 80MG | AMLODIPINE-5-MG-TABLET-VALSARTAN-80-MG-TABLET | 0,647730 | STUK
EU/1/06/370/002 | EXFORGE TABLET FILMOMHULD 5/ 80MG | AMLODIPINE-5-MG-TABLET-VALSARTAN-80-MG-TABLET | 0,647730 | STUK
EU/1/06/370/003 | EXFORGE TABLET FILMOMHULD 5/ 80MG | AMLODIPINE-5-MG-TABLET-VALSARTAN-80-MG-TABLET | 0,647730 | STUK
122774 | AMOXICILLINE DISP TEVA TABLET 1000MG | AMOXICILLIN-1000-MG-BRUISTABLET | 0,583458 | STUK
26686 | AMOXICILLINE DISPER SANDOZ TABLET 1000MG | AMOXICILLIN-1000-MG-BRUISTABLET | 0,583458 | STUK
106885 | AMOXICILLINE AUROBINDO INJPDR FLACON 1000MG | AMOXICILLIN-1000-MG-POED. V. INJECTIE, FLACON | 1,559032 | STUK
57326 | AMOXICILLINE CF INJECTIEPOEDER FLACON 1000MG | AMOXICILLIN-1000-MG-POED. V. INJECTIE, FLACON | 1,559032 | STUK
27998 | AMOXI/CLAV PCH INJPDR FLACON 1000/200MG | AMOXICILLIN-1000-MG-POED. V. INJECTIE, FLACON-CLAVULANIC ACID-200-MG-POED. V. INJECTIE, FLACON | 3,081004 | STUK
28025 | AMOXI/CLAV SANDOZ INJPDR FLACON 1000/200MG | AMOXICILLIN-1000-MG-POED. V. INJECTIE, FLACON-CLAVULANIC ACID-200-MG-POED. V. INJECTIE, FLACON | 2,629888 | STUK
27999 | AMOXI/CLAV PCH INFPDR FLACON 2000/200MG | AMOXICILLIN-2000-MG-POED. V. INJECTIE, FLACON-CLAVULANIC ACID-200-MG-POED. V. INJECTIE, FLACON | 4,953667 | STUK
29702 | AMOXICILLINE SANDOZ POEDER V SUSPENSIE 125MG/5ML | AMOXICILLIN-25-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,031615 | ML
121961 | AMOXICILLINE TEVA POEDER VOOR SUSPENSIE 125MG/5ML | AMOXICILLIN-25-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,031615 | ML
11217 | AMOXICILLINE MYLAN CAPSULE 500MG | AMOXICILLIN-500-MG-CAPSULE | 0,211969 | STUK
25942 | AMOXICILLINE SANDOZ CAPSULE 500MG | AMOXICILLIN-500-MG-CAPSULE | 0,211969 | STUK
14459 | AMOXICILLINE TEVA CAPSULE 500MG | AMOXICILLIN-500-MG-CAPSULE | 0,211969 | STUK
29420 | AMOXI/CLAV PCH INJPDR FLACON 500/ 50MG | AMOXICILLIN-500-MG-POED. V. INJECTIE, FLACON-CLAVULANIC ACID-50-MG-POED. V. INJECTIE, FLACON | 0,907000 | STUK
29725 | AMOXI/CLAV SANDOZ INJPDR FLACON 500/ 50MG | AMOXICILLIN-500-MG-POED. V. INJECTIE, FLACON-CLAVULANIC ACID-50-MG-POED. V. INJECTIE, FLACON | 0,907000 | STUK
9840 | AUGMENTIN TABLET 500/125MG | AMOXICILLIN-500-MG-TABLET-CLAVULANIC ACID-125-MG-TABLET | 0,592442 | STUK
29703 | AMOXICILLINE SANDOZ POEDER V SUSPENSIE 250MG/5ML | AMOXICILLIN-50-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,045094 | ML
121962 | AMOXICILLINE TEVA FORTE PDR V SUSP 250MG/5ML | AMOXICILLIN-50-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,045094 | ML
26685 | AMOXICILLINE DISPER SANDOZ TABLET 750MG | AMOXICILLIN-750-MG-BRUISTABLET | 0,418841 | STUK
125987//15610 | AMBISOME INFUSIEPOEDER FLACON 50MG | AMPHOTERICIN LIPOSOMAAL-50-MG-POED. V. INFUSIE,FLACON | 106,776858 | STUK
15610 | AMBISOME INFUSIEPOEDER FLACON 50MG | AMPHOTERICIN LIPOSOMAAL-50-MG-POED. V. INFUSIE,FLACON | 106,776858 | STUK
20805 | ABELCET INFVLST CONC 5MG/ML FLACON 20ML | AMPHOTERICIN LIPOSOMAAL-5-MG/ML-INFUUSVLOEISTOF, FLACON | 5,618109 | ML
9084 | AMSIDINE INFVLST CONC 50MG/ML FL 1,5ML+SOLV 13,5ML | AMSACRINE-50-MG/ML-INJ.VLOEISTOF AMPUL | 147,464093 | ML
120302 | ANAGRELIDE ACCORD CAPSULE 0,5MG | ANAGRELIDE-.5-MG-CAPSULE | 3,115147 | STUK
120312 | ANAGRELIDE GLENMARK CAPSULE 0,5MG | ANAGRELIDE-.5-MG-CAPSULE | 3,115147 | STUK
120313 | ANAGRELIDE SANDOZ CAPSULE 0,5MG | ANAGRELIDE-.5-MG-CAPSULE | 3,115147 | STUK
120307 | ANAGRELIDE TEVA CAPSULE 0,5MG | ANAGRELIDE-.5-MG-CAPSULE | 3,115147 | STUK
EU/1/04/295/001 | XAGRID CAPSULE 0,5MG | ANAGRELIDE-.5-MG-CAPSULE | 3,115147 | STUK
EU/1/02/203/002 | KINERET 100 INJVLST 150MG/ML WWSP 0,67ML | ANAKINRA-150-MG/ML-INJ.VLOEISTOF, WWSP | 46,556136 | ML
EU/1/02/203/003 | KINERET 100 INJVLST 150MG/ML WWSP 0,67ML | ANAKINRA-150-MG/ML-INJ.VLOEISTOF, WWSP | 46,556136 | ML
EU/1/02/203/006 | KINERET 100 INJVLST 150MG/ML WWSP 0,67ML | ANAKINRA-150-MG/ML-INJ.VLOEISTOF, WWSP | 46,556136 | ML
34003 | ANASTROZOL SYNTHON TABLET FILMOMHULD 1MG | ANASTROZOLE-1-MG-TABLET | 1,042595 | STUK
19123 | ARIMIDEX TABLET FILMOMHULD 1MG | ANASTROZOLE-1-MG-TABLET | 1,042595 | STUK
120607 | ANIDULAFUNGINE CF INFPDR FLACON 100MG | ANIDULAFUNGINE-100-MG-POED. V. INFUSIE,FLACON | 285,224371 | STUK
122931 | ANIDULAFUNGINE FRESENIUS KABI INFPDR FLACON 100MG | ANIDULAFUNGINE-100-MG-POED. V. INFUSIE,FLACON | 285,224371 | STUK
120603 | ANIDULAFUNGINE TEVA INFPDR FLACON 100MG | ANIDULAFUNGINE-100-MG-POED. V. INFUSIE,FLACON | 285,224371 | STUK
EU/1/07/416/002 | ECALTA INFPDR FLACON 100MG | ANIDULAFUNGINE-100-MG-POED. V. INFUSIE,FLACON | 285,224371 | STUK
EU/1/11/691/002 | ELIQUIS TABLET FILMOMHULD 2,5MG | APIXABAN-2.5-MG-TABLET | 1,085890 | STUK
EU/1/11/691/003 | ELIQUIS TABLET FILMOMHULD 2,5MG | APIXABAN-2.5-MG-TABLET | 1,085890 | STUK
EU/1/11/691/005 | ELIQUIS TABLET FILMOMHULD 2,5MG | APIXABAN-2.5-MG-TABLET | 1,085890 | STUK
EU/1/11/691/015 | ELIQUIS TABLET FILMOMHULD 2,5MG | APIXABAN-2.5-MG-TABLET | 1,085890 | STUK
EU/1/11/691/006 | ELIQUIS TABLET FILMOMHULD 5MG | APIXABAN-5-MG-TABLET | 1,085973 | STUK
EU/1/11/691/008 | ELIQUIS TABLET FILMOMHULD 5MG | APIXABAN-5-MG-TABLET | 1,085973 | STUK
EU/1/11/691/009 | ELIQUIS TABLET FILMOMHULD 5MG | APIXABAN-5-MG-TABLET | 1,085973 | STUK
EU/1/11/691/010 | ELIQUIS TABLET FILMOMHULD 5MG | APIXABAN-5-MG-TABLET | 1,085973 | STUK
EU/1/11/691/011 | ELIQUIS TABLET FILMOMHULD 5MG | APIXABAN-5-MG-TABLET | 1,085973 | STUK
EU/1/11/691/012 | ELIQUIS TABLET FILMOMHULD 5MG | APIXABAN-5-MG-TABLET | 1,085973 | STUK
EU/1/11/691/014 | ELIQUIS TABLET FILMOMHULD 5MG | APIXABAN-5-MG-TABLET | 1,085973 | STUK
109039 | APO-GO INF/INJVLST 10MG/ML AMPUL 5ML | APOMORPHINE-10-MG/ML-INJ.VLOEISTOF AMPUL | 5,614990 | ML
112181 | APOMORFINE HCL PHARMSWED INFVLST 5MG/ML FLAC 20ML | APOMORPHINE-5-MG/ML-INFUUSVLOEISTOF, FLACON | 1,707571 | ML
112999 | DACEPTON INFVLST 5MG/ML FLACON 20ML | APOMORPHINE-5-MG/ML-INFUUSVLOEISTOF, FLACON | 1,963335 | ML
117327//35295 | APO-GO INFVLST 5MG/ML WWSP 10ML | APOMORPHINE-5-MG/ML-INFUUSVLOEISTOF, WWSP | 1,715631 | ML
35295 | APO-GO INFVLST 5MG/ML WWSP 10ML | APOMORPHINE-5-MG/ML-INFUUSVLOEISTOF, WWSP | 1,715631 | ML
120992//19708 | IOPIDINE OOGDRUPPELS 10MG/ML TUBE 0,25ML | APRACLONIDINE-10-MG/ML-OOGDRUPPELS UNITDOSE | 17,956760 | ML
121605//19708 | IOPIDINE OOGDRUPPELS 10MG/ML TUBE 0,25ML | APRACLONIDINE-10-MG/ML-OOGDRUPPELS UNITDOSE | 17,956760 | ML
124006//19708 | IOPIDINE OOGDRUPPELS 10MG/ML TUBE 0,25ML | APRACLONIDINE-10-MG/ML-OOGDRUPPELS UNITDOSE | 17,956760 | ML
126913//19708 | IOPIDINE OOGDRUPPELS 10MG/ML TUBE 0,25ML | APRACLONIDINE-10-MG/ML-OOGDRUPPELS UNITDOSE | 17,956760 | ML
19708 | IOPIDINE OOGDRUPPELS 10MG/ML TUBE 0,25ML | APRACLONIDINE-10-MG/ML-OOGDRUPPELS UNITDOSE | 18,930415 | ML
117618//16925 | IOPIDINE OOGDRUPPELS 5MG/ML FLACON 5ML | APRACLONIDINE-5-MG/ML-OOGDRUPPELS | 2,901635 | ML
119048//16925 | IOPIDINE OOGDRUPPELS 5MG/ML FLACON 5ML | APRACLONIDINE-5-MG/ML-OOGDRUPPELS | 2,901635 | ML
16925 | IOPIDINE OOGDRUPPELS 5MG/ML FLACON 5ML | APRACLONIDINE-5-MG/ML-OOGDRUPPELS | 2,901635 | ML
EU/1/14/981/001 | OTEZLA STARTVERPAKKING (4X10MG+4X20MG+19X30MG) | APREMILAST-10-MG-TABLET-APREMILAST FASE 2-20-MG-TABLET-APREMILAST FASE 3-30-MG-TABLET | 11,754317 | STUK
EU/1/14/981/002 | OTEZLA TABLET FILMOMHULD 30MG | APREMILAST-30-MG-TABLET | 11,734685 | STUK
EU/1/03/262/002 | EMEND CAPSULE 80MG | APREPITANT-80-MG-CAPSULE | 18,062291 | STUK
EU/1/03/262/006 | EMEND CAPSULE 1X125MG/2X80MG | APREPITANT-80-MG-CAPSULE-APREPITANT FASE 2-125-MG-CAPSULE | 19,243138 | STUK
EU/1/04/276/007 | ABILIFY TABLET 10MG | ARIPIPRAZOL-10-MG-TABLET | 1,347127 | STUK
116177 | ARIPIPRAZOL UNICHEM TABLET 10MG | ARIPIPRAZOL-10-MG-TABLET | 1,347127 | STUK
EU/1/04/276/012 | ABILIFY TABLET 15MG | ARIPIPRAZOL-15-MG-TABLET | 1,385205 | STUK
116178 | ARIPIPRAZOL UNICHEM TABLET 15MG | ARIPIPRAZOL-15-MG-TABLET | 1,385205 | STUK
EU/1/04/276/017 | ABILIFY TABLET 30MG | ARIPIPRAZOL-30-MG-TABLET | 2,807564 | STUK
115660 | ARIPIPRAZOL AUROBINDO TABLET 30MG | ARIPIPRAZOL-30-MG-TABLET | 2,807564 | STUK
EU/1/15/1029/052 | ARIPIPRAZOL SANDOZ TABLET 30MG | ARIPIPRAZOL-30-MG-TABLET | 2,807564 | STUK
EU/1/15/1029/061 | ARIPIPRAZOL SANDOZ TABLET 30MG | ARIPIPRAZOL-30-MG-TABLET | 2,807564 | STUK
115602 | ARIPIPRAZOL TEVA TABLET 30MG | ARIPIPRAZOL-30-MG-TABLET | 2,807564 | STUK
116179 | ARIPIPRAZOL UNICHEM TABLET 30MG | ARIPIPRAZOL-30-MG-TABLET | 2,807564 | STUK
EU/1/13/882/002 | ABILIFY MAINTENA INJPDR MVA FLACON 400MG +SOLV 2ML | ARIPIPRAZOL-400-MG-POED. V. INJECTIE, FLACON | 235,565947 | STUK
EU/1/04/276/036 | ABILIFY INJVLST 7,5MG/ML FLACON 1,3ML | ARIPIPRAZOL-7.5-MG/ML-INJECTIEVLOEISTOF, FLAC | 2,727749 | ML
EU/1/02/204/001 | TRISENOX INFVLST CONC 1MG/ML AMPUL 10ML | ARSEENTRIOXIDE-1-MG/ML-INFUUSVLOEISTOF, PATROON | 29,698456 | ML
EU/1/13/902/003 | TRANSLARNA GRANULAAT V SUSPENSIE IN SACHET 1000MG | ATALUREN-1000-MG-POEDER/GRANULAAT, ORAAL | 853,579090 | STUK
EU/1/13/902/001 | TRANSLARNA GRANULAAT V SUSPENSIE IN SACHET 125MG | ATALUREN-125-MG-POEDER/GRANULAAT, ORAAL | 106,705559 | STUK
EU/1/13/902/002 | TRANSLARNA GRANULAAT V SUSPENSIE IN SACHET 250MG | ATALUREN-250-MG-POEDER/GRANULAAT, ORAAL | 213,399233 | STUK
EU/1/03/267/003 | REYATAZ CAPSULE 150MG | ATAZANAVIR-150-MG-CAPSULE | 4,501792 | STUK
EU/1/03/267/004 | REYATAZ CAPSULE 150MG | ATAZANAVIR-150-MG-CAPSULE | 7,128753 | STUK
EU/1/03/267/005 | REYATAZ CAPSULE 200MG | ATAZANAVIR-200-MG-CAPSULE | 6,642274 | STUK
EU/1/03/267/006 | REYATAZ CAPSULE 200MG | ATAZANAVIR-200-MG-CAPSULE | 7,380304 | STUK
EU/1/16/1091/017 | ATAZANAVIR MYLAN CAPSULE 300MG | ATAZANAVIR-300-MG-CAPSULE | 8,867211 | STUK
EU/1/03/267/009 | REYATAZ CAPSULE 300MG | ATAZANAVIR-300-MG-CAPSULE | 8,867211 | STUK
EU/1/03/267/010 | REYATAZ CAPSULE 300MG | ATAZANAVIR-300-MG-CAPSULE | 8,867211 | STUK
EU/1/03/267/008 | REYATAZ CAPSULE 300MG | ATAZANAVIR-300-MG-CAPSULE | 12,850320 | STUK
25367 | ATENOLOL ACCORD TABLET 100MG | ATENOLOL-100-MG-TABLET | 0,097410 | STUK
17287 | ATENOLOL APOTEX TABLET 100MG | ATENOLOL-100-MG-TABLET | 0,120784 | STUK
57553 | ATENOLOL SANDOZ TABLET FILMOMHULD 100MG | ATENOLOL-100-MG-TABLET | 0,120784 | STUK
56332 | ATENOLOL TEVA TABLET 100MG | ATENOLOL-100-MG-TABLET | 0,120784 | STUK
18618 | ATENOLOL/CHLOORTALIDON APOTEX TABLET 100/25MG | ATENOLOL-100-MG-TABLET-CHLORTALIDONE-25-MG-TABLET | 0,237934 | STUK
57119 | ATENOLOL/CHLOORTALIDON MYLAN TABLET 100/25MG | ATENOLOL-100-MG-TABLET-CHLORTALIDONE-25-MG-TABLET | 0,237934 | STUK
17036 | ATENOLOL/CHLOORTALIDON SANDOZ TABLET 100/25MG | ATENOLOL-100-MG-TABLET-CHLORTALIDONE-25-MG-TABLET | 0,237934 | STUK
23281 | ATENOLOL ACCORD TABLET 25MG | ATENOLOL-25-MG-TABLET | 0,051364 | STUK
17887 | ATENOLOL APOTEX TABLET 25MG | ATENOLOL-25-MG-TABLET | 0,064667 | STUK
16049 | ATENOLOL CF TABLET 25MG | ATENOLOL-25-MG-TABLET | 0,061971 | STUK
20205 | ATENOLOL SANDOZ TABLET FILMOMHULD 25MG | ATENOLOL-25-MG-TABLET | 0,064667 | STUK
16272 | ATENOLOL TEVA TABLET 25MG | ATENOLOL-25-MG-TABLET | 0,064667 | STUK
25366 | ATENOLOL ACCORD TABLET 50MG | ATENOLOL-50-MG-TABLET | 0,084745 | STUK
17286 | ATENOLOL APOTEX TABLET 50MG | ATENOLOL-50-MG-TABLET | 0,087510 | STUK
16050 | ATENOLOL CF TABLET 50MG | ATENOLOL-50-MG-TABLET | 0,086957 | STUK
57552 | ATENOLOL SANDOZ TABLET FILMOMHULD 50MG | ATENOLOL-50-MG-TABLET | 0,087510 | STUK
56331 | ATENOLOL TEVA TABLET 50MG | ATENOLOL-50-MG-TABLET | 0,087510 | STUK
18617 | ATENOLOL/CHLOORTALIDON APOTEX TABLET 50/12,5MG | ATENOLOL-50-MG-TABLET-CHLORTALIDONE-12.5-MG-TABLET | 0,184619 | STUK
57118 | ATENOLOL/CHLOORTALIDON MYLAN TABLET 50/12,5MG | ATENOLOL-50-MG-TABLET-CHLORTALIDONE-12.5-MG-TABLET | 0,184619 | STUK
17035 | ATENOLOL/CHLOORTALIDON SANDOZ TABLET 50/12,5MG | ATENOLOL-50-MG-TABLET-CHLORTALIDONE-12.5-MG-TABLET | 0,184619 | STUK
EU/1/17/1220/002 | TECENTRIQ INFVLST CONC 840MG/14ML (60MG/ML) FLACON | ATEZOLIZUMAB-840-MG-INJECTIEVLOEISTOF, FLAC | 3328,045862 | STUK
100392 | STRATTERA CAPSULE 100MG | ATOMOXETIN-100-MG-CAPSULE | 3,824158 | STUK
31494 | STRATTERA CAPSULE 10MG | ATOMOXETIN-10-MG-CAPSULE | 2,901875 | STUK
31495 | STRATTERA CAPSULE 18MG | ATOMOXETIN-18-MG-CAPSULE | 2,901875 | STUK
31496 | STRATTERA CAPSULE 25MG | ATOMOXETIN-25-MG-CAPSULE | 2,816568 | STUK
31497 | STRATTERA CAPSULE 40MG | ATOMOXETIN-40-MG-CAPSULE | 2,800477 | STUK
31498 | STRATTERA CAPSULE 60MG | ATOMOXETIN-60-MG-CAPSULE | 2,837620 | STUK
100389 | STRATTERA CAPSULE 80MG | ATOMOXETIN-80-MG-CAPSULE | 3,694515 | STUK
107607 | LIPITOR KAUWTABLET 10MG | ATORVASTATIN-10-MG-KAUWDRAGEE/KAUWTABLET | 0,619969 | STUK
116319 | ATORVASTATINE CF TABLET FILMOMHULD 10MG | ATORVASTATIN-10-MG-TABLET | 0,153919 | STUK
105244 | ATORVASTATINE TEVA TABLET FILMOMHULD 10MG | ATORVASTATIN-10-MG-TABLET | 0,156963 | STUK
21081 | LIPITOR TABLET OMHULD 10MG | ATORVASTATIN-10-MG-TABLET | 0,156963 | STUK
107608 | LIPITOR KAUWTABLET 20MG | ATORVASTATIN-20-MG-KAUWDRAGEE/KAUWTABLET | 0,867363 | STUK
116322 | ATORVASTATINE CF TABLET FILMOMHULD 20MG | ATORVASTATIN-20-MG-TABLET | 0,243718 | STUK
105245 | ATORVASTATINE TEVA TABLET FILMOMHULD 20MG | ATORVASTATIN-20-MG-TABLET | 0,243718 | STUK
119436//21082 | LIPITOR TABLET OMHULD 20MG | ATORVASTATIN-20-MG-TABLET | 0,243718 | STUK
21082 | LIPITOR TABLET OMHULD 20MG | ATORVASTATIN-20-MG-TABLET | 0,243718 | STUK
116324 | ATORVASTATINE CF TABLET FILMOMHULD 40MG | ATORVASTATIN-40-MG-TABLET | 0,264884 | STUK
105246 | ATORVASTATINE TEVA TABLET FILMOMHULD 40MG | ATORVASTATIN-40-MG-TABLET | 0,264884 | STUK
119435//21083 | LIPITOR TABLET OMHULD 40MG | ATORVASTATIN-40-MG-TABLET | 0,264884 | STUK
21083 | LIPITOR TABLET OMHULD 40MG | ATORVASTATIN-40-MG-TABLET | 0,264884 | STUK
113995 | ATORVASTATINE AUROBINDO TABLET FILMOMHULD 80MG | ATORVASTATIN-80-MG-TABLET | 0,369523 | STUK
108089 | ATORVASTATINE PFIZER TABLET FILMOMHULD 80MG | ATORVASTATIN-80-MG-TABLET | 0,364223 | STUK
108984 | ATORVASTATINE SUN TABLET FILMOMHULD 80MG | ATORVASTATIN-80-MG-TABLET | 0,364223 | STUK
115743 | ATOSIBAN ACCORD INFVLST CONC 7,5MG/ML FLACON 5ML | ATOSIBAN-7.5-MG/ML-INFUUSVLOEISTOF, FLACON | 14,870464 | ML
117776 | ATOSIBAN EVER PHARMA INFVLS CONC 7,5MG/ML FLAC 5ML | ATOSIBAN-7.5-MG/ML-INFUUSVLOEISTOF, FLACON | 14,870464 | ML
EU/1/99/124/002 | TRACTOCILE INFVLST CONC 7,5MG/ML FLACON 5ML | ATOSIBAN-7.5-MG/ML-INFUUSVLOEISTOF, FLACON | 14,870464 | ML
116896 | ATOSIBAN DEVRIMED INJVLST 7,5MG/ML FLACON 0,9ML | ATOSIBAN-7.5-MG/ML-INJECTIEVLOEISTOF, FLAC | 24,577218 | ML
117775 | ATOSIBAN EVER PHARMA INJVLST 7,5MG/ML FLACON 0,9ML | ATOSIBAN-7.5-MG/ML-INJECTIEVLOEISTOF, FLAC | 27,147754 | ML
EU/1/99/124/001 | TRACTOCILE INJVLST 7,5MG/ML FLACON 0,9ML | ATOSIBAN-7.5-MG/ML-INJECTIEVLOEISTOF, FLAC | 27,147754 | ML
120808//21070 | WELLVONE SUSPENSIE 150MG/ML | ATOVAQUONE-150-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 1,762757 | ML
124977//21070 | WELLVONE SUSPENSIE 150MG/ML | ATOVAQUONE-150-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 1,762757 | ML
119434//21070 | WELLVONE SUSPENSIE 150MG/ML | ATOVAQUONE-150-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 1,800774 | ML
121642//21070 | WELLVONE SUSPENSIE 150MG/ML | ATOVAQUONE-150-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 2,000860 | ML
21070 | WELLVONE SUSPENSIE 150MG/ML | ATOVAQUONE-150-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 2,000860 | ML
EU/1/13/841/005 | SPEDRA TABLET 100MG | AVANAFIL-100-MG-TABLET | 4,117447 | STUK
EU/1/13/841/008 | SPEDRA TABLET 200MG | AVANAFIL-200-MG-TABLET | 5,802554 | STUK
EU/1/13/841/001 | SPEDRA TABLET 50MG | AVANAFIL-50-MG-TABLET | 3,032437 | STUK
EU/1/17/1214/001 | BAVENCIO INFVLST CONC 20MG/ML FLACON 10ML | AVELUMAB-20-MG/ML-INFUUSVLOEISTOF, FLACON | 93,879946 | ML
EU/1/12/777/002 | INLYTA TABLET FILMOMHULD 1MG | AXITINIB-1-MG-TABLET | 13,227245 | STUK
EU/1/12/777/005 | INLYTA TABLET FILMOMHULD 5MG | AXITINIB-5-MG-TABLET | 64,025712 | STUK
EU/1/12/777/011 | INLYTA TABLET FILMOMHULD 7MG | AXITINIB-7-MG-TABLET | 91,662508 | STUK
EU/1/19/1416/001 | AZACITIDINE BETAPHARM INJECTIEPOEDER FLACON 100MG | AZACITIDINE-100-MG-POED. V. INJECTIE, FLACON | 226,092346 | STUK
EU/1/20/1426/001 | AZACITIDINE MYLAN INJECTIEPOEDER FLACON 100MG | AZACITIDINE-100-MG-POED. V. INJECTIE, FLACON | 226,092346 | STUK
EU/1/08/488/001 | VIDAZA INJECTIEPOEDER FLACON 100MG | AZACITIDINE-100-MG-POED. V. INJECTIE, FLACON | 226,092346 | STUK
24721 | AZATHIOPRINE MYLAN TABLET 25MG | AZATHIOPRINE-25-MG-TABLET | 0,158216 | STUK
27562 | AZATHIOPRINE SANDOZ TABLET 25MG | AZATHIOPRINE-25-MG-TABLET | 0,158216 | STUK
12476 | IMURAN TABLET 25MG | AZATHIOPRINE-25-MG-TABLET | 0,158216 | STUK
21767=10467 | AZATHIOPRINE AUROBINDO TABLET 50MG | AZATHIOPRINE-50-MG-TABLET | 0,185970 | STUK
24722 | AZATHIOPRINE MYLAN TABLET 50MG | AZATHIOPRINE-50-MG-TABLET | 0,125804 | STUK
27563 | AZATHIOPRINE SANDOZ TABLET 50MG | AZATHIOPRINE-50-MG-TABLET | 0,185970 | STUK
10467 | AZATHIOPRINE TEVA TABLET 50MG | AZATHIOPRINE-50-MG-TABLET | 0,185970 | STUK
32650//5565 | IMURAN TABLET 50MG | AZATHIOPRINE-50-MG-TABLET | 0,125804 | STUK
5565 | IMURAN TABLET 50MG | AZATHIOPRINE-50-MG-TABLET | 0,185970 | STUK
22946 | ALLERGODIL OOGDRUPPELS 0,5MG/ML FLACON 6ML | AZELASTINE-.5-MG/ML-OOGDRUPPELS | 0,961307 | ML
114215 | DYMISTA NEUSSPRAY 137/50MCG/DO FLACON 120DO | AZELASTINE-0.137-MG-NEUSSPRAY-FLUTICASONE-0.05-MG-NEUSSPRAY | 0,138554 | DOSIS
122919//114215 | DYMISTA NEUSSPRAY 137/50MCG/DO FLACON 120DO | AZELASTINE-0.137-MG-NEUSSPRAY-FLUTICASONE-0.05-MG-NEUSSPRAY | 0,138554 | DOSIS
123321//114215 | DYMISTA NEUSSPRAY 137/50MCG/DO FLACON 120DO | AZELASTINE-0.137-MG-NEUSSPRAY-FLUTICASONE-0.05-MG-NEUSSPRAY | 0,138554 | DOSIS
123997//114215 | DYMISTA NEUSSPRAY 137/50MCG/DO FLACON 120DO | AZELASTINE-0.137-MG-NEUSSPRAY-FLUTICASONE-0.05-MG-NEUSSPRAY | 0,138554 | DOSIS
124002//114215 | DYMISTA NEUSSPRAY 137/50MCG/DO FLACON 120DO | AZELASTINE-0.137-MG-NEUSSPRAY-FLUTICASONE-0.05-MG-NEUSSPRAY | 0,138554 | DOSIS
124845//114215 | DYMISTA NEUSSPRAY 137/50MCG/DO FLACON 120DO | AZELASTINE-0.137-MG-NEUSSPRAY-FLUTICASONE-0.05-MG-NEUSSPRAY | 0,138554 | DOSIS
125731//114215 | DYMISTA NEUSSPRAY 137/50MCG/DO FLACON 120DO | AZELASTINE-0.137-MG-NEUSSPRAY-FLUTICASONE-0.05-MG-NEUSSPRAY | 0,138554 | DOSIS
113043//17886 | ALLERGODIL NEVEL NEUSSPRAY 1MG/ML | AZELASTINE-1-MG/ML-NEUSSPRAY | 0,582232 | ML
126502//17886 | ALLERGODIL NEVEL NEUSSPRAY 1MG/ML | AZELASTINE-1-MG/ML-NEUSSPRAY | 0,582232 | ML
17886 | ALLERGODIL NEVEL NEUSSPRAY 1MG/ML | AZELASTINE-1-MG/ML-NEUSSPRAY | 0,630966 | ML
34031 | AZYTER SINGLE DOSE OOGDRUPPELS 15MG/G TUBE 0,25G | AZITHROMYCIN-15-MG/ML-OOGDRUPPELS UNITDOSE | 4,018349 | G
101499 | AZITROMYCINE APOTEX TABLET OMHULD 250MG | AZITHROMYCIN-250-MG-TABLET | 1,077238 | STUK
32493 | AZITROMYCINE CF TABLET OMHULD 250MG | AZITHROMYCIN-250-MG-TABLET | 0,969514 | STUK
32491 | AZITROMYCINE SANDOZ TABLET OMHULD 250MG | AZITHROMYCIN-250-MG-TABLET | 1,077238 | STUK
19432 | ZITHROMAX TABLET 250MG | AZITHROMYCIN-250-MG-TABLET | 0,969514 | STUK
34294 | AZITROMYCINE CF POEDER VOOR SUSPENSIE 200MG/5ML | AZITHROMYCIN-40-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,365091 | ML
34300 | AZITROMYCINE MYLAN POEDER VOOR SUSPENSIE 200MG/5ML | AZITHROMYCIN-40-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,379170 | ML
32017 | AZITROMYCINE SANDOZ POEDER V SUSPENSIE 200MG/5ML | AZITHROMYCIN-40-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,379170 | ML
30440 | AZITROMYCINE TEVA POEDER VOOR SUSPENSIE 200MG/5ML | AZITHROMYCIN-40-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,379170 | ML
14999 | ZITHROMAX POEDER VOOR SUSPENSIE 200MG/5ML | AZITHROMYCIN-40-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,358199 | ML
32494 | AZITROMYCINE CF TABLET OMHULD 500MG | AZITHROMYCIN-500-MG-TABLET | 1,460095 | STUK
29677 | AZITROMYCINE MYLAN TABLET OMHULD 500MG | AZITHROMYCIN-500-MG-TABLET | 1,460095 | STUK
32492 | AZITROMYCINE SANDOZ TABLET OMHULD 500MG | AZITHROMYCIN-500-MG-TABLET | 1,462614 | STUK
19433 | ZITHROMAX TABLET 500MG | AZITHROMYCIN-500-MG-TABLET | 1,462614 | STUK
EU/1/09/543/002 | CAYSTON PDR V VERNEVELOPL FL 75MG+SOLV 1ML+ALTERA | AZTREONAM-75-MG-POEDER VOOR INHALATIEVLOEISTOF | 28,806571 | STUK
21618 | BACLOFEN AUROBINDO TABLET 10MG | BACLOFEN-10-MG-TABLET | 0,086194 | STUK
24100=12153 | BACLOFEN MYLAN TABLET 10MG | BACLOFEN-10-MG-TABLET | 0,076888 | STUK
23864=12153 | BACLOFEN SANDOZ TABLET 10MG | BACLOFEN-10-MG-TABLET | 0,086194 | STUK
12153 | BACLOFEN TEVA TABLET 10MG | BACLOFEN-10-MG-TABLET | 0,086194 | STUK
6347 | LIORESAL TABLET 10MG | BACLOFEN-10-MG-TABLET | 0,086194 | STUK
25864=12154 | BACLOFEN MYLAN TABLET 25MG | BACLOFEN-25-MG-TABLET | 0,180843 | STUK
23865=12154 | BACLOFEN SANDOZ TABLET 25MG | BACLOFEN-25-MG-TABLET | 0,180843 | STUK
12154 | BACLOFEN TEVA TABLET 25MG | BACLOFEN-25-MG-TABLET | 0,180843 | STUK
EU/1/16/1170/002 | OLUMIANT TABLET FILMOMHULD 2MG | BARICITINIB-2-MG-TABLET | 29,201790 | STUK
EU/1/16/1170/010 | OLUMIANT TABLET FILMOMHULD 4MG | BARICITINIB-4-MG-TABLET | 29,201790 | STUK
EU/1/98/084/001 | SIMULECT INFUSIEPOEDER FLACON 20MG + SOLV 5ML | BASILIXIMAB-20-MG-POED. V. INFUSIE,FLACON | 922,496467 | STUK
33316 | BECLOMETASON ALL AER CFKVR 50MCG/DO SPB 200DO+INH | BECLOMETASONE-.05-MG-AEROSOL | 0,033653 | DOSIS
101708 | BECLOMETASON MYL AER CFKVR 50MCG/DO SPB 200DO+INH | BECLOMETASONE-.05-MG-AEROSOL | 0,033653 | DOSIS
30099 | BECLOMETASON PCH AER CFKVR 50MCG/DO SPB 200DO+INH | BECLOMETASONE-.05-MG-AEROSOL | 0,033653 | DOSIS
34150 | BECLOMETASON SANDOZ AER 50MCG/DO SPBS 200DO+INH | BECLOMETASONE-.05-MG-AEROSOL | 0,033653 | DOSIS
28086=10957 | BECLOMETASON NEVEL APOTEX NEUSSP 50MCG/DO FL 200DO | BECLOMETASONE-.05-MG-NEUSSPRAY | 0,032071 | DOSIS
10957 | BECLOMETASON NEVEL SANDOZ NEUSSP 50MCG/DO FL 200DO | BECLOMETASONE-.05-MG-NEUSSPRAY | 0,032071 | DOSIS
15716 | BECLOMETASON NEVEL TEVA NEUSSPR 50MCG/DO FL 200DO | BECLOMETASONE-.05-MG-NEUSSPRAY | 0,032071 | DOSIS
33317 | BECLOMETASON ALL AER CFKVR 100MCG/DO SPB 200DO+INH | BECLOMETASONE-.1-MG-AEROSOL | 0,076806 | DOSIS
101709 | BECLOMETASON MYL AER CFKVR 100MCG/DO SPB 200DO+INH | BECLOMETASONE-.1-MG-AEROSOL | 0,076806 | DOSIS
30100 | BECLOMETASON PCH AER CFKVR 100MCG/DO SPB 200DO+INH | BECLOMETASONE-.1-MG-AEROSOL | 0,076806 | DOSIS
34151 | BECLOMETASON SANDOZ AER 100MCG/DO SPBS 200DO+INH | BECLOMETASONE-.1-MG-AEROSOL | 0,076806 | DOSIS
33318 | BECLOMETASON ALL AER CFKVR 250MCG/DO SPB 200DO+INH | BECLOMETASONE-.25-MG-AEROSOL | 0,097116 | DOSIS
101710 | BECLOMETASON MYL AER CFKVR 250MCG/DO SPB 200DO+INH | BECLOMETASONE-.25-MG-AEROSOL | 0,097116 | DOSIS
30101 | BECLOMETASON PCH AER CFKVR 250MCG/DO SPB 200DO+INH | BECLOMETASONE-.25-MG-AEROSOL | 0,097116 | DOSIS
34152 | BECLOMETASON SANDOZ AER 250MCG/DO SPBS 200DO+INH | BECLOMETASONE-.25-MG-AEROSOL | 0,097116 | DOSIS
124333//34610 | BECLOMETASON/FORMOT BMODESTO AER 100/6MCG/DO 120DO | BECLOMETASONE-0.1-MG-AEROSOL-FORMOTEROL-0.006-MG-AEROSOL | 0,275193 | DOSIS
114630//34610 | BECLOMETASON/FORMOTEROL ERC AER 100/6MCG/DO 120DO | BECLOMETASONE-0.1-MG-AEROSOL-FORMOTEROL-0.006-MG-AEROSOL | 0,274104 | DOSIS
112364//34610 | BECLOMETASON/FORMOTEROL FISH AER 100/6MCG/DO 180DO | BECLOMETASONE-0.1-MG-AEROSOL-FORMOTEROL-0.006-MG-AEROSOL | 0,274104 | DOSIS
119129//34610 | BECLOMETASON/FORMOTEROL FISH AER 100/6MCG/DO 180DO | BECLOMETASONE-0.1-MG-AEROSOL-FORMOTEROL-0.006-MG-AEROSOL | 0,274104 | DOSIS
119130//34615 | BECLOMETASON/FORMOTEROL FISH AER 100/6MCG/DO 180DO | BECLOMETASONE-0.1-MG-AEROSOL-FORMOTEROL-0.006-MG-AEROSOL | 0,274104 | DOSIS
120008//34610 | FOSTER AEROSOL 100/6MCG/DOSIS SPUITBUS 120DO | BECLOMETASONE-0.1-MG-AEROSOL-FORMOTEROL-0.006-MG-AEROSOL | 0,274104 | DOSIS
121719//34610 | FOSTER AEROSOL 100/6MCG/DOSIS SPUITBUS 120DO | BECLOMETASONE-0.1-MG-AEROSOL-FORMOTEROL-0.006-MG-AEROSOL | 0,274104 | DOSIS
122449//34610 | FOSTER AEROSOL 100/6MCG/DOSIS SPUITBUS 120DO | BECLOMETASONE-0.1-MG-AEROSOL-FORMOTEROL-0.006-MG-AEROSOL | 0,274104 | DOSIS
34610 | FOSTER AEROSOL 100/6MCG/DOSIS SPUITBUS 120DO | BECLOMETASONE-0.1-MG-AEROSOL-FORMOTEROL-0.006-MG-AEROSOL | 0,274104 | DOSIS
113068//34610 | FOSTER AEROSOL 100/6MCG/DOSIS SPUITBUS 120DO | BECLOMETASONE-0.1-MG-AEROSOL-FORMOTEROL-0.006-MG-AEROSOL | 0,275193 | DOSIS
126830//34610 | FOSTER AEROSOL 100/6MCG/DOSIS SPUITBUS 120DO | BECLOMETASONE-0.1-MG-AEROSOL-FORMOTEROL-0.006-MG-AEROSOL | 0,275193 | DOSIS
113567//34610 | FOSTER AEROSOL 100/6MCG/DOSIS SPUITBUS 180DO | BECLOMETASONE-0.1-MG-AEROSOL-FORMOTEROL-0.006-MG-AEROSOL | 0,274104 | DOSIS
114923//34610 | FOSTER AEROSOL 100/6MCG/DOSIS SPUITBUS 180DO | BECLOMETASONE-0.1-MG-AEROSOL-FORMOTEROL-0.006-MG-AEROSOL | 0,274104 | DOSIS
118343//34610 | FOSTER AEROSOL 100/6MCG/DOSIS SPUITBUS 180DO | BECLOMETASONE-0.1-MG-AEROSOL-FORMOTEROL-0.006-MG-AEROSOL | 0,274104 | DOSIS
121351//34610 | FOSTER AEROSOL 100/6MCG/DOSIS SPUITBUS 180DO | BECLOMETASONE-0.1-MG-AEROSOL-FORMOTEROL-0.006-MG-AEROSOL | 0,274104 | DOSIS
121354//34610 | FOSTER AEROSOL 100/6MCG/DOSIS SPUITBUS 180DO | BECLOMETASONE-0.1-MG-AEROSOL-FORMOTEROL-0.006-MG-AEROSOL | 0,274104 | DOSIS
121654//34610 | FOSTER AEROSOL 100/6MCG/DOSIS SPUITBUS 180DO | BECLOMETASONE-0.1-MG-AEROSOL-FORMOTEROL-0.006-MG-AEROSOL | 0,274104 | DOSIS
122557//34610 | FOSTER AEROSOL 100/6MCG/DOSIS SPUITBUS 180DO | BECLOMETASONE-0.1-MG-AEROSOL-FORMOTEROL-0.006-MG-AEROSOL | 0,274104 | DOSIS
124337//34610 | FOSTER AEROSOL 100/6MCG/DOSIS SPUITBUS 180DO | BECLOMETASONE-0.1-MG-AEROSOL-FORMOTEROL-0.006-MG-AEROSOL | 0,274104 | DOSIS
127947//34610 | FOSTER AEROSOL 100/6MCG/DOSIS SPUITBUS 180DO | BECLOMETASONE-0.1-MG-AEROSOL-FORMOTEROL-0.006-MG-AEROSOL | 0,274104 | DOSIS
113068//34610 | FOSTER AEROSOL 100/6MCG/DOSIS SPUITBUS 180DO | BECLOMETASONE-0.1-MG-AEROSOL-FORMOTEROL-0.006-MG-AEROSOL | 0,275193 | DOSIS
EU/1/17/1208/002 | TRIMBOW AEROSOL 87/5/9MCG/DOSIS SPUITBUS 120DO | BECLOMETASONE-0.1-MG-AEROSOL-FORMOTEROL-0.006-MG-AEROSOL-GLYCOPYRRONIUM-0.01-MG-AEROSOL | 0,435834 | DOSIS
110104 | FOSTER NEXTHALER INHALPDR 100/6MCG/DO 120DO | BECLOMETASONE-0.1-MG-INHALATIEPOEDER INCL INHALER-FORMOTEROL-0.006-MG-INHALATIEPOEDER INCL INHALER | 0,269373 | DOSIS
114924//110104 | FOSTER NEXTHALER INHALPDR 100/6MCG/DO 120DO | BECLOMETASONE-0.1-MG-INHALATIEPOEDER INCL INHALER-FORMOTEROL-0.006-MG-INHALATIEPOEDER INCL INHALER | 0,269373 | DOSIS
115671//110104 | FOSTER NEXTHALER INHALPDR 100/6MCG/DO 120DO | BECLOMETASONE-0.1-MG-INHALATIEPOEDER INCL INHALER-FORMOTEROL-0.006-MG-INHALATIEPOEDER INCL INHALER | 0,269373 | DOSIS
119859//110104 | FOSTER NEXTHALER INHALPDR 100/6MCG/DO 120DO | BECLOMETASONE-0.1-MG-INHALATIEPOEDER INCL INHALER-FORMOTEROL-0.006-MG-INHALATIEPOEDER INCL INHALER | 0,269373 | DOSIS
121048//110104 | FOSTER NEXTHALER INHALPDR 100/6MCG/DO 120DO | BECLOMETASONE-0.1-MG-INHALATIEPOEDER INCL INHALER-FORMOTEROL-0.006-MG-INHALATIEPOEDER INCL INHALER | 0,269373 | DOSIS
121616//110104 | FOSTER NEXTHALER INHALPDR 100/6MCG/DO 120DO | BECLOMETASONE-0.1-MG-INHALATIEPOEDER INCL INHALER-FORMOTEROL-0.006-MG-INHALATIEPOEDER INCL INHALER | 0,269373 | DOSIS
123875//110104 | FOSTER NEXTHALER INHALPDR 100/6MCG/DO 120DO | BECLOMETASONE-0.1-MG-INHALATIEPOEDER INCL INHALER-FORMOTEROL-0.006-MG-INHALATIEPOEDER INCL INHALER | 0,269373 | DOSIS
124179//110104 | FOSTER NEXTHALER INHALPDR 100/6MCG/DO 120DO | BECLOMETASONE-0.1-MG-INHALATIEPOEDER INCL INHALER-FORMOTEROL-0.006-MG-INHALATIEPOEDER INCL INHALER | 0,269373 | DOSIS
124899//110104 | FOSTER NEXTHALER INHALPDR 100/6MCG/DO 120DO | BECLOMETASONE-0.1-MG-INHALATIEPOEDER INCL INHALER-FORMOTEROL-0.006-MG-INHALATIEPOEDER INCL INHALER | 0,269373 | DOSIS
126905//110104 | FOSTER NEXTHALER INHALPDR 100/6MCG/DO 120DO | BECLOMETASONE-0.1-MG-INHALATIEPOEDER INCL INHALER-FORMOTEROL-0.006-MG-INHALATIEPOEDER INCL INHALER | 0,269373 | DOSIS
117578//110104 | FOSTER NEXTHALER INHALPDR 100/6MCG/DO 120DO | BECLOMETASONE-0.1-MG-INHALATIEPOEDER INCL INHALER-FORMOTEROL-0.006-MG-INHALATIEPOEDER INCL INHALER | 0,280201 | DOSIS
115693 | FOSTER AEROSOL 200/6MCG/DOSIS SPUITBUS 120DO | BECLOMETASONE-0.2-MG-AEROSOL-FORMOTEROL-0.006-MG-AEROSOL | 0,297605 | DOSIS
119245//115693 | FOSTER AEROSOL 200/6MCG/DOSIS SPUITBUS 120DO | BECLOMETASONE-0.2-MG-AEROSOL-FORMOTEROL-0.006-MG-AEROSOL | 0,297605 | DOSIS
120007//115693 | FOSTER AEROSOL 200/6MCG/DOSIS SPUITBUS 120DO | BECLOMETASONE-0.2-MG-AEROSOL-FORMOTEROL-0.006-MG-AEROSOL | 0,297605 | DOSIS
120719//115693 | FOSTER AEROSOL 200/6MCG/DOSIS SPUITBUS 120DO | BECLOMETASONE-0.2-MG-AEROSOL-FORMOTEROL-0.006-MG-AEROSOL | 0,297605 | DOSIS
121359//115693 | FOSTER AEROSOL 200/6MCG/DOSIS SPUITBUS 120DO | BECLOMETASONE-0.2-MG-AEROSOL-FORMOTEROL-0.006-MG-AEROSOL | 0,297605 | DOSIS
124342//115693 | FOSTER AEROSOL 200/6MCG/DOSIS SPUITBUS 120DO | BECLOMETASONE-0.2-MG-AEROSOL-FORMOTEROL-0.006-MG-AEROSOL | 0,297605 | DOSIS
124839//115693 | FOSTER AEROSOL 200/6MCG/DOSIS SPUITBUS 120DO | BECLOMETASONE-0.2-MG-AEROSOL-FORMOTEROL-0.006-MG-AEROSOL | 0,297605 | DOSIS
124897//115693 | FOSTER AEROSOL 200/6MCG/DOSIS SPUITBUS 120DO | BECLOMETASONE-0.2-MG-AEROSOL-FORMOTEROL-0.006-MG-AEROSOL | 0,297605 | DOSIS
125084//115693 | FOSTER AEROSOL 200/6MCG/DOSIS SPUITBUS 120DO | BECLOMETASONE-0.2-MG-AEROSOL-FORMOTEROL-0.006-MG-AEROSOL | 0,297605 | DOSIS
125377//115693 | FOSTER AEROSOL 200/6MCG/DOSIS SPUITBUS 120DO | BECLOMETASONE-0.2-MG-AEROSOL-FORMOTEROL-0.006-MG-AEROSOL | 0,297605 | DOSIS
125931//115693 | FOSTER AEROSOL 200/6MCG/DOSIS SPUITBUS 120DO | BECLOMETASONE-0.2-MG-AEROSOL-FORMOTEROL-0.006-MG-AEROSOL | 0,297605 | DOSIS
126190//115693 | FOSTER AEROSOL 200/6MCG/DOSIS SPUITBUS 120DO | BECLOMETASONE-0.2-MG-AEROSOL-FORMOTEROL-0.006-MG-AEROSOL | 0,297605 | DOSIS
126903//115693 | FOSTER AEROSOL 200/6MCG/DOSIS SPUITBUS 120DO | BECLOMETASONE-0.2-MG-AEROSOL-FORMOTEROL-0.006-MG-AEROSOL | 0,297605 | DOSIS
124004//115693 | FOSTER AEROSOL 200/6MCG/DOSIS SPUITBUS 180DO | BECLOMETASONE-0.2-MG-AEROSOL-FORMOTEROL-0.006-MG-AEROSOL | 0,320392 | DOSIS
125716//115695 | BECLOMET/FORMO BMODESTO NEXTHALER 200/6MCG/D 120DO | BECLOMETASONE-0.2-MG-INHALATIEPOEDER INCL INHALER-FORMOTEROL-0.006-MG-INHALATIEPOEDER INCL INHALER | 0,293039 | DOSIS
119168//115695 | FOSTER NEXTHALER INHALPDR 200/6MCG/DO 120DO | BECLOMETASONE-0.2-MG-INHALATIEPOEDER INCL INHALER-FORMOTEROL-0.006-MG-INHALATIEPOEDER INCL INHALER | 0,293039 | DOSIS
120017//115695 | FOSTER NEXTHALER INHALPDR 200/6MCG/DO 120DO | BECLOMETASONE-0.2-MG-INHALATIEPOEDER INCL INHALER-FORMOTEROL-0.006-MG-INHALATIEPOEDER INCL INHALER | 0,293039 | DOSIS
121353//115695 | FOSTER NEXTHALER INHALPDR 200/6MCG/DO 120DO | BECLOMETASONE-0.2-MG-INHALATIEPOEDER INCL INHALER-FORMOTEROL-0.006-MG-INHALATIEPOEDER INCL INHALER | 0,293039 | DOSIS
121368//115695 | FOSTER NEXTHALER INHALPDR 200/6MCG/DO 120DO | BECLOMETASONE-0.2-MG-INHALATIEPOEDER INCL INHALER-FORMOTEROL-0.006-MG-INHALATIEPOEDER INCL INHALER | 0,293039 | DOSIS
124001//115695 | FOSTER NEXTHALER INHALPDR 200/6MCG/DO 120DO | BECLOMETASONE-0.2-MG-INHALATIEPOEDER INCL INHALER-FORMOTEROL-0.006-MG-INHALATIEPOEDER INCL INHALER | 0,293039 | DOSIS
125351//115695 | FOSTER NEXTHALER INHALPDR 200/6MCG/DO 120DO | BECLOMETASONE-0.2-MG-INHALATIEPOEDER INCL INHALER-FORMOTEROL-0.006-MG-INHALATIEPOEDER INCL INHALER | 0,293039 | DOSIS
127868//115695 | FOSTER NEXTHALER INHALPDR 200/6MCG/DO 120DO | BECLOMETASONE-0.2-MG-INHALATIEPOEDER INCL INHALER-FORMOTEROL-0.006-MG-INHALATIEPOEDER INCL INHALER | 0,293039 | DOSIS
115695 | FOSTER NEXTHALER INHALPDR 200/6MCG/DO 120DO | BECLOMETASONE-0.2-MG-INHALATIEPOEDER INCL INHALER-FORMOTEROL-0.006-MG-INHALATIEPOEDER INCL INHALER | 0,364947 | DOSIS
EU/1/11/694/001 | NULOJIX INFUSIEPOEDER FLACON 250MG | BELATACEPT-250-MG-POED. V. INFUSIE,FLACON | 406,908321 | STUK
EU/1/11/700/001 | BENLYSTA INFPDR FLACON 120MG | BELIMUMAB-120-MG-POED. V. INFUSIE,FLACON | 155,923470 | STUK
EU/1/11/700/003 | BENLYSTA INJVLST 200MG/ML PEN 1ML | BELIMUMAB-200-MG/ML-INJ.VLOEISTOF, WWSP | 217,384444 | ML
EU/1/11/700/004 | BENLYSTA INJVLST 200MG/ML PEN 1ML | BELIMUMAB-200-MG/ML-INJ.VLOEISTOF, WWSP | 217,384444 | ML
EU/1/11/700/002 | BENLYSTA INFPDR FLACON 400MG | BELIMUMAB-400-MG-POED. V. INFUSIE,FLACON | 519,743000 | STUK
117843 | BENDAMUSTINE ACCORD INFPDR FLACON 100MG | BENDAMUSTINE-100-MG-POED. V. INFUSIE,FLACON | 212,116742 | STUK
121963 | BENDAMUSTINE BAXTER INFPDR FLACON 100MG | BENDAMUSTINE-100-MG-POED. V. INFUSIE,FLACON | 204,235285 | STUK
117807 | BENDAMUSTINE MEDAC INFPDR FLACON 100MG | BENDAMUSTINE-100-MG-POED. V. INFUSIE,FLACON | 235,685269 | STUK
109342 | LEVACT INFUSIEPOEDER FLACON 100MG | BENDAMUSTINE-100-MG-POED. V. INFUSIE,FLACON | 235,685269 | STUK
117843 | BENDAMUSTINE ACCORD INFPDR FLACON 25MG | BENDAMUSTINE-25-MG-POED. V. INFUSIE,FLACON | 51,129361 | STUK
121963 | BENDAMUSTINE BAXTER INFPDR FLACON 25MG | BENDAMUSTINE-25-MG-POED. V. INFUSIE,FLACON | 51,129361 | STUK
117807 | BENDAMUSTINE MEDAC INFPDR FLACON 25MG | BENDAMUSTINE-25-MG-POED. V. INFUSIE,FLACON | 53,925316 | STUK
109342 | LEVACT INFUSIEPOEDER FLACON 25MG | BENDAMUSTINE-25-MG-POED. V. INFUSIE,FLACON | 53,925316 | STUK
EU/1/17/1252/002 | FASENRA INJVLST 30MG/ML PEN 1ML | BENRALIZUMAB-30-MG-INJ.VLOEISTOF, WWSP | 2327,611731 | STUK
EU/1/17/1252/001 | FASENRA INJVLST 30MG/ML WWSP 1ML | BENRALIZUMAB-30-MG-INJ.VLOEISTOF, WWSP | 2327,611731 | ST
EU/1/17/1252/001 | FASENRA INJVLST 30MG/ML WWSP 1ML | BENRALIZUMAB-30-MG-INJ.VLOEISTOF, WWSP | 2327,611731 | STUK
19428 | MADOPAR DISPER TABLET 125MG | BENSERAZIDE-25-MG-BRUISTABLET-LEVODOPA-100-MG-BRUISTABLET | 0,120116 | STUK
115063 | BETAHISTINE DIHCL AUROBINDO TABLET 24MG | BETAHISTINE-24-MG-TABLET | 0,120554 | STUK
101754 | BETAHISTINE DIHCL TEVA TABLET 24MG | BETAHISTINE-24-MG-TABLET | 0,120554 | STUK
121445//6650 | DIPROSONE CREME 0,5MG/G | BETAMETHASONE-.5-MG/G-CREME, CUTAAN | 0,080022 | G
29743//6650 | DIPROSONE CREME 0,5MG/G | BETAMETHASONE-.5-MG/G-CREME, CUTAAN | 0,080022 | G
17955//6650 | DIPROSONE CREME 0,5MG/G | BETAMETHASONE-.5-MG/G-CREME, CUTAAN | 0,112511 | G
6650 | DIPROSONE CREME 0,5MG/G | BETAMETHASONE-.5-MG/G-CREME, CUTAAN | 0,112511 | G
9522 | DIPROLENE ZALF 0,5MG/G | BETAMETHASONE-.5-MG/G-ZALF, CUTAAN | 0,125432 | G
121371//6864 | DIPROSONE ZALF 0,5MG/G (0,05%) | BETAMETHASONE-.5-MG/G-ZALF, CUTAAN | 0,091688 | G
122888//6864 | DIPROSONE ZALF 0,5MG/G (0,05%) | BETAMETHASONE-.5-MG/G-ZALF, CUTAAN | 0,091688 | G
123694//6864 | DIPROSONE ZALF 0,5MG/G (0,05%) | BETAMETHASONE-.5-MG/G-ZALF, CUTAAN | 0,125432 | G
6864 | DIPROSONE ZALF 0,5MG/G (0,05%) | BETAMETHASONE-.5-MG/G-ZALF, CUTAAN | 0,125432 | G
13546//8211 | DIPROSONE LOTION 0,5MG/G (0,05%) | BETAMETHASONE-.5-MG/ML-APPLICATIEVLOEISTOF, VOOR CUTAAN GEBRUIK | 0,119419 | ML
8211 | DIPROSONE LOTION 0,5MG/G (0,05%) | BETAMETHASONE-.5-MG/ML-APPLICATIEVLOEISTOF, VOOR CUTAAN GEBRUIK | 0,119419 | ML
100401 | DOVOBET GEL | BETAMETHASONE-0.5-MG/G-HUIDGEL-CALCIPOTRIOL-0.05-MG/G-HUIDGEL | 0,628305 | G
16004 | BETAMETHASON PCH CREME 1MG/G | BETAMETHASONE-1-MG/G-CREME, CUTAAN | 0,096767 | G
125551//4519 | BETNELAN CREME 1MG/G | BETAMETHASONE-1-MG/G-CREME, CUTAAN | 0,068201 | G
16003 | BETAMETHASON TEVA ZALF 1MG/G | BETAMETHASONE-1-MG/G-ZALF, CUTAAN | 0,086082 | G
16002 | BETAMETHASON TEVA LOTION 1MG/G | BETAMETHASONE-1-MG/ML-APPLICATIEVLOEISTOF, VOOR CUTAAN GEBRUIK | 0,096897 | ML
5650 | BETNELAN VLOEISTOF VOOR CUTAAN GEBRUIK 1MG/G | BETAMETHASONE-1-MG/ML-APPLICATIEVLOEISTOF, VOOR CUTAAN GEBRUIK | 0,096897 | ML
124437//17806 | BETAMETHASON BMODESTO HUIDEMULSIE 1MG/G | BETAMETHASONE-1-MG/ML-SMEERSEL/EMULSIE, ALS DERMATICUM | 0,099694 | ML
17806 | BETNELAN HUIDEMULSIE 1MG/G | BETAMETHASONE-1-MG/ML-SMEERSEL/EMULSIE, ALS DERMATICUM | 0,105730 | ML
5399 | CELESTONE CHRONODOSE INJSUSP AMPUL 1ML | BETAMETHASONE-5.7-MG/ML-INJ.VLOEISTOF AMPUL | 5,126000 | ML
15337 | BETOPTIC S OOGDRUPPELS 2,5MG/ML FLACON 5ML | BETAXOLOL-2.5-MG/ML-OOGDRUPPELS | 0,927802 | ML
EU/1/20/1509/002 | ALYMSYS INFVLST CONC 25MG/ML FLACON 16ML | BEVACIZUMAB-25-MG/ML-INFUUSVLOEISTOF, FLACON | 59,023958 | ML
EU/1/20/1509/001 | ALYMSYS INFVLST CONC 25MG/ML FLACON 4ML | BEVACIZUMAB-25-MG/ML-INFUUSVLOEISTOF, FLACON | 59,023958 | ML
EU/1/04/300/001 | AVASTIN INFVLST CONC 25MG/ML FLACON 4ML | BEVACIZUMAB-25-MG/ML-INFUUSVLOEISTOF, FLACON | 59,023958 | ML
EU/1/04/300/002 | AVASTIN INFVLST CONC 25MG/ML FLACON 16ML | BEVACIZUMAB-25-MG/ML-INFUUSVLOEISTOF, FLACON | 59,023958 | ML
EU/1/20/1454/002 | AYBINTIO INFVLST CONC 25MG/ML FLACON 16ML | BEVACIZUMAB-25-MG/ML-INFUUSVLOEISTOF, FLACON | 59,023958 | ML
EU/1/20/1454/001 | AYBINTIO INFVLST CONC 25MG/ML FLACON 4ML | BEVACIZUMAB-25-MG/ML-INFUUSVLOEISTOF, FLACON | 59,023958 | ML
EU/1/17/1246/002 | MVASI INFVLST CONC 25MG/ML FLACON 16ML | BEVACIZUMAB-25-MG/ML-INFUUSVLOEISTOF, FLACON | 59,023958 | ML
EU/1/17/1246/001 | MVASI INFVLST CONC 25MG/ML FLACON 4ML | BEVACIZUMAB-25-MG/ML-INFUUSVLOEISTOF, FLACON | 59,023958 | ML
EU/1/20/1510/002 | OYAVAS INFVLST CONC 25MG/ML FLACON 16ML | BEVACIZUMAB-25-MG/ML-INFUUSVLOEISTOF, FLACON | 59,023958 | ML
EU/1/20/1510/001 | OYAVAS INFVLST CONC 25MG/ML FLACON 4ML | BEVACIZUMAB-25-MG/ML-INFUUSVLOEISTOF, FLACON | 59,023958 | ML
EU/1/18/1344/002 | ZIRABEV INFVLST CONC 25MG/ML FLACON 16ML | BEVACIZUMAB-25-MG/ML-INFUUSVLOEISTOF, FLACON | 59,023958 | ML
EU/1/01/178/001 | TARGRETIN CAPSULE 75MG | BEXAROTENE-75-MG-CAPSULE | 11,397954 | STUK
28346//18388 | BEZALIP RETARD TABLET MGA 400MG | BEZAFIBRATE-400-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,232350 | STUK
18388 | BEZALIP RETARD TABLET MGA 400MG | BEZAFIBRATE-400-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,235019 | STUK
109671 | BICALUTAMIDE FAIR-MED TABLET FILMOMHULD 50MG | BICALUTAMID-50-MG-TABLET | 2,201787 | STUK
34467 | BICALUTAMIDE PCH TABLET FILMOMHULD 50MG | BICALUTAMID-50-MG-TABLET | 2,201787 | STUK
102249 | BILURON TABLET FILMOMHULD 50MG | BICALUTAMID-50-MG-TABLET | 2,201787 | STUK
18356 | CASODEX TABLET 50MG | BICALUTAMID-50-MG-TABLET | 2,201787 | STUK
114643 | BIMATOPROST CF OOGDRUPPELS 0,3 MG/ML FLACON 3ML | BIMATOPROST-.3-MG/ML-OOGDRUPPELS | 3,738176 | ML
EU/1/02/205/001 | LUMIGAN OOGDRUPPELS 0,3MG/ML FLACON 3ML | BIMATOPROST-.3-MG/ML-OOGDRUPPELS | 3,738176 | ML
EU/1/02/205/002 | LUMIGAN OOGDRUPPELS 0,3MG/ML FLACON 3ML | BIMATOPROST-.3-MG/ML-OOGDRUPPELS | 3,738176 | ML
114648 | BIMATOPROST MYLAN OOGDRUPPELS 0,1MG/ML FLACON 3ML | BIMATOPROST-0.1-MG/ML-OOGDRUPPELS | 3,235942 | ML
EU/1/02/205/003 | LUMIGAN OOGDRUPPELS 0,1MG/ML FLACON 3ML | BIMATOPROST-0.1-MG/ML-OOGDRUPPELS | 3,244237 | ML
EU/1/02/205/006 | LUMIGAN OOGDRUPPELS 0,3MG/ML MINIM 0,4ML | BIMATOPROST-0.3-MG/ML-OOGDRUPPELS UNITDOSE | 1,140956 | ML
EU/1/18/1315/001 | MEKTOVI TABLET FILMOMHULD 15MG | BINIMETINIB-15-MG-TABLET | 31,431472 | STUK
2196 | AKINETON TABLET 2MG | BIPERIDEN-2-MG-TABLET | 0,048134 | STUK
26450//2196 | AKINETON TABLET 2MG | BIPERIDEN-2-MG-TABLET | 0,048134 | STUK
106067 | BISOPROLOLFUMARAAT MYLAN TABLET 1,25MG | BISOPROLOL-1.25-MG-TABLET | 0,099618 | STUK
33096 | BISOPROLOLFUMARAAT SANDOZ TABLET 1,25MG | BISOPROLOL-1.25-MG-TABLET | 0,108911 | STUK
107723 | BISOPROLOLFUMARAAT TEVA TABLET 1,25MG | BISOPROLOL-1.25-MG-TABLET | 0,108911 | STUK
24009 | BISOPROLOLFUMARAAT PCH TABLET 10MG | BISOPROLOL-10-MG-TABLET | 0,108458 | STUK
33101 | BISOPROLOLFUMARAAT SANDOZ TABLET 10MG | BISOPROLOL-10-MG-TABLET | 0,108458 | STUK
116525 | COSIMPREL TABLET FILMOMHULD 10/10MG | BISOPROLOL-10-MG-TABLET-PERINDOPRIL-10-MG-TABLET | 0,334623 | STUK
116524 | COSIMPREL TABLET FILMOMHULD 10/ 5MG | BISOPROLOL-10-MG-TABLET-PERINDOPRIL-5-MG-TABLET | 0,252726 | STUK
108798 | BISOPROLOLFUMARAAT ACCORD TABLET FILMOMHULD 2,5MG | BISOPROLOL-2.5-MG-TABLET | 0,077976 | STUK
102391 | BISOPROLOLFUMARAAT CF TABLET 2,5MG | BISOPROLOL-2.5-MG-TABLET | 0,084811 | STUK
106055 | BISOPROLOLFUMARAAT DECO AUROB TABL FILMOMH 2,5MG | BISOPROLOL-2.5-MG-TABLET | 0,084811 | STUK
33097 | BISOPROLOLFUMARAAT SANDOZ TABLET 2,5MG | BISOPROLOL-2.5-MG-TABLET | 0,084811 | STUK
107724 | BISOPROLOLFUMARAAT TEVA TABLET 2,5MG | BISOPROLOL-2.5-MG-TABLET | 0,084811 | STUK
24503 | EMCOR DECO TABLET 2,5MG | BISOPROLOL-2.5-MG-TABLET | 0,082261 | STUK
24008 | BISOPROLOLFUMARAAT PCH TABLET 5MG | BISOPROLOL-5-MG-TABLET | 0,084866 | STUK
33099 | BISOPROLOLFUMARAAT SANDOZ TABLET 5MG | BISOPROLOL-5-MG-TABLET | 0,084866 | STUK
116523 | COSIMPREL TABLET FILMOMHULD 5/10MG | BISOPROLOL-5-MG-TABLET-PERINDOPRIL-10-MG-TABLET | 0,282291 | STUK
116522 | COSIMPREL TABLET FILMOMHULD 5/ 5MG | BISOPROLOL-5-MG-TABLET-PERINDOPRIL-5-MG-TABLET | 0,200394 | STUK
24506 | EMCOR DECO TABLET 7,5MG | BISOPROLOL-7.5-MG-TABLET | 0,120486 | STUK
116622 | BIVALIRUDINE ACCORD INJ/INFUSIEPOEDER FLACON 250MG | BIVALIRUDINE-250-MG-POED. V. INJECTIE, FLACON | 276,915927 | STUK
105676 | BLEOMEDAC INJPDR FLACON 15000IU PH EUR | BLEOMYCIN-15000-IE-POED. V. INJECTIE, FLACON | 30,375756 | STUK
114717//105676 | BLEOMYCINE EURECO PH INJPDR FLACON 15000IU PH EUR | BLEOMYCIN-15000-IE-POED. V. INJECTIE, FLACON | 27,338180 | STUK
EU/1/15/1047/001 | BLINCYTO INFPDR FLACON 38,5MCG + SOLV 10ML | BLINATUMOMAB-0.0385-MG-POED. V. INFUSIE,FLACON | 2717,017464 | STUK
EU/1/04/274/002 | VELCADE INJPDR IV FLACON 1MG | BORTEZOMIB-1-MG-POED. V. INJECTIE, FLACON | 303,778500 | STUK
120351 | BORTEZOMIB CF INJVLST 2,5MG/ML FLACON 1,4ML | BORTEZOMIB-2.5-MG/ML-INJECTIEVLOEISTOF, FLAC | 319,330956 | ML
EU/1/04/274/001 | VELCADE INJPDR IV/SC FLACON 3,5MG | BORTEZOMIB-3.5-MG-POED. V. INJECTIE, FLACON | 625,305723 | STUK
114397 | BOSENTAN ACCORD TABLET FILMOMHULD 125MG | BOSENTAN-125-MG-TABLET | 18,386693 | STUK
117028 | BOSENTAN SANDOZ TABLET FILMOMHULD 125MG | BOSENTAN-125-MG-TABLET | 22,594312 | STUK
116950 | BOSENTAN TEVA TABLET FILMOMHULD 125MG | BOSENTAN-125-MG-TABLET | 22,594312 | STUK
EU/1/02/220/008 | TRACLEER TABLET FILMOMHULD 125MG | BOSENTAN-125-MG-TABLET | 20,334881 | STUK
EU/1/02/220/004 | TRACLEER TABLET FILMOMHULD 125MG | BOSENTAN-125-MG-TABLET | 22,594312 | STUK
117027 | BOSENTAN SANDOZ TABLET FILMOMHULD 62,5MG | BOSENTAN-62.5-MG-TABLET | 21,802565 | STUK
116946 | BOSENTAN TEVA TABLET FILMOMHULD 62,5MG | BOSENTAN-62.5-MG-TABLET | 21,802565 | STUK
EU/1/02/220/002 | TRACLEER TABLET FILMOMHULD 62,5MG | BOSENTAN-62.5-MG-TABLET | 21,802565 | STUK
EU/1/02/220/007 | TRACLEER TABLET FILMOMHULD 62,5MG | BOSENTAN-62.5-MG-TABLET | 21,802565 | STUK
113961 | XEOMIN INJECTIEPOEDER FLACON 100E | BOTULINUM TOXIN-100-IE/LD50-POED. V. INJECTIE, FLACON | 171,143651 | STUK
117448 | BOCOUTURE INJPDR FLACON 100E | BOTULINUM TOXIN-100-IE-POED. V. INJECTIE, FLACON | 189,411562 | STUK
114883//17379 | BOTOX INJECTIEPOEDER FLACON 100E | BOTULINUM TOXIN-100-IE-POED. V. INJECTIE, FLACON | 189,411562 | STUK
117146 | BOTOX INJECTIEPOEDER FLACON 100E | BOTULINUM TOXIN-100-IE-POED. V. INJECTIE, FLACON | 189,411562 | STUK
117239//17379 | BOTOX INJECTIEPOEDER FLACON 100E | BOTULINUM TOXIN-100-IE-POED. V. INJECTIE, FLACON | 189,411562 | STUK
117255//17379 | BOTOX INJECTIEPOEDER FLACON 100E | BOTULINUM TOXIN-100-IE-POED. V. INJECTIE, FLACON | 189,411562 | STUK
117380//117146 | BOTOX INJECTIEPOEDER FLACON 100E | BOTULINUM TOXIN-100-IE-POED. V. INJECTIE, FLACON | 189,411562 | STUK
121158//117146 | BOTOX INJECTIEPOEDER FLACON 100E | BOTULINUM TOXIN-100-IE-POED. V. INJECTIE, FLACON | 189,411562 | STUK
121735//117146 | BOTOX INJECTIEPOEDER FLACON 100E | BOTULINUM TOXIN-100-IE-POED. V. INJECTIE, FLACON | 189,411562 | STUK
123539//117146 | BOTOX INJECTIEPOEDER FLACON 100E | BOTULINUM TOXIN-100-IE-POED. V. INJECTIE, FLACON | 189,411562 | STUK
106065 | AZZALURE INJPDR 125E FLACON | BOTULINUM TOXIN-125-IE/LD50-POED. V. INJECTIE, FLACON | 89,076914 | STUK
115734 | XEOMIN INJECTIEPOEDER FLACON 200E | BOTULINUM TOXIN-200-IE/LD50-POED. V. INJECTIE, FLACON | 341,109566 | STUK
110968//17505 | DYSPORT INJECTIEPOEDER FLACON 500E | BOTULINUM TOXIN-500-IE-POED. V. INJECTIE, FLACON | 195,312731 | STUK
117083//17505 | DYSPORT INJECTIEPOEDER FLACON 500E | BOTULINUM TOXIN-500-IE-POED. V. INJECTIE, FLACON | 195,312731 | STUK
119380//17505 | DYSPORT INJECTIEPOEDER FLACON 500E | BOTULINUM TOXIN-500-IE-POED. V. INJECTIE, FLACON | 195,312731 | STUK
123525//17505 | DYSPORT INJECTIEPOEDER FLACON 500E | BOTULINUM TOXIN-500-IE-POED. V. INJECTIE, FLACON | 195,312731 | STUK
123678//17505 | DYSPORT INJECTIEPOEDER FLACON 500E | BOTULINUM TOXIN-500-IE-POED. V. INJECTIE, FLACON | 195,312731 | STUK
125666//17505 | DYSPORT INJECTIEPOEDER FLACON 500E | BOTULINUM TOXIN-500-IE-POED. V. INJECTIE, FLACON | 195,312731 | STUK
17505 | DYSPORT INJECTIEPOEDER FLACON 500E | BOTULINUM TOXIN-500-IE-POED. V. INJECTIE, FLACON | 195,312731 | STUK
113963 | XEOMIN INJECTIEPOEDER FLACON 50E | BOTULINUM TOXIN-50-IE/LD50-POED. V. INJECTIE, FLACON | 87,619938 | STUK
107018 | BOCOUTURE INJPDR FLACON 50E | BOTULINUM TOXIN-50-IE-POED. V. INJECTIE, FLACON | 116,108610 | STUK
124957//107018 | BOCOUTURE INJPDR FLACON 50E | BOTULINUM TOXIN-50-IE-POED. V. INJECTIE, FLACON | 116,108610 | STUK
EU/1/12/794/001 | ADCETRIS INFUSIEPOEDER FLACON 50MG | BRENTUXIMAB VEDOTIN-50-MG-POED. V. INFUSIE,FLACON | 3177,830198 | STUK
21754 | ALPHAGAN OOGDRUPPELS 2MG/ML FLACON 5ML | BRIMONIDINE-2-MG/ML-OOGDRUPPELS | 1,245093 | ML
100260 | BRIMONIDINETARTRAAT MYLAN OOGDR 2MG/ML FL 5ML | BRIMONIDINE-2-MG/ML-OOGDRUPPELS | 1,245093 | ML
103574 | BRIMONIDINETARTRAAT SANDOZ OOGDR 2MG/ML FL 5ML | BRIMONIDINE-2-MG/ML-OOGDRUPPELS | 1,245093 | ML
EU/1/14/933/001 | SIMBRINZA OOGDRUPPELS FLACON 5ML | BRIMONIDINE-2-MG/ML-OOGDRUPPELS-BRINZOLAMIDE-10-MG/ML-OOGDRUPPELS | 2,287352 | ML
EU/1/14/933/002 | SIMBRINZA OOGDRUPPELS FLACON 5ML | BRIMONIDINE-2-MG/ML-OOGDRUPPELS-BRINZOLAMIDE-10-MG/ML-OOGDRUPPELS | 2,287352 | ML
EU/1/13/904/005 | MIRVASO GEL 3MG/G | BRIMONIDINE-3-MG/G-HUIDGEL | 1,374315 | G
EU/1/00/129/001 | AZOPT OOGDRUPPELS 10MG/ML FLACON 5ML | BRINZOLAMIDE-10-MG/ML-OOGDRUPPELS | 1,319923 | ML
EU/1/00/129/003 | AZOPT OOGDRUPPELS 10MG/ML FLACON 5ML | BRINZOLAMIDE-10-MG/ML-OOGDRUPPELS | 1,319923 | ML
112025 | BRINZOLAMIDE CF OOGDR 10MG/ML FLACON 5ML | BRINZOLAMIDE-10-MG/ML-OOGDRUPPELS | 1,319923 | ML
114558 | BRINZOLAMIDE MYLAN OOGDR 10MG/ML FLACON 5ML | BRINZOLAMIDE-10-MG/ML-OOGDRUPPELS | 1,319923 | ML
113375 | BRINZOLAMIDE SANDOZ OOGDR 10MG/ML FLACON 5ML | BRINZOLAMIDE-10-MG/ML-OOGDRUPPELS | 1,319923 | ML
113971 | BRINZOLAMIDE TEVA OOGDR 10MG/ML FLACON 5ML | BRINZOLAMIDE-10-MG/ML-OOGDRUPPELS | 1,319923 | ML
EU/1/15/1073/018 | BRIVIACT TABLET FILMOMHULD 100MG | BRIVARACETAM-100-MG-TABLET | 2,543655 | STUK
EU/1/16/1155/001 | KYNTHEUM INJVLST 140MG/ML WWSP 1,5ML | BRODALUMAB-210-MG-INJ.VLOEISTOF, WWSP | 599,908644 | STUK
12992 | BROMAZEPAM SANDOZ TABLET 6MG | BROMAZEPAM-6-MG-TABLET | 0,085153 | STUK
EU/1/11/692/001 | YELLOX OOGDRUPPELS 0,9MG/ML FLACON 5ML | BROMFENAC-0.9-MG/ML-OOGDRUPPELS | 1,486134 | ML
8202 | PARLODEL TABLET 2,5MG | BROMOCRIPTINE-2.5-MG-TABLET | 0,990272 | STUK
106952//23838 | RHINOCORT NEVEL NEUSSPRAY 64MCG/DO 120DO | BUDESONIDE-.064-MG-NEUSSPRAY | 0,044936 | DOSIS
110505//23838 | RHINOCORT NEVEL NEUSSPRAY 64MCG/DO 120DO | BUDESONIDE-.064-MG-NEUSSPRAY | 0,044936 | DOSIS
31010//23838 | RHINOCORT NEVEL NEUSSPRAY 64MCG/DO 120DO | BUDESONIDE-.064-MG-NEUSSPRAY | 0,044936 | DOSIS
14758 | PULMICORT 100 TURBUHALER INHALPDR 100MCG/DO 200DO | BUDESONIDE-.1-MG-INHALATIEPOEDER INCL INHALER | 0,072195 | DOSIS
25886 | SYMBICORT TURBUHALER INHALPDR 100/6MCG/DO 120DO | BUDESONIDE-.1-MG-INHALATIEPOEDER INCL INHALER-FORMOTEROL-.006-MG-INHALATIEPOEDER INCL INHALER | 0,272857 | DOSIS
32122 | BUDESONIDE SANDOZ VERNEVELSUSP 0,25MG/ML AMP 2ML | BUDESONIDE-.25-MG/ML-INHALATIEVLOEISTOF UNITDOSE | 0,575465 | ML
112504 | BUDESONIDE TEVA STERI-NEB VERNS 0,25MG/ML AMP 2ML | BUDESONIDE-.25-MG/ML-INHALATIEVLOEISTOF UNITDOSE | 0,575465 | ML
14196 | PULMICORT 500 VERNEVELSUSP 0,250MG/ML RESPULE 2ML | BUDESONIDE-.25-MG/ML-INHALATIEVLOEISTOF UNITDOSE | 0,575465 | ML
28795 | BUDESONIDE NOVOLIZER INHALPD NAVUL 200MCG/DO 200DO | BUDESONIDE-.2-MG-INHALATIEPOEDER | 0,102891 | DOSIS
18062 | BUDESONIDE CYCLOCAPS INHALPDR 200MCG +CYCLOHALER | BUDESONIDE-.2-MG-INHALATIEPOEDER INCL INHALER | 0,124195 | DOSIS
28795 | BUDESONIDE NOVOLIZER PDR START 200MCG/DO 200DO+INH | BUDESONIDE-.2-MG-INHALATIEPOEDER INCL INHALER | 0,124195 | DOSIS
30315 | BUDESONIDE ORION 200 EASYH INHALPDR 200MCG/DO 200D | BUDESONIDE-.2-MG-INHALATIEPOEDER INCL INHALER | 0,124195 | DOSIS
13698 | PULMICORT 200 TURBUHALER INHALPDR 200MCG/DO 200DO | BUDESONIDE-.2-MG-INHALATIEPOEDER INCL INHALER | 0,111744 | DOSIS
116984 | BUFOLER EASYHALER INHPDR 160/4,5MCG 120DO | BUDESONIDE-.2-MG-INHALATIEPOEDER INCL INHALER-FORMOTEROL-.006-MG-INHALATIEPOEDER INCL INHALER | 0,272519 | DOSIS
EU/1/14/920/001 | DUORESP SPIROMAX INHPDR 160/4,5MCG 120DO | BUDESONIDE-.2-MG-INHALATIEPOEDER INCL INHALER-FORMOTEROL-.006-MG-INHALATIEPOEDER INCL INHALER | 0,231014 | DOSIS
122880//25887 | SYMBICORT TURBUHALER INHALPDR 200/6MCG/DO 60DO | BUDESONIDE-.2-MG-INHALATIEPOEDER INCL INHALER-FORMOTEROL-.006-MG-INHALATIEPOEDER INCL INHALER | 0,231014 | DOSIS
122798//25887 | SYMBICORT TURBUHALER INHALPDR 200/6MCG/DO 120DO | BUDESONIDE-.2-MG-INHALATIEPOEDER INCL INHALER-FORMOTEROL-.006-MG-INHALATIEPOEDER INCL INHALER | 0,231014 | DOSIS
123642//25887 | SYMBICORT TURBUHALER INHALPDR 200/6MCG/DO 120DO | BUDESONIDE-.2-MG-INHALATIEPOEDER INCL INHALER-FORMOTEROL-.006-MG-INHALATIEPOEDER INCL INHALER | 0,231014 | DOSIS
25887 | SYMBICORT TURBUHALER INHALPDR 200/6MCG/DO 120DO | BUDESONIDE-.2-MG-INHALATIEPOEDER INCL INHALER-FORMOTEROL-.006-MG-INHALATIEPOEDER INCL INHALER | 0,231014 | DOSIS
18063 | BUDESONIDE CYCLOCAPS INHALPDR 400MCG +CYCLOHALER | BUDESONIDE-.4-MG-INHALATIEPOEDER INCL INHALER | 0,244555 | DOSIS
32454 | BUDESONIDE NOVOLIZER PDR START 400MCG/DO 100DO+INH | BUDESONIDE-.4-MG-INHALATIEPOEDER INCL INHALER | 0,244555 | DOSIS
30316 | BUDESONIDE ORION 400 EASYH INHALPDR 400MCG/DO 100D | BUDESONIDE-.4-MG-INHALATIEPOEDER INCL INHALER | 0,244555 | DOSIS
13699 | PULMICORT 400 TURBUHALER INHALPDR 400MCG/DO 50DO | BUDESONIDE-.4-MG-INHALATIEPOEDER INCL INHALER | 0,234216 | DOSIS
13699 | PULMICORT 400 TURBUHALER INHALPDR 400MCG/DO 200DO | BUDESONIDE-.4-MG-INHALATIEPOEDER INCL INHALER | 0,234216 | DOSIS
116988 | BUFOLER EASYHALER INHPDR 320/9MCG 60DO | BUDESONIDE-.4-MG-INHALATIEPOEDER INCL INHALER-FORMOTEROL-.012-MG-INHALATIEPOEDER INCL INHALER | 0,535049 | DOSIS
EU/1/14/920/004 | DUORESP SPIROMAX INHPDR 320/9MCG 60DO | BUDESONIDE-.4-MG-INHALATIEPOEDER INCL INHALER-FORMOTEROL-.012-MG-INHALATIEPOEDER INCL INHALER | 0,453726 | DOSIS
122800//27690 | SYMBICORT TURBUHALER INHALPDR 400/12MCG/DO 60DO | BUDESONIDE-.4-MG-INHALATIEPOEDER INCL INHALER-FORMOTEROL-.012-MG-INHALATIEPOEDER INCL INHALER | 0,453726 | DOSIS
122883//27690 | SYMBICORT TURBUHALER INHALPDR 400/12MCG/DO 60DO | BUDESONIDE-.4-MG-INHALATIEPOEDER INCL INHALER-FORMOTEROL-.012-MG-INHALATIEPOEDER INCL INHALER | 0,453726 | DOSIS
27690 | SYMBICORT TURBUHALER INHALPDR 400/12MCG/DO 60DO | BUDESONIDE-.4-MG-INHALATIEPOEDER INCL INHALER-FORMOTEROL-.012-MG-INHALATIEPOEDER INCL INHALER | 0,453726 | DOSIS
32123 | BUDESONIDE SANDOZ VERNEVELSUSP 0,5MG/ML AMP 2ML | BUDESONIDE-.5-MG/ML-INHALATIEVLOEISTOF UNITDOSE | 0,842303 | ML
112505 | BUDESONIDE TEVA STERI-NEB VERNS 0,5MG/ML AMP 2ML | BUDESONIDE-.5-MG/ML-INHALATIEVLOEISTOF UNITDOSE | 0,842303 | ML
123557//14197 | PULMICORT 1000 VERNEVELSUSP 0,500MG/ML RESPULE 2ML | BUDESONIDE-.5-MG/ML-INHALATIEVLOEISTOF UNITDOSE | 0,729956 | ML
14197 | PULMICORT 1000 VERNEVELSUSP 0,500MG/ML RESPULE 2ML | BUDESONIDE-.5-MG/ML-INHALATIEVLOEISTOF UNITDOSE | 0,842303 | ML
116348 | SYMBICORT AEROSOL 200/6MCG/DOSIS SPUITBUS 120DO | BUDESONIDE-0.2-MG-AEROSOL-FORMOTEROL-0.006-MG-AEROSOL | 0,253445 | DOSIS
122249//116348 | SYMBICORT AEROSOL 200/6MCG/DOSIS SPUITBUS 120DO | BUDESONIDE-0.2-MG-AEROSOL-FORMOTEROL-0.006-MG-AEROSOL | 0,253445 | DOSIS
123399//116348 | SYMBICORT AEROSOL 200/6MCG/DOSIS SPUITBUS 120DO | BUDESONIDE-0.2-MG-AEROSOL-FORMOTEROL-0.006-MG-AEROSOL | 0,253445 | DOSIS
120712//116348 | SYMBICORT AEROSOL 200/6MCG/DOSIS SPUITBUS 120DO | BUDESONIDE-0.2-MG-AEROSOL-FORMOTEROL-0.006-MG-AEROSOL | 0,277357 | DOSIS
121006//15660 | ENTOCORT TABLET VOOR KLYSMA + SOLVENS 115ML | BUDESONIDE-2.3-MG-TABLET VOOR KLYSMA | 5,614525 | STUK
122586//15660 | ENTOCORT TABLET VOOR KLYSMA + SOLVENS 115ML | BUDESONIDE-2.3-MG-TABLET VOOR KLYSMA | 5,614525 | STUK
124316//15660 | ENTOCORT TABLET VOOR KLYSMA + SOLVENS 115ML | BUDESONIDE-2.3-MG-TABLET VOOR KLYSMA | 6,050330 | STUK
15660 | ENTOCORT TABLET VOOR KLYSMA + SOLVENS 115ML | BUDESONIDE-2.3-MG-TABLET VOOR KLYSMA | 6,050330 | STUK
102383 | BUDENOFALK SCHUIM 2MG/DO FLACON 14DO | BUDESONIDE-2-MG-SCHUIM, RECTAAL | 5,194486 | DOSIS
119365//102383 | BUDENOFALK SCHUIM 2MG/DO FLACON 14DO | BUDESONIDE-2-MG-SCHUIM, RECTAAL | 5,194486 | DOSIS
119729//102383 | BUDENOFALK SCHUIM 2MG/DO FLACON 14DO | BUDESONIDE-2-MG-SCHUIM, RECTAAL | 5,194486 | DOSIS
108613//22557 | BUDENOFALK CAPSULE MSR 3MG | BUDESONIDE-3-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,783673 | STUK
124934//22557 | BUDENOFALK CAPSULE MSR 3MG | BUDESONIDE-3-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,783673 | STUK
22557 | BUDENOFALK CAPSULE MSR 3MG | BUDESONIDE-3-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,783673 | STUK
123643//22557 | BUDESONIDE BMODESTO CAPSULE MSR 3MG | BUDESONIDE-3-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,783673 | STUK
120666//22557 | BUDESONIDE FISHER CAPSULE MSR 3MG | BUDESONIDE-3-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,839363 | STUK
101367//18765 | ENTOCORT CAPSULE MGA 3MG | BUDESONIDE-3-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,783673 | STUK
121916//18765 | ENTOCORT CAPSULE MGA 3MG | BUDESONIDE-3-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,783673 | STUK
125021//18765 | ENTOCORT CAPSULE MGA 3MG | BUDESONIDE-3-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,783673 | STUK
18765 | ENTOCORT CAPSULE MGA 3MG | BUDESONIDE-3-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,783673 | STUK
123687//18765 | ENTOCORT CAPSULE MGA 3MG | BUDESONIDE-3-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,839363 | STUK
106117 | BUDENOFALK GRANULAAT MSR 9MG IN SACHET | BUDESONIDE-9-MG-GRANULAAT, MAAGSAPRESISTENT, VERDEELD | 2,933070 | STUK
121931//106117 | BUDENOFALK GRANULAAT MSR 9MG IN SACHET | BUDESONIDE-9-MG-GRANULAAT, MAAGSAPRESISTENT, VERDEELD | 2,933070 | STUK
122382//106117 | BUDENOFALK GRANULAAT MSR 9MG IN SACHET | BUDESONIDE-9-MG-GRANULAAT, MAAGSAPRESISTENT, VERDEELD | 2,933070 | STUK
122413//106117 | BUDENOFALK GRANULAAT MSR 9MG IN SACHET | BUDESONIDE-9-MG-GRANULAAT, MAAGSAPRESISTENT, VERDEELD | 2,933070 | STUK
122558//106117 | BUDENOFALK GRANULAAT MSR 9MG IN SACHET | BUDESONIDE-9-MG-GRANULAAT, MAAGSAPRESISTENT, VERDEELD | 2,933070 | STUK
110023 | CORTIMENT TABLET MVA 9MG | BUDESONIDE-9-MG-TABLET, MET GEREGULEERDE AFGIFTE | 3,060145 | STUK
12412 | BURINEX INJVLST 0,50MG/ML AMPUL 4ML | BUMETANIDE-.5-MG/ML-INJ.VLOEISTOF AMPUL | 0,241890 | ML
23140 | BUMETANIDE CF TABLET 1MG | BUMETANIDE-1-MG-TABLET | 0,128727 | STUK
23141 | BUMETANIDE CF TABLET 5MG | BUMETANIDE-5-MG-TABLET | 0,488717 | STUK
30467 | BUMETANIDE TEVA TABLET 5MG | BUMETANIDE-5-MG-TABLET | 0,488717 | STUK
11872 | TEMGESIC SL TABLET OROMUCOSAAL 0,2MG | BUPRENORPHINE-.2-MG-TABLET, OROMUCOSAAL | 0,200623 | STUK
114442//11872 | TEMGESIC SL TABLET OROMUCOSAAL 0,2MG | BUPRENORPHINE-.2-MG-TABLET, OROMUCOSAAL | 0,220078 | STUK
8725 | TEMGESIC INJVLST 0,3MG/ML AMPUL 1ML | BUPRENORPHINE-.3-MG/ML-INJ.VLOEISTOF AMPUL | 1,048453 | ML
117659 | BUPRENORFINE MYLAN PLEISTER TRANSDERM 5MCG/UUR | BUPRENORPHINE-0.005-MG/H-PLEISTER, DERMAAL | 2,334455 | STUK
114799 | BUPRENORFINE SANDOZ PLEISTER TRANSDERM 5MCG/UUR | BUPRENORPHINE-0.005-MG/H-PLEISTER, DERMAAL | 3,475089 | STUK
100975 | BUTRANS PLEISTER TRANSDERMAAL 5MCG/UUR | BUPRENORPHINE-0.005-MG/H-PLEISTER, DERMAAL | 3,475089 | STUK
117216 | BUPRENORFINE GLENMARK PLEISTER TRANSDERM 10MCG/UUR | BUPRENORPHINE-0.01-MG/H-PLEISTER, DERMAAL | 5,359799 | STUK
117660 | BUPRENORFINE MYLAN PLEISTER TRANSDERM 10MCG/UUR | BUPRENORPHINE-0.01-MG/H-PLEISTER, DERMAAL | 4,090660 | STUK
114800 | BUPRENORFINE SANDOZ PLEISTER TRANSDERM 10MCG/UUR | BUPRENORPHINE-0.01-MG/H-PLEISTER, DERMAAL | 5,359799 | STUK
100978 | BUTRANS PLEISTER TRANSDERMAAL 10MCG/UUR | BUPRENORPHINE-0.01-MG/H-PLEISTER, DERMAAL | 5,359799 | STUK
117217 | BUPRENORFINE GLENMARK PLEISTER TRANSDERM 20MCG/UUR | BUPRENORPHINE-0.02-MG/H-PLEISTER, DERMAAL | 8,341662 | STUK
117661 | BUPRENORFINE MYLAN PLEISTER TRANSDERM 20MCG/UUR | BUPRENORPHINE-0.02-MG/H-PLEISTER, DERMAAL | 7,274235 | STUK
114802 | BUPRENORFINE SANDOZ PLEISTER TRANSDERM 20MCG/UUR | BUPRENORPHINE-0.02-MG/H-PLEISTER, DERMAAL | 8,341662 | STUK
100979 | BUTRANS PLEISTER TRANSDERMAAL 20MCG/UUR | BUPRENORPHINE-0.02-MG/H-PLEISTER, DERMAAL | 8,341662 | STUK
32909 | TRANSTEC 35MCG/UUR MATRIXPLEISTER | BUPRENORPHINE-0.035-MG/H-PLEISTER, DERMAAL | 5,513265 | STUK
32910 | TRANSTEC 52,5MCG/UUR MATRIXPLEISTER | BUPRENORPHINE-0.0525-MG/H-PLEISTER, DERMAAL | 8,070394 | STUK
32911 | TRANSTEC 70MCG/UUR MATRIXPLEISTER | BUPRENORPHINE-0.07-MG/H-PLEISTER, DERMAAL | 10,128084 | STUK
102355 | BUPRENORFINE MYLAN TABLET SUBLINGUAAL 2MG | BUPRENORPHINE-2-MG-TABLET, OROMUCOSAAL | 0,852887 | STUK
120176 | BUNALICT TABLET SUBLINGUAAL 2MG/0,5MG | BUPRENORPHINE-2-MG-TABLET, OROMUCOSAAL-NALOXONE-0.5-MG-TABLET, OROMUCOSAAL | 0,805759 | STUK
121932 | BUPRENORFINE/NALOXON AUROB TAB SUBLINGUAAL 2/0,5MG | BUPRENORPHINE-2-MG-TABLET, OROMUCOSAAL-NALOXONE-0.5-MG-TABLET, OROMUCOSAAL | 0,805759 | STUK
120721 | BUPRENORFINE/NALOXON MYLAN TAB SUBLINGUAAL 2/0,5MG | BUPRENORPHINE-2-MG-TABLET, OROMUCOSAAL-NALOXONE-0.5-MG-TABLET, OROMUCOSAAL | 0,805759 | STUK
EU/1/06/359/001 | SUBOXONE TABLET SUBLINGUAAL 2MG/0,5MG | BUPRENORPHINE-2-MG-TABLET, OROMUCOSAAL-NALOXONE-0.5-MG-TABLET, OROMUCOSAAL | 0,805759 | STUK
102356 | BUPRENORFINE MYLAN TABLET SUBLINGUAAL 8MG | BUPRENORPHINE-8-MG-TABLET, OROMUCOSAAL | 2,335212 | STUK
120177 | BUNALICT TABLET SUBLINGUAAL 8MG/2MG | BUPRENORPHINE-8-MG-TABLET, OROMUCOSAAL-NALOXONE-2-MG-TABLET, OROMUCOSAAL | 2,590827 | STUK
121934 | BUPRENORFINE/NALOXON AUROB TAB SUBLINGUAAL 8/2MG | BUPRENORPHINE-8-MG-TABLET, OROMUCOSAAL-NALOXONE-2-MG-TABLET, OROMUCOSAAL | 2,590827 | STUK
120722 | BUPRENORFINE/NALOXON MYLAN TAB SUBLINGUAAL 8/2MG | BUPRENORPHINE-8-MG-TABLET, OROMUCOSAAL-NALOXONE-2-MG-TABLET, OROMUCOSAAL | 2,590827 | STUK
EU/1/06/359/003 | SUBOXONE TABLET SUBLINGUAAL 8MG/2MG | BUPRENORPHINE-8-MG-TABLET, OROMUCOSAAL-NALOXONE-2-MG-TABLET, OROMUCOSAAL | 2,590827 | STUK
105721//33669 | WELLBUTRIN XR TABLET MGA 300MG | BUPROPION-300-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,690095 | STUK
114168//33669 | WELLBUTRIN XR TABLET MGA 300MG | BUPROPION-300-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,690095 | STUK
33669 | WELLBUTRIN XR TABLET MGA 300MG | BUPROPION-300-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,690095 | STUK
EU/1/17/1262/002 | CRYSVITA INJVLST 20MG/ML FLACON 1ML | BUREAUSUMAB-20-MG/ML-INJECTIEVLOEISTOF, FLAC | 6549,902635 | ML
EU/1/17/1262/003 | CRYSVITA INJVLST 30MG/ML FLACON 1ML | BUREAUSUMAB-30-MG/ML-INJECTIEVLOEISTOF, FLAC | 9820,817600 | ML
21782=19732 | BUSPIRON HCL AUROBINDO TABLET 10MG | BUSPIRONE-10-MG-TABLET | 0,338634 | STUK
19732 | BUSPIRON HCL CF TABLET 10MG | BUSPIRONE-10-MG-TABLET | 0,338634 | STUK
21900 | BUSPIRON HCL SANDOZ TABLET 10MG | BUSPIRONE-10-MG-TABLET | 0,338634 | STUK
262 | MYLERAN TABLET 2MG | BUSULFAN-2-MG-TABLET | 2,692310 | STUK
EU/1/03/254/002 | BUSILVEX INFVLST CONC 6MG/ML FLACON 10ML | BUSULFAN-6-MG/ML-INFUUSVLOEISTOF, FLACON | 26,654910 | ML
120583 | BUSULFAN TEVA INFVLST CONC 6MG/ML FLACON 10ML | BUSULFAN-6-MG/ML-INFUUSVLOEISTOF, FLACON | 26,654910 | ML
EU/1/11/676/001 | JEVTANA INFVLST CONC 40MG/ML FLACON 1,5ML + SOLV | CABAZITAXEL-40-MG/ML-INFUUSVLOEISTOF, FLACON | 2819,943323 | ML
34176 | CABERGOLINE PCH TABLET 0,5MG | CABERGOLINE-.5-MG-TABLET | 4,847556 | STUK
121152//15375 | DOSTINEX TABLET 0,5MG | CABERGOLINE-.5-MG-TABLET | 4,801587 | STUK
122398//15375 | DOSTINEX TABLET 0,5MG | CABERGOLINE-.5-MG-TABLET | 4,801587 | STUK
123401//15375 | DOSTINEX TABLET 0,5MG | CABERGOLINE-.5-MG-TABLET | 4,801587 | STUK
126385//15375 | DOSTINEX TABLET 0,5MG | CABERGOLINE-.5-MG-TABLET | 4,801587 | STUK
15375 | DOSTINEX TABLET 0,5MG | CABERGOLINE-.5-MG-TABLET | 4,801587 | STUK
EU/1/13/890/004 | COMETRIQ CAPSULE 20MG | CABOZANTINIB-20-MG-CAPSULE | 64,789854 | STUK
EU/1/16/1136/002 | CABOMETYX TABLET FILMOMHULD 20MG | CABOZANTINIB-20-MG-TABLET | 195,808209 | STUK
EU/1/16/1136/004 | CABOMETYX TABLET FILMOMHULD 40MG | CABOZANTINIB-40-MG-TABLET | 195,808209 | STUK
EU/1/16/1136/006 | CABOMETYX TABLET FILMOMHULD 60MG | CABOZANTINIB-60-MG-TABLET | 195,808209 | STUK
8201 | CALCITONINE ESSPHARMA INJVLST 100IE/ML AMPUL 1ML | CALCITONIN (SALMON SYNTHETIC)-100-IE/ML-INJ.VLOEISTOF AMPUL | 36,787070 | ML
112460//8285 | ROCALTROL CAPSULE 0,25MCG | CALCITRIOL-.00025-MG-CAPSULE | 0,267930 | STUK
20778//8285 | ROCALTROL CAPSULE 0,25MCG | CALCITRIOL-.00025-MG-CAPSULE | 0,267930 | STUK
8285 | ROCALTROL CAPSULE 0,25MCG | CALCITRIOL-.00025-MG-CAPSULE | 0,267930 | STUK
20779//8286 | ROCALTROL CAPSULE 0,50MCG | CALCITRIOL-.0005-MG-CAPSULE | 0,561749 | STUK
8286 | ROCALTROL CAPSULE 0,50MCG | CALCITRIOL-.0005-MG-CAPSULE | 0,561749 | STUK
16330 | SILKIS ZALF 3MCG/G | CALCITRIOL-.003-MG/G-ZALF, CUTAAN | 0,294220 | G
18866 | CAD CITROEN BRUISGRANULAAT 500MG/440IE IN SACHET | CALCIUM CARBONATE-1250-MG-BRUISPOEDER/BRUISGRANULAAT-COLECALCIFEROL-440-IE-BRUISPOEDER/BRUISGRANULAAT | 0,207554 | STUK
31002 | CAD ORANGE BRUISGRANULAAT 500MG/440IE IN SACHET | CALCIUM CARBONATE-1250-MG-BRUISPOEDER/BRUISGRANULAAT-COLECALCIFEROL-440-IE-BRUISPOEDER/BRUISGRANULAAT | 0,207554 | STUK
112389//25692 | CALCI CHEW D3 KAUWTABLET 500MG/400IE | CALCIUM CARBONATE-1250-MG-KAUWDRAGEE/KAUWTABLET-COLECALCIFEROL-400-IE-KAUWDRAGEE/KAUWTABLET | 0,102779 | STUK
25692 | CALCI CHEW D3 KAUWTABLET 500MG/400IE | CALCIUM CARBONATE-1250-MG-KAUWDRAGEE/KAUWTABLET-COLECALCIFEROL-400-IE-KAUWDRAGEE/KAUWTABLET | 0,102779 | STUK
31801 | TACAL D3 KAUWTABLET 500MG/400IE MUNT | CALCIUM CARBONATE-1250-MG-KAUWDRAGEE/KAUWTABLET-COLECALCIFEROL-400-IE-KAUWDRAGEE/KAUWTABLET | 0,115133 | STUK
105832 | CALCI CHEW D3 KAUWTABLET 500MG/800IE | CALCIUM CARBONATE-1250-MG-KAUWDRAGEE/KAUWTABLET-COLECALCIFEROL-800-IE-KAUWDRAGEE/KAUWTABLET | 0,165854 | STUK
112388//105832 | CALCI CHEW D3 KAUWTABLET 500MG/800IE | CALCIUM CARBONATE-1250-MG-KAUWDRAGEE/KAUWTABLET-COLECALCIFEROL-800-IE-KAUWDRAGEE/KAUWTABLET | 0,165854 | STUK
117421 | CALCIUM/VITAMINE D3 SANDOZ KAUWTABLET 500MG/800IE | CALCIUM CARBONATE-1250-MG-KAUWDRAGEE/KAUWTABLET-COLECALCIFEROL-800-IE-KAUWDRAGEE/KAUWTABLET | 0,165854 | STUK
102707 | KALCIPOS-D KAUWTABLET 500MG/800IE | CALCIUM CARBONATE-1250-MG-KAUWDRAGEE/KAUWTABLET-COLECALCIFEROL-800-IE-KAUWDRAGEE/KAUWTABLET | 0,165854 | STUK
119279//102707 | KALCIPOS-D KAUWTABLET 500MG/800IE | CALCIUM CARBONATE-1250-MG-KAUWDRAGEE/KAUWTABLET-COLECALCIFEROL-800-IE-KAUWDRAGEE/KAUWTABLET | 0,165854 | STUK
105833 | TACAL D3 KAUWTABLET 500MG/800IE SINAASAPPEL | CALCIUM CARBONATE-1250-MG-KAUWDRAGEE/KAUWTABLET-COLECALCIFEROL-800-IE-KAUWDRAGEE/KAUWTABLET | 0,165854 | STUK
18867 | CAD CITROEN BRUISGRANULAAT 1000MG/880IE IN SACHET | CALCIUM CARBONATE-2500-MG-BRUISPOEDER/BRUISGRANULAAT-COLECALCIFEROL-880-IE-BRUISPOEDER/BRUISGRANULAAT | 0,301210 | STUK
31003 | CAD ORANGE BRUISGRANULAAT 1000MG/880IE IN SACHET | CALCIUM CARBONATE-2500-MG-BRUISPOEDER/BRUISGRANULAAT-COLECALCIFEROL-880-IE-BRUISPOEDER/BRUISGRANULAAT | 0,301210 | STUK
101127 | CALCI CHEW D3 KAUWTABLET 1000MG/800IE | CALCIUM CARBONATE-2500-MG-KAUWDRAGEE/KAUWTABLET-COLECALCIFEROL-800-IE-KAUWDRAGEE/KAUWTABLET | 0,295737 | STUK
112394//101127 | CALCI CHEW D3 KAUWTABLET 1000MG/800IE | CALCIUM CARBONATE-2500-MG-KAUWDRAGEE/KAUWTABLET-COLECALCIFEROL-800-IE-KAUWDRAGEE/KAUWTABLET | 0,295737 | STUK
116190 | FOLIKABI INJ/INFVLST 10MG/ML FLACON 5ML | CALCIUM FOLINATE-10-MG/ML-INJECTIEVLOEISTOF, FLAC | 3,023297 | ML
116190 | FOLIKABI INJ/INFVLST 10MG/ML FLACON 10ML | CALCIUM FOLINATE-10-MG/ML-INJECTIEVLOEISTOF, FLAC | 3,023297 | ML
116190 | FOLIKABI INJ/INFVLST 10MG/ML FLACON 20ML | CALCIUM FOLINATE-10-MG/ML-INJECTIEVLOEISTOF, FLAC | 3,023297 | ML
116190 | FOLIKABI INJ/INFVLST 10MG/ML FLACON 35ML | CALCIUM FOLINATE-10-MG/ML-INJECTIEVLOEISTOF, FLAC | 3,023297 | ML
116190 | FOLIKABI INJ/INFVLST 10MG/ML FLACON 50ML | CALCIUM FOLINATE-10-MG/ML-INJECTIEVLOEISTOF, FLAC | 3,023297 | ML
15827 | FOLINEZUUR SANDOZ INJVLST 10MG/ML FLACON 40ML | CALCIUM FOLINATE-10-MG/ML-INJECTIEVLOEISTOF, FLAC | 3,023297 | ML
17416 | RESCUVOLIN INJECTIEVLOEISTOF 10MG/ML FLACON 5ML | CALCIUM FOLINATE-10-MG/ML-INJECTIEVLOEISTOF, FLAC | 3,023297 | ML
17416 | RESCUVOLIN INJECTIEVLOEISTOF 10MG/ML FLACON 10ML | CALCIUM FOLINATE-10-MG/ML-INJECTIEVLOEISTOF, FLAC | 3,023297 | ML
17416 | RESCUVOLIN INJECTIEVLOEISTOF 10MG/ML FLACON 30ML | CALCIUM FOLINATE-10-MG/ML-INJECTIEVLOEISTOF, FLAC | 3,023297 | ML
8997 | RESCUVOLIN TABLET 15MG | CALCIUM FOLINATE-15-MG-TABLET | 3,080846 | STUK
EU/1/13/884/003 | INVOKANA TABLET 100MG | CANAGLIFLOZIN-100-MG-TABLET | 1,360125 | STUK
EU/1/13/884/008 | INVOKANA TABLET 300MG | CANAGLIFLOZIN-300-MG-TABLET | 1,575378 | STUK
EU/1/13/884/006 | INVOKANA TABLET 300MG | CANAGLIFLOZIN-300-MG-TABLET | 1,837146 | STUK
EU/1/09/564/004 | ILARIS INJVLST 150MG/ML FLACON 1ML | CANAKINUMAB-150-MG/ML-INJECTIEVLOEISTOF, FLAC | 11380,146245 | ML
21706 | ATACAND TABLET 16MG | CANDESARTAN-16-MG-TABLET | 0,250820 | STUK
100143 | CANDESARTAN CILEXETIL SANDOZ TABLET 16MG | CANDESARTAN-16-MG-TABLET | 0,250820 | STUK
107532 | CANDESARTAN CILEXETIL TEVA TABLET 16MG | CANDESARTAN-16-MG-TABLET | 0,250820 | STUK
30755 | ATACAND TABLET 32MG | CANDESARTAN-32-MG-TABLET | 0,338774 | STUK
100144 | CANDESARTAN CILEXETIL SANDOZ TABLET 32MG | CANDESARTAN-32-MG-TABLET | 0,338774 | STUK
21704 | ATACAND TABLET 4MG | CANDESARTAN-4-MG-TABLET | 0,204206 | STUK
100133 | CANDESARTAN CILEXETIL SANDOZ TABLET 4MG | CANDESARTAN-4-MG-TABLET | 0,204206 | STUK
21705 | ATACAND TABLET 8MG | CANDESARTAN-8-MG-TABLET | 0,213152 | STUK
100135 | CANDESARTAN CILEXETIL SANDOZ TABLET 8MG | CANDESARTAN-8-MG-TABLET | 0,213152 | STUK
107526 | CANDESARTAN CILEXETIL TEVA TABLET 8MG | CANDESARTAN-8-MG-TABLET | 0,213152 | STUK
EU/1/00/163/001 | XELODA TABLET FILMOMHULD 150MG | CAPECITABINE-150-MG-TABLET | 0,450920 | STUK
EU/1/00/163/002 | XELODA TABLET FILMOMHULD 500MG | CAPECITABINE-500-MG-TABLET | 1,650735 | STUK
EU/1/18/1305/001 | CABLIVI INJPDR FLACON 10MG + SOLVENS 1ML + TOEBEH | CAPLACIZUMAB-10-MG-POED. V. INJECTIE, FLACON | 4431,014916 | STUK
EU/1/18/1305/003 | CABLIVI INJPDR FLACON 10MG + SOLVENS 1ML + TOEBEH | CAPLACIZUMAB-10-MG-POED. V. INJECTIE, FLACON | 4431,014916 | STUK
23055 | CAPTOPRIL ACCORD TABLET 12,5MG | CAPTOPRIL-12.5-MG-TABLET | 0,062395 | STUK
23069 | CAPTOPRIL PCH TABLET 12,5MG | CAPTOPRIL-12.5-MG-TABLET | 0,062395 | STUK
23056 | CAPTOPRIL ACCORD TABLET 25MG | CAPTOPRIL-25-MG-TABLET | 0,096103 | STUK
23683 | CAPTOPRIL MYLAN TABLET 25MG | CAPTOPRIL-25-MG-TABLET | 0,096103 | STUK
23057 | CAPTOPRIL ACCORD TABLET 50MG | CAPTOPRIL-50-MG-TABLET | 0,113433 | STUK
23684 | CAPTOPRIL MYLAN TABLET 50MG | CAPTOPRIL-50-MG-TABLET | 0,119123 | STUK
9884 | CARBAMAZEPINE APOTEX TABLET 200MG | CARBAMAZEPINE-200-MG-TABLET | 0,093928 | STUK
55157 | CARBAMAZEPINE CF TABLET 200MG | CARBAMAZEPINE-200-MG-TABLET | 0,085669 | STUK
11735 | CARBAMAZEPINE MYLAN TABLET 200MG | CARBAMAZEPINE-200-MG-TABLET | 0,093928 | STUK
3899 | TEGRETOL TABLET 200MG | CARBAMAZEPINE-200-MG-TABLET | 0,093928 | STUK
21169 | CARBAMAZEPINE APOTEX RETARD TABLET MGA 200MG | CARBAMAZEPINE-200-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,088604 | STUK
24401 | CARBAMAZEPINE SANDOZ RETARD TABLET MGA 200MG | CARBAMAZEPINE-200-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,088604 | STUK
11874 | TEGRETOL CR TABLET MGA 200MG | CARBAMAZEPINE-200-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,088604 | STUK
6346 | TEGRETOL SUSPENSIE 20MG/ML | CARBAMAZEPINE-20-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,025088 | ML
16869 | CARBAMAZEPINE APOTEX RETARD TABLET MGA 400MG | CARBAMAZEPINE-400-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,150387 | STUK
24402 | CARBAMAZEPINE SANDOZ RETARD TABLET MGA 400MG | CARBAMAZEPINE-400-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,150387 | STUK
11875 | TEGRETOL CR TABLET MGA 400MG | CARBAMAZEPINE-400-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,150387 | STUK
50906 | CARBIMAZOL TEVA TABLET 5MG | CARBIMAZOLE-5-MG-TABLET | 0,251067 | STUK
15881=14227 | DRY EYE GEL OOGGEL TUBE 10G | CARBOMEER 974-3-MG/G-OOGGEL | 0,457409 | G
14227 | THILO TEARS OOGGEL TUBE 10G | CARBOMEER 974-3-MG/G-OOGGEL | 0,457409 | G
107234 | LIPOSIC OOGGEL 2MG/G TUBE 10G | CARBOMEER 980-2-MG/G-OOGGEL | 0,341582 | G
110177//107234 | LIPOSIC OOGGEL 2MG/G TUBE 10G | CARBOMEER 980-2-MG/G-OOGGEL | 0,341582 | G
113411//14862 | VIDISIC CARBOGEL OOGGEL 2MG/G TUBE 10G | CARBOMEER 980-2-MG/G-OOGGEL | 0,341582 | G
14862 | VIDISIC CARBOGEL OOGGEL 2MG/G TUBE 10G | CARBOMEER 980-2-MG/G-OOGGEL | 0,341582 | G
29773 | VIDISIC CARBOGEL EDO OOGGEL 2MG/G 0,6ML | CARBOMEER 980-2-MG/G-OOGGEL UNITDOSE | 0,268253 | ML
100101 | CARBOPLATINE ACCORD INFVLST CONC 10MG/ML FL 5ML | CARBOPLATIN-10-MG/ML-INFUUSVLOEISTOF, FLACON | 3,467260 | ML
100101 | CARBOPLATINE ACCORD INFVLST CONC 10MG/ML FL 15ML | CARBOPLATIN-10-MG/ML-INFUUSVLOEISTOF, FLACON | 3,467260 | ML
100101 | CARBOPLATINE ACCORD INFVLST CONC 10MG/ML FL 45ML | CARBOPLATIN-10-MG/ML-INFUUSVLOEISTOF, FLACON | 3,467260 | ML
100101 | CARBOPLATINE ACCORD INFVLST CONC 10MG/ML FL 60ML | CARBOPLATIN-10-MG/ML-INFUUSVLOEISTOF, FLACON | 3,467260 | ML
108902 | CARBOPLATINE FRES KAB INFVLST CONC 10MG/ML FL 5ML | CARBOPLATIN-10-MG/ML-INFUUSVLOEISTOF, FLACON | 3,467260 | ML
108902 | CARBOPLATINE FRES KAB INFVLST CONC 10MG/ML FL 15ML | CARBOPLATIN-10-MG/ML-INFUUSVLOEISTOF, FLACON | 3,467260 | ML
108902 | CARBOPLATINE FRES KAB INFVLST CONC 10MG/ML FL 45ML | CARBOPLATIN-10-MG/ML-INFUUSVLOEISTOF, FLACON | 3,467260 | ML
108902 | CARBOPLATINE FRES KAB INFVLST CONC 10MG/ML FL 60ML | CARBOPLATIN-10-MG/ML-INFUUSVLOEISTOF, FLACON | 3,467260 | ML
EU/1/15/1060/003 | KYPROLIS INFUSIEPOEDER FLACON 30MG | CARFILZOMIB-30-MG-POED. V. INFUSIE,FLACON | 624,261604 | STUK
EU/1/15/1060/001 | KYPROLIS INFUSIEPOEDER FLACON 60MG | CARFILZOMIB-60-MG-POED. V. INFUSIE,FLACON | 1248,523207 | STUK
EU/1/02/246/002 | CARBAGLU DISPERGEERBAAR TABLET 200MG | CARGLUMIC ACID-200-MG-BRUISTABLET | 67,228196 | STUK
EU/1/02/246/003 | CARBAGLU DISPERGEERBAAR TABLET 200MG | CARGLUMIC ACID-200-MG-BRUISTABLET | 67,228196 | STUK
EU/1/17/1202/001 | UCEDANE DISPERGEERBARE TABLET 200MG | CARGLUMIC ACID-200-MG-BRUISTABLET | 68,697593 | STUK
EU/1/17/1202/002 | UCEDANE DISPERGEERBARE TABLET 200MG | CARGLUMIC ACID-200-MG-BRUISTABLET | 68,697593 | STUK
EU/1/17/1209/021 | REAGILA CAPSULE 4,5MG | CARIPRAZINE-4.5-MG-CAPSULE | 5,807935 | STUK
EU/1/17/1209/029 | REAGILA CAPSULE 6MG | CARIPRAZINE-6-MG-CAPSULE | 7,002578 | STUK
29950 | CARTEABAK OOGDRUPPELS 20MG/ML FL 5ML | CARTEOLOL-20-MG/ML-OOGDRUPPELS | 1,006733 | ML
107595 | CARVEDILOL AUROBINDO TABLET FILMOMHULD 12,5MG | CARVEDILOL-12.5-MG-TABLET | 0,164845 | STUK
29079 | CARVEDILOL TEVA TABLET 12,5MG | CARVEDILOL-12.5-MG-TABLET | 0,164845 | STUK
107596 | CARVEDILOL AUROBINDO TABLET FILMOMHULD 25MG | CARVEDILOL-25-MG-TABLET | 0,195089 | STUK
30019 | CARVEDILOL MYLAN TABLET 25MG | CARVEDILOL-25-MG-TABLET | 0,195089 | STUK
28748 | CARVEDILOL SANDOZ TABLET 25MG | CARVEDILOL-25-MG-TABLET | 0,195089 | STUK
29080 | CARVEDILOL TEVA TABLET 25MG | CARVEDILOL-25-MG-TABLET | 0,195089 | STUK
29078 | CARVEDILOL TEVA TABLET 6,25MG | CARVEDILOL-6.25-MG-TABLET | 0,091625 | STUK
EU/1/01/196/001 | CANCIDAS INFUSIEPOEDER FLACON 50MG | CASPOFUNGIN-50-MG-POED. V. INFUSIE,FLACON | 281,625497 | STUK
117579 | CASPOFUNGINE CF INFUSIEPOEDER FLACON 50MG | CASPOFUNGIN-50-MG-POED. V. INFUSIE,FLACON | 308,583299 | STUK
118247 | CASPOFUNGINE HIKMA INFUSIEPOEDER FLACON 50MG | CASPOFUNGIN-50-MG-POED. V. INFUSIE,FLACON | 281,625497 | STUK
118249 | CASPOFUNGINE MYLAN INFUSIEPOEDER FLACON 50MG | CASPOFUNGIN-50-MG-POED. V. INFUSIE,FLACON | 308,583299 | STUK
EU/1/01/196/003 | CANCIDAS INFUSIEPOEDER FLACON 70MG | CASPOFUNGIN-70-MG-POED. V. INFUSIE,FLACON | 359,615750 | STUK
117580 | CASPOFUNGINE CF INFUSIEPOEDER FLACON 70MG | CASPOFUNGIN-70-MG-POED. V. INFUSIE,FLACON | 391,573611 | STUK
118248 | CASPOFUNGINE HIKMA INFUSIEPOEDER FLACON 70MG | CASPOFUNGIN-70-MG-POED. V. INFUSIE,FLACON | 359,615750 | STUK
118250 | CASPOFUNGINE MYLAN INFUSIEPOEDER FLACON 70MG | CASPOFUNGIN-70-MG-POED. V. INFUSIE,FLACON | 391,573611 | STUK
6325 | KEFORAL TABLET 500MG | CEFALEXIN-500-MG-TABLET | 0,323935 | STUK
16532 | CEFAZOLINE MYLAN INJECTIEPOEDER FLAC 1000MG | CEFAZOLIN-1000-MG-POED. V. INJECTIE, FLACON | 11,485578 | STUK
122822//27755 | CEFOTAXIM EURECO-PH INJECTIEPOEDER FLACON 1000MG | CEFOTAXIME-1000-MG-POED. V. INJECTIE, FLACON | 3,744145 | STUK
122848//27755 | CEFOTAXIM EURECO-PH INJECTIEPOEDER FLACON 1000MG | CEFOTAXIME-1000-MG-POED. V. INJECTIE, FLACON | 3,744145 | STUK
27751 | CEFOTAXIM PCH INJECTIEPOEDER FLACON 1000MG | CEFOTAXIME-1000-MG-POED. V. INJECTIE, FLACON | 5,417739 | STUK
27755 | CEFOTAXIM SANDOZ INJECTIEPOEDER FLACON 1000MG | CEFOTAXIME-1000-MG-POED. V. INJECTIE, FLACON | 4,875965 | STUK
27750 | CEFOTAXIM PCH INJECTIEPOEDER FLACON 500MG | CEFOTAXIME-500-MG-POED. V. INJECTIE, FLACON | 3,774282 | STUK
EU/1/12/785/001 | ZINFORO INFPDR FLACON 600MG | CEFTAROLINE-600-MG-POED. V. INFUSIE,FLACON | 57,419732 | STUK
101819 | CEFTAZIDIM FRESENIUS KABI INJPDR FLACON 1000MG | CEFTAZIDIME-1000-MG-POED. V. INJECTIE, FLACON | 6,277873 | STUK
EU/1/16/1109/001 | ZAVICEFTA INFPDR FLACON 2000/500MG | CEFTAZIDIME-2000-MG-POED. V. INFUSIE,FLACON-AVIBACTAM-500-MG-POED. V. INFUSIE,FLACON | 106,277422 | STUK
101820 | CEFTAZIDIM FRESENIUS KABI INJPDR FLACON 2000MG | CEFTAZIDIME-2000-MG-POED. V. INJECTIE, FLACON | 12,990747 | STUK
101815 | CEFTAZIDIM FRESENIUS KABI INJPDR FLACON 500MG | CEFTAZIDIME-500-MG-POED. V. INJECTIE, FLACON | 4,147246 | STUK
100048 | CEFTRIAXON FRESENIUS KABI INJPDR FLACON 1000MG | CEFTRIAXONE-1000-MG-POED. V. INJECTIE, FLACON | 7,159050 | STUK
29390 | CEFTRIAXON HIKMA INJPDR FLACON 1000MG | CEFTRIAXONE-1000-MG-POED. V. INJECTIE, FLACON | 7,159050 | STUK
27774 | CEFTRIAXON PCH INJPDR FLACON 1000MG | CEFTRIAXONE-1000-MG-POED. V. INJECTIE, FLACON | 8,680049 | STUK
100046 | CEFTRIAXON FRESENIUS KABI INFPDR FLACON 2000MG | CEFTRIAXONE-2000-MG-POED. V. INJECTIE, FLACON | 17,172555 | STUK
29392 | CEFTRIAXON HIKMA INFPDR FLACON 2000MG | CEFTRIAXONE-2000-MG-POED. V. INJECTIE, FLACON | 17,172555 | STUK
27775 | CEFTRIAXON PCH INFUSIEPOEDER FLACON 2000MG | CEFTRIAXONE-2000-MG-POED. V. INJECTIE, FLACON | 17,684316 | STUK
27773 | CEFTRIAXON PCH INJPDR FLACON 500MG | CEFTRIAXONE-500-MG-POED. V. INJECTIE, FLACON | 6,391530 | STUK
35183 | CEFUROXIM FRESENIUS KABI INJECTIEPOEDER FL 1500MG | CEFUROXIME-1500-MG-POED. V. INJECTIE, FLACON | 5,103580 | STUK
20590 | CEFUROXIM HIKMA INJ/INFUSIEPOEDER FLACON 1500MG | CEFUROXIME-1500-MG-POED. V. INJECTIE, FLACON | 5,103580 | STUK
15264 | CEFUROXIM PCH INJECTIEPOEDER FLACON 1500MG | CEFUROXIME-1500-MG-POED. V. INJECTIE, FLACON | 5,575918 | STUK
116519//13226 | ZINNAT 250 TABLET 250MG | CEFUROXIME-250-MG-TABLET | 0,676505 | STUK
123581//13226 | ZINNAT 250 TABLET 250MG | CEFUROXIME-250-MG-TABLET | 0,676505 | STUK
13226 | ZINNAT 250 TABLET 250MG | CEFUROXIME-250-MG-TABLET | 0,676505 | STUK
14376 | ZINNAT GRANULAAT VOOR SUSPENSIE 25MG/ML | CEFUROXIME-25-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,100360 | ML
126075//13227 | ZINNAT 500 TABLET 500MG | CEFUROXIME-500-MG-TABLET | 0,662209 | STUK
123564//13227 | ZINNAT 500 TABLET 500MG | CEFUROXIME-500-MG-TABLET | 0,709494 | STUK
13227 | ZINNAT 500 TABLET 500MG | CEFUROXIME-500-MG-TABLET | 0,709494 | STUK
109659 | APROKAM INJECTIEPOEDER FLACON 50MG | CEFUROXIME-50-MG-POED. V. INJECTIE, FLACON | 6,737773 | STUK
117330 | XIMARACT INJPDR FLACON 50MG | CEFUROXIME-50-MG-POED. V. INJECTIE, FLACON | 6,737773 | STUK
35182 | CEFUROXIM FRESENIUS KABI INJECTIEPOEDER FL 750MG | CEFUROXIME-750-MG-POED. V. INJECTIE, FLACON | 3,096328 | STUK
20588 | CEFUROXIM HIKMA INJ/INFUSIEPOEDER FLACON 750MG | CEFUROXIME-750-MG-POED. V. INJECTIE, FLACON | 3,096328 | STUK
15264 | CEFUROXIM TEVA INJECTIEPOEDER FLACON 750MG | CEFUROXIME-750-MG-POED. V. INJECTIE, FLACON | 3,321978 | STUK
123315//25053 | CELEBREX CAPSULE 100MG | CELECOXIB-100-MG-CAPSULE | 0,212520 | STUK
25053 | CELEBREX CAPSULE 100MG | CELECOXIB-100-MG-CAPSULE | 0,216509 | STUK
108780 | CELECOXIB TEVA CAPSULE 100MG | CELECOXIB-100-MG-CAPSULE | 0,229153 | STUK
122560//25054 | CELEBREX CAPSULE 200MG | CELECOXIB-200-MG-CAPSULE | 0,389921 | STUK
25054 | CELEBREX CAPSULE 200MG | CELECOXIB-200-MG-CAPSULE | 0,389921 | STUK
108794 | CELECOXIB TEVA CAPSULE 200MG | CELECOXIB-200-MG-CAPSULE | 0,415243 | STUK
27376 | CELIPROLOL HCL TEVA TABLET 200MG | CELIPROLOL-200-MG-TABLET | 0,377657 | STUK
13074 | DILANORM TABLET 200MG | CELIPROLOL-200-MG-TABLET | 0,377657 | STUK
EU/1/19/1376/001 | LIBTAYO 350 INFVLST CONCENTRAAT 50MG/ML FLACON 7ML | CEMIPLIMAB-350-MG-INJECTIEVLOEISTOF, FLAC | 5694,941403 | STUK
EU/1/15/999/001 | ZYKADIA CAPSULE 150MG | CERITINIB-150-MG-CAPSULE | 33,941582 | STUK
EU/1/09/544/005 | CIMZIA INJVLST 200MG/ML PEN 1ML | CERTOLIZUMAB PEGOL-200-MG/ML-INJ.VLOEISTOF, WWSP | 401,785410 | ML
EU/1/09/544/001 | CIMZIA INJVLST 200MG/ML WWSP 1ML | CERTOLIZUMAB PEGOL-200-MG/ML-INJ.VLOEISTOF, WWSP | 401,785410 | ML
EU/1/99/100/001 | CETROTIDE INJPDR FLACON 0,25MG + SOLV 1ML + TOEBEH | CETRORELIX-0.25-MG-POED. V. INJECTIE, FLACON | 35,528503 | STUK
EU/1/04/281/003 | ERBITUX INFVLST 5MG/ML FLACON 20ML | CETUXIMAB-5-MG/ML-INFUUSVLOEISTOF, FLACON | 9,362594 | ML
EU/1/04/281/005 | ERBITUX INFVLST 5MG/ML FLACON 100ML | CETUXIMAB-5-MG/ML-INFUUSVLOEISTOF, FLACON | 9,362594 | ML
125372//256 | LEUKERAN TABLET FILMOMHULD 2MG | CHLORAMBUCIL-2-MG-TABLET | 1,060560 | STUK
256 | LEUKERAN TABLET FILMOMHULD 2MG | CHLORAMBUCIL-2-MG-TABLET | 2,023544 | STUK
17418 | CHLOORAMFENICOL POS OOGZALF 10MG/G TUBE 5G | CHLORAMPHENICOL-10-MG/G-OOGZALF | 1,510377 | G
57557 | CHLOORAMFENICOL TEVA OOGZALF 10MG/G TUBE 5G | CHLORAMPHENICOL-10-MG/G-OOGZALF | 1,510377 | G
56086 | CHLOORAMFENICOL TEVA OOGDRUPPELS 5MG/ML FLAC 10ML | CHLORAMPHENICOL-5-MG/ML-OOGDRUPPELS | 0,918513 | ML
56726 | CHLOORTALIDON ACCORD TABLET 50MG | CHLORTALIDONE-50-MG-TABLET | 1,980031 | STUK
16520 | CHLOORTALIDON APOTEX TABLET 50MG | CHLORTALIDONE-50-MG-TABLET | 1,980031 | STUK
EU/1/00/165/008 | OVITRELLE 250 INJVLST 500MCG/ML PEN 0,5ML | CHORIONIC GONADOTROPHIN ALFA-0.5-MG/ML-INJ.VLOEISTOF, WWSP | 69,664925 | ML
EU/1/00/165/007 | OVITRELLE 250 INJVLST 500MCG/ML WWSP 0,5ML | CHORIONIC GONADOTROPHIN ALFA-0.5-MG/ML-INJ.VLOEISTOF, WWSP | 65,949599 | ML
110807//31632 | ALVESCO 80 AEROSOL 80MCG/DO SPBS 60DO + INH | CICLESONIDE-.08-MG-AEROSOL | 0,245399 | DOSIS
123228//31632 | ALVESCO 80 AEROSOL 80MCG/DO SPBS 60DO + INH | CICLESONIDE-.08-MG-AEROSOL | 0,245399 | DOSIS
124078//31632 | ALVESCO 80 AEROSOL 80MCG/DO SPBS 60DO + INH | CICLESONIDE-.08-MG-AEROSOL | 0,245399 | DOSIS
117352//31632 | ALVESCO 80 AEROSOL 80MCG/DO SPBS 120DO + INH | CICLESONIDE-.08-MG-AEROSOL | 0,245399 | DOSIS
122025//31632 | ALVESCO 80 AEROSOL 80MCG/DO SPBS 120DO + INH | CICLESONIDE-.08-MG-AEROSOL | 0,245399 | DOSIS
123228//31632 | ALVESCO 80 AEROSOL 80MCG/DO SPBS 120DO + INH | CICLESONIDE-.08-MG-AEROSOL | 0,245399 | DOSIS
31632 | ALVESCO 80 AEROSOL 80MCG/DO SPBS 120DO + INH | CICLESONIDE-.08-MG-AEROSOL | 0,245399 | DOSIS
121549//31632 | ALVESCO 80 AEROSOL 80MCG/DO SPBS 120DO + INH | CICLESONIDE-.08-MG-AEROSOL | 0,264785 | DOSIS
108053//31633 | ALVESCO 160 AEROSOL 160MCG/DO SPBS 60DO + INH | CICLESONIDE-.16-MG-AEROSOL | 0,338069 | DOSIS
109558//31633 | ALVESCO 160 AEROSOL 160MCG/DO SPBS 60DO + INH | CICLESONIDE-.16-MG-AEROSOL | 0,338069 | DOSIS
111366//31633 | ALVESCO 160 AEROSOL 160MCG/DO SPBS 60DO + INH | CICLESONIDE-.16-MG-AEROSOL | 0,338069 | DOSIS
113866//31633 | ALVESCO 160 AEROSOL 160MCG/DO SPBS 60DO + INH | CICLESONIDE-.16-MG-AEROSOL | 0,338069 | DOSIS
117518//31633 | ALVESCO 160 AEROSOL 160MCG/DO SPBS 60DO + INH | CICLESONIDE-.16-MG-AEROSOL | 0,338069 | DOSIS
119131//31633 | ALVESCO 160 AEROSOL 160MCG/DO SPBS 60DO + INH | CICLESONIDE-.16-MG-AEROSOL | 0,338069 | DOSIS
121142//31633 | ALVESCO 160 AEROSOL 160MCG/DO SPBS 60DO + INH | CICLESONIDE-.16-MG-AEROSOL | 0,338069 | DOSIS
121382//31633 | ALVESCO 160 AEROSOL 160MCG/DO SPBS 60DO + INH | CICLESONIDE-.16-MG-AEROSOL | 0,338069 | DOSIS
123307//31633 | ALVESCO 160 AEROSOL 160MCG/DO SPBS 60DO + INH | CICLESONIDE-.16-MG-AEROSOL | 0,338069 | DOSIS
123411//31633 | ALVESCO 160 AEROSOL 160MCG/DO SPBS 60DO + INH | CICLESONIDE-.16-MG-AEROSOL | 0,338069 | DOSIS
124165//31633 | ALVESCO 160 AEROSOL 160MCG/DO SPBS 60DO + INH | CICLESONIDE-.16-MG-AEROSOL | 0,338069 | DOSIS
127175//31633 | ALVESCO 160 AEROSOL 160MCG/DO SPBS 60DO + INH | CICLESONIDE-.16-MG-AEROSOL | 0,338069 | DOSIS
31633 | ALVESCO 160 AEROSOL 160MCG/DO SPBS 60DO + INH | CICLESONIDE-.16-MG-AEROSOL | 0,338069 | DOSIS
113037//31633 | ALVESCO 160 AEROSOL 160MCG/DO SPBS 60DO + INH | CICLESONIDE-.16-MG-AEROSOL | 0,338540 | DOSIS
121172//31633 | ALVESCO 160 AEROSOL 160MCG/DO SPBS 60DO + INH | CICLESONIDE-.16-MG-AEROSOL | 0,338540 | DOSIS
108053//31633 | ALVESCO 160 AEROSOL 160MCG/DO SPBS 120DO + INH | CICLESONIDE-.16-MG-AEROSOL | 0,338069 | DOSIS
123307//31633 | ALVESCO 160 AEROSOL 160MCG/DO SPBS 120DO + INH | CICLESONIDE-.16-MG-AEROSOL | 0,338069 | DOSIS
125766//31633 | ALVESCO 160 AEROSOL 160MCG/DO SPBS 120DO + INH | CICLESONIDE-.16-MG-AEROSOL | 0,338069 | DOSIS
31633 | ALVESCO 160 AEROSOL 160MCG/DO SPBS 120DO + INH | CICLESONIDE-.16-MG-AEROSOL | 0,338069 | DOSIS
121172//31633 | ALVESCO 160 AEROSOL 160MCG/DO SPBS 120DO + INH | CICLESONIDE-.16-MG-AEROSOL | 0,338540 | DOSIS
15466 | LOPROX HYDROFIELE CREME 10MG/G | CICLOPIROX-10-MG/G-CREME, CUTAAN | 0,127654 | G
124937//17497 | NEORAL DRANK 100MG/ML | CICLOSPORIN-100-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 2,496307 | ML
125854//17497 | NEORAL DRANK 100MG/ML | CICLOSPORIN-100-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 2,496307 | ML
106281//17497 | NEORAL DRANK 100MG/ML | CICLOSPORIN-100-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 2,707860 | ML
17497 | NEORAL DRANK 100MG/ML | CICLOSPORIN-100-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 2,707860 | ML
34434 | CICLOSPORINE AUROBINDO CAPSULE 100MG | CICLOSPORIN-100-MG-CAPSULE | 2,291949 | STUK
34437 | CICLOSPORINE PCH CAPSULE 100MG | CICLOSPORIN-100-MG-CAPSULE | 2,291949 | STUK
17496 | NEORAL CAPSULE 100MG | CICLOSPORIN-100-MG-CAPSULE | 2,291949 | STUK
EU/1/15/990/001 | IKERVIS OOGDRUPPELS 1MG/ML FLACON 0,3ML | CICLOSPORIN-1-MG/ML-OOGDRUPPELS UNITDOSE | 9,130329 | ML
34432 | CICLOSPORINE AUROBINDO CAPSULE 25MG | CICLOSPORIN-25-MG-CAPSULE | 0,662534 | STUK
34435 | CICLOSPORINE PCH CAPSULE 25MG | CICLOSPORIN-25-MG-CAPSULE | 0,662534 | STUK
17495 | NEORAL CAPSULE 25MG | CICLOSPORIN-25-MG-CAPSULE | 0,635530 | STUK
9846 | SANDIMMUNE INFUSIEVLOEISTOF CONC 50MG/ML AMP 1ML | CICLOSPORIN-50-MG/ML-INFUUSVLOEISTOF, FLACON | 2,303405 | ML
101614 | IMIPENEM/CILASTATINE FRES KABI INFPDR FL 500/500MG | CILASTATINE-500-MG-POED. V. INJECTIE, FLACON-IMIPENEM-500-MG-POED. V. INJECTIE, FLACON | 13,496986 | STUK
102982 | IMIPENEM/CILASTATINE HIKMA INFPDR FL 500/500MG | CILASTATINE-500-MG-POED. V. INJECTIE, FLACON-IMIPENEM-500-MG-POED. V. INJECTIE, FLACON | 13,496986 | STUK
24021 | CIMETIDINE ACCORD TABLET FILMOMHULD 200MG | CIMETIDINE-200-MG-TABLET | 0,375483 | STUK
24022 | CIMETIDINE ACCORD TABLET FILMOMHULD 400MG | CIMETIDINE-400-MG-TABLET | 0,408352 | STUK
56339 | CIMETIDINE CF TABLET 400MG | CIMETIDINE-400-MG-TABLET | 0,408352 | STUK
24023 | CIMETIDINE ACCORD TABLET FILMOMHULD 800MG | CIMETIDINE-800-MG-TABLET | 0,698678 | STUK
119501 | CINACALCET ACCORD TABLET FILMOMHULD 30MG | CINACALCET-30-MG-TABLET | 4,220905 | STUK
EU/1/15/1054/002 | CINACALCET MYLAN TABLET FILMOMHULD 30MG | CINACALCET-30-MG-TABLET | 4,220905 | STUK
EU/1/15/1054/003 | CINACALCET MYLAN TABLET FILMOMHULD 30MG | CINACALCET-30-MG-TABLET | 4,400998 | STUK
116450 | CINACALCET TEVA TABLET FILMOMHULD 30MG | CINACALCET-30-MG-TABLET | 4,400998 | STUK
EU/1/04/292/002 | MIMPARA TABLET FILMOMHULD 30MG | CINACALCET-30-MG-TABLET | 4,220905 | STUK
EU/1/15/1054/006 | CINACALCET MYLAN TABLET FILMOMHULD 60MG | CINACALCET-60-MG-TABLET | 8,142468 | STUK
116451 | CINACALCET TEVA TABLET FILMOMHULD 60MG | CINACALCET-60-MG-TABLET | 8,142468 | STUK
EU/1/04/292/006 | MIMPARA TABLET FILMOMHULD 60MG | CINACALCET-60-MG-TABLET | 10,624935 | STUK
116452 | CINACALCET TEVA TABLET FILMOMHULD 90MG | CINACALCET-90-MG-TABLET | 12,012850 | STUK
EU/1/04/292/010 | MIMPARA TABLET FILMOMHULD 90MG | CINACALCET-90-MG-TABLET | 15,785636 | STUK
27311 | CIPROFLOXACINE CF TABLET 250MG | CIPROFLOXACIN-250-MG-TABLET | 0,382382 | STUK
26276 | CIPROFLOXACINE MYLAN TABLET 250MG | CIPROFLOXACIN-250-MG-TABLET | 0,382382 | STUK
25206 | CIPROFLOXACINE SANDOZ TABLET 250MG | CIPROFLOXACIN-250-MG-TABLET | 0,382382 | STUK
122294 | CIPROFLOXACINE ALTAN INFVLST 2MG/ML ZAK 100ML | CIPROFLOXACIN-2-MG/ML-INFUUSVLOEISTOF, FLACON | 0,085142 | ML
122294 | CIPROFLOXACINE ALTAN INFVLST 2MG/ML ZAK 200ML | CIPROFLOXACIN-2-MG/ML-INFUUSVLOEISTOF, FLACON | 0,085142 | ML
29032 | CIPROFLOXACINE HIKMA INFVLST 2MG/ML FLACON 100ML | CIPROFLOXACIN-2-MG/ML-INFUUSVLOEISTOF, FLACON | 0,085142 | ML
29032 | CIPROFLOXACINE HIKMA INFVLST 2MG/ML ZAK 200ML | CIPROFLOXACIN-2-MG/ML-INFUUSVLOEISTOF, FLACON | 0,085142 | ML
30477 | CIPROFLOXACINE KABI INFVLST 2MG/ML FLACON 100ML | CIPROFLOXACIN-2-MG/ML-INFUUSVLOEISTOF, FLACON | 0,085142 | ML
30478 | CIPROFLOXACINE KABI INFVLST 2MG/ML FLACON 200ML | CIPROFLOXACIN-2-MG/ML-INFUUSVLOEISTOF, FLACON | 0,085142 | ML
30477 | CIPROFLOXACINE KABI INFVLST 2MG/ML ZAK 100ML | CIPROFLOXACIN-2-MG/ML-INFUUSVLOEISTOF, FLACON | 0,085142 | ML
30478 | CIPROFLOXACINE KABI INFVLST 2MG/ML ZAK 200ML | CIPROFLOXACIN-2-MG/ML-INFUUSVLOEISTOF, FLACON | 0,085142 | ML
26277 | CIPROFLOXACINE MYLAN TABLET 500MG | CIPROFLOXACIN-500-MG-TABLET | 0,751450 | STUK
25207 | CIPROFLOXACINE SANDOZ TABLET 500MG | CIPROFLOXACIN-500-MG-TABLET | 0,751450 | STUK
19341 | CIPROXIN SUSPENSIE 50MG/ML | CIPROFLOXACIN-50-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,268979 | ML
25208 | CIPROFLOXACINE SANDOZ TABLET 750MG | CIPROFLOXACIN-750-MG-TABLET | 1,126335 | STUK
104068 | CISPLATINE ACCORD INFVLST CONC 1MG/ML FLACON 10ML | CISPLATIN-1-MG/ML-INFUUSVLOEISTOF, FLACON | 0,431287 | ML
104068 | CISPLATINE ACCORD INFVLST CONC 1MG/ML FLACON 50ML | CISPLATIN-1-MG/ML-INFUUSVLOEISTOF, FLACON | 0,431287 | ML
104068 | CISPLATINE ACCORD INFVLST CONC 1MG/ML FLACON 100ML | CISPLATIN-1-MG/ML-INFUUSVLOEISTOF, FLACON | 0,431287 | ML
101430 | CISPLATINE PCH INFVLST CONC 1MG/ML FLACON 10ML | CISPLATIN-1-MG/ML-INFUUSVLOEISTOF, FLACON | 0,475430 | ML
101430 | CISPLATINE PCH INFVLST CONC 1MG/ML FLACON 50ML | CISPLATIN-1-MG/ML-INFUUSVLOEISTOF, FLACON | 0,475430 | ML
24575 | CISPLATINE SANDOZ INFVLST CONC 1MG/ML FLACON 10ML | CISPLATIN-1-MG/ML-INFUUSVLOEISTOF, FLACON | 0,431287 | ML
119686 | CITALOPRAM AUROBINDO TABLET OMHULD 10MG | CITALOPRAM-10-MG-TABLET | 0,152387 | STUK
25147 | CITALOPRAM CF TABLET OMHULD 10MG | CITALOPRAM-10-MG-TABLET | 0,152387 | STUK
31125 | CITALOPRAM PCH TABLET OMHULD 10MG | CITALOPRAM-10-MG-TABLET | 0,152387 | STUK
25148 | CITALOPRAM CF TABLET OMHULD 20MG | CITALOPRAM-20-MG-TABLET | 0,205068 | STUK
28672 | CITALOPRAM MYLAN TABLET OMHULD 20MG | CITALOPRAM-20-MG-TABLET | 0,196932 | STUK
31126 | CITALOPRAM PCH TABLET OMHULD 20MG | CITALOPRAM-20-MG-TABLET | 0,205068 | STUK
26734 | CITALOPRAM SANDOZ TABLET OMHULD 20MG | CITALOPRAM-20-MG-TABLET | 0,205068 | STUK
107157//22687 | CIPRAMIL DRUPPELVLOEISTOF 40MG/ML | CITALOPRAM-40-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 1,436319 | ML
111055//22687 | CIPRAMIL DRUPPELVLOEISTOF 40MG/ML | CITALOPRAM-40-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 1,436319 | ML
120714//22687 | CIPRAMIL DRUPPELVLOEISTOF 40MG/ML | CITALOPRAM-40-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 1,436319 | ML
22687 | CIPRAMIL DRUPPELVLOEISTOF 40MG/ML | CITALOPRAM-40-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 1,436319 | ML
126084//22687 | CITALOPRAM BMODESTO DRUPPELVLOEISTOF 40MG/ML | CITALOPRAM-40-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 1,436319 | ML
19594 | CIPRAMIL TABLET OMHULD 40MG | CITALOPRAM-40-MG-TABLET | 0,289337 | STUK
25149 | CITALOPRAM CF TABLET OMHULD 40MG | CITALOPRAM-40-MG-TABLET | 0,289337 | STUK
28673 | CITALOPRAM MYLAN TABLET OMHULD 40MG | CITALOPRAM-40-MG-TABLET | 0,289337 | STUK
31127 | CITALOPRAM PCH TABLET OMHULD 40MG | CITALOPRAM-40-MG-TABLET | 0,289337 | STUK
26736 | CITALOPRAM SANDOZ TABLET OMHULD 40MG | CITALOPRAM-40-MG-TABLET | 0,289337 | STUK
EU/1/17/1212/004 | MAVENCLAD TABLET 10MG | CLADRIBINE-10-MG-TABLET | 2095,216663 | STUK
EU/1/17/1212/001 | MAVENCLAD TABLET 10MG | CLADRIBINE-10-MG-TABLET | 2192,347723 | STUK
EU/1/17/1212/002 | MAVENCLAD TABLET 10MG | CLADRIBINE-10-MG-TABLET | 2192,347723 | STUK
16844 | LEUSTATIN INFVLST CONC 1MG/ML FLACON 10ML | CLADRIBINE-1-MG/ML-INFUUSVLOEISTOF, FLACON | 28,513013 | ML
EU/1/04/275/002 | LITAK INJVLST 2MG/ML FLACON 5ML | CLADRIBINE-2-MG/ML-INJECTIEVLOEISTOF, FLAC | 58,459422 | ML
118826 | CLARITROMYCINE ACCORD TABLET FILMOMHULD 250MG | CLARITHROMYCIN-250-MG-TABLET | 0,344022 | STUK
30789 | CLARITROMYCINE SANDOZ TABLET 250MG | CLARITHROMYCIN-250-MG-TABLET | 0,369404 | STUK
29081 | CLARITROMYCINE TEVA TABLET 250MG | CLARITHROMYCIN-250-MG-TABLET | 0,369404 | STUK
30849 | CLARITROMYCINE SANDOZ GRAN V SUSPENSIE 125MG/5ML | CLARITHROMYCIN-25-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,060558 | ML
30790 | CLARITROMYCINE SANDOZ TABLET 500MG | CLARITHROMYCIN-500-MG-TABLET | 0,656831 | STUK
29850 | CLARITROMYCINE SUN TABLET 500MG | CLARITHROMYCIN-500-MG-TABLET | 0,607267 | STUK
29082 | CLARITROMYCINE TEVA TABLET 500MG | CLARITHROMYCIN-500-MG-TABLET | 0,656831 | STUK
108434 | CLARITROMYCINE AUROBINDO SR TABLET MVA 500MG | CLARITHROMYCIN-500-MG-TABLET, MET GEREGULEERDE AFGIFTE | 1,016946 | STUK
107530 | CLARITROMYCINE CF RETARD TABLET MVA 500MG | CLARITHROMYCIN-500-MG-TABLET, MET GEREGULEERDE AFGIFTE | 1,016946 | STUK
21555 | KLACID SR TABLET MGA 500MG | CLARITHROMYCIN-500-MG-TABLET, MET GEREGULEERDE AFGIFTE | 1,016946 | STUK
30850 | CLARITROMYCINE SANDOZ GRAN V SUSPENSIE 250MG/5ML | CLARITHROMYCIN-50-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,106392 | ML
123384//9728 | CLINDAMYCINE BMODESTO LOTION 10MG/ML | CLINDAMYCIN-10-MG/ML-APPLICATIEVLOEISTOF, VOOR CUTAAN GEBRUIK | 0,183432 | ML
32509 | CLINDAMYCINE LOTION FNA 10MG/ML | CLINDAMYCIN-10-MG/ML-APPLICATIEVLOEISTOF, VOOR CUTAAN GEBRUIK | 0,183432 | ML
123224 | CLINDAMYCINE ADDEDPHARMA INFVLST 12MG/ML ZAK 50ML | CLINDAMYCIN-12-MG/ML-INFUUSVLOEISTOF, FLACON | 0,221372 | ML
101396 | CLINDAMYCINE KABI INJVLST 150MG/ML AMPUL 2ML | CLINDAMYCIN-150-MG/ML-INJ.VLOEISTOF AMPUL | 2,188708 | ML
101396 | CLINDAMYCINE KABI INJVLST 150MG/ML AMPUL 4ML | CLINDAMYCIN-150-MG/ML-INJ.VLOEISTOF AMPUL | 2,188708 | ML
21828 | CLINDAMYCINE SANDOZ CAPSULE 150MG | CLINDAMYCIN-150-MG-CAPSULE | 0,306810 | STUK
108229 | CLINDAMYCINE CF CAPSULE 300MG | CLINDAMYCIN-300-MG-CAPSULE | 0,657946 | STUK
23169=21829 | CLINDAMYCINE MYLAN CAPSULE 300MG | CLINDAMYCIN-300-MG-CAPSULE | 0,657946 | STUK
21829 | CLINDAMYCINE SANDOZ CAPSULE 300MG | CLINDAMYCIN-300-MG-CAPSULE | 0,657946 | STUK
14457 | DALACIN C CAPSULE 300MG | CLINDAMYCIN-300-MG-CAPSULE | 0,681740 | STUK
9600 | FRISIUM TABLET 10MG | CLOBAZAM-10-MG-TABLET | 0,122646 | STUK
9601 | FRISIUM TABLET 20MG | CLOBAZAM-20-MG-TABLET | 0,243116 | STUK
30644//6932 | DERMOVATE HYDROFIELE CREME 0,5MG/G | CLOBETASOL-.5-MG/G-CREME, CUTAAN | 0,136252 | G
6932 | DERMOVATE HYDROFIELE CREME 0,5MG/G | CLOBETASOL-.5-MG/G-CREME, CUTAAN | 0,136252 | G
126183//6933 | CLOBETASOLPROPIONAAT BMODESTO ZALF 0,5MG/G | CLOBETASOL-.5-MG/G-ZALF, CUTAAN | 0,101885 | G
125100//6933 | CLOBETASOLPROPIONAAT ERC ZALF 0,5MG/G | CLOBETASOL-.5-MG/G-ZALF, CUTAAN | 0,101885 | G
115467//6933 | DERMOVATE HYDROFOBE ZALF 0,05% | CLOBETASOL-.5-MG/G-ZALF, CUTAAN | 0,101885 | G
6933 | DERMOVATE HYDROFOBE ZALF 0,05% | CLOBETASOL-.5-MG/G-ZALF, CUTAAN | 0,101885 | G
114559//6933 | DERMOVATE HYDROFOBE ZALF 0,05% | CLOBETASOL-.5-MG/G-ZALF, CUTAAN | 0,111173 | G
119006//7579 | DERMOVATE LOTION 0,05% | CLOBETASOL-.5-MG/ML-APPLICATIEVLOEISTOF, VOOR CUTAAN GEBRUIK | 0,116771 | G
29618//7579 | DERMOVATE LOTION 0,05% | CLOBETASOL-.5-MG/ML-APPLICATIEVLOEISTOF, VOOR CUTAAN GEBRUIK | 0,116771 | G
30965//7579 | DERMOVATE LOTION 0,05% | CLOBETASOL-.5-MG/ML-APPLICATIEVLOEISTOF, VOOR CUTAAN GEBRUIK | 0,141121 | G
7579 | DERMOVATE LOTION 0,05% | CLOBETASOL-.5-MG/ML-APPLICATIEVLOEISTOF, VOOR CUTAAN GEBRUIK | 0,141121 | G
117878//20245 | BONEFOS TABLET 800MG | CLODRONIC ACID-800-MG-TABLET | 3,277677 | STUK
EU/1/06/334/005 | EVOLTRA INFVLST CONC 1MG/ML FLACON 20ML | CLOFARABINE-1-MG/ML-INFUUSVLOEISTOF, FLACON | 84,693013 | ML
15575 | CLOMIPRAMINE HCL MYLAN TABLET OMHULD 10MG | CLOMIPRAMINE-10-MG-TABLET | 0,046521 | STUK
23924 | CLOMIPRAMINE HCL SANDOZ TABLET OMHULD 10MG | CLOMIPRAMINE-10-MG-TABLET | 0,046521 | STUK
15576 | CLOMIPRAMINE HCL MYLAN TABLET OMHULD 25MG | CLOMIPRAMINE-25-MG-TABLET | 0,077867 | STUK
23925 | CLOMIPRAMINE HCL SANDOZ TABLET OMHULD 25MG | CLOMIPRAMINE-25-MG-TABLET | 0,077867 | STUK
6870 | RIVOTRIL TABLET 0,5MG | CLONAZEPAM-.5-MG-TABLET | 0,166306 | STUK
6872 | RIVOTRIL DRUPPELS 2,5MG/ML | CLONAZEPAM-2.5-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,166566 | ML
6871 | RIVOTRIL TABLET 2MG | CLONAZEPAM-2-MG-TABLET | 0,171266 | STUK
28802=56919 | CLONIDINE HCL AUROBINDO TABLET 0,150MG | CLONIDINE-.15-MG-TABLET | 0,103071 | STUK
56919 | CLONIDINE HCL CF TABLET 0,150MG | CLONIDINE-.15-MG-TABLET | 0,103071 | STUK
16337=56919 | CLONIDINE HCL SANDOZ TABLET 0,150MG | CLONIDINE-.15-MG-TABLET | 0,103071 | STUK
19846=56919 | CLONIDINE HCL TEVA TABLET 0,150MG | CLONIDINE-.15-MG-TABLET | 0,103071 | STUK
EU/1/98/069/009 | PLAVIX TABLET FILMOMHULD 300MG | CLOPIDOGREL-300-MG-TABLET | 5,500513 | STUK
106384 | CLOPIDOGREL AUROBINDO TAB FILMOM 75MG(ALS BISULF) | CLOPIDOGREL-75-MG-TABLET | 0,339376 | STUK
103173 | CLOPIDOGREL MYLAN TABLET FILMOMHULD 75MG | CLOPIDOGREL-75-MG-TABLET | 0,339376 | STUK
103071 | CLOPIDOGREL SANDOZ TABLET FILMOMHULD 75MG | CLOPIDOGREL-75-MG-TABLET | 0,339376 | STUK
EU/1/09/540/013 | CLOPIDOGREL TEVA TABL FILMOMHULD 75MG(ALS WATERS) | CLOPIDOGREL-75-MG-TABLET | 0,352924 | STUK
EU/1/98/070/001 | ISCOVER TABLET FILMOMHULD 75MG | CLOPIDOGREL-75-MG-TABLET | 0,352924 | STUK
EU/1/98/069/004 | PLAVIX TABLET FILMOMHULD 75MG | CLOPIDOGREL-75-MG-TABLET | 0,339376 | STUK
EU/1/98/069/005 | PLAVIX TABLET FILMOMHULD 75MG | CLOPIDOGREL-75-MG-TABLET | 0,339376 | STUK
EU/1/98/069/001 | PLAVIX TABLET FILMOMHULD 75MG | CLOPIDOGREL-75-MG-TABLET | 0,352924 | STUK
EU/1/98/069/002 | PLAVIX TABLET FILMOMHULD 75MG | CLOPIDOGREL-75-MG-TABLET | 0,352924 | STUK
122541//6120 | TRANXENE CAPSULE 10MG | CLORAZEPATE POTASSIUM-10-MG-CAPSULE | 0,087676 | STUK
6120 | TRANXENE CAPSULE 10MG | CLORAZEPATE POTASSIUM-10-MG-CAPSULE | 0,132584 | STUK
6119 | TRANXENE CAPSULE 5MG | CLORAZEPATE POTASSIUM-5-MG-CAPSULE | 0,068270 | STUK
8935 | CANESTEN GYNO 3 VAGINAALCREME 20MG/G + 3 APPLIC | CLOTRIMAZOLE-20-MG/G-CREME, VAGINAAL | 0,317435 | G
106836 | CLOZAPINE CF TABLET 100MG | CLOZAPINE-100-MG-TABLET | 0,410966 | STUK
103904 | CLOZAPINE LEYDEN DELTA TABLET 100MG | CLOZAPINE-100-MG-TABLET | 0,410966 | STUK
23636=21825 | CLOZAPINE MYLAN TABLET 100MG | CLOZAPINE-100-MG-TABLET | 0,410966 | STUK
25051 | CLOZAPINE SANDOZ TABLET 100MG | CLOZAPINE-100-MG-TABLET | 0,424674 | STUK
21825 | CLOZAPINE TABLET 100MG | CLOZAPINE-100-MG-TABLET | 0,410966 | STUK
23678=21825 | CLOZAPINE TEVA TABLET 100MG | CLOZAPINE-100-MG-TABLET | 0,424674 | STUK
23678=21825 | CLOZAPINE TEVA TABLET 100MG | CLOZAPINE-100-MG-TABLET | 0,424674 | STUK
21825 | CLOZAPINUM TABLET 100MG | CLOZAPINE-100-MG-TABLET | 0,410966 | STUK
10460 | LEPONEX TABLET 100MG | CLOZAPINE-100-MG-TABLET | 0,410966 | STUK
116183 | CLOZAPINE ACCORD TABLET 25MG | CLOZAPINE-25-MG-TABLET | 0,116045 | STUK
106835 | CLOZAPINE CF TABLET 25MG | CLOZAPINE-25-MG-TABLET | 0,121711 | STUK
103903 | CLOZAPINE LEYDEN DELTA TABLET 25MG | CLOZAPINE-25-MG-TABLET | 0,116045 | STUK
23635=21823 | CLOZAPINE MYLAN TABLET 25MG | CLOZAPINE-25-MG-TABLET | 0,126541 | STUK
25049 | CLOZAPINE SANDOZ TABLET 25MG | CLOZAPINE-25-MG-TABLET | 0,126541 | STUK
21823 | CLOZAPINE TABLET 25MG | CLOZAPINE-25-MG-TABLET | 0,116045 | STUK
23677=21823 | CLOZAPINE TEVA TABLET 25MG | CLOZAPINE-25-MG-TABLET | 0,126541 | STUK
21823 | CLOZAPINUM TABLET 25MG | CLOZAPINE-25-MG-TABLET | 0,116045 | STUK
10459 | LEPONEX TABLET 25MG | CLOZAPINE-25-MG-TABLET | 0,126541 | STUK
118048 | CLOZAPINE GLENMARK TABLET 50MG | CLOZAPINE-50-MG-TABLET | 0,313593 | STUK
EU/1/15/1048/001 | COTELLIC TABLET FILMOMHULD 20MG | COBIMETINIB-20-MG-TABLET | 88,682307 | STUK
34100 | COLCHICINE TEVA TABLET 0,5MG | COLCHICINE-.5-MG-TABLET | 0,320150 | STUK
21347 | COLCHICINE TIOFARMA TABLET 0,5MG | COLCHICINE-.5-MG-TABLET | 0,320150 | STUK
EU/1/06/364/002 | ADROVANCE TABLET 70MG/2800IE | COLECALCIFEROL-.07-MG-TABLET-ALENDRONIC ACID-70-MG-TABLET | 3,342272 | STUK
117983 | ALENDRONINEZUUR/CHOLECALCIFEROL AUR TB 70MG/2800IE | COLECALCIFEROL-.07-MG-TABLET-ALENDRONIC ACID-70-MG-TABLET | 3,421857 | STUK
113274 | ALENDRONINEZUUR/CHOLECALCIFEROL TEVA T 70MG/2800IE | COLECALCIFEROL-.07-MG-TABLET-ALENDRONIC ACID-70-MG-TABLET | 3,421857 | STUK
EU/1/05/310/002 | FOSAVANCE TABLET 70MG/2800IE | COLECALCIFEROL-.07-MG-TABLET-ALENDRONIC ACID-70-MG-TABLET | 3,342272 | STUK
EU/1/05/310/004 | FOSAVANCE TABLET 70MG/2800IE | COLECALCIFEROL-.07-MG-TABLET-ALENDRONIC ACID-70-MG-TABLET | 3,342272 | STUK
EU/1/09/572/002 | VANTAVO TABLET 70MG/2800IE | COLECALCIFEROL-.07-MG-TABLET-ALENDRONIC ACID-70-MG-TABLET | 3,342272 | STUK
EU/1/06/364/007 | ADROVANCE TABLET 70MG/5600IE | COLECALCIFEROL-0.14-MG-TABLET-ALENDRONIC ACID-70-MG-TABLET | 1,300995 | STUK
117985 | ALENDRONINEZUUR/CHOLECALCIFEROL AUR TB 70MG/5600IE | COLECALCIFEROL-0.14-MG-TABLET-ALENDRONIC ACID-70-MG-TABLET | 1,660496 | STUK
113276 | ALENDRONINEZUUR/CHOLECALCIFEROL TEVA T 70MG/5600IE | COLECALCIFEROL-0.14-MG-TABLET-ALENDRONIC ACID-70-MG-TABLET | 1,660496 | STUK
EU/1/05/310/007 | FOSAVANCE TABLET 70MG/5600IE | COLECALCIFEROL-0.14-MG-TABLET-ALENDRONIC ACID-70-MG-TABLET | 1,502946 | STUK
119600//112993 | D-CURA DRUPPELS 2400IE/ML | COLECALCIFEROL-2400-IE/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,400101 | ML
112993 | D-CURA DRUPPELS 2400IE/ML | COLECALCIFEROL-2400-IE/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,404850 | ML
109397 | D-CURA DRANK 25000IE AMPUL 1ML | COLECALCIFEROL-25000-IE/ML-OPLOSSING/SUSPENSIE, ORAAL | 1,369939 | ML
114888//109397 | D-CURA DRANK 25000IE AMPUL 1ML | COLECALCIFEROL-25000-IE/ML-OPLOSSING/SUSPENSIE, ORAAL | 1,369939 | ML
117085//109397 | D-CURA DRANK 25000IE AMPUL 1ML | COLECALCIFEROL-25000-IE/ML-OPLOSSING/SUSPENSIE, ORAAL | 1,369939 | ML
117325//109397 | D-CURA DRANK 25000IE AMPUL 1ML | COLECALCIFEROL-25000-IE/ML-OPLOSSING/SUSPENSIE, ORAAL | 1,369939 | ML
117092 | COLECALCIFEROL BENFEROL CAPSULE 25000IE | COLECALCIFEROL-25000-IE-CAPSULE | 1,336861 | STUK
112986 | D-CURA CAPSULE 25000IE | COLECALCIFEROL-25000-IE-CAPSULE | 1,336861 | STUK
117094 | COLECALCIFEROL BENFEROL CAPSULE 50000IE | COLECALCIFEROL-50000-IE-CAPSULE | 2,453197 | STUK
118130 | COLECALCIFEROL BENFEROL CAPSULE 5600IE | COLECALCIFEROL-5600-IE-CAPSULE | 0,853550 | STUK
117069 | COLECALCIFEROL BENFEROL CAPSULE 800IE | COLECALCIFEROL-800-IE-CAPSULE | 0,121714 | STUK
108396 | CALCI-BONED3 ORANGE KAUWTABLET 1000MG/880IE | COLECALCIFEROL-880-IE-KAUWDRAGEE/KAUWTABLET-CALCIUM CARBONATE-2500-MG-KAUWDRAGEE/KAUWTABLET | 0,200024 | STUK
108406 | CALCIUM/VITAMINE D3 SANDOZ KAUWTABLET 1000MG/880IE | COLECALCIFEROL-880-IE-KAUWDRAGEE/KAUWTABLET-CALCIUM CARBONATE-2500-MG-KAUWDRAGEE/KAUWTABLET | 0,204363 | STUK
EU/1/03/268/003 | CHOLESTAGEL TABLET FILMOMHULD 625MG | COLESEVELAM-625-MG-TABLET | 0,714581 | STUK
EU/1/03/268/004 | CHOLESTAGEL TABLET FILMOMHULD 625MG | COLESEVELAM-625-MG-TABLET | 0,714581 | STUK
115912//14276 | QUESTRAN A POEDER 4G IN SACHET | COLESTYRAMINE-4000-MG-POEDER/GRANULAAT, ORAAL | 0,399842 | STUK
120597//14276 | QUESTRAN A POEDER 4G IN SACHET | COLESTYRAMINE-4000-MG-POEDER/GRANULAAT, ORAAL | 0,399842 | STUK
125038//14276 | QUESTRAN A POEDER 4G IN SACHET | COLESTYRAMINE-4000-MG-POEDER/GRANULAAT, ORAAL | 0,399842 | STUK
14276 | QUESTRAN A POEDER 4G IN SACHET | COLESTYRAMINE-4000-MG-POEDER/GRANULAAT, ORAAL | 0,399842 | STUK
6761 | QUESTRAN POEDER 4G IN SACHET | COLESTYRAMINE-4000-MG-POEDER/GRANULAAT, ORAAL | 0,399842 | STUK
127373//106362 | COLISTIMETHAAT NATR EUR-PH PDR V VERNOPL 1 MILJ IE | COLISTIN-1000000-IE-POEDER VOOR INHALATIEVLOEISTOF | 9,474046 | STUK
29664 | COLISTIN PDR V VERNEVELOPL FL 1 MILJ IE + SOLV 3ML | COLISTIN-1000000-IE-POEDER VOOR INHALATIEVLOEISTOF | 11,379741 | STUK
106362 | TADIM PDR V VERNEVELOPL FL 1 MILJ IE + TADIM DISC | COLISTIN-1000000-IE-POEDER VOOR INHALATIEVLOEISTOF | 9,474046 | STUK
123273//106362 | TADIM PDR V VERNEVELOPL FL 1 MILJ IE + TADIM DISC | COLISTIN-1000000-IE-POEDER VOOR INHALATIEVLOEISTOF | 9,474046 | STUK
EU/1/11/747/001 | COLOBREATHE INHALPDR 1662500IE + TURBOSPIN | COLISTIN-1662500-IE-INHALATIEPOEDER INCL INHALER | 21,499818 | STUK
EU/1/10/641/001 | RUCONEST INJECTIEPOEDER FLACON 2100E | CONESTAT ALFA-2100-IE-POED. V. INJECTIE, FLACON | 889,389988 | STUK
EU/1/10/641/002 | RUCONEST INJPDR FL 2100E + SOLV 20ML +TOEBEH | CONESTAT ALFA-2100-IE-POED. V. INJECTIE, FLACON | 889,389988 | STUK
EU/1/14/960/001 | DUAVIVE TABLET MGA 0,45/20MG | CONJUGATED ESTROGENS-0.45-MG-TABLET, MET GEREGULEERDE AFGIFTE-BAZEDOXIFEEN-20-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,940493 | STUK
EU/1/09/609/002 | ELONVA 150 INJVLST 300MCG/ML WWSP 0,5ML | CORIFOLLITROPIN ALFA-0.3-MG/ML-INJ.VLOEISTOF, WWSP | 1061,701585 | ML
EU/1/12/793/001 | XALKORI CAPSULE 200MG | CRIZOTINIB-200-MG-CAPSULE | 75,190701 | STUK
EU/1/12/793/003 | XALKORI CAPSULE 250MG | CRIZOTINIB-250-MG-CAPSULE | 82,674856 | STUK
12447 | NALCROM DRANK 20MG/ML AMPUL 10ML | CROMOGLICIC ACID-20-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,195388 | ML
6851 | CYCLOGYL OOGDRUPPELS 1% FLACON 15ML | CYCLOPENTOLATE-10-MG/ML-OOGDRUPPELS | 1,260947 | ML
1155 | ENDOXAN DRAGEE 50MG | CYCLOPHOSPHAMIDE-50-MG-TABLET | 0,621074 | STUK
6540 | ANDROCUR TABLET 50MG | CYPROTERONE-50-MG-TABLET | 0,604110 | STUK
15742 | CYPROTERONACETAAT PCH TABLET 50MG | CYPROTERONE-50-MG-TABLET | 0,604110 | STUK
112666 | CYTARABINE ACCORD INJVLST 100MG/ML FLACON 1ML | CYTARABINE-100-MG/ML-INJECTIEVLOEISTOF, FLAC | 3,398082 | ML
112666 | CYTARABINE ACCORD INJVLST 100MG/ML FLACON 5ML | CYTARABINE-100-MG/ML-INJECTIEVLOEISTOF, FLAC | 3,398082 | ML
112666 | CYTARABINE ACCORD INJVLST 100MG/ML FLACON 10ML | CYTARABINE-100-MG/ML-INJECTIEVLOEISTOF, FLAC | 3,398082 | ML
112666 | CYTARABINE ACCORD INJVLST 100MG/ML FLACON 20ML | CYTARABINE-100-MG/ML-INJECTIEVLOEISTOF, FLAC | 3,398082 | ML
112666 | CYTARABINE ACCORD INJVLST 100MG/ML FLACON 40ML | CYTARABINE-100-MG/ML-INJECTIEVLOEISTOF, FLAC | 3,398082 | ML
112666 | CYTARABINE ACCORD INJVLST 100MG/ML FLACON 50ML | CYTARABINE-100-MG/ML-INJECTIEVLOEISTOF, FLAC | 3,398082 | ML
22863 | CYTARABINE HOSPIRA INFVL C 100MG/ML 10ML ONCOTAIN | CYTARABINE-100-MG/ML-INJECTIEVLOEISTOF, FLAC | 3,398082 | ML
22864 | CYTARABINE HOSPIRA INFVL C 100MG/ML 20ML ONCOTAIN | CYTARABINE-100-MG/ML-INJECTIEVLOEISTOF, FLAC | 3,398082 | ML
22860 | CYTARABINE HOSPIRA INJVLST 20MG/ML FL 5ML ONCOTAIN | CYTARABINE-20-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,685894 | ML
EU/1/08/442/006 | PRADAXA CAPSULE 110MG | DABIGATRAN-110-MG-CAPSULE | 1,025772 | STUK
EU/1/08/442/007 | PRADAXA CAPSULE 110MG | DABIGATRAN-110-MG-CAPSULE | 1,025772 | STUK
EU/1/08/442/008 | PRADAXA CAPSULE 110MG | DABIGATRAN-110-MG-CAPSULE | 1,025772 | STUK
EU/1/08/442/018 | PRADAXA CAPSULE 110MG | DABIGATRAN-110-MG-CAPSULE | 1,025772 | STUK
EU/1/08/442/011 | PRADAXA CAPSULE 150MG | DABIGATRAN-150-MG-CAPSULE | 1,025814 | STUK
EU/1/08/442/013 | PRADAXA CAPSULE 150MG | DABIGATRAN-150-MG-CAPSULE | 1,025814 | STUK
EU/1/08/442/019 | PRADAXA CAPSULE 150MG | DABIGATRAN-150-MG-CAPSULE | 1,025814 | STUK
EU/1/08/442/002 | PRADAXA CAPSULE 75MG | DABIGATRAN-75-MG-CAPSULE | 1,045121 | STUK
EU/1/08/442/003 | PRADAXA CAPSULE 75MG | DABIGATRAN-75-MG-CAPSULE | 1,045121 | STUK
EU/1/08/442/004 | PRADAXA CAPSULE 75MG | DABIGATRAN-75-MG-CAPSULE | 1,045121 | STUK
EU/1/08/442/017 | PRADAXA CAPSULE 75MG | DABIGATRAN-75-MG-CAPSULE | 1,045121 | STUK
EU/1/13/865/001 | TAFINLAR CAPSULE 50MG | DABRAFENIB-50-MG-CAPSULE | 34,476754 | STUK
EU/1/13/865/002 | TAFINLAR CAPSULE 50MG | DABRAFENIB-50-MG-CAPSULE | 34,476754 | STUK
EU/1/13/865/003 | TAFINLAR CAPSULE 75MG | DABRAFENIB-75-MG-CAPSULE | 51,659882 | STUK
EU/1/13/865/004 | TAFINLAR CAPSULE 75MG | DABRAFENIB-75-MG-CAPSULE | 51,659882 | STUK
12787 | FRAGMIN 2500 INJVLST 12.500IE/ML WWSP 0,2ML | DALTEPARIN-12500-IE/ML-INJ.VLOEISTOF, WWSP | 11,268731 | ML
110754//12788 | FRAGMIN 5000 INJVLST 25.000IE/ML WWSP 0,2ML | DALTEPARIN-25000-IE/ML-INJ.VLOEISTOF, WWSP | 16,399554 | ML
110939//12788 | FRAGMIN 5000 INJVLST 25.000IE/ML WWSP 0,2ML | DALTEPARIN-25000-IE/ML-INJ.VLOEISTOF, WWSP | 16,399554 | ML
12788 | FRAGMIN 5000 INJVLST 25.000IE/ML WWSP 0,2ML | DALTEPARIN-25000-IE/ML-INJ.VLOEISTOF, WWSP | 16,399554 | ML
110755//20607 | FRAGMIN 7500 INJVLST 25.000IE/ML WWSP 0,3ML | DALTEPARIN-25000-IE/ML-INJ.VLOEISTOF, WWSP | 16,399554 | ML
116567//21896 | FRAGMIN 10000 INJVLST 25.000IE/ML WWSP 0,4ML | DALTEPARIN-25000-IE/ML-INJ.VLOEISTOF, WWSP | 16,399554 | ML
21896 | FRAGMIN 10000 INJVLST 25.000IE/ML WWSP 0,4ML | DALTEPARIN-25000-IE/ML-INJ.VLOEISTOF, WWSP | 18,035627 | ML
116569//21897 | FRAGMIN 12500 INJVLST 25.000IE/ML WWSP 0,5ML | DALTEPARIN-25000-IE/ML-INJ.VLOEISTOF, WWSP | 16,399554 | ML
126028//21897 | FRAGMIN 12500 INJVLST 25.000IE/ML WWSP 0,5ML | DALTEPARIN-25000-IE/ML-INJ.VLOEISTOF, WWSP | 16,399554 | ML
21897 | FRAGMIN 12500 INJVLST 25.000IE/ML WWSP 0,5ML | DALTEPARIN-25000-IE/ML-INJ.VLOEISTOF, WWSP | 18,035627 | ML
116571//21898 | FRAGMIN 15000 INJVLST 25.000IE/ML WWSP 0,6ML | DALTEPARIN-25000-IE/ML-INJ.VLOEISTOF, WWSP | 16,399554 | ML
119860//21898 | FRAGMIN 15000 INJVLST 25.000IE/ML WWSP 0,6ML | DALTEPARIN-25000-IE/ML-INJ.VLOEISTOF, WWSP | 16,399554 | ML
21898 | FRAGMIN 15000 INJVLST 25.000IE/ML WWSP 0,6ML | DALTEPARIN-25000-IE/ML-INJ.VLOEISTOF, WWSP | 16,399554 | ML
116572//21899 | FRAGMIN 18000 INJVLST 25.000IE/ML WWSP 0,72ML | DALTEPARIN-25000-IE/ML-INJ.VLOEISTOF, WWSP | 16,399554 | ML
119843//21899 | FRAGMIN 18000 INJVLST 25.000IE/ML WWSP 0,72ML | DALTEPARIN-25000-IE/ML-INJ.VLOEISTOF, WWSP | 16,399554 | ML
127108//21899 | FRAGMIN 18000 INJVLST 25.000IE/ML WWSP 0,72ML | DALTEPARIN-25000-IE/ML-INJ.VLOEISTOF, WWSP | 16,399554 | ML
21899 | FRAGMIN 18000 INJVLST 25.000IE/ML WWSP 0,72ML | DALTEPARIN-25000-IE/ML-INJ.VLOEISTOF, WWSP | 16,399554 | ML
109721//6978 | DANTRIUM CAPSULE 25MG | DANTROLENE-25-MG-CAPSULE | 0,252289 | STUK
121196//6978 | DANTRIUM CAPSULE 25MG | DANTROLENE-25-MG-CAPSULE | 0,252289 | STUK
6978 | DANTRIUM CAPSULE 25MG | DANTROLENE-25-MG-CAPSULE | 0,252289 | STUK
EU/1/12/795/006 | FORXIGA TABLET FILMOMHULD 10MG | DAPAGLIFLOZIN-10-MG-TABLET | 1,366524 | STUK
EU/1/12/795/009 | FORXIGA TABLET FILMOMHULD 10MG | DAPAGLIFLOZIN-10-MG-TABLET | 1,366524 | STUK
108199 | PRILIGY TABLET FILMOMHULD 30MG | DAPOXETINE-30-MG-TABLET | 5,390852 | STUK
108200 | PRILIGY TABLET FILMOMHULD 60MG | DAPOXETINE-60-MG-TABLET | 7,323207 | STUK
EU/1/05/328/002 | CUBICIN INFUSIEPOEDER FLACON 500MG | DAPTOMYCIN-500-MG-POED. V. INFUSIE,FLACON | 116,814816 | STUK
EU/1/01/185/001 | ARANESP 10 INJVLST 25MCG/ML WWSP 0,4ML | DARBEPOETIN ALFA-.025-MG/ML-INJ.VLOEISTOF, WWSP | 43,859431 | ML
EU/1/01/185/002 | ARANESP 10 INJVLST 25MCG/ML WWSP 0,4ML | DARBEPOETIN ALFA-.025-MG/ML-INJ.VLOEISTOF, WWSP | 43,859431 | ML
EU/1/01/185/033 | ARANESP 10 INJVLST 25MCG/ML WWSP 0,4ML | DARBEPOETIN ALFA-.025-MG/ML-INJ.VLOEISTOF, WWSP | 43,859431 | ML
EU/1/01/185/035 | ARANESP 20 INJVLST 40MCG/ML WWSP 0,5ML | DARBEPOETIN ALFA-.04-MG/ML-INJ.VLOEISTOF, WWSP | 64,929557 | ML
EU/1/01/185/078 | ARANESP 20 INJVLST 40MCG/ML WWSP 0,5ML | DARBEPOETIN ALFA-.04-MG/ML-INJ.VLOEISTOF, WWSP | 64,929557 | ML
EU/1/01/185/005 | ARANESP 20 INJVLST 40MCG/ML WWSP 0,5ML | DARBEPOETIN ALFA-.04-MG/ML-INJ.VLOEISTOF, WWSP | 66,320503 | ML
EU/1/01/185/006 | ARANESP 20 INJVLST 40MCG/ML WWSP 0,5ML | DARBEPOETIN ALFA-.04-MG/ML-INJ.VLOEISTOF, WWSP | 66,320503 | ML
EU/1/01/185/079 | ARANESP 20 INJVLST 40MCG/ML WWSP 0,5ML | DARBEPOETIN ALFA-.04-MG/ML-INJ.VLOEISTOF, WWSP | 66,320503 | ML
EU/1/01/185/047 | ARANESP SURECLICK 20 INJVLST 40MCG/ML WWSP 0,5ML | DARBEPOETIN ALFA-.04-MG/ML-INJ.VLOEISTOF, WWSP | 66,320503 | ML
EU/1/01/185/036 | ARANESP 30 INJVLST 100MCG/ML WWSP 0,3ML | DARBEPOETIN ALFA-.1-MG/ML-INJ.VLOEISTOF, WWSP | 161,998474 | ML
EU/1/01/185/007 | ARANESP 30 INJVLST 100MCG/ML WWSP 0,3ML | DARBEPOETIN ALFA-.1-MG/ML-INJ.VLOEISTOF, WWSP | 165,651005 | ML
EU/1/01/185/008 | ARANESP 30 INJVLST 100MCG/ML WWSP 0,3ML | DARBEPOETIN ALFA-.1-MG/ML-INJ.VLOEISTOF, WWSP | 165,651005 | ML
EU/1/01/185/081 | ARANESP 30 INJVLST 100MCG/ML WWSP 0,3ML | DARBEPOETIN ALFA-.1-MG/ML-INJ.VLOEISTOF, WWSP | 165,651005 | ML
EU/1/01/185/037 | ARANESP 40 INJVLST 100MCG/ML WWSP 0,4ML | DARBEPOETIN ALFA-.1-MG/ML-INJ.VLOEISTOF, WWSP | 161,998474 | ML
EU/1/01/185/082 | ARANESP 40 INJVLST 100MCG/ML WWSP 0,4ML | DARBEPOETIN ALFA-.1-MG/ML-INJ.VLOEISTOF, WWSP | 161,998474 | ML
EU/1/01/185/083 | ARANESP 40 INJVLST 100MCG/ML WWSP 0,4ML | DARBEPOETIN ALFA-.1-MG/ML-INJ.VLOEISTOF, WWSP | 161,998474 | ML
EU/1/01/185/009 | ARANESP 40 INJVLST 100MCG/ML WWSP 0,4ML | DARBEPOETIN ALFA-.1-MG/ML-INJ.VLOEISTOF, WWSP | 165,651005 | ML
EU/1/01/185/010 | ARANESP 40 INJVLST 100MCG/ML WWSP 0,4ML | DARBEPOETIN ALFA-.1-MG/ML-INJ.VLOEISTOF, WWSP | 165,651005 | ML
EU/1/01/185/011 | ARANESP 50 INJVLST 100MCG/ML WWSP 0,5ML | DARBEPOETIN ALFA-.1-MG/ML-INJ.VLOEISTOF, WWSP | 161,998474 | ML
EU/1/01/185/085 | ARANESP 50 INJVLST 100MCG/ML WWSP 0,5ML | DARBEPOETIN ALFA-.1-MG/ML-INJ.VLOEISTOF, WWSP | 161,998474 | ML
EU/1/01/185/012 | ARANESP 50 INJVLST 100MCG/ML WWSP 0,5ML | DARBEPOETIN ALFA-.1-MG/ML-INJ.VLOEISTOF, WWSP | 165,651005 | ML
EU/1/01/185/049 | ARANESP SURECLICK 40 INJVLST 100MCG/ML WWSP 0,4ML | DARBEPOETIN ALFA-.1-MG/ML-INJ.VLOEISTOF, WWSP | 161,998474 | ML
EU/1/01/185/013 | ARANESP 60 INJVLST 200MCG/ML WWSP 0,3ML | DARBEPOETIN ALFA-.2-MG/ML-INJ.VLOEISTOF, WWSP | 324,898691 | ML
EU/1/01/185/039 | ARANESP 60 INJVLST 200MCG/ML WWSP 0,3ML | DARBEPOETIN ALFA-.2-MG/ML-INJ.VLOEISTOF, WWSP | 324,898691 | ML
EU/1/01/185/014 | ARANESP 60 INJVLST 200MCG/ML WWSP 0,3ML | DARBEPOETIN ALFA-.2-MG/ML-INJ.VLOEISTOF, WWSP | 333,820413 | ML
EU/1/01/185/087 | ARANESP 60 INJVLST 200MCG/ML WWSP 0,3ML | DARBEPOETIN ALFA-.2-MG/ML-INJ.VLOEISTOF, WWSP | 333,820413 | ML
EU/1/01/185/015 | ARANESP 80 INJVLST 200MCG/ML WWSP 0,4ML | DARBEPOETIN ALFA-.2-MG/ML-INJ.VLOEISTOF, WWSP | 324,898691 | ML
EU/1/01/185/016 | ARANESP 80 INJVLST 200MCG/ML WWSP 0,4ML | DARBEPOETIN ALFA-.2-MG/ML-INJ.VLOEISTOF, WWSP | 333,820413 | ML
EU/1/01/185/089 | ARANESP 80 INJVLST 200MCG/ML WWSP 0,4ML | DARBEPOETIN ALFA-.2-MG/ML-INJ.VLOEISTOF, WWSP | 333,820413 | ML
EU/1/01/185/017 | ARANESP 100 INJVLST 200MCG/ML WWSP 0,5ML | DARBEPOETIN ALFA-.2-MG/ML-INJ.VLOEISTOF, WWSP | 324,898691 | ML
EU/1/01/185/091 | ARANESP 100 INJVLST 200MCG/ML WWSP 0,5ML | DARBEPOETIN ALFA-.2-MG/ML-INJ.VLOEISTOF, WWSP | 333,820413 | ML
EU/1/01/185/093 | ARANESP 130 INJVLST 200MCG/ML WWSP 0,65ML | DARBEPOETIN ALFA-.2-MG/ML-INJ.VLOEISTOF, WWSP | 333,820413 | ML
EU/1/01/185/051 | ARANESP SURECLICK 60 INJVLST 200MCG/ML WWSP 0,3ML | DARBEPOETIN ALFA-.2-MG/ML-INJ.VLOEISTOF, WWSP | 324,898691 | ML
EU/1/01/185/052 | ARANESP SURECLICK 80 INJVLST 200MCG/ML WWSP 0,4ML | DARBEPOETIN ALFA-.2-MG/ML-INJ.VLOEISTOF, WWSP | 324,898691 | ML
EU/1/01/185/053 | ARANESP SURECLICK 100 INJVLST 200MCG/ML WWSP 0,5ML | DARBEPOETIN ALFA-.2-MG/ML-INJ.VLOEISTOF, WWSP | 324,898691 | ML
EU/1/01/185/095 | ARANESP 150 INJVLST 500MCG/ML WWSP 0,3ML | DARBEPOETIN ALFA-.5-MG/ML-INJ.VLOEISTOF, WWSP | 782,848081 | ML
EU/1/01/185/019 | ARANESP 150 INJVLST 500MCG/ML WWSP 0,3ML | DARBEPOETIN ALFA-.5-MG/ML-INJ.VLOEISTOF, WWSP | 807,912973 | ML
EU/1/01/185/020 | ARANESP 150 INJVLST 500MCG/ML WWSP 0,3ML | DARBEPOETIN ALFA-.5-MG/ML-INJ.VLOEISTOF, WWSP | 807,912973 | ML
EU/1/01/185/096 | ARANESP 300 INJVLST 500MCG/ML WWSP 0,6ML | DARBEPOETIN ALFA-.5-MG/ML-INJ.VLOEISTOF, WWSP | 782,848081 | ML
EU/1/01/185/021 | ARANESP 300 INJVLST 500MCG/ML WWSP 0,6ML | DARBEPOETIN ALFA-.5-MG/ML-INJ.VLOEISTOF, WWSP | 807,912973 | ML
EU/1/01/185/098 | ARANESP 500 INJVLST 500MCG/ML WWSP 1ML | DARBEPOETIN ALFA-.5-MG/ML-INJ.VLOEISTOF, WWSP | 782,848081 | ML
EU/1/01/185/031 | ARANESP 500 INJVLST 500MCG/ML WWSP 1ML | DARBEPOETIN ALFA-.5-MG/ML-INJ.VLOEISTOF, WWSP | 807,912973 | ML
EU/1/01/185/054 | ARANESP SURECLICK 150 INJVLST 500MCG/ML WWSP 0,3ML | DARBEPOETIN ALFA-.5-MG/ML-INJ.VLOEISTOF, WWSP | 782,848081 | ML
EU/1/01/185/055 | ARANESP SURECLICK 300 INJVLST 500MCG/ML WWSP 0,6ML | DARBEPOETIN ALFA-.5-MG/ML-INJ.VLOEISTOF, WWSP | 782,848081 | ML
EU/1/01/185/056 | ARANESP SURECLICK 500 INJVLST 500MCG/ML WWSP 1ML | DARBEPOETIN ALFA-.5-MG/ML-INJ.VLOEISTOF, WWSP | 782,848081 | ML
EU/1/04/294/009 | EMSELEX TABLET MVA 15MG | DARIFENACINE-15-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,983200 | STUK
EU/1/04/294/023 | EMSELEX TABLET MVA 15MG | DARIFENACINE-15-MG-TABLET, MET GEREGULEERDE AFGIFTE | 1,037846 | STUK
EU/1/04/294/003 | EMSELEX TABLET MVA 7,5MG | DARIFENACINE-7.5-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,810578 | STUK
EU/1/04/294/017 | EMSELEX TABLET MVA 7,5MG | DARIFENACINE-7.5-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,810578 | STUK
EU/1/06/380/004 | PREZISTA TABLET FILMOMHULD 150MG | DARUNAVIR-150-MG-TABLET | 2,838414 | STUK
EU/1/06/380/003 | PREZISTA TABLET FILMOMHULD 400MG | DARUNAVIR-400-MG-TABLET | 6,126818 | STUK
EU/1/16/1140/037 | DARUNAVIR MYLAN TABLET FILMOMHULD 600MG | DARUNAVIR-600-MG-TABLET | 7,638037 | STUK
118529 | DARUNAVIR SANDOZ TABLET FILMOMHULD 600MG | DARUNAVIR-600-MG-TABLET | 7,638037 | STUK
117023 | DARUNAVIR TEVA TABLET FILMOMHULD 600MG | DARUNAVIR-600-MG-TABLET | 7,638037 | STUK
EU/1/06/380/002 | PREZISTA TABLET FILMOMHULD 600MG | DARUNAVIR-600-MG-TABLET | 7,638037 | STUK
EU/1/06/380/005 | PREZISTA TABLET FILMOMHULD 75MG | DARUNAVIR-75-MG-TABLET | 1,419207 | STUK
EU/1/16/1140/043 | DARUNAVIR MYLAN TABLET FILMOMHULD 800MG | DARUNAVIR-800-MG-TABLET | 8,091444 | STUK
118530 | DARUNAVIR SANDOZ TABLET FILMOMHULD 800MG | DARUNAVIR-800-MG-TABLET | 10,692986 | STUK
119914 | DARUNAVIR TEVA TABLET FILMOMHULD 800MG | DARUNAVIR-800-MG-TABLET | 8,091444 | STUK
EU/1/06/380/007 | PREZISTA TABLET FILMOMHULD 800MG | DARUNAVIR-800-MG-TABLET | 10,692986 | STUK
EU/1/14/967/001 | REZOLSTA TABLET FILMOMHULD 800/150MG | DARUNAVIR-800-MG-TABLET-COBICISTAT-150-MG-TABLET | 13,303944 | STUK
120799 | DASATINIB CF TABLET FILMOMHULD 100MG | DASATINIB-100-MG-TABLET | 100,267510 | STUK
120805 | DASATINIB SANDOZ TABLET FILMOMHULD 100MG | DASATINIB-100-MG-TABLET | 100,267510 | STUK
EU/1/06/363/011 | SPRYCEL TABLET FILMOMHULD 100MG | DASATINIB-100-MG-TABLET | 100,267510 | STUK
EU/1/06/363/016 | SPRYCEL POEDER VOOR SUSPENSIE 10MG/ML | DASATINIB-10-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 8,631148 | ML
120801 | DASATINIB SANDOZ TABLET FILMOMHULD 20MG | DASATINIB-20-MG-TABLET | 29,346310 | STUK
EU/1/06/363/001 | SPRYCEL TABLET FILMOMHULD 20MG | DASATINIB-20-MG-TABLET | 25,561584 | STUK
EU/1/06/363/007 | SPRYCEL TABLET FILMOMHULD 20MG | DASATINIB-20-MG-TABLET | 25,561584 | STUK
120802 | DASATINIB SANDOZ TABLET FILMOMHULD 50MG | DASATINIB-50-MG-TABLET | 58,236849 | STUK
EU/1/06/363/002 | SPRYCEL TABLET FILMOMHULD 50MG | DASATINIB-50-MG-TABLET | 51,373462 | STUK
EU/1/06/363/008 | SPRYCEL TABLET FILMOMHULD 50MG | DASATINIB-50-MG-TABLET | 51,373462 | STUK
120797 | DASATINIB CF TABLET FILMOMHULD 70MG | DASATINIB-70-MG-TABLET | 52,027602 | STUK
120803 | DASATINIB SANDOZ TABLET FILMOMHULD 70MG | DASATINIB-70-MG-TABLET | 59,050009 | STUK
EU/1/06/363/003 | SPRYCEL TABLET FILMOMHULD 70MG | DASATINIB-70-MG-TABLET | 52,027602 | STUK
EU/1/06/363/009 | SPRYCEL TABLET FILMOMHULD 70MG | DASATINIB-70-MG-TABLET | 52,027602 | STUK
EU/1/12/792/001 | DACOGEN INFPDR FLACON 50MG | DECITABINE-50-MG-POED. V. INFUSIE,FLACON | 1118,930183 | STUK
EU/1/06/356/014 | EXJADE TABLET FILMOMHULD 180MG | DEFERASIROX-180-MG-TABLET | 12,192266 | STUK
EU/1/06/356/017 | EXJADE TABLET FILMOMHULD 360MG | DEFERASIROX-360-MG-TABLET | 22,008387 | STUK
EU/1/06/356/011 | EXJADE TABLET FILMOMHULD 90MG | DEFERASIROX-90-MG-TABLET | 5,983166 | STUK
EU/1/99/108/003 | FERRIPROX OPLOSSING VOOR ORAAL GEBRUIK 100MG/ML | DEFERIPRON-100-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,412984 | ML
EU/1/99/108/001 | FERRIPROX TABLET 500MG | DEFERIPRON-500-MG-TABLET | 1,908710 | STUK
EU/1/13/878/001 | DEFITELIO INFVLST CONC 80MG/ML FLACON 2,5ML | DEFIBROTIDE-80-MG/ML-INFUUSVLOEISTOF, FLACON | 172,330524 | ML
EU/1/08/504/002 | FIRMAGON INJPDR FLACON 120MG + SOLV 3ML + TOEBEH | DEGARELIX-120-MG-POED. V. INJECTIE, FLACON | 130,107788 | STUK
EU/1/08/504/001 | FIRMAGON INJPDR FLACON 80MG + SOLV 4,2ML + TOEBEH | DEGARELIX-80-MG-POED. V. INJECTIE, FLACON | 138,233171 | STUK
EU/1/10/618/003 | PROLIA 60 INJVLST 60MG/ML WWSP 1ML | DENOSUMAB-60-MG/ML-INJ.VLOEISTOF, WWSP | 182,822912 | ML
EU/1/11/703/001 | XGEVA 120 INJVLST 70MG/ML FLACON 1,7ML | DENOSUMAB-70-MG/ML-INJECTIEVLOEISTOF, FLAC | 176,329201 | ML
EU/1/00/160/065 | AERIUS DRANK 0,5MG/ML | DESLORATADINE-.5-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,036093 | ML
EU/1/00/160/063 | AERIUS DRANK 0,5MG/ML | DESLORATADINE-.5-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,049963 | ML
EU/1/00/160/066 | AERIUS DRANK 0,5MG/ML | DESLORATADINE-.5-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,049963 | ML
109205 | DESLORATADINE CF DRANK 0,5MG/ML | DESLORATADINE-.5-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,049963 | ML
109202 | DESLORATADINE SANDOZ DRANK 0,5MG/ML | DESLORATADINE-.5-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,049963 | ML
110902 | DESLORATADINE TEVA DRANK 0,5MG/ML | DESLORATADINE-.5-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,045533 | ML
EU/1/00/160/044 | AERIUS ORODISPERGEERBARE TABLET 2,5MG | DESLORATADINE-2.5-MG-SMELTTABLET | 0,221403 | STUK
EU/1/00/160/008 | AERIUS TABLET FILMOMHULD 5MG | DESLORATADINE-5-MG-TABLET | 0,179974 | STUK
EU/1/00/160/009 | AERIUS TABLET FILMOMHULD 5MG | DESLORATADINE-5-MG-TABLET | 0,179974 | STUK
EU/1/00/160/011 | AERIUS TABLET FILMOMHULD 5MG | DESLORATADINE-5-MG-TABLET | 0,179974 | STUK
EU/1/11/746/006 | DESLORATADINE RP TABLET FILMOMHULD 5MG | DESLORATADINE-5-MG-TABLET | 0,111591 | STUK
109201 | DESLORATADINE SANDOZ TABLET FILMOMHULD 5MG | DESLORATADINE-5-MG-TABLET | 0,179974 | STUK
EU/1/00/161/011 | NEOCLARITYN TABLET FILMOMHULD 5MG | DESLORATADINE-5-MG-TABLET | 0,179974 | STUK
8868 | MINRIN INJVLST 4MCG/ML AMPUL 1ML (IV/IM) | DESMOPRESSIN-.004-MG/ML-INJ.VLOEISTOF AMPUL | 6,288972 | ML
24110 | DESMOPRESSINE SANDOZ NEUSSPR 10MCG/DO FLACON 50DO | DESMOPRESSIN-.01-MG-NEUSSPRAY | 0,617792 | DOSIS
13958 | MINRIN NEUSSPRAY 0,1MG/ML SPUITBUS 5ML | DESMOPRESSIN-.01-MG-NEUSSPRAY | 0,617792 | DOSIS
113352//16175 | OCTOSTIM NEUSSPRAY 150MCG/DO FLACON 25DOSES | DESMOPRESSIN-.15-MG-NEUSSPRAY | 14,794005 | DOSIS
121153//16175 | OCTOSTIM NEUSSPRAY 150MCG/DO FLACON 25DOSES | DESMOPRESSIN-.15-MG-NEUSSPRAY | 14,794005 | DOSIS
122698//16175 | OCTOSTIM NEUSSPRAY 150MCG/DO FLACON 25DOSES | DESMOPRESSIN-.15-MG-NEUSSPRAY | 14,794005 | DOSIS
120915//16175 | OCTOSTIM NEUSSPRAY 150MCG/DO FLACON 25DOSES | DESMOPRESSIN-.15-MG-NEUSSPRAY | 15,634664 | DOSIS
16175 | OCTOSTIM NEUSSPRAY 150MCG/DO FLACON 25DOSES | DESMOPRESSIN-.15-MG-NEUSSPRAY | 15,634664 | DOSIS
127098//6684 | MINRIN NEUSDRUPPELS 0,1MG/ML | DESMOPRESSIN-.1-MG/ML-NEUSDRUPPELS | 5,439745 | ML
6684 | MINRIN NEUSDRUPPELS 0,1MG/ML | DESMOPRESSIN-.1-MG/ML-NEUSDRUPPELS | 6,993935 | ML
32000 | DESMOPRESSINE ACETAAT TEVA TABLET 0,1MG | DESMOPRESSIN-.1-MG-TABLET | 1,130667 | STUK
122643//12624 | MINRIN TABLET 0,1MG | DESMOPRESSIN-.1-MG-TABLET | 0,770614 | STUK
12624 | MINRIN TABLET 0,1MG | DESMOPRESSIN-.1-MG-TABLET | 1,130667 | STUK
30784 | DESMOPRESSINE ACETAAT AUROBINDO TABLET 0,2MG | DESMOPRESSIN-.2-MG-TABLET | 0,983672 | STUK
32842 | DESMOPRESSINE ACETAAT SANDOZ TABLET 0,2MG | DESMOPRESSIN-.2-MG-TABLET | 0,983672 | STUK
32001 | DESMOPRESSINE ACETAAT TEVA TABLET 0,2MG | DESMOPRESSIN-.2-MG-TABLET | 0,983672 | STUK
12625 | MINRIN TABLET 0,2MG | DESMOPRESSIN-.2-MG-TABLET | 0,983672 | STUK
122248//117304 | DESMOPRESSINE FISHER LYOPHILISAAT 50MCG | DESMOPRESSIN-0.05-MG-SMELTTABLET | 0,683062 | STUK
124747//30855 | MINRIN MELT LYOPHILISAAT 60MCG | DESMOPRESSIN-0.06-MG-SMELTTABLET | 0,641728 | STUK
115957//30857 | MINRIN MELT LYOPHILISAAT 240MCG | DESMOPRESSIN-0.24-MG-SMELTTABLET | 2,435054 | STUK
30857 | MINRIN MELT LYOPHILISAAT 240MCG | DESMOPRESSIN-0.24-MG-SMELTTABLET | 2,719367 | STUK
127829//22743 | CERAZETTE TABLET OMHULD 0,075MG | DESOGESTREL-.075-MG-TABLET | 0,115367 | STUK
22743 | CERAZETTE TABLET OMHULD 0,075MG | DESOGESTREL-.075-MG-TABLET | 0,117301 | STUK
111004 | DESOGESTREL THERAMEX TABLET FILMOMHULD 0,075MG | DESOGESTREL-.075-MG-TABLET | 0,115367 | STUK
21768=56079 | DEXAMETHASON APOTEX TABLET 0,5MG | DEXAMETHASONE-.5-MG-TABLET | 0,962194 | STUK
52990 | DEXAMETHASON CF TABLET 0,5MG | DEXAMETHASONE-.5-MG-TABLET | 0,937539 | STUK
56079 | DEXAMETHASON TEVA TABLET 0,5MG | DEXAMETHASONE-.5-MG-TABLET | 0,962194 | STUK
EU/1/10/638/001 | OZURDEX IMPLANTAAT IN APPLICATOR 700MCG | DEXAMETHASONE-0.7-MG-IMPLANTATEN | 1019,086035 | STUK
56003 | DEXAMETHASON TEVA OOGDRUPPELS 1MG/ML FLACON 5ML | DEXAMETHASONE-1-MG/ML-OOGDRUPPELS | 0,704727 | ML
123370//18658 | MONOFREE DEXAMETHASON OOGDR 1MG/ML MINIM 0,4ML | DEXAMETHASONE-1-MG/ML-OOGDRUPPELS UNITDOSE | 0,781720 | ML
124288//18658 | MONOFREE DEXAMETHASON OOGDR 1MG/ML MINIM 0,4ML | DEXAMETHASONE-1-MG/ML-OOGDRUPPELS UNITDOSE | 0,781720 | ML
18658 | MONOFREE DEXAMETHASON OOGDR 1MG/ML MINIM 0,4ML | DEXAMETHASONE-1-MG/ML-OOGDRUPPELS UNITDOSE | 0,781720 | ML
121080//14223 | TOBRADEX OOGDRUPPELS FLACON 5ML | DEXAMETHASONE-1-MG/ML-OOGDRUPPELS-TOBRAMYCIN-3-MG/ML-OOGDRUPPELS | 0,783114 | ML
123104//14223 | TOBRADEX OOGDRUPPELS FLACON 5ML | DEXAMETHASONE-1-MG/ML-OOGDRUPPELS-TOBRAMYCIN-3-MG/ML-OOGDRUPPELS | 0,783114 | ML
14223 | TOBRADEX OOGDRUPPELS FLACON 5ML | DEXAMETHASONE-1-MG/ML-OOGDRUPPELS-TOBRAMYCIN-3-MG/ML-OOGDRUPPELS | 0,903562 | ML
29111//14223 | TOBRADEX OOGDRUPPELS FLACON 5ML | DEXAMETHASONE-1-MG/ML-OOGDRUPPELS-TOBRAMYCIN-3-MG/ML-OOGDRUPPELS | 0,903562 | ML
107717 | DEXAMETHASON CF INJVLST 4MG/ML AMPUL 1ML | DEXAMETHASONE-4-MG/ML-INJ.VLOEISTOF AMPUL | 7,673243 | ML
56517 | ORADEXON INJVLST 5MG/ML FLACON 1ML | DEXAMETHASONE-5-MG/ML-INJECTIEVLOEISTOF, FLAC | 2,417921 | ML
110336 | AMFEXA TABLET 5MG | DEXAMFETAMINE-5-MG-TABLET | 0,884522 | STUK
124800 | TENTIN TABLET 5MG | DEXAMFETAMINE-5-MG-TABLET | 0,884522 | STUK
22082 | STADIUM TABLET 25MG | DEXKETOPROFEN-25-MG-TABLET | 0,259406 | STUK
10187 | DURATEARS OOGDRUPPELS FLACON 15ML | DEXTRAN 70-1-MG/ML-OOGDRUPPELS-HYPROMELLOSE-3-MG/ML-OOGDRUPPELS | 0,219022 | ML
104871//10187 | TEARS NATURALE OOGDRUPPELS FLACON 15ML | DEXTRAN 70-1-MG/ML-OOGDRUPPELS-HYPROMELLOSE-3-MG/ML-OOGDRUPPELS | 0,219022 | ML
107633//10187 | TEARS NATURALE OOGDRUPPELS FLACON 15ML | DEXTRAN 70-1-MG/ML-OOGDRUPPELS-HYPROMELLOSE-3-MG/ML-OOGDRUPPELS | 0,219022 | ML
120416//10187 | TEARS NATURALE OOGDRUPPELS FLACON 15ML | DEXTRAN 70-1-MG/ML-OOGDRUPPELS-HYPROMELLOSE-3-MG/ML-OOGDRUPPELS | 0,219022 | ML
123903//10187 | TEARS NATURALE OOGDRUPPELS FLACON 15ML | DEXTRAN 70-1-MG/ML-OOGDRUPPELS-HYPROMELLOSE-3-MG/ML-OOGDRUPPELS | 0,219022 | ML
55376 | DIAZEPAM ACCORD TABLET 10MG | DIAZEPAM-10-MG-TABLET | 0,106525 | STUK
50282 | DIAZEPAM APOTEX TABLET 10MG | DIAZEPAM-10-MG-TABLET | 0,106525 | STUK
56681 | DIAZEPAM CF TABLET 10MG | DIAZEPAM-10-MG-TABLET | 0,106525 | STUK
20265=52642 | DIAZEPAM MYLAN TABLET 10MG | DIAZEPAM-10-MG-TABLET | 0,106525 | STUK
56254 | DIAZEPAM PCH TABLET 10MG | DIAZEPAM-10-MG-TABLET | 0,106525 | STUK
7606 | STESOLID REKTIOOL 5MG | DIAZEPAM-2-MG/ML-KLYSMA | 0,884852 | ML
55374 | DIAZEPAM ACCORD TABLET 2MG | DIAZEPAM-2-MG-TABLET | 0,044295 | STUK
50280 | DIAZEPAM APOTEX TABLET 2MG | DIAZEPAM-2-MG-TABLET | 0,044295 | STUK
108992 | DIAZEPAM AUROBINDO TABLET 2MG | DIAZEPAM-2-MG-TABLET | 0,044295 | STUK
56679 | DIAZEPAM CF TABLET 2MG | DIAZEPAM-2-MG-TABLET | 0,044295 | STUK
20263=52640 | DIAZEPAM MYLAN TABLET 2MG | DIAZEPAM-2-MG-TABLET | 0,044295 | STUK
56252 | DIAZEPAM PCH TABLET 2MG | DIAZEPAM-2-MG-TABLET | 0,044295 | STUK
7607 | STESOLID REKTIOOL 10MG | DIAZEPAM-4-MG/ML-KLYSMA | 1,052915 | ML
56691 | DIAZEPAM CF INJVLST 5MG/ML AMP 2ML | DIAZEPAM-5-MG/ML-INJ.VLOEISTOF AMPUL | 0,378035 | ML
55375 | DIAZEPAM ACCORD TABLET 5MG | DIAZEPAM-5-MG-TABLET | 0,068368 | STUK
50281 | DIAZEPAM APOTEX TABLET 5MG | DIAZEPAM-5-MG-TABLET | 0,068368 | STUK
56680 | DIAZEPAM CF TABLET 5MG | DIAZEPAM-5-MG-TABLET | 0,068368 | STUK
56253 | DIAZEPAM PCH TABLET 5MG | DIAZEPAM-5-MG-TABLET | 0,068368 | STUK
16275 | DICLOFENAC NATRIUM AUROBINDO RET TABLET MGA 100MG | DICLOFENAC-100-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,290811 | STUK
23148 | DICLOFENAC NATRIUM SANDOZ RETARD TABLET MGA 100MG | DICLOFENAC-100-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,290811 | STUK
16278 | DICLOFENAC NATRIUM AUROBINDO ZETPIL 100MG | DICLOFENAC-100-MG-ZETPIL | 0,284576 | STUK
17261 | DICLOFENAC NATRIUM CF ZETPIL 100MG | DICLOFENAC-100-MG-ZETPIL | 0,284576 | STUK
22930=20743 | DICLOFENAC NATRIUM SANDOZ ZETPIL 100MG | DICLOFENAC-100-MG-ZETPIL | 0,284576 | STUK
121620//34473 | DICLOABAK OOGDRUPPELS 1MG/ML FLACON 10ML | DICLOFENAC-1-MG/ML-OOGDRUPPELS | 0,932242 | ML
34473 | DICLOABAK OOGDRUPPELS 1MG/ML FLACON 10ML | DICLOFENAC-1-MG/ML-OOGDRUPPELS | 0,932242 | ML
122641//12800 | NACLOF OOGDRUPPELS 1MG/ML FLACON 5ML | DICLOFENAC-1-MG/ML-OOGDRUPPELS | 0,844065 | ML
12800 | NACLOF OOGDRUPPELS 1MG/ML FLACON 5ML | DICLOFENAC-1-MG/ML-OOGDRUPPELS | 0,844065 | ML
16483 | NACLOF UNIDOSE OOGDRUPPELS 1MG/ML AMPUL 0,3ML | DICLOFENAC-1-MG/ML-OOGDRUPPELS UNITDOSE | 1,814658 | ML
17256 | DICLOFENAC NATRIUM CF INJVLST 25MG/ML AMPUL 3ML | DICLOFENAC-25-MG/ML-INJ.VLOEISTOF AMPUL | 0,285867 | ML
25586 | DICLOFENAC NATRIUM SDZ INJVLST 25MG/ML AMPUL 3ML | DICLOFENAC-25-MG/ML-INJ.VLOEISTOF AMPUL | 0,286982 | ML
7460 | VOLTAREN INJVLST 25MG/ML AMPUL 3ML | DICLOFENAC-25-MG/ML-INJ.VLOEISTOF AMPUL | 0,286982 | ML
16273 | DICLOFENAC NATRIUM AUROBINDO TABLET MSR 25MG | DICLOFENAC-25-MG-TABLET, MAAGSAPRESISTENT | 0,096010 | STUK
17257 | DICLOFENAC NATRIUM CF TABLET MSR 25MG | DICLOFENAC-25-MG-TABLET, MAAGSAPRESISTENT | 0,096010 | STUK
11985 | DICLOFENAC NATRIUM TEVA TABLET MSR 25MG | DICLOFENAC-25-MG-TABLET, MAAGSAPRESISTENT | 0,096010 | STUK
16276 | DICLOFENAC NATRIUM AUROBINDO ZETPIL 25MG | DICLOFENAC-25-MG-ZETPIL | 0,263220 | STUK
22928=20741 | DICLOFENAC NATRIUM SANDOZ ZETPIL 25MG | DICLOFENAC-25-MG-ZETPIL | 0,256652 | STUK
13245 | CATAFLAM 50 TABLET OMHULD 50MG | DICLOFENAC-50-MG-TABLET | 0,375873 | STUK
16274 | DICLOFENAC NATRIUM AUROBINDO TABLET MSR 50MG | DICLOFENAC-50-MG-TABLET, MAAGSAPRESISTENT | 0,099461 | STUK
17258 | DICLOFENAC NATRIUM CF TABLET MSR 50MG | DICLOFENAC-50-MG-TABLET, MAAGSAPRESISTENT | 0,092044 | STUK
11986 | DICLOFENAC NATRIUM PCH TABLET MSR 50MG | DICLOFENAC-50-MG-TABLET, MAAGSAPRESISTENT | 0,099461 | STUK
11986 | DICLOFENAC NATRIUM TEVA TABLET MSR 50MG | DICLOFENAC-50-MG-TABLET, MAAGSAPRESISTENT | 0,099461 | STUK
16410 | ARTHROTEC TABLET MGA 50MG | DICLOFENAC-50-MG-TABLET, MET GEREGULEERDE AFGIFTE-MISOPROSTOL-0.2-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,239284 | STUK
16277 | DICLOFENAC NATRIUM AUROBINDO ZETPIL 50MG | DICLOFENAC-50-MG-ZETPIL | 0,258880 | STUK
17260 | DICLOFENAC NATRIUM CF ZETPIL 50MG | DICLOFENAC-50-MG-ZETPIL | 0,258880 | STUK
22929=20742 | DICLOFENAC NATRIUM SANDOZ ZETPIL 50MG | DICLOFENAC-50-MG-ZETPIL | 0,258880 | STUK
22690 | DICLOFENAC NATRIUM AUROBINDO RET TABLET MGA 75MG | DICLOFENAC-75-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,220610 | STUK
23147 | DICLOFENAC NATRIUM SANDOZ RETARD TABLET MGA 75MG | DICLOFENAC-75-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,220610 | STUK
20871 | ARTHROTEC TABLET MGA 75MG | DICLOFENAC-75-MG-TABLET, MET GEREGULEERDE AFGIFTE-MISOPROSTOL-0.2-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,343109 | STUK
113370 | DICLOFENAC NA/MISOPROSTOL AUROB T MGA 75MG/200MCG | DICLOFENAC-75-MG-TABLET, MET GEREGULEERDE AFGIFTE-MISOPROSTOL-0.2-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,343109 | STUK
122556 | DIENOGEST STRAGEN TABLET FILMOMHULD 2MG | DIENOGEST-2-MG-TABLET | 0,910020 | STUK
1365 | LANOXIN PG ELIXER 0,05MG/ML | DIGOXIN-.05-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,072069 | ML
119722//8963 | LANOXIN TABLET 0,125MG | DIGOXIN-.125-MG-TABLET | 0,058270 | STUK
120450//8963 | LANOXIN TABLET 0,125MG | DIGOXIN-.125-MG-TABLET | 0,058270 | STUK
8963 | LANOXIN TABLET 0,125MG | DIGOXIN-.125-MG-TABLET | 0,058270 | STUK
124568//1363 | LANOXIN TABLET 0,25MG | DIGOXIN-.25-MG-TABLET | 0,057602 | STUK
119535//1363 | LANOXIN TABLET 0,25MG | DIGOXIN-.25-MG-TABLET | 0,061326 | STUK
121000//1363 | LANOXIN TABLET 0,25MG | DIGOXIN-.25-MG-TABLET | 0,061326 | STUK
1363 | LANOXIN TABLET 0,25MG | DIGOXIN-.25-MG-TABLET | 0,061326 | STUK
17463 | DILTIAZEM HCL APOTEX TABLET MGA 120MG | DILTIAZEM-120-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,174925 | STUK
21375=17463 | DILTIAZEM HCL AUROBINDO RETARD TABLET MGA 120MG | DILTIAZEM-120-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,174925 | STUK
22527 | DILTIAZEM HCL MYLAN RETARD CAPSULE MGA 180MG | DILTIAZEM-180-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,245375 | STUK
100833 | DILTIAZEM HCL MYLAN RETARD CAPSULE MGA 200MG | DILTIAZEM-200-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,222817 | STUK
16538 | TILDIEM XR CAPSULE MGA 200MG | DILTIAZEM-200-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,222817 | STUK
22528 | DILTIAZEM HCL MYLAN RETARD CAPSULE MGA 240MG | DILTIAZEM-240-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,300847 | STUK
22529 | DILTIAZEM HCL MYLAN RETARD CAPSULE MGA 300MG | DILTIAZEM-300-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,265276 | STUK
109448 | DILTIAZEM HCL TEVA RETARD CAPSULE MGA 300MG | DILTIAZEM-300-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,265276 | STUK
16539 | TILDIEM XR CAPSULE MGA 300MG | DILTIAZEM-300-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,265276 | STUK
18110 | DILTIAZEM HCL AUROBINDO TABLET 60MG | DILTIAZEM-60-MG-TABLET | 0,062947 | STUK
17462 | DILTIAZEM HCL APOTEX TABLET MGA 90MG | DILTIAZEM-90-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,159855 | STUK
21374=17462 | DILTIAZEM HCL AUROBINDO RETARD TABLET MGA 90MG | DILTIAZEM-90-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,159855 | STUK
EU/1/12/769/001 | DOCETAXEL ACCORD INFVLST CONC 20MG/ML FL 1ML | DOCETAXEL-20-MG/ML-INFUUSVLOEISTOF, FLACON | 76,009435 | ML
EU/1/12/769/002 | DOCETAXEL ACCORD INFVLST CONC 20MG/ML FL 4ML | DOCETAXEL-20-MG/ML-INFUUSVLOEISTOF, FLACON | 76,009435 | ML
EU/1/12/769/003 | DOCETAXEL ACCORD INFVLST CONC 20MG/ML FL 8ML | DOCETAXEL-20-MG/ML-INFUUSVLOEISTOF, FLACON | 76,009435 | ML
105481 | DOCETAXEL AUROBINDO INFVLST CONC 20MG/ML FL 1ML | DOCETAXEL-20-MG/ML-INFUUSVLOEISTOF, FLACON | 82,913653 | ML
105481 | DOCETAXEL AUROBINDO INFVLST CONC 20MG/ML FL 4ML | DOCETAXEL-20-MG/ML-INFUUSVLOEISTOF, FLACON | 82,913653 | ML
105481 | DOCETAXEL AUROBINDO INFVLST CONC 20MG/ML FL 7ML | DOCETAXEL-20-MG/ML-INFUUSVLOEISTOF, FLACON | 82,913653 | ML
105481 | DOCETAXEL AUROBINDO INFVLST CONC 20MG/ML FL 8ML | DOCETAXEL-20-MG/ML-INFUUSVLOEISTOF, FLACON | 82,913653 | ML
EU/1/12/770/005 | DOCETAXEL KABI INFVLST CONC 20MG/ML FL 1ML | DOCETAXEL-20-MG/ML-INFUUSVLOEISTOF, FLACON | 76,009435 | ML
EU/1/12/770/001 | DOCETAXEL KABI INFVLST CONC 20MG/ML FL 4ML | DOCETAXEL-20-MG/ML-INFUUSVLOEISTOF, FLACON | 76,009435 | ML
EU/1/12/770/003 | DOCETAXEL KABI INFVLST CONC 20MG/ML FL 8ML | DOCETAXEL-20-MG/ML-INFUUSVLOEISTOF, FLACON | 76,009435 | ML
14141 | NORGALAX KLYSMA 12MG/G FLACON 10G | DOCUSATE SODIUM-12-MG/G-KLYSMA | 0,621982 | G
EU/1/13/892/003 | TIVICAY TABLET FILMOMHULD 10MG | DOLUTEGRAVIR-10-MG-TABLET | 3,862042 | STUK
EU/1/13/892/005 | TIVICAY TABLET FILMOMHULD 25MG | DOLUTEGRAVIR-25-MG-TABLET | 9,639144 | STUK
EU/1/13/892/001 | TIVICAY TABLET FILMOMHULD 50MG | DOLUTEGRAVIR-50-MG-TABLET | 19,240273 | STUK
112357 | DOMPERIDON SMELTTAB TEVA ORODISP TABLET 10MG | DOMPERIDONE-10-MG-SMELTTABLET | 0,137877 | STUK
24213 | DOMPERIDON ACCORD TABLET 10MG | DOMPERIDONE-10-MG-TABLET | 0,092857 | STUK
26086=24277 | DOMPERIDON CF TABLET 10MG | DOMPERIDONE-10-MG-TABLET | 0,125218 | STUK
104463 | DOMPERIDON PCH TABLET 10MG | DOMPERIDONE-10-MG-TABLET | 0,134316 | STUK
30008 | DOMPERIDON SANDOZ TABLET 10MG | DOMPERIDONE-10-MG-TABLET | 0,134316 | STUK
115552//7679 | MOTILIUM SUSPENSIE 1MG/ML | DOMPERIDONE-1-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,059456 | ML
7679 | MOTILIUM SUSPENSIE 1MG/ML | DOMPERIDONE-1-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,059456 | ML
109058 | NAVAZIL TABLET FILMOMHULD 5MG | DONEPEZIL-5-MG-TABLET | 0,800027 | STUK
101993//16734 | PULMOZYME INHALATIEVLOEISTOF 1MG/ML AMPUL 2,5ML | DORNASE ALFA (DESOXYRIBONUCLEASE)-1-MG/ML-INHALATIEVLOEISTOF UNITDOSE | 7,895161 | ML
122741//16734 | PULMOZYME INHALATIEVLOEISTOF 1MG/ML AMPUL 2,5ML | DORNASE ALFA (DESOXYRIBONUCLEASE)-1-MG/ML-INHALATIEVLOEISTOF UNITDOSE | 7,895161 | ML
16734 | PULMOZYME INHALATIEVLOEISTOF 1MG/ML AMPUL 2,5ML | DORNASE ALFA (DESOXYRIBONUCLEASE)-1-MG/ML-INHALATIEVLOEISTOF UNITDOSE | 7,895161 | ML
27368//16734 | PULMOZYME INHALATIEVLOEISTOF 1MG/ML AMPUL 2,5ML | DORNASE ALFA (DESOXYRIBONUCLEASE)-1-MG/ML-INHALATIEVLOEISTOF UNITDOSE | 7,895161 | ML
117399//16734 | PULMOZYME VERNEVELVLOEISTOF 1000E/ML AMPUL 2,5ML | DORNASE ALFA (DESOXYRIBONUCLEASE)-1-MG/ML-INHALATIEVLOEISTOF UNITDOSE | 7,895161 | ML
122905//16734 | PULMOZYME VERNEVELVLOEISTOF 1000E/ML AMPUL 2,5ML | DORNASE ALFA (DESOXYRIBONUCLEASE)-1-MG/ML-INHALATIEVLOEISTOF UNITDOSE | 7,895161 | ML
124035//16734 | PULMOZYME VERNEVELVLOEISTOF 1000E/ML AMPUL 2,5ML | DORNASE ALFA (DESOXYRIBONUCLEASE)-1-MG/ML-INHALATIEVLOEISTOF UNITDOSE | 7,895161 | ML
101854 | DORZOLAMIDE MYLAN OOGDRUPPELS 20MG/ML FLACON 5ML | DORZOLAMIDE-20-MG/ML-OOGDRUPPELS | 1,247836 | ML
17618 | TRUSOPT OOGDRUPPELS 20MG/ML FLACON 5ML | DORZOLAMIDE-20-MG/ML-OOGDRUPPELS | 1,247836 | ML
32633 | TRUSOPT CONSERVEERMIDDELVR OOGDR 20MG/ML FL 0,2ML | DORZOLAMIDE-20-MG/ML-OOGDRUPPELS UNITDOSE | 2,063306 | ML
9997 | PROTHIADEN MITIS CAPSULE 25MG | DOSULEPIN-25-MG-CAPSULE | 0,078906 | STUK
9998 | PROTHIADEN DRAGEE 75MG | DOSULEPIN-75-MG-TABLET | 0,317999 | STUK
22688 | CARDURA XL TABLET MGA 4MG | DOXAZOSIN-4-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,213429 | STUK
101671 | DOXAZOSINE PCH RETARD TABLET MVA 4MG | DOXAZOSIN-4-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,213429 | STUK
33594 | DOXAZOSINE SANDOZ RETARD TABLET MVA 4MG | DOXAZOSIN-4-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,213429 | STUK
22689 | CARDURA XL TABLET MGA 8MG | DOXAZOSIN-8-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,388617 | STUK
107688 | DOXAZOSINE AUROBINDO RETARD TABLET MVA 8MG | DOXAZOSIN-8-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,388617 | STUK
107678 | DOXAZOSINE MYLAN RETARD TABLET MVA 8MG | DOXAZOSIN-8-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,388617 | STUK
107680 | DOXAZOSINE SANDOZ RETARD TABLET MVA 8MG | DOXAZOSIN-8-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,388617 | STUK
5908 | SINEQUAN CAPSULE 25MG | DOXEPIN-25-MG-CAPSULE | 2,233014 | STUK
EU/1/96/011/001 | CAELYX PEGYLATED LIPOSOMAL INF CONC 2MG/ML FL 10ML | DOXORUBICIN LIPOSOMAAL-2-MG/ML-INFUUSVLOEISTOF, FLACON | 32,754824 | ML
EU/1/96/011/003 | CAELYX PEGYLATED LIPOSOMAL INF CONC 2MG/ML FL 25ML | DOXORUBICIN LIPOSOMAAL-2-MG/ML-INFUUSVLOEISTOF, FLACON | 39,203309 | ML
EU/1/00/141/001 | MYOCET INFPDR FL 50MG + FL LIPOSOMEN + FL BUFFER | DOXORUBICIN LIPOSOMAAL-50-MG-POED. V. INFUSIE,FLACON | 503,983891 | STUK
103617 | DOXORUBICINE HCL ACC INFVLST CONC 2MG/ML FL 5ML | DOXORUBICIN-2-MG/ML-INFUUSVLOEISTOF, FLACON | 2,278409 | ML
103617 | DOXORUBICINE HCL ACC INFVLST CONC 2MG/ML FL 10ML | DOXORUBICIN-2-MG/ML-INFUUSVLOEISTOF, FLACON | 2,278409 | ML
103617 | DOXORUBICINE HCL ACC INFVLST CONC 2MG/ML FL 25ML | DOXORUBICIN-2-MG/ML-INFUUSVLOEISTOF, FLACON | 2,278409 | ML
103617 | DOXORUBICINE HCL ACC INFVLST CONC 2MG/ML FL 50ML | DOXORUBICIN-2-MG/ML-INFUUSVLOEISTOF, FLACON | 2,278409 | ML
103617 | DOXORUBICINE HCL ACC INFVLST CONC 2MG/ML FL 100ML | DOXORUBICIN-2-MG/ML-INFUUSVLOEISTOF, FLACON | 2,278409 | ML
109099 | DOXORUBICINE HCL ACT INFVLST CONC 2MG/ML FL 25ML | DOXORUBICIN-2-MG/ML-INFUUSVLOEISTOF, FLACON | 2,036687 | ML
109099 | DOXORUBICINE HCL ACT INFVLST CONC 2MG/ML FL 50ML | DOXORUBICIN-2-MG/ML-INFUUSVLOEISTOF, FLACON | 2,036687 | ML
109099 | DOXORUBICINE HCL AUROB INFVLS CONC 2MG/ML FL 100ML | DOXORUBICIN-2-MG/ML-INFUUSVLOEISTOF, FLACON | 2,036687 | ML
109099 | DOXORUBICINE HCL AUROB INFVLST CONC 2MG/ML FL 10ML | DOXORUBICIN-2-MG/ML-INFUUSVLOEISTOF, FLACON | 2,036687 | ML
109099 | DOXORUBICINE HCL AUROB INFVLST CONC 2MG/ML FL 5ML | DOXORUBICIN-2-MG/ML-INFUUSVLOEISTOF, FLACON | 2,036687 | ML
113860 | DOXORUBICINE HCL HIKMA INFVLST CONC 2MG/ML FL 25ML | DOXORUBICIN-2-MG/ML-INFUUSVLOEISTOF, FLACON | 2,036687 | ML
113860 | DOXORUBICINE HCL HIKMA INFVLST CONC 2MG/ML FL 5ML | DOXORUBICIN-2-MG/ML-INFUUSVLOEISTOF, FLACON | 2,036687 | ML
102758 | DOXORUBICINE HCL PCH INFVLST CONC 2MG/ML FL 5ML | DOXORUBICIN-2-MG/ML-INFUUSVLOEISTOF, FLACON | 2,531566 | ML
102758 | DOXORUBICINE HCL PCH INFVLST CONC 2MG/ML FL 25ML | DOXORUBICIN-2-MG/ML-INFUUSVLOEISTOF, FLACON | 2,531566 | ML
102758 | DOXORUBICINE HCL PCH INFVLST CONC 2MG/ML FL 100ML | DOXORUBICIN-2-MG/ML-INFUUSVLOEISTOF, FLACON | 2,531566 | ML
EU/1/14/956/002 | TRULICITY 0,75 INJVLST 0,75MG/0,5ML (1,5MG/ML) PEN | DULAGLUTIDE-0.75-MG-INJ.VLOEISTOF, WWSP | 21,674544 | STUK
EU/1/14/956/007 | TRULICITY 1,5 INJVLST 1,5MG/0,5ML (3MG/ML) PEN | DULAGLUTIDE-1.5-MG-INJ.VLOEISTOF, WWSP | 21,599579 | STUK
EU/1/04/296/001 | CYMBALTA CAPSULE MSR 30MG | DULOXETINE-30-MG-CAPSULE, MAAGSAPRESISTENT | 0,451995 | STUK
116117 | DULOXETINE PENSA CAPSULE MSR 30MG | DULOXETINE-30-MG-CAPSULE, MAAGSAPRESISTENT | 0,306845 | STUK
EU/1/04/297/006 | XERISTAR CAPSULE MSR 30MG | DULOXETINE-30-MG-CAPSULE, MAAGSAPRESISTENT | 0,406796 | STUK
EU/1/04/296/002 | CYMBALTA CAPSULE MSR 60MG | DULOXETINE-60-MG-CAPSULE, MAAGSAPRESISTENT | 0,553398 | STUK
EU/1/15/1010/011 | DULOXETINE MYLAN CAPSULE MSR 60MG | DULOXETINE-60-MG-CAPSULE, MAAGSAPRESISTENT | 0,553398 | STUK
116123 | DULOXETINE PENSA CAPSULE MSR 60MG | DULOXETINE-60-MG-CAPSULE, MAAGSAPRESISTENT | 0,512721 | STUK
EU/1/04/297/002 | XERISTAR CAPSULE MSR 60MG | DULOXETINE-60-MG-CAPSULE, MAAGSAPRESISTENT | 0,515690 | STUK
126027//28317 | AVODART CAPSULE 0,5MG | DUTASTERIDE-.5-MG-CAPSULE | 0,514118 | STUK
32868//28317 | AVODART CAPSULE 0,5MG | DUTASTERIDE-.5-MG-CAPSULE | 0,514118 | STUK
122245//28317 | AVODART CAPSULE 0,5MG | DUTASTERIDE-.5-MG-CAPSULE | 0,568118 | STUK
28317 | AVODART CAPSULE 0,5MG | DUTASTERIDE-.5-MG-CAPSULE | 0,568118 | STUK
32039//28317 | AVODART CAPSULE 0,5MG | DUTASTERIDE-.5-MG-CAPSULE | 0,568118 | STUK
119311 | DUTASTERIDE AUROBINDO CAPSULE 0,5MG | DUTASTERIDE-.5-MG-CAPSULE | 0,568118 | STUK
116062 | DUTASTERIDE CF CAPSULE 0,5MG | DUTASTERIDE-.5-MG-CAPSULE | 0,528115 | STUK
117221 | DUTASTERIDE XIROMED CAPSULE 0,5MG | DUTASTERIDE-.5-MG-CAPSULE | 0,514118 | STUK
5619 | DUPHASTON TABLET 10MG | DYDROGESTERONE-10-MG-TABLET | 0,260875 | STUK
107765//5619 | DUPHASTON TABLET OMHULD 10MG | DYDROGESTERONE-10-MG-TABLET | 0,248536 | STUK
122827//5619 | DUPHASTON TABLET OMHULD 10MG | DYDROGESTERONE-10-MG-TABLET | 0,248536 | STUK
5619 | DUPHASTON TABLET OMHULD 10MG | DYDROGESTERONE-10-MG-TABLET | 0,260875 | STUK
103887 | FEMOSTON CONTINU TABLET OMHULD 0,5/2,5MG | DYDROGESTERONE-2.5-MG-TABLET-ESTRADIOL-0.5-MG-TABLET | 0,362905 | STUK
117691//103887 | FEMOSTON CONTINU TABLET OMHULD 0,5/2,5MG | DYDROGESTERONE-2.5-MG-TABLET-ESTRADIOL-0.5-MG-TABLET | 0,362905 | STUK
119489//103887 | FEMOSTON CONTINU TABLET OMHULD 0,5/2,5MG | DYDROGESTERONE-2.5-MG-TABLET-ESTRADIOL-0.5-MG-TABLET | 0,362905 | STUK
110701//25549 | FEMOSTON CONTINU TABLET OMHULD 1/5MG | DYDROGESTERONE-5-MG-TABLET-ESTRADIOL-1-MG-TABLET | 0,364457 | STUK
117576//25549 | FEMOSTON CONTINU TABLET OMHULD 1/5MG | DYDROGESTERONE-5-MG-TABLET-ESTRADIOL-1-MG-TABLET | 0,364457 | STUK
125008//25549 | FEMOSTON CONTINU TABLET OMHULD 1/5MG | DYDROGESTERONE-5-MG-TABLET-ESTRADIOL-1-MG-TABLET | 0,364457 | STUK
25549 | FEMOSTON CONTINU TABLET OMHULD 1/5MG | DYDROGESTERONE-5-MG-TABLET-ESTRADIOL-1-MG-TABLET | 0,364457 | STUK
28349//25549 | FEMOSTON CONTINU TABLET OMHULD 1/5MG | DYDROGESTERONE-5-MG-TABLET-ESTRADIOL-1-MG-TABLET | 0,364457 | STUK
107003 | EBASTINE SMELT TEVA ORODISP TABLET 10MG | EBASTINE-10-MG-SMELTTABLET | 0,172595 | STUK
17708 | KESTINE TABLET 10MG | EBASTINE-10-MG-TABLET | 0,159006 | STUK
EU/1/07/393/001 | SOLIRIS INFVLST CONC 10MG/ML FLACON 30ML | ECULIZUMAB-10-MG/ML-INFUUSVLOEISTOF, FLACON | 140,216678 | ML
EU/1/15/993/001 | LIXIANA TABLET FILMOMHULD 15MG | EDOXABAN-15-MG-TABLET | 2,222904 | STUK
EU/1/15/993/005 | LIXIANA TABLET FILMOMHULD 30MG | EDOXABAN-30-MG-TABLET | 2,166618 | STUK
EU/1/15/993/006 | LIXIANA TABLET FILMOMHULD 30MG | EDOXABAN-30-MG-TABLET | 2,166618 | STUK
EU/1/15/993/011 | LIXIANA TABLET FILMOMHULD 30MG | EDOXABAN-30-MG-TABLET | 2,166618 | STUK
EU/1/15/993/014 | LIXIANA TABLET FILMOMHULD 30MG | EDOXABAN-30-MG-TABLET | 2,166618 | STUK
EU/1/15/993/018 | LIXIANA TABLET FILMOMHULD 60MG | EDOXABAN-60-MG-TABLET | 2,166618 | STUK
EU/1/15/993/024 | LIXIANA TABLET FILMOMHULD 60MG | EDOXABAN-60-MG-TABLET | 2,166618 | STUK
EU/1/15/993/027 | LIXIANA TABLET FILMOMHULD 60MG | EDOXABAN-60-MG-TABLET | 2,166618 | STUK
EU/1/99/111/008 | STOCRIN TABLET FILMOMHULD 600MG | EFAVIRENZ-600-MG-TABLET | 4,879547 | STUK
EU/1/07/430/001 | ATRIPLA TABLET FILMOMHULD | EFAVIRENZ-600-MG-TABLET-TENOFOVIR-245-MG-TABLET-EMTRICITABINE-200-MG-TABLET | 15,710636 | STUK
120159 | EFAVIRENZ/EMTRIC/TENOF CF TB FILMOMH 600/200/245MG | EFAVIRENZ-600-MG-TABLET-TENOFOVIR-245-MG-TABLET-EMTRICITABINE-200-MG-TABLET | 14,743442 | STUK
EU/1/17/1222/001 | EFAVIRENZ/EMTRIC/TENOF MYL TB FILMOM 600/200/245MG | EFAVIRENZ-600-MG-TABLET-TENOFOVIR-245-MG-TABLET-EMTRICITABINE-200-MG-TABLET | 14,605878 | STUK
120145 | EFAVIRENZ/EMTRIC/TENOF SDZ TB FILMOM 600/200/245MG | EFAVIRENZ-600-MG-TABLET-TENOFOVIR-245-MG-TABLET-EMTRICITABINE-200-MG-TABLET | 14,743442 | STUK
118667 | EFAVIRENZ/EMTRIC/TENOF TEV TB FILMOM 600/200/245MG | EFAVIRENZ-600-MG-TABLET-TENOFOVIR-245-MG-TABLET-EMTRICITABINE-200-MG-TABLET | 14,743442 | STUK
119267//26579 | RELPAX TABLET FILMOMHULD 40MG | ELETRIPTAN-40-MG-TABLET | 3,380889 | STUK
120564//26579 | RELPAX TABLET FILMOMHULD 40MG | ELETRIPTAN-40-MG-TABLET | 3,380889 | STUK
122261//26579 | RELPAX TABLET FILMOMHULD 40MG | ELETRIPTAN-40-MG-TABLET | 3,380889 | STUK
122262//26579 | RELPAX TABLET FILMOMHULD 40MG | ELETRIPTAN-40-MG-TABLET | 3,380889 | STUK
112039//26579 | RELPAX TABLET FILMOMHULD 40MG | ELETRIPTAN-40-MG-TABLET | 3,892226 | STUK
115425//26579 | RELPAX TABLET FILMOMHULD 40MG | ELETRIPTAN-40-MG-TABLET | 3,892226 | STUK
26579 | RELPAX TABLET FILMOMHULD 40MG | ELETRIPTAN-40-MG-TABLET | 3,892226 | STUK
EU/1/14/974/001 | CERDELGA CAPSULE 84MG | ELIGLUSTAT-84-MG-CAPSULE | 366,170361 | STUK
EU/1/14/914/001 | VIMIZIM INFVLST CONC 1MG/ML FLACON 5ML | ELOSULFASE ALFA-1-MG/ML-INFUUSVLOEISTOF, FLACON | 180,599707 | ML
EU/1/10/612/002 | REVOLADE TABLET OMHULD 25MG | ELTROMBOPAG-25-MG-TABLET | 32,829444 | STUK
EU/1/10/612/005 | REVOLADE TABLET OMHULD 50MG | ELTROMBOPAG-50-MG-TABLET | 65,318150 | STUK
EU/1/10/612/008 | REVOLADE TABLET OMHULD 75MG | ELTROMBOPAG-75-MG-TABLET | 96,660903 | STUK
EU/1/14/930/013 | JARDIANCE TABLET FILMOMHULD 10MG | EMPAGLIFLOZINE-10-MG-TABLET | 1,371474 | STUK
EU/1/14/930/014 | JARDIANCE TABLET FILMOMHULD 10MG | EMPAGLIFLOZINE-10-MG-TABLET | 1,371474 | STUK
EU/1/14/930/017 | JARDIANCE TABLET FILMOMHULD 10MG | EMPAGLIFLOZINE-10-MG-TABLET | 1,371474 | STUK
EU/1/14/930/004 | JARDIANCE TABLET FILMOMHULD 25MG | EMPAGLIFLOZINE-25-MG-TABLET | 1,371473 | STUK
EU/1/14/930/008 | JARDIANCE TABLET FILMOMHULD 25MG | EMPAGLIFLOZINE-25-MG-TABLET | 1,371473 | STUK
EU/1/14/930/005 | JARDIANCE TABLET FILMOMHULD 25MG | EMPAGLIFLOZINE-25-MG-TABLET | 1,386831 | STUK
EU/1/03/261/001 | EMTRIVA CAPSULE 200MG | EMTRICITABINE-200-MG-CAPSULE | 5,789885 | STUK
EU/1/15/1061/001 | GENVOYA TABLET FILMOMHULD | EMTRICITABINE-200-MG-TABLET-COBICISTAT-150-MG-TABLET-ELVITEGRAVIR-150-MG-TABLET-TENOFOVIR-10-MG-TABLET | 28,547698 | STUK
EU/1/15/1061/002 | GENVOYA TABLET FILMOMHULD | EMTRICITABINE-200-MG-TABLET-COBICISTAT-150-MG-TABLET-ELVITEGRAVIR-150-MG-TABLET-TENOFOVIR-10-MG-TABLET | 28,547698 | STUK
EU/1/17/1225/001 | SYMTUZA TABLET FILMOMHULD | EMTRICITABINE-200-MG-TABLET-DARUNAVIR-800-MG-TABLET-COBICISTAT-150-MG-TABLET-TENOFOVIR-10-MG-TABLET | 26,828022 | STUK
EU/1/16/1112/001 | ODEFSEY TABLET FILMOMHULD | EMTRICITABINE-200-MG-TABLET-RILPIVIRINE-25-MG-TABLET-TENOFOVIR-25-MG-TABLET | 21,048705 | STUK
EU/1/16/1099/001 | DESCOVY TABLET FILMOMHULD 200/10MG | EMTRICITABINE-200-MG-TABLET-TENOFOVIR-10-MG-TABLET | 15,601043 | STUK
EU/1/16/1099/003 | DESCOVY TABLET FILMOMHULD 200/25MG | EMTRICITABINE-200-MG-TABLET-TENOFOVIR-25-MG-TABLET | 15,523684 | STUK
EU/1/16/1099/004 | DESCOVY TABLET FILMOMHULD 200/25MG | EMTRICITABINE-200-MG-TABLET-TENOFOVIR-25-MG-TABLET | 15,523684 | STUK
EU/1/18/1289/001 | BIKTARVY TABLET FILMOMHULD | EMTRICITABINE-200-MG-TABLET-TENOFOVIR-25-MG-TABLET-BICTEGRAVIR-50-MG-TABLET | 28,495388 | STUK
EU/1/18/1289/002 | BIKTARVY TABLET FILMOMHULD | EMTRICITABINE-200-MG-TABLET-TENOFOVIR-25-MG-TABLET-BICTEGRAVIR-50-MG-TABLET | 28,495388 | STUK
24867 | ENALAPRIL MALEAAT MYLAN TABLET 10MG | ENALAPRIL-10-MG-TABLET | 0,184678 | STUK
23649 | ENALAPRIL MALEAAT SANDOZ TABLET 10MG | ENALAPRIL-10-MG-TABLET | 0,184678 | STUK
24516 | ENALAPRIL MALEAAT SANDOZ TABLET 10MG | ENALAPRIL-10-MG-TABLET | 0,184678 | STUK
25290 | ENALAPRIL MALEAAT TEVA TABLET 10MG | ENALAPRIL-10-MG-TABLET | 0,184678 | STUK
101314 | LERTEC TABLET FILMOMHULD 10/10MG | ENALAPRIL-10-MG-TABLET-LERCANIDIPINE-10-MG-TABLET | 0,246468 | STUK
24868 | ENALAPRIL MALEAAT MYLAN TABLET 20MG | ENALAPRIL-20-MG-TABLET | 0,185141 | STUK
23650 | ENALAPRIL MALEAAT SANDOZ TABLET 20MG | ENALAPRIL-20-MG-TABLET | 0,185141 | STUK
24517 | ENALAPRIL MALEAAT SANDOZ TABLET 20MG | ENALAPRIL-20-MG-TABLET | 0,185141 | STUK
25291 | ENALAPRIL MALEAAT TEVA TABLET 20MG | ENALAPRIL-20-MG-TABLET | 0,185141 | STUK
10576 | RENITEC TABLET 20MG | ENALAPRIL-20-MG-TABLET | 0,185141 | STUK
101315 | LERTEC TABLET FILMOMHULD 20/10MG | ENALAPRIL-20-MG-TABLET-LERCANIDIPINE-10-MG-TABLET | 0,264518 | STUK
24866 | ENALAPRIL MALEAAT MYLAN TABLET 5MG | ENALAPRIL-5-MG-TABLET | 0,084623 | STUK
23648 | ENALAPRIL MALEAAT SANDOZ TABLET 5MG | ENALAPRIL-5-MG-TABLET | 0,084623 | STUK
24515 | ENALAPRIL MALEAAT SANDOZ TABLET 5MG | ENALAPRIL-5-MG-TABLET | 0,084623 | STUK
25289 | ENALAPRIL MALEAAT TEVA TABLET 5MG | ENALAPRIL-5-MG-TABLET | 0,084623 | STUK
EU/1/18/1314/001 | BRAFTOVI CAPSULE 50MG | ENCORAFENIB-50-MG-CAPSULE | 24,494895 | STUK
EU/1/18/1314/002 | BRAFTOVI CAPSULE 75MG | ENCORAFENIB-75-MG-CAPSULE | 34,948170 | STUK
124590//121187 | CLEXANE INJVLST 4.000IE (40MG)/0,4ML WWSP | ENOXAPARIN-100-MG/ML-INJ.VLOEISTOF, WWSP | 6,044774 | ML
124589//121188 | CLEXANE INJVLST 6.000IE (60MG)/0,6ML WWSP | ENOXAPARIN-100-MG/ML-INJ.VLOEISTOF, WWSP | 6,044774 | ML
124478//121189 | CLEXANE INJVLST 8.000IE (80MG)/0,8ML WWSP | ENOXAPARIN-100-MG/ML-INJ.VLOEISTOF, WWSP | 6,044774 | ML
116134 | ENOXAPARINE BECAT INJVLST 10.000IE (100MG)/1ML WW | ENOXAPARIN-100-MG/ML-INJ.VLOEISTOF, WWSP | 6,044774 | ML
120703 | ENOXAPARINE BECAT INJVLST 2.000IE (20MG)/0,2ML WW | ENOXAPARIN-100-MG/ML-INJ.VLOEISTOF, WWSP | 6,044774 | ML
120702 | ENOXAPARINE BECAT INJVLST 4.000IE (40MG)/0,4ML WW | ENOXAPARIN-100-MG/ML-INJ.VLOEISTOF, WWSP | 6,044774 | ML
120701 | ENOXAPARINE BECAT INJVLST 6.000IE (60MG)/0,6ML WW | ENOXAPARIN-100-MG/ML-INJ.VLOEISTOF, WWSP | 6,044774 | ML
120700 | ENOXAPARINE BECAT INJVLST 8.000IE (80MG)/0,8ML WW | ENOXAPARIN-100-MG/ML-INJ.VLOEISTOF, WWSP | 6,044774 | ML
EU/1/16/1132/002 | INHIXA INJVLST 2.000IE (20MG)/0,2ML WWSP | ENOXAPARIN-100-MG/ML-INJ.VLOEISTOF, WWSP | 6,044774 | ML
EU/1/16/1132/004 | INHIXA INJVLST 4.000IE (40MG)/0,4ML WWSP | ENOXAPARIN-100-MG/ML-INJ.VLOEISTOF, WWSP | 6,044774 | ML
EU/1/16/1132/006 | INHIXA INJVLST 6.000IE (60MG)/0,6ML WWSP | ENOXAPARIN-100-MG/ML-INJ.VLOEISTOF, WWSP | 6,044774 | ML
EU/1/16/1132/008 | INHIXA INJVLST 8.000IE (80MG)/0,8ML WWSP | ENOXAPARIN-100-MG/ML-INJ.VLOEISTOF, WWSP | 6,044774 | ML
EU/1/16/1132/010 | INHIXA INJVLST 10.000IE (100MG)/1ML WWSP | ENOXAPARIN-100-MG/ML-INJ.VLOEISTOF, WWSP | 6,044774 | ML
EU/1/98/081/002 | COMTAN TABLET 200MG | ENTACAPON-200-MG-TABLET | 0,506745 | STUK
EU/1/98/081/003 | COMTAN TABLET 200MG | ENTACAPON-200-MG-TABLET | 0,506745 | STUK
EU/1/98/081/001 | COMTAN TABLET 200MG | ENTACAPON-200-MG-TABLET | 0,544226 | STUK
EU/1/98/082/001 | COMTESS TABLET FILMOMHULD 200MG | ENTACAPON-200-MG-TABLET | 0,506745 | STUK
EU/1/98/082/003 | COMTESS TABLET FILMOMHULD 200MG | ENTACAPON-200-MG-TABLET | 0,506745 | STUK
107812 | ENTACAPONE MYLAN TABLET FILMOMHULD 200MG | ENTACAPON-200-MG-TABLET | 0,506745 | STUK
EU/1/10/665/001 | ENTACAPONE TEVA TABLET FILMOMHULD 200MG | ENTACAPON-200-MG-TABLET | 0,544226 | STUK
EU/1/06/343/003 | BARACLUDE TABLET FILMOMHULD 0,5MG | ENTECAVIR-0.5-MG-TABLET | 9,674555 | STUK
119620 | ENTECAVIR CF TABLET FILMOMHULD 0,5MG | ENTECAVIR-0.5-MG-TABLET | 8,816681 | STUK
119632 | ENTECAVIR GLENMARK TABLET FILMOMHULD 0,5MG | ENTECAVIR-0.5-MG-TABLET | 8,816681 | STUK
EU/1/17/1227/003 | ENTECAVIR MYLAN TABLET FILMOMHULD 0,5MG | ENTECAVIR-0.5-MG-TABLET | 8,816681 | STUK
119701 | ENTECAVIR SANDOZ TABLET FILMOMHULD 0,5MG | ENTECAVIR-0.5-MG-TABLET | 9,674555 | STUK
119690 | ENTECAVIR TEVA TABLET FILMOMHULD 0,5MG | ENTECAVIR-0.5-MG-TABLET | 9,674555 | STUK
EU/1/06/343/004 | BARACLUDE TABLET FILMOMHULD 1MG | ENTECAVIR-1-MG-TABLET | 10,721697 | STUK
119621 | ENTECAVIR CF TABLET FILMOMHULD 1MG | ENTECAVIR-1-MG-TABLET | 9,649527 | STUK
119633 | ENTECAVIR GLENMARK TABLET FILMOMHULD 1MG | ENTECAVIR-1-MG-TABLET | 9,033815 | STUK
EU/1/17/1227/008 | ENTECAVIR MYLAN TABLET FILMOMHULD 1MG | ENTECAVIR-1-MG-TABLET | 10,721697 | STUK
119702 | ENTECAVIR SANDOZ TABLET FILMOMHULD 1MG | ENTECAVIR-1-MG-TABLET | 10,721697 | STUK
119695 | ENTECAVIR TEVA TABLET FILMOMHULD 1MG | ENTECAVIR-1-MG-TABLET | 10,721697 | STUK
EU/1/13/846/001 | XTANDI CAPSULE 40MG | ENZALUTAMIDE-40-MG-CAPSULE | 27,608921 | STUK
EU/1/13/846/002 | XTANDI TABLET FILMOMHULD 40MG | ENZALUTAMIDE-40-MG-TABLET | 26,641801 | STUK
101490 | EPIRUBICIN HCL PCH INJVLST 2MG/ML FLACON 5ML | EPIRUBICIN-2-MG/ML-INFUUSVLOEISTOF, FLACON | 3,432454 | ML
101490 | EPIRUBICIN HCL PCH INJVLST 2MG/ML FLACON 25ML | EPIRUBICIN-2-MG/ML-INFUUSVLOEISTOF, FLACON | 3,432454 | ML
100134 | EPIRUBICINE HCL ACCORD INFVLST 2MG/ML FLACON 5ML | EPIRUBICIN-2-MG/ML-INFUUSVLOEISTOF, FLACON | 3,432454 | ML
100134 | EPIRUBICINE HCL ACCORD INFVLST 2MG/ML FLACON 10ML | EPIRUBICIN-2-MG/ML-INFUUSVLOEISTOF, FLACON | 3,432454 | ML
100134 | EPIRUBICINE HCL ACCORD INFVLST 2MG/ML FLACON 25ML | EPIRUBICIN-2-MG/ML-INFUUSVLOEISTOF, FLACON | 3,432454 | ML
100134 | EPIRUBICINE HCL ACCORD INFVLST 2MG/ML FLACON 50ML | EPIRUBICIN-2-MG/ML-INFUUSVLOEISTOF, FLACON | 3,432454 | ML
100134 | EPIRUBICINE HCL ACCORD INFVLST 2MG/ML FLACON 100ML | EPIRUBICIN-2-MG/ML-INFUUSVLOEISTOF, FLACON | 3,432454 | ML
101743 | EPIRUBICINE HCL HIKMA INJVLST 2MG/ML FLACON 5ML | EPIRUBICIN-2-MG/ML-INFUUSVLOEISTOF, FLACON | 2,494400 | ML
101743 | EPIRUBICINE HCL HIKMA INJVLST 2MG/ML FLACON 25ML | EPIRUBICIN-2-MG/ML-INFUUSVLOEISTOF, FLACON | 2,494400 | ML
101743 | EPIRUBICINE HCL HIKMA INJVLST 2MG/ML FLACON 100ML | EPIRUBICIN-2-MG/ML-INFUUSVLOEISTOF, FLACON | 2,494400 | ML
101743 | EPIRUBICINE HCL HIKMA INJVLST 2MG/ML FLACON 10ML | EPIRUBICIN-2-MG/ML-INFUUSVLOEISTOF, FLACON | 2,494400 | ML
123372//29963 | INSPRA TABLET 25MG | EPLERENON-25-MG-TABLET | 0,955823 | STUK
126306//29963 | INSPRA TABLET 25MG | EPLERENON-25-MG-TABLET | 0,955823 | STUK
127061//29963 | INSPRA TABLET 25MG | EPLERENON-25-MG-TABLET | 0,955823 | STUK
127188//29963 | INSPRA TABLET 25MG | EPLERENON-25-MG-TABLET | 0,955823 | STUK
29963 | INSPRA TABLET 25MG | EPLERENON-25-MG-TABLET | 0,955823 | STUK
115915 | EPLERENON ACCORD TABLET FILMOMHULD 50MG | EPLERENON-50-MG-TABLET | 1,047196 | STUK
115187 | EPLERENON TEVA TABLET FILMOMHULD 50MG | EPLERENON-50-MG-TABLET | 1,047196 | STUK
127063//29964 | INSPRA TABLET 50MG | EPLERENON-50-MG-TABLET | 1,047196 | STUK
127189//29964 | INSPRA TABLET 50MG | EPLERENON-50-MG-TABLET | 1,047196 | STUK
29964 | INSPRA TABLET 50MG | EPLERENON-50-MG-TABLET | 1,047196 | STUK
EU/1/07/431/008 | RETACRIT 4000 INJVLST 10000IE/ML WWSP 0,4ML | EPOETIN ZETA-10000-IE/ML-INJ.VLOEISTOF, WWSP | 57,595079 | ML
EU/1/07/431/010 | RETACRIT 5000 INJVLST 10000IE/ML WWSP 0,5ML | EPOETIN ZETA-10000-IE/ML-INJ.VLOEISTOF, WWSP | 57,595079 | ML
EU/1/07/431/012 | RETACRIT 6000 INJVLST 10000IE/ML WWSP 0,6ML | EPOETIN ZETA-10000-IE/ML-INJ.VLOEISTOF, WWSP | 57,595079 | ML
EU/1/07/431/014 | RETACRIT 8000 INJVLST 10000IE/ML WWSP 0,8ML | EPOETIN ZETA-10000-IE/ML-INJ.VLOEISTOF, WWSP | 57,595079 | ML
EU/1/07/431/016 | RETACRIT 10000 INJVLST 10000IE/ML WWSP 1ML | EPOETIN ZETA-10000-IE/ML-INJ.VLOEISTOF, WWSP | 57,595079 | ML
EU/1/07/431/002 | RETACRIT 1000 INJVLST 3333IE/ML WWSP 0,3ML | EPOETIN ZETA-3333-IE/ML-INJ.VLOEISTOF, WWSP | 19,769414 | ML
EU/1/07/431/004 | RETACRIT 2000 INJVLST 3333IE/ML WWSP 0,6ML | EPOETIN ZETA-3333-IE/ML-INJ.VLOEISTOF, WWSP | 19,769414 | ML
EU/1/07/431/006 | RETACRIT 3000 INJVLST 3333IE/ML WWSP 0,9ML | EPOETIN ZETA-3333-IE/ML-INJ.VLOEISTOF, WWSP | 19,769414 | ML
EU/1/07/431/018 | RETACRIT 30000 INJVLST 40000IE/ML WWSP 0,75ML | EPOETIN ZETA-40000-IE/ML-INJ.VLOEISTOF, WWSP | 225,290312 | ML
EU/1/07/431/019 | RETACRIT 40000 INJVLST 40000IE/ML WWSP 1ML | EPOETIN ZETA-40000-IE/ML-INJ.VLOEISTOF, WWSP | 225,290312 | ML
EU/1/07/410/006 | BINOCRIT 3000 INJVLST 10000IE/ML WWSP 0,3ML | EPOETINE ALFA-10000-IE/ML-INJ.VLOEISTOF, WWSP | 63,523501 | ML
EU/1/07/410/008 | BINOCRIT 4000 INJVLST 10000IE/ML WWSP 0,4ML | EPOETINE ALFA-10000-IE/ML-INJ.VLOEISTOF, WWSP | 63,523501 | ML
EU/1/07/410/034 | BINOCRIT 4000 INJVLST 10000IE/ML WWSP 0,4ML | EPOETINE ALFA-10000-IE/ML-INJ.VLOEISTOF, WWSP | 63,523501 | ML
EU/1/07/410/010 | BINOCRIT 5000 INJVLST 10000IE/ML WWSP 0,5ML | EPOETINE ALFA-10000-IE/ML-INJ.VLOEISTOF, WWSP | 63,523501 | ML
EU/1/07/410/012 | BINOCRIT 6000 INJVLST 10000IE/ML WWSP 0,6ML | EPOETINE ALFA-10000-IE/ML-INJ.VLOEISTOF, WWSP | 63,523501 | ML
EU/1/07/410/014 | BINOCRIT 8000 INJVLST 10000IE/ML WWSP 0,8ML | EPOETINE ALFA-10000-IE/ML-INJ.VLOEISTOF, WWSP | 63,523501 | ML
EU/1/07/410/016 | BINOCRIT 10000 INJVLST 10000IE/ML WWSP 1ML | EPOETINE ALFA-10000-IE/ML-INJ.VLOEISTOF, WWSP | 63,523501 | ML
18481 | EPREX 3000 INJVLST 10000IE/ML WWSP 0,3ML | EPOETINE ALFA-10000-IE/ML-INJ.VLOEISTOF, WWSP | 65,462134 | ML
18482 | EPREX 4000 INJVLST 10000IE/ML WWSP 0,4ML | EPOETINE ALFA-10000-IE/ML-INJ.VLOEISTOF, WWSP | 65,462134 | ML
25882 | EPREX 6000 INJVLST 10000IE/ML WWSP 0,6ML | EPOETINE ALFA-10000-IE/ML-INJ.VLOEISTOF, WWSP | 65,462134 | ML
25884 | EPREX 8000 INJVLST 10000IE/ML WWSP 0,8ML | EPOETINE ALFA-10000-IE/ML-INJ.VLOEISTOF, WWSP | 65,462134 | ML
18483 | EPREX 10000 INJVLST 10000IE/ML WWSP 1,0ML | EPOETINE ALFA-10000-IE/ML-INJ.VLOEISTOF, WWSP | 65,462134 | ML
EU/1/07/410/002 | BINOCRIT 1000 INJVLST 2000IE/ML WWSP 0,5ML | EPOETINE ALFA-2000-IE/ML-INJ.VLOEISTOF, WWSP | 13,193808 | ML
EU/1/07/410/004 | BINOCRIT 2000 INJVLST 2000IE/ML WWSP 1ML | EPOETINE ALFA-2000-IE/ML-INJ.VLOEISTOF, WWSP | 13,193808 | ML
18479 | EPREX 1000 INJVLST 2000IE/ML WWSP 0,5ML | EPOETINE ALFA-2000-IE/ML-INJ.VLOEISTOF, WWSP | 13,193808 | ML
EU/1/07/410/049 | BINOCRIT 30000 INJVLST 40000IE/ML WWSP 0,75ML | EPOETINE ALFA-40000-IE/ML-INJ.VLOEISTOF, WWSP | 253,464164 | ML
EU/1/07/410/051 | BINOCRIT 40000 INJVLST 40000IE/ML WWSP 1ML | EPOETINE ALFA-40000-IE/ML-INJ.VLOEISTOF, WWSP | 244,334230 | ML
35142 | EPREX 30000 INJVLST 40000IE/ML WWSP 0,75ML | EPOETINE ALFA-40000-IE/ML-INJ.VLOEISTOF, WWSP | 253,464164 | ML
33268 | EPREX 40000 INJVLST 40000IE/ML WWSP 1ML | EPOETINE ALFA-40000-IE/ML-INJ.VLOEISTOF, WWSP | 244,334230 | ML
18480 | EPREX 2000 INJVLST 4000IE/ML WWSP 0,5ML | EPOETINE ALFA-4000-IE/ML-INJ.VLOEISTOF, WWSP | 27,121868 | ML
EU/1/97/031/032 | NEORECORMON 3000 INJVLST 10000IE/ML WWSP 0,3ML | EPOETINE BETA-10000-IE/ML-INJ.VLOEISTOF, WWSP | 74,808643 | ML
EU/1/97/031/041 | NEORECORMON 4000 INJVLST 13333IE/ML WWSP 0,3ML | EPOETINE BETA-13333-IE/ML-INJ.VLOEISTOF, WWSP | 98,225977 | ML
EU/1/97/031/042 | NEORECORMON 4000 INJVLST 13333IE/ML WWSP 0,3ML | EPOETINE BETA-13333-IE/ML-INJ.VLOEISTOF, WWSP | 98,225977 | ML
EU/1/97/031/034 | NEORECORMON 5000 INJVLST 16667IE/ML WWSP 0,3ML | EPOETINE BETA-16667-IE/ML-INJ.VLOEISTOF, WWSP | 122,421930 | ML
EU/1/97/031/035 | NEORECORMON 10000 INJVLST 16667IE/ML WWSP 0,6ML | EPOETINE BETA-16667-IE/ML-INJ.VLOEISTOF, WWSP | 122,421930 | ML
EU/1/97/031/036 | NEORECORMON 10000 INJVLST 16667IE/ML WWSP 0,6ML | EPOETINE BETA-16667-IE/ML-INJ.VLOEISTOF, WWSP | 122,421930 | ML
EU/1/97/031/026 | NEORECORMON 500 INJVLST 1667IE/ML WWSP 0,3ML | EPOETINE BETA-1667-IE/ML-INJ.VLOEISTOF, WWSP | 14,021588 | ML
EU/1/97/031/043 | NEORECORMON 6000 INJVLST 20000IE/ML WWSP 0,3ML | EPOETINE BETA-20000-IE/ML-INJ.VLOEISTOF, WWSP | 147,391221 | ML
EU/1/97/031/044 | NEORECORMON 6000 INJVLST 20000IE/ML WWSP 0,3ML | EPOETINE BETA-20000-IE/ML-INJ.VLOEISTOF, WWSP | 147,391221 | ML
EU/1/97/031/045 | NEORECORMON 30000 INJVLST 50000IE/ML WWSP 0,6ML | EPOETINE BETA-50000-IE/ML-INJ.VLOEISTOF, WWSP | 377,850150 | ML
EU/1/97/031/046 | NEORECORMON 30000 INJVLST 50000IE/ML WWSP 0,6ML | EPOETINE BETA-50000-IE/ML-INJ.VLOEISTOF, WWSP | 377,850150 | ML
EU/1/97/031/029 | NEORECORMON 2000 INJVLST 6667IE/ML WWSP 0,3ML | EPOETINE BETA-6667-IE/ML-INJ.VLOEISTOF, WWSP | 49,897617 | ML
EU/1/97/031/030 | NEORECORMON 2000 INJVLST 6667IE/ML WWSP 0,3ML | EPOETINE BETA-6667-IE/ML-INJ.VLOEISTOF, WWSP | 49,897617 | ML
23523 | FLOLAN INFUSIEPOEDER FLACON 0,5MG | EPOPROSTENOL-.5-MG-POED. V. INFUSIE,FLACON | 48,489035 | STUK
14469 | FLOLAN INFUSIEPOEDER FLACON 0,5MG + SOLV 100ML | EPOPROSTENOL-.5-MG-POED. V. INFUSIE,FLACON | 48,489035 | STUK
111570 | VELETRI INFUSIEPOEDER FLACON 0,5MG | EPOPROSTENOL-.5-MG-POED. V. INFUSIE,FLACON | 48,489035 | STUK
23524 | FLOLAN INFUSIEPOEDER FLACON 1,5MG | EPOPROSTENOL-1.5-MG-POED. V. INFUSIE,FLACON | 80,300301 | STUK
23525 | FLOLAN INFUSIEPOEDER FLACON 1,5MG + SOLV 100ML | EPOPROSTENOL-1.5-MG-POED. V. INFUSIE,FLACON | 80,300301 | STUK
111571 | VELETRI INFUSIEPOEDER FLACON 1,5MG | EPOPROSTENOL-1.5-MG-POED. V. INFUSIE,FLACON | 80,257725 | STUK
23983 | TEVETEN TABLET OMHULD 600MG | EPROSARTAN-600-MG-TABLET | 0,550450 | STUK
EU/1/99/109/001 | INTEGRILIN INFVLST 0,75MG/ML FLACON 100ML | EPTIFIBATIDE-0.75-MG/ML-INFUUSVLOEISTOF, FLACON | 0,458394 | ML
EU/1/99/109/002 | INTEGRILIN INJVLST 2MG/ML FLACON 10ML | EPTIFIBATIDE-2-MG/ML-INJECTIEVLOEISTOF, FLAC | 1,460098 | ML
EU/1/11/678/002 | HALAVEN INJVLST 0,44MG/ML FLACON 2ML | ERIBULIN-0.44-MG/ML-INJECTIEVLOEISTOF, FLAC | 185,228823 | ML
EU/1/11/678/001 | HALAVEN INJVLST 0,44MG/ML FLACON 2ML | ERIBULIN-0.44-MG/ML-INJECTIEVLOEISTOF, FLAC | 193,501251 | ML
EU/1/11/678/003 | HALAVEN INJVLST 0,44MG/ML FLACON 3ML | ERIBULIN-0.44-MG/ML-INJECTIEVLOEISTOF, FLAC | 185,228823 | ML
119578 | ERLOTINIB AMAROX TABLET FILMOMHULD 100MG | ERLOTINIB-100-MG-TABLET | 33,670401 | STUK
119544 | ERLOTINIB CF TABLET FILMOMHULD 100MG | ERLOTINIB-100-MG-TABLET | 33,670401 | STUK
119540 | ERLOTINIB MYLAN TABLET FILMOMHULD 100MG | ERLOTINIB-100-MG-TABLET | 33,670401 | STUK
EU/1/05/311/002 | TARCEVA TABLET FILMOMHULD 100MG | ERLOTINIB-100-MG-TABLET | 33,670401 | STUK
119579 | ERLOTINIB AMAROX TABLET FILMOMHULD 150MG | ERLOTINIB-150-MG-TABLET | 39,323538 | STUK
119545 | ERLOTINIB CF TABLET FILMOMHULD 150MG | ERLOTINIB-150-MG-TABLET | 39,323538 | STUK
119541 | ERLOTINIB MYLAN TABLET FILMOMHULD 150MG | ERLOTINIB-150-MG-TABLET | 39,323538 | STUK
EU/1/05/311/003 | TARCEVA TABLET FILMOMHULD 150MG | ERLOTINIB-150-MG-TABLET | 39,323538 | STUK
119577 | ERLOTINIB AMAROX TABLET FILMOMHULD 25MG | ERLOTINIB-25-MG-TABLET | 11,046224 | STUK
119542 | ERLOTINIB CF TABLET FILMOMHULD 25MG | ERLOTINIB-25-MG-TABLET | 11,046224 | STUK
EU/1/05/311/001 | TARCEVA TABLET FILMOMHULD 25MG | ERLOTINIB-25-MG-TABLET | 11,046224 | STUK
EU/1/02/216/001 | INVANZ INFUSIEPOEDER FLACON 1000MG | ERTAPENEM-1000-MG-POED. V. INFUSIE,FLACON | 38,562601 | STUK
1800 | ERYTHROCINE IV INFUSIEPOEDER FLACON 1000MG | ERYTHROMYCIN-1000-MG-POED. V. INFUSIE,FLACON | 14,394298 | STUK
120150//1800 | ERYTHROMYCINE EURECO-PH IV INFUSIEPOEDER FL 1000MG | ERYTHROMYCIN-1000-MG-POED. V. INFUSIE,FLACON | 14,394298 | STUK
1799 | ERYTHROCINE TABLET 250MG | ERYTHROMYCIN-250-MG-TABLET | 0,373194 | STUK
9314 | ERYTHROCINE-ES TABLET 500MG SUIKERVRIJ | ERYTHROMYCIN-500-MG-TABLET | 0,302357 | STUK
10247 | ERYTHROCINE-ES KERSEN GRAN V SUSP 250MG/5ML | ERYTHROMYCIN-50-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,077764 | ML
111566 | ESCITALOPRAM AUROBINDO TABLET FILMOMHULD 10MG | ESCITALOPRAM-10-MG-TABLET | 0,244388 | STUK
111295 | ESCITALOPRAM MYLAN TABLET FILMOMHULD 10MG | ESCITALOPRAM-10-MG-TABLET | 0,244388 | STUK
111779 | ESCITALOPRAM SANDOZ TABLET FILMOMHULD 10MG | ESCITALOPRAM-10-MG-TABLET | 0,244388 | STUK
111216 | ESCITALOPRAM TEVA TABLET FILMOMHULD 10MG | ESCITALOPRAM-10-MG-TABLET | 0,244388 | STUK
30495 | LEXAPRO TABLET FILMOMHULD 10MG | ESCITALOPRAM-10-MG-TABLET | 0,244388 | STUK
111780 | ESCITALOPRAM SANDOZ TABLET FILMOMHULD 15MG | ESCITALOPRAM-15-MG-TABLET | 0,165451 | STUK
111217 | ESCITALOPRAM TEVA TABLET FILMOMHULD 15MG | ESCITALOPRAM-15-MG-TABLET | 0,174824 | STUK
30496 | LEXAPRO TABLET FILMOMHULD 15MG | ESCITALOPRAM-15-MG-TABLET | 0,165451 | STUK
114814 | ESCITALOPRAM FOCUS DRUPPELS 20MG/ML | ESCITALOPRAM-20-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 1,296265 | ML
111199 | ESCITALOPRAM SANDOZ DRUPPELS 20MG/ML | ESCITALOPRAM-20-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 1,296265 | ML
117233//35339 | LEXAPRO DRUPPELS 20MG/ML | ESCITALOPRAM-20-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 1,296265 | ML
125039//35339 | LEXAPRO DRUPPELS 20MG/ML | ESCITALOPRAM-20-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 1,296265 | ML
35339 | LEXAPRO DRUPPELS 20MG/ML | ESCITALOPRAM-20-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 1,296265 | ML
117593 | ESCITALOPRAM MYLAN TABLET FILMOMHULD 20MG | ESCITALOPRAM-20-MG-TABLET | 0,341479 | STUK
111781 | ESCITALOPRAM SANDOZ TABLET FILMOMHULD 20MG | ESCITALOPRAM-20-MG-TABLET | 0,341479 | STUK
111218 | ESCITALOPRAM TEVA TABLET FILMOMHULD 20MG | ESCITALOPRAM-20-MG-TABLET | 0,341479 | STUK
30497 | LEXAPRO TABLET FILMOMHULD 20MG | ESCITALOPRAM-20-MG-TABLET | 0,341479 | STUK
115432 | ESCITALOPRAM ACCORD TABLET FILMOMHULD 5MG | ESCITALOPRAM-5-MG-TABLET | 0,194146 | STUK
111778 | ESCITALOPRAM SANDOZ TABLET FILMOMHULD 5MG | ESCITALOPRAM-5-MG-TABLET | 0,215655 | STUK
111215 | ESCITALOPRAM TEVA TABLET FILMOMHULD 5MG | ESCITALOPRAM-5-MG-TABLET | 0,215655 | STUK
31523 | ESMOLOL HCL ORPHA INJVLST 10MG/ML FLACON 10ML | ESMOLOL-10-MG/ML-INFUUSVLOEISTOF, FLACON | 0,677839 | ML
106226 | ESMOLOL HCL LYO ORPHA INFUSIEPOEDER FLACON 2500MG | ESMOLOL-2500-MG-POED. V. INFUSIE,FLACON | 103,539695 | STUK
119083//101600 | ESOMEPRAZOL ERC GRANULAAT MSR V SUSP SACHET 10MG | ESOMEPRAZOL-10-MG-GRANULAAT, MAAGSAPRESISTENT, VERDEELD | 0,895346 | STUK
113657//101600 | ESOMEPRAZOL FISHER GRANULAAT MSR V SUSP SACH 10MG | ESOMEPRAZOL-10-MG-GRANULAAT, MAAGSAPRESISTENT, VERDEELD | 0,895346 | STUK
101600 | NEXIUM GRANULAAT MSR V SUSP IN SACHET 10MG | ESOMEPRAZOL-10-MG-GRANULAAT, MAAGSAPRESISTENT, VERDEELD | 0,895346 | STUK
107756//101600 | NEXIUM GRANULAAT MSR V SUSP IN SACHET 10MG | ESOMEPRAZOL-10-MG-GRANULAAT, MAAGSAPRESISTENT, VERDEELD | 0,895346 | STUK
108347//101600 | NEXIUM GRANULAAT MSR V SUSP IN SACHET 10MG | ESOMEPRAZOL-10-MG-GRANULAAT, MAAGSAPRESISTENT, VERDEELD | 0,895346 | STUK
113284//101600 | NEXIUM GRANULAAT MSR V SUSP IN SACHET 10MG | ESOMEPRAZOL-10-MG-GRANULAAT, MAAGSAPRESISTENT, VERDEELD | 0,895346 | STUK
118425//101600 | NEXIUM GRANULAAT MSR V SUSP IN SACHET 10MG | ESOMEPRAZOL-10-MG-GRANULAAT, MAAGSAPRESISTENT, VERDEELD | 0,895346 | STUK
119264//101600 | NEXIUM GRANULAAT MSR V SUSP IN SACHET 10MG | ESOMEPRAZOL-10-MG-GRANULAAT, MAAGSAPRESISTENT, VERDEELD | 0,895346 | STUK
120565//101600 | NEXIUM GRANULAAT MSR V SUSP IN SACHET 10MG | ESOMEPRAZOL-10-MG-GRANULAAT, MAAGSAPRESISTENT, VERDEELD | 0,895346 | STUK
123576//101600 | NEXIUM GRANULAAT MSR V SUSP IN SACHET 10MG | ESOMEPRAZOL-10-MG-GRANULAAT, MAAGSAPRESISTENT, VERDEELD | 0,895346 | STUK
125733//101600 | NEXIUM GRANULAAT MSR V SUSP IN SACHET 10MG | ESOMEPRAZOL-10-MG-GRANULAAT, MAAGSAPRESISTENT, VERDEELD | 0,895346 | STUK
107196 | ESOMEPRAZOL PCH CAPSULE MSR 20MG | ESOMEPRAZOL-20-MG-CAPSULE, MAAGSAPRESISTENT | 0,202281 | STUK
107193 | ESOMEPRAZOL SANDOZ CAPSULE MSR 20MG | ESOMEPRAZOL-20-MG-CAPSULE, MAAGSAPRESISTENT | 0,202281 | STUK
107233 | ESOMEPRAZOL SUN TABLET MSR 20MG | ESOMEPRAZOL-20-MG-TABLET, MAAGSAPRESISTENT | 0,275629 | STUK
113287//25387 | NEXIUM TABLET MSR 20MG | ESOMEPRAZOL-20-MG-TABLET, MAAGSAPRESISTENT | 0,275629 | STUK
25387 | NEXIUM TABLET MSR 20MG | ESOMEPRAZOL-20-MG-TABLET, MAAGSAPRESISTENT | 0,275629 | STUK
25387 | NEXIUM TABLET MSR 20MG WALLET | ESOMEPRAZOL-20-MG-TABLET, MAAGSAPRESISTENT | 0,275629 | STUK
108869 | ESOMEPRAZOL MYLAN CAPSULE MSR 40MG | ESOMEPRAZOL-40-MG-CAPSULE, MAAGSAPRESISTENT | 0,262933 | STUK
107201 | ESOMEPRAZOL PCH CAPSULE MSR 40MG | ESOMEPRAZOL-40-MG-CAPSULE, MAAGSAPRESISTENT | 0,262933 | STUK
107194 | ESOMEPRAZOL SANDOZ CAPSULE MSR 40MG | ESOMEPRAZOL-40-MG-CAPSULE, MAAGSAPRESISTENT | 0,262933 | STUK
120055 | ESOMEPRAZOL DEMO INJ/INFUSIEPOEDER FLACON 40MG | ESOMEPRAZOL-40-MG-POED. V. INJECTIE, FLACON | 4,930039 | STUK
123721 | ESOMEPRAZOL TILLOMED INJ/INFUSIEPOEDER FLACON 40MG | ESOMEPRAZOL-40-MG-POED. V. INJECTIE, FLACON | 4,930039 | STUK
30091 | NEXIUM IV INJECTIEPOEDER FLACON 40MG | ESOMEPRAZOL-40-MG-POED. V. INJECTIE, FLACON | 5,276183 | STUK
107235 | ESOMEPRAZOL SUN TABLET MSR 40MG | ESOMEPRAZOL-40-MG-TABLET, MAAGSAPRESISTENT | 0,366671 | STUK
113296//25388 | NEXIUM TABLET MSR 40MG | ESOMEPRAZOL-40-MG-TABLET, MAAGSAPRESISTENT | 0,366671 | STUK
117783//25388 | NEXIUM TABLET MSR 40MG | ESOMEPRAZOL-40-MG-TABLET, MAAGSAPRESISTENT | 0,366671 | STUK
25388 | NEXIUM TABLET MSR 40MG | ESOMEPRAZOL-40-MG-TABLET, MAAGSAPRESISTENT | 0,366671 | STUK
25388 | NEXIUM TABLET MSR 40MG WALLET | ESOMEPRAZOL-40-MG-TABLET, MAAGSAPRESISTENT | 0,366671 | STUK
103834 | VAGIFEM VAGINAALTABLET 10MCG | ESTRADIOL-0.01-MG-TABLET, VAGINAAL | 0,891948 | STUK
19582 | ESTRADIOL SANDOZ PLEISTER TRANSDERM 100MCG/24UUR | ESTRADIOL-0.1-MG/24H-PLEISTER, DERMAAL | 1,244872 | STUK
122679//19259 | SYSTEN 100 PLEISTER MGA 100MCG/24UUR | ESTRADIOL-0.1-MG/24H-PLEISTER, DERMAAL | 1,244872 | STUK
19259 | SYSTEN 100 PLEISTER MGA 100MCG/24UUR | ESTRADIOL-0.1-MG/24H-PLEISTER, DERMAAL | 1,244872 | STUK
127200//114597 | LENZETTO SPRAY TRANSDERMAAL 1,53MG/DOSIS FLAC 56DO | ESTRADIOL-1.53-MG-HUIDSPRAY | 0,149838 | DOSIS
EU/1/11/690/002 | ZOELY TABLET FILMOMHULD | ESTRADIOL-1.5-MG-TABLET-NOMEGESTROL-2.5-MG-TABLET | 0,299310 | STUK
112126//5861 | PROGYNOVA DRAGEE 1MG | ESTRADIOL-1-MG-TABLET | 0,124449 | STUK
114149//5861 | PROGYNOVA DRAGEE 1MG | ESTRADIOL-1-MG-TABLET | 0,138277 | STUK
5861 | PROGYNOVA DRAGEE 1MG | ESTRADIOL-1-MG-TABLET | 0,138277 | STUK
27505 | ANGELIQ TABLET FILMOMHULD | ESTRADIOL-1-MG-TABLET-DROSPIRENON-2-MG-TABLET | 0,521436 | STUK
117326//22819 | ACTIVELLE TABLET OMHULD | ESTRADIOL-1-MG-TABLET-NORETHISTERONE-.5-MG-TABLET | 0,281107 | STUK
22819 | ACTIVELLE TABLET OMHULD | ESTRADIOL-1-MG-TABLET-NORETHISTERONE-.5-MG-TABLET | 0,281107 | STUK
26359 | ESTRADIOL SANDOZ TABLET 2MG | ESTRADIOL-2-MG-TABLET | 0,153093 | STUK
9810 | ESTROFEM TABLET 2MG | ESTRADIOL-2-MG-TABLET | 0,153093 | STUK
112125//5311 | PROGYNOVA DRAGEE 2MG | ESTRADIOL-2-MG-TABLET | 0,138998 | STUK
114152//5311 | PROGYNOVA DRAGEE 2MG | ESTRADIOL-2-MG-TABLET | 0,153093 | STUK
5311 | PROGYNOVA DRAGEE 2MG | ESTRADIOL-2-MG-TABLET | 0,153093 | STUK
15462 | ZUMENON TABLET 2MG | ESTRADIOL-2-MG-TABLET | 0,153093 | STUK
17490 | FEMOSTON TABLET 2/10MG | ESTRADIOL-2-MG-TABLET-DYDROGESTERONE-10-MG-TABLET-ESTRADIOL-FASE2-2-MG-TABLET | 0,242157 | STUK
122828//14942 | KLIOGEST TABLET | ESTRADIOL-2-MG-TABLET-NORETHISTERONE-1-MG-TABLET | 0,270811 | STUK
14942 | KLIOGEST TABLET | ESTRADIOL-2-MG-TABLET-NORETHISTERONE-1-MG-TABLET | 0,270811 | STUK
9812 | TRISEQUENS TABLET | ESTRADIOL-2-MG-TABLET-NORETHISTERONE-1-MG-TABLET-ESTRADIOL-FASE2-2-MG-TABLET-ESTRADIOL-FASE3-1-MG-TABLET | 0,190660 | STUK
7375 | ESTRACYT CAPSULE 140MG | ESTRAMUSTINE-140-MG-CAPSULE | 1,767146 | STUK
28533//8977 | SYNAPAUSE E3 VAGINAALCREME 1MG/G + APPLICATOR | ESTRIOL-1-MG/G-CREME, VAGINAAL | 0,352670 | G
8977 | SYNAPAUSE E3 VAGINAALCREME 1MG/G + APPLICATOR | ESTRIOL-1-MG/G-CREME, VAGINAAL | 0,352670 | G
9969 | SYNAPAUSE E3 TABLET 1MG | ESTRIOL-1-MG-TABLET | 0,112614 | STUK
9970 | SYNAPAUSE E3 TABLET 2MG | ESTRIOL-2-MG-TABLET | 0,160221 | STUK
EU/1/99/126/022 | ENBREL INJPDR FLACON 10MG+SOLVENS 1ML+TOEBEHOREN | ETANERCEPT-10-MG-POED. V. INJECTIE, FLACON | 46,148372 | STUK
EU/1/99/126/003 | ENBREL INJPDR FLACON 25MG+SOLVENS 1ML+TOEBEHOREN | ETANERCEPT-25-MG-POED. V. INJECTIE, FLACON | 89,803341 | STUK
EU/1/15/1074/002 | BENEPALI INJVLST 50MG/ML PEN 1ML | ETANERCEPT-50-MG/ML-INJ.VLOEISTOF, WWSP | 155,123116 | ML
EU/1/15/1074/005 | BENEPALI INJVLST 50MG/ML WWSP 0,5ML | ETANERCEPT-50-MG/ML-INJ.VLOEISTOF, WWSP | 155,123116 | ML
EU/1/15/1074/001 | BENEPALI INJVLST 50MG/ML WWSP 1ML | ETANERCEPT-50-MG/ML-INJ.VLOEISTOF, WWSP | 155,123116 | ML
EU/1/99/126/013 | ENBREL INJVLST 50MG/ML WWSP 0,5ML | ETANERCEPT-50-MG/ML-INJ.VLOEISTOF, WWSP | 155,123116 | ML
EU/1/99/126/017 | ENBREL INJVLST 50MG/ML WWSP 1ML | ETANERCEPT-50-MG/ML-INJ.VLOEISTOF, WWSP | 155,123116 | ML
EU/1/99/126/023 | ENBREL MYCLIC INJVLST 50MG/ML PEN 0,5ML | ETANERCEPT-50-MG/ML-INJ.VLOEISTOF, WWSP | 183,371531 | ML
EU/1/99/126/020 | ENBREL MYCLIC INJVLST 50MG/ML PEN 1ML | ETANERCEPT-50-MG/ML-INJ.VLOEISTOF, WWSP | 155,123116 | ML
EU/1/17/1195/003 | ERELZI INJVLST 50MG/ML WWSP 0,5ML | ETANERCEPT-50-MG/ML-INJ.VLOEISTOF, WWSP | 203,746146 | ML
EU/1/17/1195/007 | ERELZI INJVLST 50MG/ML WWSP 1ML | ETANERCEPT-50-MG/ML-INJ.VLOEISTOF, WWSP | 203,746146 | ML
EU/1/17/1195/011 | ERELZI SENSOREADY INJVLST 50MG/ML PEN 1ML | ETANERCEPT-50-MG/ML-INJ.VLOEISTOF, WWSP | 203,746146 | ML
EU/1/16/1142/010 | PARSABIV 10 INJVLST 5MG/ML FLACON 2ML | ETELCALCETIDE-10-MG-INJECTIEVLOEISTOF, FLAC | 62,032124 | STUK
117584//6445 | MYAMBUTOL TABLET 400MG | ETHAMBUTOL-400-MG-TABLET | 0,422078 | STUK
6445 | MYAMBUTOL TABLET 400MG | ETHAMBUTOL-400-MG-TABLET | 0,422078 | STUK
11508 | MERCILON TABLET | ETHINYLESTRADIOL-.02-MG-TABLET-DESOGESTREL-.15-MG-TABLET | 0,143156 | STUK
21187 | LOVETTE TABLET OMHULD | ETHINYLESTRADIOL-.02-MG-TABLET-LEVONORGESTREL-.1-MG-TABLET | 0,118648 | STUK
30863 | MICROGYNON 20 TABLET OMHULD | ETHINYLESTRADIOL-.02-MG-TABLET-LEVONORGESTREL-.1-MG-TABLET | 0,118648 | STUK
8859 | MARVELON TABLET | ETHINYLESTRADIOL-.03-MG-TABLET-DESOGESTREL-.15-MG-TABLET | 0,129665 | STUK
122806//23827 | YASMIN TABLET OMHULD | ETHINYLESTRADIOL-.03-MG-TABLET-DROSPIRENON-3-MG-TABLET | 0,257715 | STUK
23827 | YASMIN TABLET OMHULD | ETHINYLESTRADIOL-.03-MG-TABLET-DROSPIRENON-3-MG-TABLET | 0,257715 | STUK
122874//12575 | MINULET DRAGEE | ETHINYLESTRADIOL-.03-MG-TABLET-GESTODENE-.075-MG-TABLET | 0,142411 | STUK
12575 | MINULET DRAGEE | ETHINYLESTRADIOL-.03-MG-TABLET-GESTODENE-.075-MG-TABLET | 0,142411 | STUK
8663 | TRIGYNON DRAGEE | ETHINYLESTRADIOL-.03-MG-TABLET-LEVONORGESTREL-.05-MG-TABLET-LEVONORGESTREL-FASE2-.075-MG-TABLET-ETHINYLESTRADIOL-FASE2-.04-MG-TABLET-ETHINYLESTRADIOL-FASE3-.03-MG-TABLET-LEVONORGESTREL-FASE3-.125-MG-TABLET | 0,114302 | STUK
8514 | TRINORDIOL DRAGEE | ETHINYLESTRADIOL-.03-MG-TABLET-LEVONORGESTREL-.05-MG-TABLET-LEVONORGESTREL-FASE2-.075-MG-TABLET-ETHINYLESTRADIOL-FASE2-.04-MG-TABLET-ETHINYLESTRADIOL-FASE3-.03-MG-TABLET-LEVONORGESTREL-FASE3-.125-MG-TABLET | 0,114302 | STUK
8204 | MICROGYNON 30 TABLET OMHULD | ETHINYLESTRADIOL-.03-MG-TABLET-LEVONORGESTREL-.15-MG-TABLET | 0,072234 | STUK
8191 | STEDIRIL 30 DRAGEE | ETHINYLESTRADIOL-.03-MG-TABLET-LEVONORGESTREL-.15-MG-TABLET | 0,087754 | STUK
33842 | YAZ 24+4 TABLET FILMOMHULD | ETHINYLESTRADIOL-0.02-MG-TABLET-DROSPIRENON-3-MG-TABLET | 0,246444 | STUK
EU/1/02/223/001 | EVRA PLEISTER TRANSDERMAAL | ETHINYLESTRADIOL-0.0339-MG/24H-PLEISTER, DERMAAL-NORELGESTROMIN-0.203-MG/24H-PLEISTER, DERMAAL | 2,879341 | STUK
2806 | LIPIODOL ULTRA FLUIDE INJVLST 480MGI/ML AMPUL 10ML | ETHYL ESTERS OF IODISED FATTY ACIDS-480-MG/ML-INJ.VLOEISTOF AMPUL | 24,428849 | ML
121593//21168 | IMPLANON NXT IMPLANTAAT IN APPLICATOR 68MG | ETONOGESTROL-68-MG-IMPLANTATEN | 107,795914 | STUK
122756//21168 | IMPLANON NXT IMPLANTAAT IN APPLICATOR 68MG | ETONOGESTROL-68-MG-IMPLANTATEN | 107,795914 | STUK
21168 | IMPLANON NXT IMPLANTAAT IN APPLICATOR 68MG | ETONOGESTROL-68-MG-IMPLANTATEN | 107,795914 | STUK
117361//8543 | VEPESID CAPSULE 100MG | ETOPOSIDE-100-MG-CAPSULE | 8,040381 | STUK
8543 | VEPESID CAPSULE 100MG | ETOPOSIDE-100-MG-CAPSULE | 16,571759 | STUK
16307 | EPOSIN INFUSIEVLOEISTOF CONC 20MG/ML FLACON 5ML | ETOPOSIDE-20-MG/ML-INFUUSVLOEISTOF, FLACON | 2,917468 | ML
113482 | ETOPOSIDE ACCORD INFVLST CONC 20MG/ML FL 5ML | ETOPOSIDE-20-MG/ML-INFUUSVLOEISTOF, FLACON | 2,917468 | ML
113482 | ETOPOSIDE ACCORD INFVLST CONC 20MG/ML FL 12,5ML | ETOPOSIDE-20-MG/ML-INFUUSVLOEISTOF, FLACON | 2,917468 | ML
30530 | ETOPOSIDE SANDOZ INFVLST C 20MG/ML FL 10ML | ETOPOSIDE-20-MG/ML-INFUUSVLOEISTOF, FLACON | 2,625721 | ML
16010 | TOPOSIN INFVLST CONC 20MG/ML FLACON 5ML | ETOPOSIDE-20-MG/ML-INFUUSVLOEISTOF, FLACON | 2,917468 | ML
16010 | TOPOSIN INFVLST CONC 20MG/ML FLACON 10ML | ETOPOSIDE-20-MG/ML-INFUUSVLOEISTOF, FLACON | 2,917468 | ML
123425//27707 | ARCOXIA TABLET FILMOMHULD 120MG | ETORICOXIB-120-MG-TABLET | 0,898946 | STUK
27707 | ARCOXIA TABLET FILMOMHULD 120MG | ETORICOXIB-120-MG-TABLET | 0,898946 | STUK
118782 | ETORICOXIB AUROBINDO TABLET FILMOMHULD 120MG | ETORICOXIB-120-MG-TABLET | 0,898946 | STUK
117989 | ETORICOXIB GLENMARK TABLET FILMOMHULD 120MG | ETORICOXIB-120-MG-TABLET | 0,898946 | STUK
115906 | ETORICOXIB TEVA TABLET FILMOMHULD 120MG | ETORICOXIB-120-MG-TABLET | 0,898946 | STUK
107700//34279 | ARCOXIA TABLET FILMOMHULD 30MG | ETORICOXIB-30-MG-TABLET | 0,298229 | STUK
110164//34279 | ARCOXIA TABLET FILMOMHULD 30MG | ETORICOXIB-30-MG-TABLET | 0,298229 | STUK
34279 | ARCOXIA TABLET FILMOMHULD 30MG | ETORICOXIB-30-MG-TABLET | 0,315711 | STUK
118779 | ETORICOXIB AUROBINDO TABLET FILMOMHULD 30MG | ETORICOXIB-30-MG-TABLET | 0,315711 | STUK
117986 | ETORICOXIB GLENMARK TABLET FILMOMHULD 30MG | ETORICOXIB-30-MG-TABLET | 0,298229 | STUK
115514 | ETORICOXIB MYLAN TABLET FILMOMHULD 30MG | ETORICOXIB-30-MG-TABLET | 0,315711 | STUK
114108 | ETORICOXIB SANDOZ TABLET FILMOMHULD 30MG | ETORICOXIB-30-MG-TABLET | 0,315711 | STUK
115901 | ETORICOXIB TEVA TABLET FILMOMHULD 30MG | ETORICOXIB-30-MG-TABLET | 0,315711 | STUK
126388//27705 | ARCOXIA TABLET FILMOMHULD 60MG | ETORICOXIB-60-MG-TABLET | 0,424268 | STUK
27705 | ARCOXIA TABLET FILMOMHULD 60MG | ETORICOXIB-60-MG-TABLET | 0,424268 | STUK
31059//27705 | ARCOXIA TABLET FILMOMHULD 60MG | ETORICOXIB-60-MG-TABLET | 0,424268 | STUK
34965//27705 | ARCOXIA TABLET FILMOMHULD 60MG | ETORICOXIB-60-MG-TABLET | 0,424268 | STUK
118780 | ETORICOXIB AUROBINDO TABLET FILMOMHULD 60MG | ETORICOXIB-60-MG-TABLET | 0,424268 | STUK
117987 | ETORICOXIB GLENMARK TABLET FILMOMHULD 60MG | ETORICOXIB-60-MG-TABLET | 0,424268 | STUK
115515 | ETORICOXIB MYLAN TABLET FILMOMHULD 60MG | ETORICOXIB-60-MG-TABLET | 0,424268 | STUK
114109 | ETORICOXIB SANDOZ TABLET FILMOMHULD 60MG | ETORICOXIB-60-MG-TABLET | 0,424268 | STUK
115904 | ETORICOXIB TEVA TABLET FILMOMHULD 60MG | ETORICOXIB-60-MG-TABLET | 0,424268 | STUK
31060//27706 | ARCOXIA TABLET FILMOMHULD 90MG | ETORICOXIB-90-MG-TABLET | 0,515643 | STUK
34966//27706 | ARCOXIA TABLET FILMOMHULD 90MG | ETORICOXIB-90-MG-TABLET | 0,515643 | STUK
27706 | ARCOXIA TABLET FILMOMHULD 90MG | ETORICOXIB-90-MG-TABLET | 0,516447 | STUK
118781 | ETORICOXIB AUROBINDO TABLET FILMOMHULD 90MG | ETORICOXIB-90-MG-TABLET | 0,516447 | STUK
117988 | ETORICOXIB GLENMARK TABLET FILMOMHULD 90MG | ETORICOXIB-90-MG-TABLET | 0,515643 | STUK
114110 | ETORICOXIB SANDOZ TABLET FILMOMHULD 90MG | ETORICOXIB-90-MG-TABLET | 0,516447 | STUK
115905 | ETORICOXIB TEVA TABLET FILMOMHULD 90MG | ETORICOXIB-90-MG-TABLET | 0,516447 | STUK
EU/1/08/468/001 | INTELENCE TABLET 100MG | ETRAVIRINE-100-MG-TABLET | 2,781476 | STUK
EU/1/08/468/002 | INTELENCE TABLET 200MG | ETRAVIRINE-200-MG-TABLET | 6,656189 | STUK
30046 | CERTICAN DISPER TABLET 0,25MG | EVEROLIMUS-.25-MG-BRUISTABLET | 1,950833 | STUK
124577//30041 | CERTICAN TABLET 0,25MG | EVEROLIMUS-.25-MG-TABLET | 2,002501 | STUK
30041 | CERTICAN TABLET 0,25MG | EVEROLIMUS-.25-MG-TABLET | 2,261252 | STUK
122510//30043 | CERTICAN TABLET 0,75MG | EVEROLIMUS-.75-MG-TABLET | 5,984753 | STUK
123690//30043 | CERTICAN TABLET 0,75MG | EVEROLIMUS-.75-MG-TABLET | 5,984753 | STUK
124828//30043 | CERTICAN TABLET 0,75MG | EVEROLIMUS-.75-MG-TABLET | 5,984753 | STUK
125823//30043 | CERTICAN TABLET 0,75MG | EVEROLIMUS-.75-MG-TABLET | 5,984753 | STUK
30043 | CERTICAN TABLET 0,75MG | EVEROLIMUS-.75-MG-TABLET | 5,984753 | STUK
EU/1/11/710/012 | VOTUBIA DISPERGEERBAAR TABLET 3MG | EVEROLIMUS-3-MG-BRUISTABLET | 51,119697 | STUK
EU/1/09/538/004 | AFINITOR TABLET 10MG | EVEROLIMUS-A-10-MG-TABLET | 86,453033 | STUK
EU/1/09/538/009 | AFINITOR TABLET 2,5MG | EVEROLIMUS-A-2.5-MG-TABLET | 40,870832 | STUK
EU/1/09/538/001 | AFINITOR TABLET 5MG | EVEROLIMUS-A-5-MG-TABLET | 66,850174 | STUK
EU/1/11/710/006 | VOTUBIA TABLET 10MG | EVEROLIMUS-V-10-MG-TABLET | 113,528121 | STUK
EU/1/11/710/002 | VOTUBIA TABLET 2,5MG | EVEROLIMUS-V-2.5-MG-TABLET | 44,157004 | STUK
EU/1/11/710/004 | VOTUBIA TABLET 5MG | EVEROLIMUS-V-5-MG-TABLET | 81,668315 | STUK
EU/1/15/1016/002 | REPATHA INJVLST 140MG/ML PEN 1ML | EVOLOCUMAB-140-MG-INJ.VLOEISTOF, WWSP | 202,986339 | STUK
EU/1/15/1016/003 | REPATHA INJVLST 140MG/ML PEN 1ML | EVOLOCUMAB-140-MG-INJ.VLOEISTOF, WWSP | 202,986339 | STUK
24443 | AROMASIN TABLET OMHULD 25MG | EXEMESTAAN-25-MG-TABLET | 1,950880 | STUK
104320 | EXEMESTAAN ACCORD TABLET FILMOMHULD 25MG | EXEMESTAAN-25-MG-TABLET | 1,950880 | STUK
104327 | EXEMESTAAN SANDOZ TABLET FILMOMHULD 25MG | EXEMESTAAN-25-MG-TABLET | 1,982528 | STUK
117229 | EZETIMIBE ACCORD TABLET 10MG | EZETIMIB-10-MG-TABLET | 0,564522 | STUK
115256 | EZETIMIBE GLENMARK TABLET 10MG | EZETIMIB-10-MG-TABLET | 0,564522 | STUK
113553 | EZETIMIBE MYLAN TABLET 10MG | EZETIMIB-10-MG-TABLET | 0,564522 | STUK
113711 | EZETIMIBE SANDOZ TABLET 10MG | EZETIMIB-10-MG-TABLET | 0,564522 | STUK
115354//28626 | EZETROL TABLET 10MG | EZETIMIB-10-MG-TABLET | 0,564522 | STUK
120037//28626 | EZETROL TABLET 10MG | EZETIMIB-10-MG-TABLET | 0,564522 | STUK
123792//28626 | EZETROL TABLET 10MG | EZETIMIB-10-MG-TABLET | 0,564522 | STUK
28626 | EZETROL TABLET 10MG | EZETIMIB-10-MG-TABLET | 0,564522 | STUK
125245//114373 | ATOZET TABLET 10/10MG | EZETIMIB-10-MG-TABLET-ATORVASTATIN-10-MG-TABLET | 0,922985 | STUK
114373 | ATOZET TABLET 10/10MG | EZETIMIB-10-MG-TABLET-ATORVASTATIN-10-MG-TABLET | 1,394489 | STUK
125244//114374 | ATOZET TABLET 10/20MG | EZETIMIB-10-MG-TABLET-ATORVASTATIN-20-MG-TABLET | 0,956842 | STUK
114374 | ATOZET TABLET 10/20MG | EZETIMIB-10-MG-TABLET-ATORVASTATIN-20-MG-TABLET | 1,430260 | STUK
125248//114375 | ATOZET TABLET 10/40MG | EZETIMIB-10-MG-TABLET-ATORVASTATIN-40-MG-TABLET | 0,956842 | STUK
114375 | ATOZET TABLET 10/40MG | EZETIMIB-10-MG-TABLET-ATORVASTATIN-40-MG-TABLET | 1,430575 | STUK
25358=24532 | FAMOTIDINE AUROBINDO TABLET 20MG | FAMOTIDINE-20-MG-TABLET | 0,582129 | STUK
24532 | FAMOTIDINE CF TABLET 20MG | FAMOTIDINE-20-MG-TABLET | 0,582129 | STUK
25359=24533 | FAMOTIDINE AUROBINDO TABLET 40MG | FAMOTIDINE-40-MG-TABLET | 1,063747 | STUK
24533 | FAMOTIDINE CF TABLET 40MG | FAMOTIDINE-40-MG-TABLET | 1,063747 | STUK
EU/1/11/699/003 | FAMPYRA TABLET MVA 10MG | FAMPRIDINE-10-MG-TABLET, MET GEREGULEERDE AFGIFTE | 4,100175 | STUK
EU/1/11/699/004 | FAMPYRA TABLET MVA 10MG | FAMPRIDINE-10-MG-TABLET, MET GEREGULEERDE AFGIFTE | 4,100175 | STUK
EU/1/08/447/003 | ADENURIC TABLET FILMOMHULD 120MG | FEBUXOSTAT-120-MG-TABLET | 0,672440 | STUK
121788 | FEBUXOSTAT XIROMED TABLET FILMOMHULD 120MG | FEBUXOSTAT-120-MG-TABLET | 0,672440 | STUK
EU/1/08/447/001 | ADENURIC TABLET FILMOMHULD 80MG | FEBUXOSTAT-80-MG-TABLET | 0,850950 | STUK
EU/1/08/447/014 | ADENURIC TABLET FILMOMHULD 80MG | FEBUXOSTAT-80-MG-TABLET | 0,850950 | STUK
117184//16889 | TALOXA SUSPENSIE 120MG/ML | FELBAMATE-120-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,371647 | ML
119849//16889 | TALOXA SUSPENSIE 120MG/ML | FELBAMATE-120-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,412941 | ML
16889 | TALOXA SUSPENSIE 120MG/ML | FELBAMATE-120-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,412941 | ML
122128//110909 | TALOXA TABS TABLET 600MG | FELBAMATE-600-MG-TABLET | 1,569788 | STUK
125326//110909 | TALOXA TABS TABLET 600MG | FELBAMATE-600-MG-TABLET | 1,569788 | STUK
30521 | FELODIPINE SANDOZ RETARD TABLET MVA 10MG | FELODIPINE-10-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,291862 | STUK
15580 | PLENDIL TABLET MVA 2,5MG | FELODIPINE-2.5-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,232400 | STUK
29746 | FELODIPINE CF RETARD TABLET MGA 5MG | FELODIPINE-5-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,164995 | STUK
29399 | FELODIPINE PCH RETARD TABLET MGA 5MG | FELODIPINE-5-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,182069 | STUK
30520 | FELODIPINE SANDOZ RETARD TABLET MVA 5MG | FELODIPINE-5-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,182069 | STUK
14123 | BERODUAL CFKVR AEROSOL SPUITBUS 200DO + INHALATOR | FENOTEROL-.05-MG-AEROSOL-IPRATROPIUM BROMIDE-.02-MG-AEROSOL | 0,031098 | DOSIS
119760 | FENTANYL KALCEKS INJVLST 0,05MG/ML AMPUL 10ML | FENTANYL-.05-MG/ML-INJ.VLOEISTOF AMPUL | 0,172018 | ML
119760 | FENTANYL KALCEKS INJVLST 0,05MG/ML AMPUL 2ML | FENTANYL-.05-MG/ML-INJ.VLOEISTOF AMPUL | 0,172018 | ML
121054//31418 | DUROGESIC MATRIXPLEISTER 12MCG/UUR | FENTANYL-0.012-MG/H-PLEISTER, DERMAAL | 2,286234 | STUK
31418 | DUROGESIC MATRIXPLEISTER 12MCG/UUR | FENTANYL-0.012-MG/H-PLEISTER, DERMAAL | 2,286234 | STUK
120689//16845 | DUROGESIC MATRIXPLEISTER 25MCG/UUR | FENTANYL-0.025-MG/H-PLEISTER, DERMAAL | 3,409643 | STUK
16845 | DUROGESIC MATRIXPLEISTER 25MCG/UUR | FENTANYL-0.025-MG/H-PLEISTER, DERMAAL | 3,409643 | STUK
121053//16846 | DUROGESIC MATRIXPLEISTER 50MCG/UUR | FENTANYL-0.05-MG/H-PLEISTER, DERMAAL | 6,393392 | STUK
16846 | DUROGESIC MATRIXPLEISTER 50MCG/UUR | FENTANYL-0.05-MG/H-PLEISTER, DERMAAL | 6,393392 | STUK
EU/1/09/531/001 | INSTANYL NEUSSPRAY 50MCG/DO FLACON 10DOSES | FENTANYL-0.05-MG-NEUSSPRAY | 5,899399 | DOSIS
EU/1/09/531/003 | INSTANYL NEUSSPRAY 50MCG/DO FLACON 40DOSES | FENTANYL-0.05-MG-NEUSSPRAY | 5,899399 | DOSIS
120690//16847 | DUROGESIC MATRIXPLEISTER 75MCG/UUR | FENTANYL-0.075-MG/H-PLEISTER, DERMAAL | 8,953578 | STUK
16847 | DUROGESIC MATRIXPLEISTER 75MCG/UUR | FENTANYL-0.075-MG/H-PLEISTER, DERMAAL | 8,953578 | STUK
120684//16848 | DUROGESIC MATRIXPLEISTER 100MCG/UUR | FENTANYL-0.1-MG/H-PLEISTER, DERMAAL | 11,186094 | STUK
16848 | DUROGESIC MATRIXPLEISTER 100MCG/UUR | FENTANYL-0.1-MG/H-PLEISTER, DERMAAL | 11,186094 | STUK
EU/1/09/531/004 | INSTANYL NEUSSPRAY 100MCG/DO FLACON 10DOSES | FENTANYL-0.1-MG-NEUSSPRAY | 6,692125 | DOSIS
EU/1/09/531/005 | INSTANYL NEUSSPRAY 100MCG/DO FLACON 20DOSES | FENTANYL-0.1-MG-NEUSSPRAY | 6,019420 | DOSIS
EU/1/09/531/006 | INSTANYL NEUSSPRAY 100MCG/DO FLACON 40DOSES | FENTANYL-0.1-MG-NEUSSPRAY | 6,019420 | DOSIS
108843 | ABSTRAL TABLET SUBLINGUAAL 100MCG | FENTANYL-0.1-MG-TABLET, OROMUCOSAAL | 5,411134 | STUK
114777//108843 | ABSTRAL TABLET SUBLINGUAAL 100MCG | FENTANYL-0.1-MG-TABLET, OROMUCOSAAL | 5,411134 | STUK
122148//108843 | ABSTRAL TABLET SUBLINGUAAL 100MCG | FENTANYL-0.1-MG-TABLET, OROMUCOSAAL | 5,411134 | STUK
125814//108843 | ABSTRAL TABLET SUBLINGUAAL 100MCG | FENTANYL-0.1-MG-TABLET, OROMUCOSAAL | 5,411134 | STUK
EU/1/09/531/007 | INSTANYL NEUSSPRAY 200MCG/DO FLACON 10DOSES | FENTANYL-0.2-MG-NEUSSPRAY | 6,634950 | DOSIS
EU/1/09/531/008 | INSTANYL NEUSSPRAY 200MCG/DO FLACON 20DOSES | FENTANYL-0.2-MG-NEUSSPRAY | 6,004317 | DOSIS
EU/1/09/531/009 | INSTANYL NEUSSPRAY 200MCG/DO FLACON 40DOSES | FENTANYL-0.2-MG-NEUSSPRAY | 6,004317 | DOSIS
108844 | ABSTRAL TABLET SUBLINGUAAL 200MCG | FENTANYL-0.2-MG-TABLET, OROMUCOSAAL | 5,916042 | STUK
114443//108844 | ABSTRAL TABLET SUBLINGUAAL 200MCG | FENTANYL-0.2-MG-TABLET, OROMUCOSAAL | 5,916042 | STUK
122157//108844 | ABSTRAL TABLET SUBLINGUAAL 200MCG | FENTANYL-0.2-MG-TABLET, OROMUCOSAAL | 5,916042 | STUK
125822//108844 | ABSTRAL TABLET SUBLINGUAAL 200MCG | FENTANYL-0.2-MG-TABLET, OROMUCOSAAL | 5,916042 | STUK
121009//108844 | ABSTRAL TABLET SUBLINGUAAL 200MCG | FENTANYL-0.2-MG-TABLET, OROMUCOSAAL | 6,342842 | STUK
121643//26571 | ACTIQ ZUIGTABLET 200MCG | FENTANYL-0.2-MG-TABLET, OROMUCOSAAL | 5,916042 | STUK
123548//26571 | ACTIQ ZUIGTABLET 200MCG | FENTANYL-0.2-MG-TABLET, OROMUCOSAAL | 5,916042 | STUK
125793//26571 | ACTIQ ZUIGTABLET 200MCG | FENTANYL-0.2-MG-TABLET, OROMUCOSAAL | 5,916042 | STUK
26571 | ACTIQ ZUIGTABLET 200MCG | FENTANYL-0.2-MG-TABLET, OROMUCOSAAL | 5,916042 | STUK
115504//26571 | ACTIQ ZUIGTABLET 200MCG | FENTANYL-0.2-MG-TABLET, OROMUCOSAAL | 6,342842 | STUK
EU/1/08/441/004 | EFFENTORA TABLET BUCCAAL 200MCG | FENTANYL-0.2-MG-TABLET, OROMUCOSAAL | 7,047602 | STUK
108845 | ABSTRAL TABLET SUBLINGUAAL 300MCG | FENTANYL-0.3-MG-TABLET, OROMUCOSAAL | 6,025292 | STUK
122154//108845 | ABSTRAL TABLET SUBLINGUAAL 300MCG | FENTANYL-0.3-MG-TABLET, OROMUCOSAAL | 6,025292 | STUK
123124//108845 | ABSTRAL TABLET SUBLINGUAAL 300MCG | FENTANYL-0.3-MG-TABLET, OROMUCOSAAL | 6,025292 | STUK
125825//108845 | ABSTRAL TABLET SUBLINGUAAL 300MCG | FENTANYL-0.3-MG-TABLET, OROMUCOSAAL | 6,025292 | STUK
EU/1/10/644/003 | PECFENT NEUSSPRAY 400MCG/DO FLACON 8DO | FENTANYL-0.4-MG-NEUSSPRAY | 6,102308 | DOSIS
108846 | ABSTRAL TABLET SUBLINGUAAL 400MCG | FENTANYL-0.4-MG-TABLET, OROMUCOSAAL | 5,995877 | STUK
114778//108846 | ABSTRAL TABLET SUBLINGUAAL 400MCG | FENTANYL-0.4-MG-TABLET, OROMUCOSAAL | 5,995877 | STUK
122158//108846 | ABSTRAL TABLET SUBLINGUAAL 400MCG | FENTANYL-0.4-MG-TABLET, OROMUCOSAAL | 5,995877 | STUK
125986//108846 | ABSTRAL TABLET SUBLINGUAAL 400MCG | FENTANYL-0.4-MG-TABLET, OROMUCOSAAL | 5,995877 | STUK
115505//26572 | ACTIQ ZUIGTABLET 400MCG | FENTANYL-0.4-MG-TABLET, OROMUCOSAAL | 5,995877 | STUK
123549//26572 | ACTIQ ZUIGTABLET 400MCG | FENTANYL-0.4-MG-TABLET, OROMUCOSAAL | 5,995877 | STUK
121641//26572 | ACTIQ ZUIGTABLET 400MCG | FENTANYL-0.4-MG-TABLET, OROMUCOSAAL | 6,966819 | STUK
26572 | ACTIQ ZUIGTABLET 400MCG | FENTANYL-0.4-MG-TABLET, OROMUCOSAAL | 6,966819 | STUK
EU/1/08/441/006 | EFFENTORA TABLET BUCCAAL 400MCG | FENTANYL-0.4-MG-TABLET, OROMUCOSAAL | 6,966819 | STUK
110888 | RECIVIT TABLET SUBLINGUAAL 400MCG | FENTANYL-0.4-MG-TABLET, OROMUCOSAAL | 6,966819 | STUK
108847 | ABSTRAL TABLET SUBLINGUAAL 600MCG | FENTANYL-0.6-MG-TABLET, OROMUCOSAAL | 7,072694 | STUK
115506//26573 | ACTIQ ZUIGTABLET 600MCG | FENTANYL-0.6-MG-TABLET, OROMUCOSAAL | 5,916070 | STUK
123547//26573 | ACTIQ ZUIGTABLET 600MCG | FENTANYL-0.6-MG-TABLET, OROMUCOSAAL | 5,916070 | STUK
121640//26573 | ACTIQ ZUIGTABLET 600MCG | FENTANYL-0.6-MG-TABLET, OROMUCOSAAL | 7,072694 | STUK
26573 | ACTIQ ZUIGTABLET 600MCG | FENTANYL-0.6-MG-TABLET, OROMUCOSAAL | 7,072694 | STUK
108848 | ABSTRAL TABLET SUBLINGUAAL 800MCG | FENTANYL-0.8-MG-TABLET, OROMUCOSAAL | 6,964478 | STUK
115507//26574 | ACTIQ ZUIGTABLET 800MCG | FENTANYL-0.8-MG-TABLET, OROMUCOSAAL | 6,146407 | STUK
121638//26574 | ACTIQ ZUIGTABLET 800MCG | FENTANYL-0.8-MG-TABLET, OROMUCOSAAL | 6,964478 | STUK
26574 | ACTIQ ZUIGTABLET 800MCG | FENTANYL-0.8-MG-TABLET, OROMUCOSAAL | 6,964478 | STUK
EU/1/13/822/001 | PHEBURANE GRANULAAT 483MG/G | FENYLBUTYRAAT NATRIUM-483-MG/G-POEDER/GRANULAAT, ORAAL | 2,479751 | G
EU/1/99/120/001 | AMMONAPS TABLET 500MG | FENYLBUTYRAAT NATRIUM-500-MG-TABLET | 2,741966 | STUK
EU/1/99/120/003 | AMMONAPS GRANULAAT 940MG/G | FENYLBUTYRAAT NATRIUM-940-MG/G-POEDER/GRANULAAT, ORAAL | 4,730743 | G
EU/1/07/386/003 | TOVIAZ TABLET MVA 4MG | FESOTERODIN-4-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,972002 | STUK
EU/1/07/386/019 | TOVIAZ TABLET MVA 4MG | FESOTERODIN-4-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,972002 | STUK
EU/1/07/386/008 | TOVIAZ TABLET MVA 8MG | FESOTERODIN-8-MG-TABLET, MET GEREGULEERDE AFGIFTE | 1,058679 | STUK
35226 | FEXOFENADINE HCL RP TABLET OMHULD 120MG | FEXOFENADINE-120-MG-TABLET | 0,234268 | STUK
123205//21625 | TELFAST TABLET OMHULD 180MG | FEXOFENADINE-180-MG-TABLET | 0,251234 | STUK
121650//21625 | TELFAST TABLET OMHULD 180MG | FEXOFENADINE-180-MG-TABLET | 0,325043 | STUK
21625 | TELFAST TABLET OMHULD 180MG | FEXOFENADINE-180-MG-TABLET | 0,325043 | STUK
EU/1/11/733/004 | DIFICLIR TABLET FILMOMHULD 200MG | FIDAXOMICINE-200-MG-TABLET | 76,658354 | STUK
14662 | NEUPOGEN 30 INJVLST 30MILJ E/ML FLACON 1ML | FILGRASTIM-30-MIE/ML-INJECTIEVLOEISTOF, FLAC | 65,554035 | ML
EU/1/14/946/001 | ACCOFIL 30 INJVLST 60MILJ E/ML WWSP 0,5ML | FILGRASTIM-60-MIE/ML-INJ.VLOEISTOF, WWSP | 107,865430 | ML
26386 | NEUPOGEN SINGLEJ 30 INJVLST 60MILJ E/ML WWSP 0,5ML | FILGRASTIM-60-MIE/ML-INJ.VLOEISTOF, WWSP | 121,312941 | ML
EU/1/10/631/005 | NIVESTIM 30 INJVLST 60MILJ E/ML WWSP 0,5ML | FILGRASTIM-60-MIE/ML-INJ.VLOEISTOF, WWSP | 121,312941 | ML
EU/1/08/445/009 | TEVAGRASTIM 30 INJVLST 60MILJ E/ML WWSP 0,5ML | FILGRASTIM-60-MIE/ML-INJ.VLOEISTOF, WWSP | 134,792157 | ML
EU/1/08/445/012 | TEVAGRASTIM 48 INJVLST 60MILJ E/ML WWSP 0,8ML | FILGRASTIM-60-MIE/ML-INJ.VLOEISTOF, WWSP | 134,792157 | ML
EU/1/08/495/001 | ZARZIO 30 INJVLST 60MILJ E/ML WWSP 0,5ML | FILGRASTIM-60-MIE/ML-INJ.VLOEISTOF, WWSP | 121,312941 | ML
EU/1/08/495/003 | ZARZIO 30 INJVLST 60MILJ E/ML WWSP 0,5ML | FILGRASTIM-60-MIE/ML-INJ.VLOEISTOF, WWSP | 134,792157 | ML
EU/1/14/946/003 | ACCOFIL 48 INJVLST 96MILJ E/ML WWSP 0,5ML | FILGRASTIM-96-MIE/ML-INJ.VLOEISTOF, WWSP | 167,820605 | ML
26387 | NEUPOGEN SINGLEJ 48 INJVLST 96MILJ E/ML WWSP 0,5ML | FILGRASTIM-96-MIE/ML-INJ.VLOEISTOF, WWSP | 190,862594 | ML
EU/1/10/631/008 | NIVESTIM 48 INJVLST 96MILJ E/ML WWSP 0,5ML | FILGRASTIM-96-MIE/ML-INJ.VLOEISTOF, WWSP | 190,862594 | ML
EU/1/08/495/005 | ZARZIO 48 INJVLST 96MILJ E/ML WWSP 0,5ML | FILGRASTIM-96-MIE/ML-INJ.VLOEISTOF, WWSP | 212,069549 | ML
EU/1/08/495/007 | ZARZIO 48 INJVLST 96MILJ E/ML WWSP 0,5ML | FILGRASTIM-96-MIE/ML-INJ.VLOEISTOF, WWSP | 212,069549 | ML
15482 | PROSCAR TABLET 5MG | FINASTERIDE-5-MG-TABLET | 0,380629 | STUK
EU/1/11/677/008 | GILENYA CAPSULE 0,25MG | FINGOLIMOD-0.25-MG-CAPSULE | 48,320393 | STUK
EU/1/11/677/001 | GILENYA CAPSULE 0,5MG | FINGOLIMOD-0.5-MG-CAPSULE | 57,744787 | STUK
EU/1/11/677/005 | GILENYA CAPSULE 0,5MG | FINGOLIMOD-0.5-MG-CAPSULE | 57,744787 | STUK
EU/1/11/677/006 | GILENYA CAPSULE 0,5MG | FINGOLIMOD-0.5-MG-CAPSULE | 57,744787 | STUK
8322 | URISPAS TABLET OMHULD 200MG | FLAVOXATE-200-MG-TABLET | 0,192427 | STUK
111300 | FLECAINIDEACETAAT CF RETARD CAPSULE MVA 100MG | FLECAINIDE-100-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,251094 | STUK
111308 | FLECAINIDEACETAAT SANDOZ RETARD CAPSULE MVA 100MG | FLECAINIDE-100-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,251094 | STUK
110876 | FLECAINIDEACETAAT TEVA RETARD CAPSULE 100MG | FLECAINIDE-100-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,251094 | STUK
27132 | TAMBOCOR CR CAPSULE MGA 100MG | FLECAINIDE-100-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,249135 | STUK
27200 | FLECAINIDEACETAAT MYLAN TABLET 100MG | FLECAINIDE-100-MG-TABLET | 0,217400 | STUK
10098 | TAMBOCOR TABLET 100MG | FLECAINIDE-100-MG-TABLET | 0,217400 | STUK
10099 | TAMBOCOR INJVLST 10MG/ML AMPUL 15ML | FLECAINIDE-10-MG/ML-INJ.VLOEISTOF AMPUL | 0,491580 | ML
111301 | FLECAINIDEACETAAT CF RETARD CAPSULE MVA 150MG | FLECAINIDE-150-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,299787 | STUK
111309 | FLECAINIDEACETAAT SANDOZ RETARD CAPSULE MVA 150MG | FLECAINIDE-150-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,299787 | STUK
110877 | FLECAINIDEACETAAT TEVA RETARD CAPSULE 150MG | FLECAINIDE-150-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,299787 | STUK
27133 | TAMBOCOR CR CAPSULE MGA 150MG | FLECAINIDE-150-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,299787 | STUK
111310 | FLECAINIDEACETAAT SANDOZ RETARD CAPSULE MVA 200MG | FLECAINIDE-200-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,476937 | STUK
110878 | FLECAINIDEACETAAT TEVA RETARD CAPSULE 200MG | FLECAINIDE-200-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,476937 | STUK
27134 | TAMBOCOR CR CAPSULE MGA 200MG | FLECAINIDE-200-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,476937 | STUK
5990 | FLOXAPEN INJECTIEPOEDER FLACON 1000MG | FLUCLOXACILLIN-1000-MG-POED. V. INJECTIE, FLACON | 4,051549 | STUK
57442 | FLUCLOXACILLINE CF INJECTIEPOEDER FLACON 1000MG | FLUCLOXACILLIN-1000-MG-POED. V. INJECTIE, FLACON | 4,308758 | STUK
109868 | FLUCLOXACILLINE AUROBINDO INJPDR FLACON 2000MG | FLUCLOXACILLIN-2000-MG-POED. V. INJECTIE, FLACON | 6,551508 | STUK
5990 | FLOXAPEN INJECTIEPOEDER FLACON 250MG | FLUCLOXACILLIN-250-MG-POED. V. INJECTIE, FLACON | 1,257392 | STUK
5990 | FLOXAPEN INJECTIEPOEDER FLACON 500MG | FLUCLOXACILLIN-500-MG-POED. V. INJECTIE, FLACON | 2,371451 | STUK
114911//15757 | DIFLUCAN POEDER VOOR SUSPENSIE 10MG/ML | FLUCONAZOLE-10-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,429926 | ML
118306//15757 | DIFLUCAN POEDER VOOR SUSPENSIE 10MG/ML | FLUCONAZOLE-10-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,477624 | ML
15757 | DIFLUCAN POEDER VOOR SUSPENSIE 10MG/ML | FLUCONAZOLE-10-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,477624 | ML
29395 | FLUCONAZOL CF CAPSULE 150MG | FLUCONAZOLE-150-MG-CAPSULE | 3,139423 | STUK
102999 | FLUCONAZOL MYLAN CAPSULE 150MG | FLUCONAZOLE-150-MG-CAPSULE | 3,455399 | STUK
26694 | FLUCONAZOL SANDOZ CAPSULE 150MG | FLUCONAZOLE-150-MG-CAPSULE | 3,455399 | STUK
28344 | FLUCONAZOL TEVA CAPSULE 150MG | FLUCONAZOLE-150-MG-CAPSULE | 3,139423 | STUK
28345 | FLUCONAZOL PCH CAPSULE 200MG | FLUCONAZOLE-200-MG-CAPSULE | 3,678744 | STUK
26695 | FLUCONAZOL SANDOZ CAPSULE 200MG | FLUCONAZOLE-200-MG-CAPSULE | 3,678744 | STUK
28345 | FLUCONAZOL TEVA CAPSULE 200MG | FLUCONAZOLE-200-MG-CAPSULE | 3,678744 | STUK
31951 | FLUCONAZOL CLARIS INFVLST 2MG/ML FLACON 50ML | FLUCONAZOLE-2-MG/ML-INFUUSVLOEISTOF, FLACON | 0,161046 | ML
31951 | FLUCONAZOL CLARIS INFVLST 2MG/ML FLACON 100ML | FLUCONAZOLE-2-MG/ML-INFUUSVLOEISTOF, FLACON | 0,161046 | ML
31951 | FLUCONAZOL CLARIS INFVLST 2MG/ML FLACON 200ML | FLUCONAZOLE-2-MG/ML-INFUUSVLOEISTOF, FLACON | 0,161046 | ML
31951 | FLUCONAZOL CLARIS INFVLST 2MG/ML ZAK 50ML | FLUCONAZOLE-2-MG/ML-INFUUSVLOEISTOF, FLACON | 0,161046 | ML
31951 | FLUCONAZOL CLARIS INFVLST 2MG/ML ZAK 100ML | FLUCONAZOLE-2-MG/ML-INFUUSVLOEISTOF, FLACON | 0,161046 | ML
31951 | FLUCONAZOL CLARIS INFVLST 2MG/ML ZAK 200ML | FLUCONAZOLE-2-MG/ML-INFUUSVLOEISTOF, FLACON | 0,161046 | ML
101844 | FLUCONAZOL FRES KABI INFVLST 2MG/ML FLACON 50ML | FLUCONAZOLE-2-MG/ML-INFUUSVLOEISTOF, FLACON | 0,161046 | ML
101844 | FLUCONAZOL FRES KABI INFVLST 2MG/ML FLACON 200ML | FLUCONAZOLE-2-MG/ML-INFUUSVLOEISTOF, FLACON | 0,161046 | ML
34106 | FLUCONAZOL HIKMA INFVLST 2MG/ML FLACON 50ML | FLUCONAZOLE-2-MG/ML-INFUUSVLOEISTOF, FLACON | 0,161046 | ML
34106 | FLUCONAZOL HIKMA INFVLST 2MG/ML FLACON 100ML | FLUCONAZOLE-2-MG/ML-INFUUSVLOEISTOF, FLACON | 0,161046 | ML
34106 | FLUCONAZOL HIKMA INFVLST 2MG/ML ZAK 200ML | FLUCONAZOLE-2-MG/ML-INFUUSVLOEISTOF, FLACON | 0,161046 | ML
120580//15758 | DIFLUCAN POEDER VOOR SUSPENSIE 40MG/ML | FLUCONAZOLE-40-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 1,829555 | ML
127770//15758 | DIFLUCAN POEDER VOOR SUSPENSIE 40MG/ML | FLUCONAZOLE-40-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 1,829555 | ML
117400//15758 | DIFLUCAN POEDER VOOR SUSPENSIE 40MG/ML | FLUCONAZOLE-40-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 2,139867 | ML
118878//15758 | DIFLUCAN POEDER VOOR SUSPENSIE 40MG/ML | FLUCONAZOLE-40-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 2,139867 | ML
15758 | DIFLUCAN POEDER VOOR SUSPENSIE 40MG/ML | FLUCONAZOLE-40-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 2,139867 | ML
102997 | FLUCONAZOL MYLAN CAPSULE 50MG | FLUCONAZOLE-50-MG-CAPSULE | 1,124716 | STUK
28342 | FLUCONAZOL PCH CAPSULE 50MG | FLUCONAZOLE-50-MG-CAPSULE | 1,124716 | STUK
26692 | FLUCONAZOL SANDOZ CAPSULE 50MG | FLUCONAZOLE-50-MG-CAPSULE | 1,124716 | STUK
28342 | FLUCONAZOL TEVA CAPSULE 50MG | FLUCONAZOLE-50-MG-CAPSULE | 1,124716 | STUK
8533 | ANCOTIL INFUSIEVLOEISTOF 10MG/ML FLAC 250ML + SYST | FLUCYTOSINE-10-MG/ML-INFUUSVLOEISTOF, FLACON | 0,183965 | ML
26919 | FLUDARA TABLET OMHULD 10MG | FLUDARABINE-10-MG-TABLET | 26,443658 | STUK
114133 | FLUDARABINE ACCORD INJVLST CONC 25MG/ML FLACON 2ML | FLUDARABINE-25-MG/ML-INJECTIEVLOEISTOF, FLAC | 61,325633 | ML
112183 | FLUDARABINE AUROBINDO INJVLST CONC 25MG/ML FL 2ML | FLUDARABINE-25-MG/ML-INJECTIEVLOEISTOF, FLAC | 63,138839 | ML
33255 | FLUDARABINE PCH INJVLST CONC 25MG/ML FL 2ML | FLUDARABINE-25-MG/ML-INJECTIEVLOEISTOF, FLAC | 63,138839 | ML
7897 | FLORINEF TABLET 0,1MG | FLUDROCORTISONE-.1-MG-TABLET | 0,259239 | STUK
6585 | PANOTILE OORDRUPPELS | FLUDROCORTISONE-1-MG/ML-OORDRUPPELS-NEOMYCIN-10-MG/ML-OORDRUPPELS-POLYMYXIN B-10000-IE/ML-OORDRUPPELS-LIDOCAINE-40-MG/ML-OORDRUPPELS | 0,293656 | ML
10579 | SIBELIUM TABLET 10MG | FLUNARIZINE-10-MG-TABLET | 0,345267 | STUK
115058 | ILUVIEN IMPLANTAAT IN APPLICATOR 190MCG | FLUOCINOLONE ACETONIDE-0.19-MG-IMPLANTATEN | 6533,131875 | STUK
100998//6539 | FML LIQUIFILM OOGDRUPPELS 0,1% FLACON 5ML | FLUOROMETHOLONE-1-MG/ML-OOGDRUPPELS | 0,526689 | ML
6539 | FML LIQUIFILM OOGDRUPPELS 0,1% FLACON 5ML | FLUOROMETHOLONE-1-MG/ML-OOGDRUPPELS | 0,526689 | ML
123870//6292 | EFUDIX CREME 50MG/G | FLUOROURACIL-50-MG/G-CREME, CUTAAN | 1,053658 | G
6292 | EFUDIX CREME 50MG/G | FLUOROURACIL-50-MG/G-CREME, CUTAAN | 1,053658 | G
100701 | FLUOROURACIL ACCORD INJVLST 50MG/ML FLACON 5ML | FLUOROURACIL-50-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,387242 | ML
100701 | FLUOROURACIL ACCORD INJVLST 50MG/ML FLACON 10ML | FLUOROURACIL-50-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,387242 | ML
100701 | FLUOROURACIL ACCORD INJVLST 50MG/ML FLACON 20ML | FLUOROURACIL-50-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,387242 | ML
100701 | FLUOROURACIL ACCORD INJVLST 50MG/ML FLACON 50ML | FLUOROURACIL-50-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,387242 | ML
100701 | FLUOROURACIL ACCORD INJVLST 50MG/ML FLACON 100ML | FLUOROURACIL-50-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,387242 | ML
22303 | FLUOROURACIL SANDOZ INFVLST CONC 50MG/ML FL 10ML | FLUOROURACIL-50-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,387242 | ML
22303 | FLUOROURACIL SANDOZ INFVLST CONC 50MG/ML FL 20ML | FLUOROURACIL-50-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,387242 | ML
22303 | FLUOROURACIL SANDOZ INFVLST CONC 50MG/ML FL 100ML | FLUOROURACIL-50-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,387242 | ML
124340//19429 | FLUOXETINE BMODESTO DISP TABLET 20MG | FLUOXETINE-20-MG-BRUISTABLET | 0,342406 | STUK
24609 | FLUOXETINE CF DISP TABLET 20MG | FLUOXETINE-20-MG-BRUISTABLET | 0,346293 | STUK
124273//19429 | PROZAC DISP TABLET 20MG | FLUOXETINE-20-MG-BRUISTABLET | 0,360815 | STUK
19429 | PROZAC DISP TABLET 20MG | FLUOXETINE-20-MG-BRUISTABLET | 0,360815 | STUK
23696 | FLUOXETINE MYLAN CAPSULE 20MG | FLUOXETINE-20-MG-CAPSULE | 0,257226 | STUK
24467 | FLUOXETINE PCH CAPSULE 20MG | FLUOXETINE-20-MG-CAPSULE | 0,257226 | STUK
30007 | FLUOXETINE SANDOZ CAPSULE 20MG | FLUOXETINE-20-MG-CAPSULE | 0,257226 | STUK
116918//7228 | FLUANXOL DEPOT INJVLST 100MG/ML AMPUL 1ML | FLUPENTIXOL-100-MG/ML-INJ.VLOEISTOF AMPUL | 8,888918 | ML
115537//7228 | FLUANXOL DEPOT INJVLST 100MG/ML AMPUL 1ML | FLUPENTIXOL-100-MG/ML-INJ.VLOEISTOF AMPUL | 10,416326 | ML
118224//7228 | FLUANXOL DEPOT INJVLST 100MG/ML AMPUL 1ML | FLUPENTIXOL-100-MG/ML-INJ.VLOEISTOF AMPUL | 10,416326 | ML
7228 | FLUANXOL DEPOT INJVLST 100MG/ML AMPUL 1ML | FLUPENTIXOL-100-MG/ML-INJ.VLOEISTOF AMPUL | 11,573695 | ML
108183 | FLUANXOL TABLET FILMOMHULD 1MG | FLUPENTIXOL-1-MG-TABLET | 0,090068 | STUK
122504//108183 | FLUANXOL TABLET FILMOMHULD 1MG | FLUPENTIXOL-1-MG-TABLET | 0,090068 | STUK
117426//6051 | FLUANXOL DEPOT INJVLST 20MG/ML AMPUL 1ML | FLUPENTIXOL-20-MG/ML-INJ.VLOEISTOF AMPUL | 2,033024 | ML
6051 | FLUANXOL DEPOT INJVLST 20MG/ML AMPUL 1ML | FLUPENTIXOL-20-MG/ML-INJ.VLOEISTOF AMPUL | 2,615578 | ML
101369//16648 | CUTIVATE HYDROFOBE ZALF 0,05MG/G | FLUTICASONE-.05-MG/G-ZALF, CUTAAN | 0,141468 | G
16648 | CUTIVATE HYDROFOBE ZALF 0,05MG/G | FLUTICASONE-.05-MG/G-ZALF, CUTAAN | 0,141468 | G
113914//16212 | FLIXOTIDE AER CFKVR 50MCG/DO SPBS 120 DO + INHAL | FLUTICASONE-.05-MG-AEROSOL | 0,070036 | DOSIS
16212 | FLIXOTIDE AER CFKVR 50MCG/DO SPBS 120 DO + INHAL | FLUTICASONE-.05-MG-AEROSOL | 0,070036 | DOSIS
126706//14424 | FLIXONASE NEUSSPRAY 50MCG/DO FLACON 120DOSES | FLUTICASONE-.05-MG-NEUSSPRAY | 0,052300 | DOSIS
120232//14424 | FLIXONASE NEUSSPRAY 50MCG/DO FLACON 120DOSES | FLUTICASONE-.05-MG-NEUSSPRAY | 0,067992 | DOSIS
16213 | FLIXOTIDE AER CFKVR 125MCG/DO SPBS 120 DO + INHAL | FLUTICASONE-.125-MG-AEROSOL | 0,145246 | DOSIS
116004 | FLUTICASONPROPIONAAT VINC AER 125MCG/DO 120DO+INH | FLUTICASONE-.125-MG-AEROSOL | 0,145246 | DOSIS
18193 | FLIXOTIDE DISKUS INHPDR 100MCG 60DO | FLUTICASONE-.1-MG-INHALATIEPOEDER INCL INHALER | 0,139658 | DOSIS
105055//16214 | FLIXOTIDE AER CFKVR 250MCG/DO SPBS 120 DO + INHAL | FLUTICASONE-.25-MG-AEROSOL | 0,237045 | DOSIS
16214 | FLIXOTIDE AER CFKVR 250MCG/DO SPBS 120 DO + INHAL | FLUTICASONE-.25-MG-AEROSOL | 0,237045 | DOSIS
116005 | FLUTICASONPROPIONAAT VINC AER 250MCG/DO 120DO+INH | FLUTICASONE-.25-MG-AEROSOL | 0,237045 | DOSIS
18194 | FLIXOTIDE DISKUS INHPDR 250MCG 60DO | FLUTICASONE-.25-MG-INHALATIEPOEDER INCL INHALER | 0,299276 | DOSIS
102106 | CORTIFIL CREME 0,5MG/G | FLUTICASONE-.5-MG/G-CREME, CUTAAN | 0,161994 | G
16647 | CUTIVATE HYDROFIELE CREME 0,5MG/G | FLUTICASONE-.5-MG/G-CREME, CUTAAN | 0,161994 | G
109360//18195 | FLIXOTIDE DISKUS INHPDR 500MCG 60DO | FLUTICASONE-.5-MG-INHALATIEPOEDER INCL INHALER | 0,515778 | DOSIS
121031//18195 | FLIXOTIDE DISKUS INHPDR 500MCG 60DO | FLUTICASONE-.5-MG-INHALATIEPOEDER INCL INHALER | 0,515778 | DOSIS
125545//18195 | FLIXOTIDE DISKUS INHPDR 500MCG 60DO | FLUTICASONE-.5-MG-INHALATIEPOEDER INCL INHALER | 0,515778 | DOSIS
126662//18195 | FLIXOTIDE DISKUS INHPDR 500MCG 60DO | FLUTICASONE-.5-MG-INHALATIEPOEDER INCL INHALER | 0,515778 | DOSIS
18195 | FLIXOTIDE DISKUS INHPDR 500MCG 60DO | FLUTICASONE-.5-MG-INHALATIEPOEDER INCL INHALER | 0,515778 | DOSIS
EU/1/07/434/003 | AVAMYS NEUSSPRAY 27,5MCG/DO FLACON 120DOSES | FLUTICASONE-0.0275-MG-NEUSSPRAY | 0,055560 | DOSIS
107222 | FLUTIFORM AEROSOL 50/ 5MCG/DO SPBS 120DO + INH | FLUTICASONE-0.05-MG-AEROSOL-FORMOTEROL-0.005-MG-AEROSOL | 0,185528 | DOSIS
EU/1/13/886/002 | RELVAR ELLIPTA INHPDR 92/22MCG 30DO | FLUTICASONE-0.092-MG-INHALATIEPOEDER INCL INHALER-VILANTEROL-0.022-MG-INHALATIEPOEDER INCL INHALER | 0,961258 | DOSIS
EU/1/13/886/003 | RELVAR ELLIPTA INHPDR 92/22MCG 30DO | FLUTICASONE-0.092-MG-INHALATIEPOEDER INCL INHALER-VILANTEROL-0.022-MG-INHALATIEPOEDER INCL INHALER | 0,961258 | DOSIS
EU/1/17/1236/002 | TRELEGY ELLIPTA INHPDR 92/55/22MCG 30DO | FLUTICASONE-0.092-MG-INHALATIEPOEDER INCL INHALER-VILANTEROL-0.022-MG-INHALATIEPOEDER INCL INHALER-UMECLIDINIUM-0.055-MG-INHALATIEPOEDER INCL INHALER | 1,735463 | DOSIS
107242 | FLUTIFORM AEROSOL 125/ 5MCG/DO SPBS 120DO + INH | FLUTICASONE-0.125-MG-AEROSOL-FORMOTEROL-0.005-MG-AEROSOL | 0,273024 | DOSIS
EU/1/13/886/005 | RELVAR ELLIPTA INHPDR 184/22MCG 30DO | FLUTICASONE-0.184-MG-INHALATIEPOEDER INCL INHALER-VILANTEROL-0.022-MG-INHALATIEPOEDER INCL INHALER | 1,184797 | DOSIS
EU/1/13/886/006 | RELVAR ELLIPTA INHPDR 184/22MCG 30DO | FLUTICASONE-0.184-MG-INHALATIEPOEDER INCL INHALER-VILANTEROL-0.022-MG-INHALATIEPOEDER INCL INHALER | 1,184797 | DOSIS
107243 | FLUTIFORM AEROSOL 250/10MCG/DO SPBS 120DO + INH | FLUTICASONE-0.25-MG-AEROSOL-FORMOTEROL-0.01-MG-AEROSOL | 0,427342 | DOSIS
116031//107243 | FLUTIFORM AEROSOL 250/10MCG/DO SPBS 120DO + INH | FLUTICASONE-0.25-MG-AEROSOL-FORMOTEROL-0.01-MG-AEROSOL | 0,427342 | DOSIS
122488//107243 | FLUTIFORM AEROSOL 250/10MCG/DO SPBS 120DO + INH | FLUTICASONE-0.25-MG-AEROSOL-FORMOTEROL-0.01-MG-AEROSOL | 0,427342 | DOSIS
21835 | FLIXOTIDE 2000 INHVLST 1MG/ML NEBULE 2ML | FLUTICASONE-1-MG/ML-INHALATIEVLOEISTOF UNITDOSE | 1,621707 | ML
113564//23477 | FLIXONASE NEUSDRUPPELS 1MG/ML PATROON 0,4ML | FLUTICASONE-1-MG/ML-NEUSDRUPPELS UNITDOSE | 1,396747 | ML
113946//23477 | FLIXONASE NEUSDRUPPELS 1MG/ML PATROON 0,4ML | FLUTICASONE-1-MG/ML-NEUSDRUPPELS UNITDOSE | 1,396747 | ML
115856//23477 | FLIXONASE NEUSDRUPPELS 1MG/ML PATROON 0,4ML | FLUTICASONE-1-MG/ML-NEUSDRUPPELS UNITDOSE | 1,396747 | ML
115898//23477 | FLIXONASE NEUSDRUPPELS 1MG/ML PATROON 0,4ML | FLUTICASONE-1-MG/ML-NEUSDRUPPELS UNITDOSE | 1,396747 | ML
119947//23477 | FLIXONASE NEUSDRUPPELS 1MG/ML PATROON 0,4ML | FLUTICASONE-1-MG/ML-NEUSDRUPPELS UNITDOSE | 1,396747 | ML
126803//23477 | FLIXONASE NEUSDRUPPELS 1MG/ML PATROON 0,4ML | FLUTICASONE-1-MG/ML-NEUSDRUPPELS UNITDOSE | 1,396747 | ML
126855//23477 | FLIXONASE NEUSDRUPPELS 1MG/ML PATROON 0,4ML | FLUTICASONE-1-MG/ML-NEUSDRUPPELS UNITDOSE | 1,396747 | ML
23477 | FLIXONASE NEUSDRUPPELS 1MG/ML PATROON 0,4ML | FLUTICASONE-1-MG/ML-NEUSDRUPPELS UNITDOSE | 1,396747 | ML
35300 | FLUVASTATINE AUROBINDO CAPSULE 20MG | FLUVASTATIN-20-MG-CAPSULE | 0,173482 | STUK
34892 | FLUVASTATINE PCH CAPSULE 20MG | FLUVASTATIN-20-MG-CAPSULE | 0,173482 | STUK
34405 | FLUVASTATINE SANDOZ CAPSULE 20MG | FLUVASTATIN-20-MG-CAPSULE | 0,173482 | STUK
34893 | FLUVASTATINE PCH CAPSULE 40MG | FLUVASTATIN-40-MG-CAPSULE | 0,215560 | STUK
34406 | FLUVASTATINE SANDOZ CAPSULE 40MG | FLUVASTATIN-40-MG-CAPSULE | 0,215560 | STUK
35306 | FLUVASTATINE AUROBINDO SR TABLET MVA 80MG | FLUVASTATIN-80-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,415302 | STUK
35265 | FLUVASTATINE MYLAN RETARD TABLET MVA 80MG | FLUVASTATIN-80-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,415302 | STUK
35264 | FLUVASTATINE SANDOZ RETARD TABLET MVA 80MG | FLUVASTATIN-80-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,415302 | STUK
25187 | LESCOL XL TABLET MVA 80MG | FLUVASTATIN-80-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,415302 | STUK
11619 | FEVARIN TABLET 100MG | FLUVOXAMINE-100-MG-TABLET | 0,431738 | STUK
21332 | FLUVOXAMINE MALEAAT AUROBINDO TABLET 100MG | FLUVOXAMINE-100-MG-TABLET | 0,431738 | STUK
29190 | FLUVOXAMINE MALEAAT MYLAN TABLET 100MG | FLUVOXAMINE-100-MG-TABLET | 0,431738 | STUK
20571 | FLUVOXAMINE MALEAAT SANDOZ TABLET 100MG | FLUVOXAMINE-100-MG-TABLET | 0,431738 | STUK
10245 | FEVARIN TABLET 50MG | FLUVOXAMINE-50-MG-TABLET | 0,257414 | STUK
21331 | FLUVOXAMINE MALEAAT AUROBINDO TABLET 50MG | FLUVOXAMINE-50-MG-TABLET | 0,257414 | STUK
29189 | FLUVOXAMINE MALEAAT MYLAN TABLET 50MG | FLUVOXAMINE-50-MG-TABLET | 0,257414 | STUK
20570 | FLUVOXAMINE MALEAAT SANDOZ TABLET 50MG | FLUVOXAMINE-50-MG-TABLET | 0,257414 | STUK
50392 | FOLIUMZUUR PCH TABLET 5MG | FOLIC ACID-5-MG-TABLET | 0,065304 | STUK
50392 | FOLIUMZUUR TEVA TABLET 5MG | FOLIC ACID-5-MG-TABLET | 0,065304 | STUK
EU/1/95/001/021 | GONAL F INJPDR FL 1050IE + SOLV 1,75ML | FOLLITROPINE ALPHA-1050-IE-POED. V. INJECTIE, FLACON | 375,263306 | STUK
EU/1/07/396/001 | PERGOVERIS INJPDR FLACON + SOLVENS 1ML | FOLLITROPINE ALPHA-150-IE-POED. V. INJECTIE, FLACON-LUTROPINE ALFA-75-IE-POED. V. INJECTIE, FLACON | 74,916669 | STUK
EU/1/13/871/001 | OVALEAP 300 INJVLST 600IE/ML PATROON 0,5ML | FOLLITROPINE ALPHA-600-IE/ML-INJ.VLOEISTOF AMPUL | 180,173792 | ML
EU/1/13/871/002 | OVALEAP 450 INJVLST 600IE/ML PATROON 0,75ML | FOLLITROPINE ALPHA-600-IE/ML-INJ.VLOEISTOF AMPUL | 180,173792 | ML
EU/1/13/871/003 | OVALEAP 900 INJVLST 600IE/ML PATROON 1,5ML | FOLLITROPINE ALPHA-600-IE/ML-INJ.VLOEISTOF AMPUL | 180,173792 | ML
EU/1/13/909/001 | BEMFOLA 75 INJVLST 600IE/ML PEN 0,125ML | FOLLITROPINE ALPHA-600-IE/ML-INJ.VLOEISTOF, WWSP | 197,815835 | ML
EU/1/13/909/002 | BEMFOLA 150 INJVLST 600IE/ML PEN 0,25ML | FOLLITROPINE ALPHA-600-IE/ML-INJ.VLOEISTOF, WWSP | 197,815835 | ML
EU/1/13/909/003 | BEMFOLA 225 INJVLST 600IE/ML PEN 0,375ML | FOLLITROPINE ALPHA-600-IE/ML-INJ.VLOEISTOF, WWSP | 197,815835 | ML
EU/1/13/909/004 | BEMFOLA 300 INJVLST 600IE/ML PEN 0,5ML | FOLLITROPINE ALPHA-600-IE/ML-INJ.VLOEISTOF, WWSP | 197,815835 | ML
EU/1/95/001/033 | GONAL F 300 INJVLST 600IE/ML PEN 0,5ML | FOLLITROPINE ALPHA-600-IE/ML-INJ.VLOEISTOF, WWSP | 197,815835 | ML
EU/1/95/001/034 | GONAL F 450 INJVLST 600IE/ML PEN 0,75ML | FOLLITROPINE ALPHA-600-IE/ML-INJ.VLOEISTOF, WWSP | 197,815835 | ML
EU/1/95/001/035 | GONAL F 900 INJVLST 600IE/ML PEN 1,5ML | FOLLITROPINE ALPHA-600-IE/ML-INJ.VLOEISTOF, WWSP | 197,815835 | ML
EU/1/07/396/004 | PERGOVERIS INJ 300/150IE/0,48ML(625/312,5IE/ML)PEN | FOLLITROPINE ALPHA-625-IE/ML-INJ.VLOEISTOF, WWSP-LUTROPINE ALFA-312.5-IE/ML-INJ.VLOEISTOF, WWSP | 308,787767 | ML
EU/1/07/396/005 | PERGOVERIS INJ 450/225IE/0,72ML(625/312,5IE/ML)PEN | FOLLITROPINE ALPHA-625-IE/ML-INJ.VLOEISTOF, WWSP-LUTROPINE ALFA-312.5-IE/ML-INJ.VLOEISTOF, WWSP | 308,787767 | ML
EU/1/07/396/006 | PERGOVERIS INJ 900/450IE/1,44ML(625/312,5IE/ML)PEN | FOLLITROPINE ALPHA-625-IE/ML-INJ.VLOEISTOF, WWSP-LUTROPINE ALFA-312.5-IE/ML-INJ.VLOEISTOF, WWSP | 308,787767 | ML
EU/1/95/001/025 | GONAL F INJPDR FL 75IE + SOLV 1ML | FOLLITROPINE ALPHA-75-IE-POED. V. INJECTIE, FLACON | 25,506806 | STUK
EU/1/95/001/026 | GONAL F INJPDR FL 75IE + SOLV 1ML | FOLLITROPINE ALPHA-75-IE-POED. V. INJECTIE, FLACON | 25,506806 | STUK
EU/1/96/008/038 | PUREGON 300 INJVLST 833IE/ML PATROON 0,36ML | FOLLITROPINE BETA-833-IE/ML-INJ.VLOEISTOF AMPUL | 224,051540 | ML
EU/1/96/008/039 | PUREGON 600 INJVLST 833IE/ML PATROON 0,72ML | FOLLITROPINE BETA-833-IE/ML-INJ.VLOEISTOF AMPUL | 278,243390 | ML
EU/1/96/008/041 | PUREGON 900 INJVLST 833IE/ML PATROON 1,08ML | FOLLITROPINE BETA-833-IE/ML-INJ.VLOEISTOF AMPUL | 250,419051 | ML
EU/1/16/1150/004 | REKOVELLE 12 INJVLST 33,33MCG/ML PEN 0,36ML | FOLLITROPINE DELTA-0.0333-MG/ML-INJ.VLOEISTOF, WWSP | 276,171645 | ML
EU/1/16/1150/005 | REKOVELLE 36 INJVLST 33,33MCG/ML PEN 1,08ML | FOLLITROPINE DELTA-0.0333-MG/ML-INJ.VLOEISTOF, WWSP | 276,171645 | ML
EU/1/16/1150/006 | REKOVELLE 72 INJVLST 33,33MCG/ML PEN 2,16ML | FOLLITROPINE DELTA-0.0333-MG/ML-INJ.VLOEISTOF, WWSP | 276,171645 | ML
EU/1/02/206/006 | ARIXTRA INJVLST 5MG/ML WWSP 0,3ML | FONDAPARINUX-5-MG/ML-INJ.VLOEISTOF, WWSP | 10,755300 | ML
EU/1/02/206/001 | ARIXTRA INJVLST 5MG/ML WWSP 0,5ML | FONDAPARINUX-5-MG/ML-INJ.VLOEISTOF, WWSP | 10,755300 | ML
EU/1/02/206/002 | ARIXTRA INJVLST 5MG/ML WWSP 0,5ML | FONDAPARINUX-5-MG/ML-INJ.VLOEISTOF, WWSP | 10,755300 | ML
EU/1/02/206/003 | ARIXTRA INJVLST 5MG/ML WWSP 0,5ML | FONDAPARINUX-5-MG/ML-INJ.VLOEISTOF, WWSP | 10,755300 | ML
32968 | FORMOTEROL NOVOLIZER PDR START 6MCG/DO 60DO+INH | FORMOTEROL-.006-MG-INHALATIEPOEDER INCL INHALER | 0,360801 | DOSIS
116612//21026 | OXIS TURBUHALER INHALPDR 6MCG/DO 60DO | FORMOTEROL-.006-MG-INHALATIEPOEDER INCL INHALER | 0,357464 | DOSIS
122241//21026 | OXIS TURBUHALER INHALPDR 6MCG/DO 60DO | FORMOTEROL-.006-MG-INHALATIEPOEDER INCL INHALER | 0,357464 | DOSIS
123083//21026 | OXIS TURBUHALER INHALPDR 6MCG/DO 60DO | FORMOTEROL-.006-MG-INHALATIEPOEDER INCL INHALER | 0,357464 | DOSIS
121792//21026 | OXIS TURBUHALER INHALPDR 6MCG/DO 60DO | FORMOTEROL-.006-MG-INHALATIEPOEDER INCL INHALER | 0,360801 | DOSIS
21026 | OXIS TURBUHALER INHALPDR 6MCG/DO 60DO | FORMOTEROL-.006-MG-INHALATIEPOEDER INCL INHALER | 0,360801 | DOSIS
28063//21026 | OXIS TURBUHALER INHALPDR 6MCG/DO 60DO | FORMOTEROL-.006-MG-INHALATIEPOEDER INCL INHALER | 0,360801 | DOSIS
120541//31994 | ATIMOS AEROSOL 12MCG/DOSIS SPUITBUS 100DO | FORMOTEROL-.012-MG-AEROSOL | 0,351735 | DOSIS
120546//31994 | ATIMOS AEROSOL 12MCG/DOSIS SPUITBUS 100DO | FORMOTEROL-.012-MG-AEROSOL | 0,351735 | DOSIS
120769//31994 | ATIMOS AEROSOL 12MCG/DOSIS SPUITBUS 100DO | FORMOTEROL-.012-MG-AEROSOL | 0,351735 | DOSIS
121127//31994 | ATIMOS AEROSOL 12MCG/DOSIS SPUITBUS 100DO | FORMOTEROL-.012-MG-AEROSOL | 0,351735 | DOSIS
126247//31994 | ATIMOS AEROSOL 12MCG/DOSIS SPUITBUS 100DO | FORMOTEROL-.012-MG-AEROSOL | 0,351735 | DOSIS
126288//31994 | ATIMOS AEROSOL 12MCG/DOSIS SPUITBUS 100DO | FORMOTEROL-.012-MG-AEROSOL | 0,351735 | DOSIS
31994 | ATIMOS AEROSOL 12MCG/DOSIS SPUITBUS 100DO | FORMOTEROL-.012-MG-AEROSOL | 0,351735 | DOSIS
125216//31994 | FORMOTEROLFUMARAAT BMODESTO AER 12MCG/DO SPB 100DO | FORMOTEROL-.012-MG-AEROSOL | 0,351735 | DOSIS
32969 | FORMOTEROL NOVOLIZER INHALPDR NAVUL 12MCG/DO 60DO | FORMOTEROL-.012-MG-INHALATIEPOEDER | 0,263210 | DOSIS
17158 | FORADIL INHALATIEPDR 12MCG + INHALATOR | FORMOTEROL-.012-MG-INHALATIEPOEDER INCL INHALER | 0,330008 | DOSIS
32660 | FORMOTEROL MYLAN INHALPDR CAPSULE 12MCG +INHALATOR | FORMOTEROL-.012-MG-INHALATIEPOEDER INCL INHALER | 0,330008 | DOSIS
32969 | FORMOTEROL NOVOLIZER PDR START 12MCG/DO 60DO+INH | FORMOTEROL-.012-MG-INHALATIEPOEDER INCL INHALER | 0,330008 | DOSIS
32586 | FORMOTEROL ORION EASYHALER INHALPD 12MCG/DO 120DO | FORMOTEROL-.012-MG-INHALATIEPOEDER INCL INHALER | 0,330008 | DOSIS
30867 | FORMOTEROLUM INHALPDR CAPSULE 12MCG + INHALATOR | FORMOTEROL-.012-MG-INHALATIEPOEDER INCL INHALER | 0,330008 | DOSIS
21027 | OXIS TURBUHALER INHALPDR 12MCG/DO 60DO | FORMOTEROL-.012-MG-INHALATIEPOEDER INCL INHALER | 0,312209 | DOSIS
EU/1/14/964/001 | DUAKLIR GENUAIR INHPDR 340/12MCG 60DO | FORMOTEROL-0.012-MG-INHALATIEPOEDER INCL INHALER-ACLIDINIUM-0.34-MG-INHALATIEPOEDER INCL INHALER | 0,646042 | DOSIS
EU/1/04/282/001 | TELZIR TABLET FILMOMHULD 700MG | FOSAMPRENAVIR-700-MG-TABLET | 6,229843 | STUK
EU/1/07/437/003 | IVEMEND INFUSIEPOEDER FLACON 150MG | FOSAPREPITANT-150-MG-POED. V. INFUSIE,FLACON | 58,774542 | STUK
109356//13066 | MONURIL GRANULAAT 3000MG/8G IN SACHET | FOSFOMYCIN-3000-MG-POEDER/GRANULAAT, ORAAL | 20,340747 | STUK
13066 | MONURIL GRANULAAT 3000MG/8G IN SACHET | FOSFOMYCIN-3000-MG-POEDER/GRANULAAT, ORAAL | 20,340747 | STUK
31945 | FOSINOPRILNATRIUM DOUBLE-E PHARMA TABLET 10MG | FOSINOPRIL-10-MG-TABLET | 0,172193 | STUK
31946 | FOSINOPRILNATRIUM DOUBLE-E PHARMA TABLET 20MG | FOSINOPRIL-20-MG-TABLET | 0,327362 | STUK
4961 | SOFRADEX OORDRUPPELS FLACON 8ML | FRAMYCETIN-5-MG/ML-OORDRUPPELS-GRAMICIDIN-.05-MG/ML-OORDRUPPELS-DEXAMETHASONE-.5-MG/ML-OORDRUPPELS | 1,046351 | ML
121161//27212 | FROMIREX TABLET OMHULD 2,5MG | FROVATRIPTAN-2.5-MG-TABLET | 2,589989 | STUK
27212 | FROMIREX TABLET OMHULD 2,5MG | FROVATRIPTAN-2.5-MG-TABLET | 2,589989 | STUK
108619//27212 | FROVATRIPTAN ERC TABLET FILMOMHULD 2,5MG | FROVATRIPTAN-2.5-MG-TABLET | 2,589989 | STUK
EU/1/03/269/002 | FASLODEX INJVLST 50MG/ML WWSP 5ML | FULVESTRANT-50-MG/ML-INJ.VLOEISTOF, WWSP | 36,521422 | ML
EU/1/03/269/001 | FASLODEX INJVLST 50MG/ML WWSP 5ML | FULVESTRANT-50-MG/ML-INJ.VLOEISTOF, WWSP | 46,405591 | ML
EU/1/17/1253/001 | FULVESTRANT MYLAN INJVLST 50MG/ML WWSP 5ML | FULVESTRANT-50-MG/ML-INJ.VLOEISTOF, WWSP | 36,521422 | ML
126295 | FULVESTRANT XIROMED INJVLST 50MG/ML WWSP 5ML | FULVESTRANT-50-MG/ML-INJ.VLOEISTOF, WWSP | 36,521422 | ML
EU/1/17/1201/004 | SKILARENCE TABLET MSR 120MG | FUMARIC ACID-120-MG-TABLET, MAAGSAPRESISTENT | 2,418808 | STUK
EU/1/17/1201/007 | SKILARENCE TABLET MSR 120MG | FUMARIC ACID-120-MG-TABLET, MAAGSAPRESISTENT | 2,418808 | STUK
EU/1/13/837/002 | TECFIDERA CAPSULE MSR 240MG | FUMARIC ACID-240-MG-CAPSULE, MAAGSAPRESISTENT | 19,498203 | STUK
55472 | FUROSEMIDE CF INJVLST 10MG/ML AMPUL 2ML | FUROSEMIDE-10-MG/ML-INJ.VLOEISTOF AMPUL | 0,319836 | ML
55472 | FUROSEMIDE CF INJVLST 10MG/ML AMPUL 4ML | FUROSEMIDE-10-MG/ML-INJ.VLOEISTOF AMPUL | 0,319836 | ML
34774 | FUROSEMIDE FRESENIUS KABI INJVLST 10MG/ML AMP 2ML | FUROSEMIDE-10-MG/ML-INJ.VLOEISTOF AMPUL | 0,251881 | ML
25839 | FUROSEMIDE SANDOZ INJVLST 10MG/ML AMPUL 2ML | FUROSEMIDE-10-MG/ML-INJ.VLOEISTOF AMPUL | 0,319836 | ML
25840 | FUROSEMIDE SANDOZ INJVLST 10MG/ML AMPUL 4ML | FUROSEMIDE-10-MG/ML-INJ.VLOEISTOF AMPUL | 0,319836 | ML
28303=10185 | FUROSEMIDE AUROBINDO TABLET 20MG | FUROSEMIDE-20-MG-TABLET | 0,056510 | STUK
57091 | FUROSEMIDE CF TABLET 20MG | FUROSEMIDE-20-MG-TABLET | 0,056510 | STUK
10185 | FUROSEMIDE TEVA TABLET 20MG | FUROSEMIDE-20-MG-TABLET | 0,056510 | STUK
53385 | FUROSEMIDE APOTEX TABLET 40MG | FUROSEMIDE-40-MG-TABLET | 0,065513 | STUK
55322 | FUROSEMIDE CF TABLET 40MG | FUROSEMIDE-40-MG-TABLET | 0,054337 | STUK
9511 | FUROSEMIDE TEVA TABLET 40MG | FUROSEMIDE-40-MG-TABLET | 0,065513 | STUK
15018 | LASIX TABLET 500MG | FUROSEMIDE-500-MG-TABLET | 0,875386 | STUK
10129 | LASIX RETARD CAPSULE 60MG | FUROSEMIDE-60-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,132120 | STUK
11902 | FUCITHALMIC OOGGEL TUBE 5G | FUSIDIC ACID-10-MG/G-OOGGEL | 2,959363 | G
111682 | AFFUSINE CREME 20MG/G | FUSIDIC ACID-20-MG/G-CREME, CUTAAN | 0,208715 | G
8813 | FUCIDIN LEO CREME 20MG/G | FUSIDIC ACID-20-MG/G-CREME, CUTAAN | 0,229018 | G
111898 | FUSIDINEZUUR CF CREME 20MG/G | FUSIDIC ACID-20-MG/G-CREME, CUTAAN | 0,208715 | G
5617 | FUCIDIN LEO ZALF 20MG/G | FUSIDIC ACID-20-MG/G-ZALF, CUTAAN | 0,237120 | G
1369 | FUCIDIN TABLET OMHULD 250MG | FUSIDIC ACID-250-MG-TABLET | 0,695239 | STUK
118008 | GABAPENTINE ACCORD CAPSULE 100MG | GABAPENTIN-100-MG-CAPSULE | 0,070812 | STUK
30739 | GABAPENTINE CF CAPSULE 100MG | GABAPENTIN-100-MG-CAPSULE | 0,070812 | STUK
30742 | GABAPENTINE MYLAN CAPSULE 100MG | GABAPENTIN-100-MG-CAPSULE | 0,070812 | STUK
124063 | GABAPENTINE STRIDES CAPSULE 100MG | GABAPENTIN-100-MG-CAPSULE | 0,070812 | STUK
30740 | GABAPENTINE CF CAPSULE 300MG | GABAPENTIN-300-MG-CAPSULE | 0,186014 | STUK
30743 | GABAPENTINE MYLAN CAPSULE 300MG | GABAPENTIN-300-MG-CAPSULE | 0,172510 | STUK
31981 | GABAPENTINE PCH CAPSULE 300MG | GABAPENTIN-300-MG-CAPSULE | 0,199046 | STUK
33681 | GABAPENTINE SANDOZ CAPSULE 300MG | GABAPENTIN-300-MG-CAPSULE | 0,199046 | STUK
124067 | GABAPENTINE STRIDES CAPSULE 300MG | GABAPENTIN-300-MG-CAPSULE | 0,179135 | STUK
123094//22482 | NEURONTIN CAPSULE 300MG | GABAPENTIN-300-MG-CAPSULE | 0,199046 | STUK
22482 | NEURONTIN CAPSULE 300MG | GABAPENTIN-300-MG-CAPSULE | 0,199046 | STUK
30741 | GABAPENTINE CF CAPSULE 400MG | GABAPENTIN-400-MG-CAPSULE | 0,221222 | STUK
30744 | GABAPENTINE MYLAN CAPSULE 400MG | GABAPENTIN-400-MG-CAPSULE | 0,237316 | STUK
31982 | GABAPENTINE PCH CAPSULE 400MG | GABAPENTIN-400-MG-CAPSULE | 0,237316 | STUK
22483 | NEURONTIN CAPSULE 400MG | GABAPENTIN-400-MG-CAPSULE | 0,237316 | STUK
101079 | GABAPENTINE CF TABLET FILMOMHULD 600MG | GABAPENTIN-600-MG-TABLET | 0,331846 | STUK
108587 | GABAPENTINE SANDOZ TABLET FILMOMHULD 600MG | GABAPENTIN-600-MG-TABLET | 0,345955 | STUK
25247 | NEURONTIN TABLET FILMOMHULD 600MG | GABAPENTIN-600-MG-TABLET | 0,345955 | STUK
101081 | GABAPENTINE CF TABLET FILMOMHULD 800MG | GABAPENTIN-800-MG-TABLET | 0,409779 | STUK
108588 | GABAPENTINE SANDOZ TABLET FILMOMHULD 800MG | GABAPENTIN-800-MG-TABLET | 0,441077 | STUK
25248 | NEURONTIN TABLET FILMOMHULD 800MG | GABAPENTIN-800-MG-TABLET | 0,441077 | STUK
EU/1/05/324/001 | NAGLAZYME INFVLST CONC 1MG/ML FLACON 5ML | GALSULFASE-1-MG/ML-INFUUSVLOEISTOF, FLACON | 266,863958 | ML
13007 | CYMEVENE INFUSIEPOEDER FLACON 500MG | GANCICLOVIR-500-MG-POED. V. INFUSIE,FLACON | 32,742201 | STUK
112948 | GANCICLOVIR SANDOZ INFPDR FLACON 500MG | GANCICLOVIR-500-MG-POED. V. INFUSIE,FLACON | 32,742201 | STUK
127525//111978 | FYREMADEL INJVLST 0,5MG/ML WWSP 0,5ML | GANIRELIX-.5-MG/ML-INJ.VLOEISTOF, WWSP | 58,531900 | ML
111978 | FYREMADEL INJVLST 0,5MG/ML WWSP 0,5ML | GANIRELIX-.5-MG/ML-INJ.VLOEISTOF, WWSP | 64,124298 | ML
EU/1/00/130/001 | ORGALUTRAN INJVLST 0,5MG/ML WWSP 0,5ML | GANIRELIX-.5-MG/ML-INJ.VLOEISTOF, WWSP | 64,124298 | ML
121542 | GEFITINIB SANDOZ TABLET FILMOMHULD 250MG | GEFITINIB-250-MG-TABLET | 48,942343 | STUK
EU/1/09/526/001 | IRESSA TABLET FILMOMHULD 250MG | GEFITINIB-250-MG-TABLET | 74,115596 | STUK
EU/1/09/526/002 | IRESSA TABLET FILMOMHULD 250MG | GEFITINIB-250-MG-TABLET | 74,115596 | STUK
100205 | GEMCITABINE ACCORD INFPDR FLACON 1000MG | GEMCITABINE-1000-MG-POED. V. INFUSIE,FLACON | 102,234260 | STUK
103033 | GEMCITABINE FRESENIUS KABI INFPDR FLACON 1000MG | GEMCITABINE-1000-MG-POED. V. INFUSIE,FLACON | 102,234260 | STUK
109019 | GEMCITABINE ACCORD INFVLST CONC 100MG/ML FL 2ML | GEMCITABINE-100-MG/ML-INFUUSVLOEISTOF, FLACON | 5,055900 | ML
109019 | GEMCITABINE ACCORD INFVLST CONC 100MG/ML FL 10ML | GEMCITABINE-100-MG/ML-INFUUSVLOEISTOF, FLACON | 5,055900 | ML
109019 | GEMCITABINE ACCORD INFVLST CONC 100MG/ML FL 15ML | GEMCITABINE-100-MG/ML-INFUUSVLOEISTOF, FLACON | 5,055900 | ML
109019 | GEMCITABINE ACCORD INFVLST CONC 100MG/ML FL 20ML | GEMCITABINE-100-MG/ML-INFUUSVLOEISTOF, FLACON | 5,055900 | ML
107507 | GEMCITABINE ACCORD INFPDR FLACON 2000MG | GEMCITABINE-2000-MG-POED. V. INFUSIE,FLACON | 204,298755 | STUK
103033 | GEMCITABINE FRESENIUS KABI INFPDR FLACON 2000MG | GEMCITABINE-2000-MG-POED. V. INFUSIE,FLACON | 204,298755 | STUK
100181 | GEMCITABINE ACCORD INFPDR FLACON 200MG | GEMCITABINE-200-MG-POED. V. INFUSIE,FLACON | 20,579790 | STUK
103033 | GEMCITABINE FRESENIUS KABI INFPDR FLACON 200MG | GEMCITABINE-200-MG-POED. V. INFUSIE,FLACON | 20,579790 | STUK
104285 | GEMCITABINE AUROBINDO INFVLST CONC 40MG/ML FL 25ML | GEMCITABINE-40-MG/ML-INFUUSVLOEISTOF, FLACON | 3,522044 | ML
104285 | GEMCITABINE AUROBINDO INFVLST CONC 40MG/ML FL 50ML | GEMCITABINE-40-MG/ML-INFUUSVLOEISTOF, FLACON | 3,522044 | ML
104285 | GEMCITABINE AUROBINDO INFVLST CONC 40MG/ML FL 5ML | GEMCITABINE-40-MG/ML-INFUUSVLOEISTOF, FLACON | 3,522044 | ML
106596 | GEMCITABINE SANDOZ INFVLST CONC 40MG/ML FL 5ML | GEMCITABINE-40-MG/ML-INFUUSVLOEISTOF, FLACON | 3,306423 | ML
106596 | GEMCITABINE SANDOZ INFVLST CONC 40MG/ML FL 25ML | GEMCITABINE-40-MG/ML-INFUUSVLOEISTOF, FLACON | 3,306423 | ML
106596 | GEMCITABINE SANDOZ INFVLST CONC 40MG/ML FL 50ML | GEMCITABINE-40-MG/ML-INFUUSVLOEISTOF, FLACON | 3,306423 | ML
57571 | GENTAMICINE CF INJVLST 10MG/ML AMPUL 2ML | GENTAMICIN-10-MG/ML-INJ.VLOEISTOF AMPUL | 1,883764 | ML
57572 | GENTAMICINE CF INJVLST 40MG/ML AMPUL 2ML | GENTAMICIN-40-MG/ML-INJ.VLOEISTOF AMPUL | 1,951501 | ML
57572 | GENTAMICINE CF INJVLST 40MG/ML AMPUL 10ML | GENTAMICIN-40-MG/ML-INJ.VLOEISTOF AMPUL | 1,951501 | ML
115993 | GLATIRAMEERACETAAT MYLAN INJVLST 20MG/ML WWSP 1ML | GLATIRAMER-20-MG/ML-INJ.VLOEISTOF, WWSP | 20,419905 | ML
119319 | GLATIRAMEERACETAAT MYLAN INJVLST 40MG/ML WWSP 1ML | GLATIRAMER-40-MG/ML-INJ.VLOEISTOF, WWSP | 48,050050 | ML
121159//30086 | COPAXONE INJVLST 20MG/ML WWSP 1ML | GLATIRAMER-C-20-MG/ML-INJ.VLOEISTOF, WWSP | 21,914185 | ML
30086 | COPAXONE INJVLST 20MG/ML WWSP 1ML | GLATIRAMER-C-20-MG/ML-INJ.VLOEISTOF, WWSP | 24,065769 | ML
113849 | COPAXONE INJVLST 40MG/ML WWSP 1ML | GLATIRAMER-C-40-MG/ML-INJ.VLOEISTOF, WWSP | 52,622686 | ML
EU/1/17/1213/001 | MAVIRET TABLET FILMOMHULD | GLECAPREVIR-100-MG-TABLET-PIBRENTASVIR-40-MG-TABLET | 170,139595 | STUK
52645 | GLIBENCLAMIDE APOTEX TABLET 5MG | GLIBENCLAMIDE-5-MG-TABLET | 0,169709 | STUK
56581 | GLIBENCLAMIDE PCH TABLET 5MG | GLIBENCLAMIDE-5-MG-TABLET | 0,169709 | STUK
25617 | DIAMICRON MR TABLET MGA 30MG | GLICLAZIDE-30-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,090808 | STUK
34591 | GLICLAZIDE PCH TABLET MGA 30MG | GLICLAZIDE-30-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,090808 | STUK
17843 | AMARYL TABLET 1MG | GLIMEPIRIDE-1-MG-TABLET | 0,088686 | STUK
102007 | GLIMEPIRIDE ACCORD TABLET 1MG | GLIMEPIRIDE-1-MG-TABLET | 0,088686 | STUK
32745 | GLIMEPIRIDE SANDOZ TABLET 1MG | GLIMEPIRIDE-1-MG-TABLET | 0,088686 | STUK
32800 | GLIMEPIRIDE TEVA TABLET 1MG | GLIMEPIRIDE-1-MG-TABLET | 0,066424 | STUK
17844 | AMARYL TABLET 2MG | GLIMEPIRIDE-2-MG-TABLET | 0,117924 | STUK
32746 | GLIMEPIRIDE SANDOZ TABLET 2MG | GLIMEPIRIDE-2-MG-TABLET | 0,117924 | STUK
32801 | GLIMEPIRIDE TEVA TABLET 2MG | GLIMEPIRIDE-2-MG-TABLET | 0,100473 | STUK
17845 | AMARYL TABLET 3MG | GLIMEPIRIDE-3-MG-TABLET | 0,175421 | STUK
32747 | GLIMEPIRIDE SANDOZ TABLET 3MG | GLIMEPIRIDE-3-MG-TABLET | 0,175421 | STUK
32802 | GLIMEPIRIDE TEVA TABLET 3MG | GLIMEPIRIDE-3-MG-TABLET | 0,142142 | STUK
17846 | AMARYL TABLET 4MG | GLIMEPIRIDE-4-MG-TABLET | 0,202871 | STUK
32748 | GLIMEPIRIDE SANDOZ TABLET 4MG | GLIMEPIRIDE-4-MG-TABLET | 0,202871 | STUK
33706 | GLIMEPIRIDE TEVA TABLET 4MG | GLIMEPIRIDE-4-MG-TABLET | 0,167915 | STUK
EU/1/15/1062/001 | RAVICTI VLOEISTOF VOOR ORAAL GEBRUIK 1,1G/ML | GLYCEROLFENYLBUTYRAAT-1100-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 7,577575 | ML
17465 | DEPONIT T 10 PLEISTER TRANSDERMAAL 10MG/24UUR | GLYCERYL TRINITRATE-10-MG/24H-PLEISTER, DERMAAL | 0,543294 | STUK
30668//17465 | DEPONIT T 10 PLEISTER TRANSDERMAAL 10MG/24UUR | GLYCERYL TRINITRATE-10-MG/24H-PLEISTER, DERMAAL | 0,543294 | STUK
15865 | MINITRAN 10 PLEISTER MGA 10MG/24UUR | GLYCERYL TRINITRATE-10-MG/24H-PLEISTER, DERMAAL | 0,563405 | STUK
19512 | NITROGLYCERINE TEVA PLEISTER TRANSDERM 10MG/24UUR | GLYCERYL TRINITRATE-10-MG/24H-PLEISTER, DERMAAL | 0,563405 | STUK
9673 | TRANSIDERM NITRO 10 PLEISTER TRANSDERM 10MG/24UUR | GLYCERYL TRINITRATE-10-MG/24H-PLEISTER, DERMAAL | 0,563405 | STUK
113638//9673 | TRANSIDERM NITRO PLEISTER TRANSDERM 10MG/24UUR | GLYCERYL TRINITRATE-10-MG/24H-PLEISTER, DERMAAL | 0,543294 | STUK
15866 | MINITRAN 15 PLEISTER MGA 15MG/24UUR | GLYCERYL TRINITRATE-15-MG/24H-PLEISTER, DERMAAL | 0,575906 | STUK
19513 | NITROGLYCERINE TEVA PLEISTER TRANSDERM 15MG/24UUR | GLYCERYL TRINITRATE-15-MG/24H-PLEISTER, DERMAAL | 0,575906 | STUK
17464 | DEPONIT T 5 PLEISTER TRANSDERMAAL 5MG/24UUR | GLYCERYL TRINITRATE-5-MG/24H-PLEISTER, DERMAAL | 0,444984 | STUK
119350//15864 | MINITRAN 5 PLEISTER MGA 5MG/24UUR | GLYCERYL TRINITRATE-5-MG/24H-PLEISTER, DERMAAL | 0,444984 | STUK
15864 | MINITRAN 5 PLEISTER MGA 5MG/24UUR | GLYCERYL TRINITRATE-5-MG/24H-PLEISTER, DERMAAL | 0,480417 | STUK
19511 | NITROGLYCERINE TEVA PLEISTER TRANSDERM 5MG/24UUR | GLYCERYL TRINITRATE-5-MG/24H-PLEISTER, DERMAAL | 0,480417 | STUK
EU/1/12/788/003 | SEEBRI BREEZHALER INHALPDR 44MCG MET BREEZHALER | GLYCOPYRRONIUM-0.044-MG-INHALATIEPOEDER INCL INHALER | 0,988612 | STUK
EU/1/12/788/007 | SEEBRI BREEZHALER INHALPDR 44MCG MET BREEZHALER | GLYCOPYRRONIUM-0.044-MG-INHALATIEPOEDER INCL INHALER | 0,988612 | STUK
EU/1/12/790/003 | TOVANOR BREEZHALER INHALPDR 44MCG MET BREEZHALER | GLYCOPYRRONIUM-0.044-MG-INHALATIEPOEDER INCL INHALER | 1,003628 | STUK
EU/1/13/862/003 | ULTIBRO BREEZHALER INHALPDR 85/43MCG MET BREEZHAL | GLYCOPYRRONIUM-0.05-MG-INHALATIEPOEDER INCL INHALER-INDACATEROL-0.11-MG-INHALATIEPOEDER INCL INHALER | 1,329232 | STUK
EU/1/13/862/007 | ULTIBRO BREEZHALER INHALPDR 85/43MCG MET BREEZHAL | GLYCOPYRRONIUM-0.05-MG-INHALATIEPOEDER INCL INHALER-INDACATEROL-0.11-MG-INHALATIEPOEDER INCL INHALER | 1,329232 | STUK
EU/1/13/863/003 | XOTERNA BREEZHALER INHALPDR 85/43MCG MET BREEZHAL | GLYCOPYRRONIUM-0.05-MG-INHALATIEPOEDER INCL INHALER-INDACATEROL-0.11-MG-INHALATIEPOEDER INCL INHALER | 1,379956 | STUK
EU/1/16/1135/001 | SIALANAR DRANK 320MCG/ML | GLYCOPYRRONIUM-0.32-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 1,580723 | ML
EU/1/09/546/001 | SIMPONI INJVLST 100MG/ML PEN 0,5ML | GOLIMUMAB-50-MG-INJ.VLOEISTOF, WWSP | 911,552327 | STUK
EU/1/09/546/003 | SIMPONI INJVLST 100MG/ML WWSP 0,5ML | GOLIMUMAB-50-MG-INJ.VLOEISTOF, WWSP | 911,552327 | STUK
101759//18562 | ZOLADEX IMPLANTATIESTIFT 10,8MG IN WWSP | GOSERELIN-10.8-MG-IMPLANTATEN | 291,402130 | STUK
109209//18562 | ZOLADEX IMPLANTATIESTIFT 10,8MG IN WWSP | GOSERELIN-10.8-MG-IMPLANTATEN | 291,402130 | STUK
109855//18562 | ZOLADEX IMPLANTATIESTIFT 10,8MG IN WWSP | GOSERELIN-10.8-MG-IMPLANTATEN | 291,402130 | STUK
113949//18562 | ZOLADEX IMPLANTATIESTIFT 10,8MG IN WWSP | GOSERELIN-10.8-MG-IMPLANTATEN | 291,402130 | STUK
118796//18562 | ZOLADEX IMPLANTATIESTIFT 10,8MG IN WWSP | GOSERELIN-10.8-MG-IMPLANTATEN | 291,402130 | STUK
28358//18562 | ZOLADEX IMPLANTATIESTIFT 10,8MG IN WWSP | GOSERELIN-10.8-MG-IMPLANTATEN | 291,402130 | STUK
118937//18562 | ZOLADEX IMPLANTATIESTIFT 10,8MG IN WWSP SAFESYSTEM | GOSERELIN-10.8-MG-IMPLANTATEN | 291,402130 | STUK
118947//18562 | ZOLADEX IMPLANTATIESTIFT 10,8MG IN WWSP SAFESYSTEM | GOSERELIN-10.8-MG-IMPLANTATEN | 291,402130 | STUK
119236//18562 | ZOLADEX IMPLANTATIESTIFT 10,8MG IN WWSP SAFESYSTEM | GOSERELIN-10.8-MG-IMPLANTATEN | 291,402130 | STUK
119237//18562 | ZOLADEX IMPLANTATIESTIFT 10,8MG IN WWSP SAFESYSTEM | GOSERELIN-10.8-MG-IMPLANTATEN | 291,402130 | STUK
119656//18562 | ZOLADEX IMPLANTATIESTIFT 10,8MG IN WWSP SAFESYSTEM | GOSERELIN-10.8-MG-IMPLANTATEN | 291,402130 | STUK
120054//18562 | ZOLADEX IMPLANTATIESTIFT 10,8MG IN WWSP SAFESYSTEM | GOSERELIN-10.8-MG-IMPLANTATEN | 291,402130 | STUK
120086//18562 | ZOLADEX IMPLANTATIESTIFT 10,8MG IN WWSP SAFESYSTEM | GOSERELIN-10.8-MG-IMPLANTATEN | 291,402130 | STUK
120093//18562 | ZOLADEX IMPLANTATIESTIFT 10,8MG IN WWSP SAFESYSTEM | GOSERELIN-10.8-MG-IMPLANTATEN | 291,402130 | STUK
122006//18562 | ZOLADEX IMPLANTATIESTIFT 10,8MG IN WWSP SAFESYSTEM | GOSERELIN-10.8-MG-IMPLANTATEN | 291,402130 | STUK
125241//18562 | ZOLADEX IMPLANTATIESTIFT 10,8MG IN WWSP SAFESYSTEM | GOSERELIN-10.8-MG-IMPLANTATEN | 291,402130 | STUK
125936//18562 | ZOLADEX IMPLANTATIESTIFT 10,8MG IN WWSP SAFESYSTEM | GOSERELIN-10.8-MG-IMPLANTATEN | 291,402130 | STUK
18562 | ZOLADEX IMPLANTATIESTIFT 10,8MG IN WWSP SAFESYSTEM | GOSERELIN-10.8-MG-IMPLANTATEN | 291,402130 | STUK
101760//12277 | ZOLADEX IMPLANTATIESTIFT 3,6MG IN WWSP | GOSERELIN-3.6-MG-IMPLANTATEN | 98,695143 | STUK
109208//12277 | ZOLADEX IMPLANTATIESTIFT 3,6MG IN WWSP | GOSERELIN-3.6-MG-IMPLANTATEN | 98,695143 | STUK
120942//12277 | ZOLADEX IMPLANTATIESTIFT 3,6MG IN WWSP | GOSERELIN-3.6-MG-IMPLANTATEN | 98,695143 | STUK
28357//12277 | ZOLADEX IMPLANTATIESTIFT 3,6MG IN WWSP | GOSERELIN-3.6-MG-IMPLANTATEN | 98,695143 | STUK
119118//12277 | ZOLADEX IMPLANTATIESTIFT 3,6MG IN WWSP | GOSERELIN-3.6-MG-IMPLANTATEN | 98,750532 | STUK
120961//12277 | ZOLADEX IMPLANTATIESTIFT 3,6MG IN WWSP | GOSERELIN-3.6-MG-IMPLANTATEN | 98,750532 | STUK
119234//12277 | ZOLADEX IMPLANTATIESTIFT 3,6MG IN WWSP SAFESYSTEM | GOSERELIN-3.6-MG-IMPLANTATEN | 98,695143 | STUK
119235//12277 | ZOLADEX IMPLANTATIESTIFT 3,6MG IN WWSP SAFESYSTEM | GOSERELIN-3.6-MG-IMPLANTATEN | 98,695143 | STUK
122266//12277 | ZOLADEX IMPLANTATIESTIFT 3,6MG IN WWSP SAFESYSTEM | GOSERELIN-3.6-MG-IMPLANTATEN | 98,695143 | STUK
12277 | ZOLADEX IMPLANTATIESTIFT 3,6MG IN WWSP SAFESYSTEM | GOSERELIN-3.6-MG-IMPLANTATEN | 98,750532 | STUK
113483 | GRANISETRON CLARIS INJVLST 1MG/ML AMPUL 1ML | GRANISETRON-1-MG/ML-INJ.VLOEISTOF AMPUL | 3,380224 | ML
113483 | GRANISETRON CLARIS INJVLST 1MG/ML AMPUL 3ML | GRANISETRON-1-MG/ML-INJ.VLOEISTOF AMPUL | 3,380224 | ML
102042 | GRANISETRON FRES KABI INFVLST CONC 1MG/ML AMP 1ML | GRANISETRON-1-MG/ML-INJ.VLOEISTOF AMPUL | 3,380224 | ML
102042 | GRANISETRON FRES KABI INFVLST CONC 1MG/ML AMP 3ML | GRANISETRON-1-MG/ML-INJ.VLOEISTOF AMPUL | 3,380224 | ML
103103 | GRANISETRON HIKMA INFVLST CONC 1MG/ML AMPUL 3ML | GRANISETRON-1-MG/ML-INJ.VLOEISTOF AMPUL | 3,380224 | ML
34915 | GRANISETRON HIKMA INJVLST 1MG/ML AMPUL 1ML | GRANISETRON-1-MG/ML-INJ.VLOEISTOF AMPUL | 3,380224 | ML
16285 | KYTRIL TABLET 1MG | GRANISETRON-1-MG-TABLET | 4,958760 | STUK
19203 | KYTRIL TABLET 2MG | GRANISETRON-2-MG-TABLET | 11,573113 | STUK
EU/1/12/766/001 | SANCUSO PLEISTER TRANSDERMAAL 3,1MG/24UUR | GRANISETRON-3.1-MG/24H-PLEISTER, DERMAAL | 82,061104 | STUK
EU/1/15/1040/006 | INTUNIV TABLET MVA 3MG | GUANFACINE-3-MG-TABLET, MET GEREGULEERDE AFGIFTE | 2,938009 | STUK
EU/1/15/1040/008 | INTUNIV TABLET MVA 4MG | GUANFACINE-4-MG-TABLET, MET GEREGULEERDE AFGIFTE | 3,433023 | STUK
EU/1/17/1234/002 | TREMFYA INJVLST 100MG/ML PEN 1ML | GUSELKUMAB-100-MG-INJ.VLOEISTOF, WWSP | 2199,176039 | STUK
EU/1/17/1234/001 | TREMFYA INJVLST 100MG/ML WWSP 1ML | GUSELKUMAB-100-MG-INJ.VLOEISTOF, WWSP | 2199,176039 | STUK
119744//9323 | HALDOL DECANOAAT INJVLST 100MG/ML AMPUL 1ML | HALOPERIDOL-100-MG/ML-INJ.VLOEISTOF AMPUL | 7,463911 | ML
119756//9323 | HALDOL DECANOAAT INJVLST 100MG/ML AMPUL 1ML | HALOPERIDOL-100-MG/ML-INJ.VLOEISTOF AMPUL | 7,463911 | ML
121694//9323 | HALDOL DECANOAAT INJVLST 100MG/ML AMPUL 1ML | HALOPERIDOL-100-MG/ML-INJ.VLOEISTOF AMPUL | 7,463911 | ML
15531//9323 | HALDOL DECANOAAT INJVLST 100MG/ML AMPUL 1ML | HALOPERIDOL-100-MG/ML-INJ.VLOEISTOF AMPUL | 7,463911 | ML
33025//9323 | HALDOL DECANOAAT INJVLST 100MG/ML AMPUL 1ML | HALOPERIDOL-100-MG/ML-INJ.VLOEISTOF AMPUL | 8,977676 | ML
9323 | HALDOL DECANOAAT INJVLST 100MG/ML AMPUL 1ML | HALOPERIDOL-100-MG/ML-INJ.VLOEISTOF AMPUL | 9,975196 | ML
55776 | HALOPERIDOL CF TABLET 1MG | HALOPERIDOL-1-MG-TABLET | 0,041415 | STUK
24409=55776 | HALOPERIDOL SANDOZ TABLET 1MG | HALOPERIDOL-1-MG-TABLET | 0,041415 | STUK
56277 | HALOPERIDOL TEVA TABLET 1MG | HALOPERIDOL-1-MG-TABLET | 0,041415 | STUK
3186 | HALDOL DRANK 2MG/ML | HALOPERIDOL-2-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,118745 | ML
104434//8994 | HALDOL DECANOAAT INJVLST 50MG/ML AMPUL 1ML | HALOPERIDOL-50-MG/ML-INJ.VLOEISTOF AMPUL | 4,161085 | ML
11298//8994 | HALDOL DECANOAAT INJVLST 50MG/ML AMPUL 1ML | HALOPERIDOL-50-MG/ML-INJ.VLOEISTOF AMPUL | 4,632048 | ML
8994 | HALDOL DECANOAAT INJVLST 50MG/ML AMPUL 1ML | HALOPERIDOL-50-MG/ML-INJ.VLOEISTOF AMPUL | 4,632048 | ML
8994 | HALDOL DECANOAAT INJVLST 50MG/ML AMPUL 3ML | HALOPERIDOL-50-MG/ML-INJ.VLOEISTOF AMPUL | 4,632048 | ML
3185 | HALDOL INJVLST 5MG/ML AMPUL 1ML | HALOPERIDOL-5-MG/ML-INJ.VLOEISTOF AMPUL | 1,779313 | ML
55601 | HALOPERIDOL CF TABLET 5MG | HALOPERIDOL-5-MG-TABLET | 0,348594 | STUK
56278 | HALOPERIDOL TEVA TABLET 5MG | HALOPERIDOL-5-MG-TABLET | 0,348594 | STUK
1372 | HEPARINE LEO INJVLST 5.000IE/ML FLACON 5ML | HEPARIN-5000-IE/ML-INJECTIEVLOEISTOF, FLAC | 0,979148 | ML
24536 | MENOPUR INJPDR FLACON 75IE + SOLV 2ML + TOEBEH | HUMAN MENOPAUSAL GONADOTROPHIN-75-IE-POED. V. INJECTIE, FLACON | 21,804893 | STUK
117486 | MERIOFERT INJPDR FL 75IE + SOLV 1ML WWSP | HUMAN MENOPAUSAL GONADOTROPHIN-75-IE-POED. V. INJECTIE, FLACON | 21,804893 | STUK
106672 | SEVIKAR HCT TABLET FILMOMHULD 40/10/12,5MG | HYDROCHLOROTHIAZIDE-12.5-MG-TABLET-AMLODIPINE-10-MG-TABLET-OLMESARTAN-40-MG-TABLET | 0,595209 | STUK
EU/1/09/569/013 | EXFORGE HCT TABLET FILMOMHULD 10/160/12,5MG | HYDROCHLOROTHIAZIDE-12.5-MG-TABLET-AMLODIPINE-10-MG-TABLET-VALSARTAN-160-MG-TABLET | 0,622328 | STUK
EU/1/09/569/014 | EXFORGE HCT TABLET FILMOMHULD 10/160/12,5MG | HYDROCHLOROTHIAZIDE-12.5-MG-TABLET-AMLODIPINE-10-MG-TABLET-VALSARTAN-160-MG-TABLET | 0,945196 | STUK
106667 | SEVIKAR HCT TABLET FILMOMHULD 20/ 5/12,5MG | HYDROCHLOROTHIAZIDE-12.5-MG-TABLET-AMLODIPINE-5-MG-TABLET-OLMESARTAN-20-MG-TABLET | 0,541138 | STUK
106671 | SEVIKAR HCT TABLET FILMOMHULD 40/ 5/12,5MG | HYDROCHLOROTHIAZIDE-12.5-MG-TABLET-AMLODIPINE-5-MG-TABLET-OLMESARTAN-40-MG-TABLET | 0,541138 | STUK
EU/1/09/569/001 | EXFORGE HCT TABLET FILMOMHULD 5/160/12,5MG | HYDROCHLOROTHIAZIDE-12.5-MG-TABLET-AMLODIPINE-5-MG-TABLET-VALSARTAN-160-MG-TABLET | 0,907902 | STUK
EU/1/09/569/002 | EXFORGE HCT TABLET FILMOMHULD 5/160/12,5MG | HYDROCHLOROTHIAZIDE-12.5-MG-TABLET-AMLODIPINE-5-MG-TABLET-VALSARTAN-160-MG-TABLET | 0,907902 | STUK
24995 | ATACAND PLUS TABLET 16/12,5MG | HYDROCHLOROTHIAZIDE-12.5-MG-TABLET-CANDESARTAN-16-MG-TABLET | 0,239319 | STUK
102913 | CANDESARTAN CILEXETIL/HCT SANDOZ TABLET 16/12,5MG | HYDROCHLOROTHIAZIDE-12.5-MG-TABLET-CANDESARTAN-16-MG-TABLET | 0,239319 | STUK
108802 | CANDESARTAN CILEXETIL/HCT TEVA TABLET 16/12,5MG | HYDROCHLOROTHIAZIDE-12.5-MG-TABLET-CANDESARTAN-16-MG-TABLET | 0,239319 | STUK
108801 | CANDESARTAN CILEXETIL/HCT TEVA TABLET 8/12,5MG | HYDROCHLOROTHIAZIDE-12.5-MG-TABLET-CANDESARTAN-8-MG-TABLET | 0,266773 | STUK
120838//11825 | CORENITEC TABLET 20/12,5MG | HYDROCHLOROTHIAZIDE-12.5-MG-TABLET-ENALAPRIL-20-MG-TABLET | 0,291920 | STUK
11825 | CORENITEC TABLET 20/12,5MG | HYDROCHLOROTHIAZIDE-12.5-MG-TABLET-ENALAPRIL-20-MG-TABLET | 0,297545 | STUK
28614 | ENALAPRIL/HYDROCHLOORTHIAZIDE AUR TABL 20/12,5MG | HYDROCHLOROTHIAZIDE-12.5-MG-TABLET-ENALAPRIL-20-MG-TABLET | 0,297545 | STUK
26500 | ENALAPRIL/HYDROCHLOORTHIAZIDE RP TABLET 20/12,5MG | HYDROCHLOROTHIAZIDE-12.5-MG-TABLET-ENALAPRIL-20-MG-TABLET | 0,297545 | STUK
25728 | ENALAPRIL/HYDROCHLOORTHIAZIDE SANDOZ TAB 20/12,5MG | HYDROCHLOROTHIAZIDE-12.5-MG-TABLET-ENALAPRIL-20-MG-TABLET | 0,297545 | STUK
25926 | TEVETEN PLUS TABLET FILMOMHULD | HYDROCHLOROTHIAZIDE-12.5-MG-TABLET-EPROSARTAN-600-MG-TABLET | 0,465992 | STUK
EU/1/98/086/001 | COAPROVEL TABLET 150/12,5MG | HYDROCHLOROTHIAZIDE-12.5-MG-TABLET-IRBESARTAN-150-MG-TABLET | 0,304223 | STUK
EU/1/98/086/012 | COAPROVEL TABLET FILMOMHULD 150/12,5MG | HYDROCHLOROTHIAZIDE-12.5-MG-TABLET-IRBESARTAN-150-MG-TABLET | 0,304223 | STUK
EU/1/98/086/029 | COAPROVEL TABLET FILMOMHULD 150/12,5MG | HYDROCHLOROTHIAZIDE-12.5-MG-TABLET-IRBESARTAN-150-MG-TABLET | 0,304223 | STUK
EU/1/98/086/032 | COAPROVEL TABLET FILMOMHULD 150/12,5MG | HYDROCHLOROTHIAZIDE-12.5-MG-TABLET-IRBESARTAN-150-MG-TABLET | 0,304223 | STUK
109810 | IRBESARTAN/HCT AUROBINDO TABLET FILMOMH 150/12,5MG | HYDROCHLOROTHIAZIDE-12.5-MG-TABLET-IRBESARTAN-150-MG-TABLET | 0,304223 | STUK
109457 | IRBESARTAN/HCT MYLAN TABLET 150/12,5MG | HYDROCHLOROTHIAZIDE-12.5-MG-TABLET-IRBESARTAN-150-MG-TABLET | 0,304223 | STUK
103784 | IRBESARTAN/HCT SANDOZ TABLET FILMOMHULD 150/12,5MG | HYDROCHLOROTHIAZIDE-12.5-MG-TABLET-IRBESARTAN-150-MG-TABLET | 0,304223 | STUK
EU/1/09/583/017 | IRBESARTAN/HCT TEVA TABLET FILMOMHULD 150/12,5MG | HYDROCHLOROTHIAZIDE-12.5-MG-TABLET-IRBESARTAN-150-MG-TABLET | 0,304223 | STUK
EU/1/98/086/004 | COAPROVEL TABLET 300/12,5MG | HYDROCHLOROTHIAZIDE-12.5-MG-TABLET-IRBESARTAN-300-MG-TABLET | 0,278730 | STUK
EU/1/98/086/017 | COAPROVEL TABLET FILMOMHULD 300/12,5MG | HYDROCHLOROTHIAZIDE-12.5-MG-TABLET-IRBESARTAN-300-MG-TABLET | 0,278730 | STUK
EU/1/98/086/030 | COAPROVEL TABLET FILMOMHULD 300/12,5MG | HYDROCHLOROTHIAZIDE-12.5-MG-TABLET-IRBESARTAN-300-MG-TABLET | 0,278730 | STUK
EU/1/98/086/033 | COAPROVEL TABLET FILMOMHULD 300/12,5MG | HYDROCHLOROTHIAZIDE-12.5-MG-TABLET-IRBESARTAN-300-MG-TABLET | 0,278730 | STUK
113591 | CONVERIDE TABLET FILMOMHULD 300/12,5MG | HYDROCHLOROTHIAZIDE-12.5-MG-TABLET-IRBESARTAN-300-MG-TABLET | 0,278730 | STUK
109812 | IRBESARTAN/HCT AUROBINDO TABLET FILMOMH 300/12,5MG | HYDROCHLOROTHIAZIDE-12.5-MG-TABLET-IRBESARTAN-300-MG-TABLET | 0,278730 | STUK
109458 | IRBESARTAN/HCT MYLAN TABLET 300/12,5MG | HYDROCHLOROTHIAZIDE-12.5-MG-TABLET-IRBESARTAN-300-MG-TABLET | 0,278730 | STUK
107105 | IRBESARTAN/HCT SANDOZ TABLET FILMOMHULD 300/12,5MG | HYDROCHLOROTHIAZIDE-12.5-MG-TABLET-IRBESARTAN-300-MG-TABLET | 0,278730 | STUK
EU/1/09/583/041 | IRBESARTAN/HCT TEVA TABLET FILMOMHULD 300/12,5MG | HYDROCHLOROTHIAZIDE-12.5-MG-TABLET-IRBESARTAN-300-MG-TABLET | 0,278730 | STUK
27891 | LISINOPRIL/HYDROCHLOORTH AUROBINDO TABL 20/12,5MG | HYDROCHLOROTHIAZIDE-12.5-MG-TABLET-LISINOPRIL-20-MG-TABLET | 0,169725 | STUK
29994 | LISINOPRIL/HYDROCHLOORTH CF TABLET 20/12,5MG | HYDROCHLOROTHIAZIDE-12.5-MG-TABLET-LISINOPRIL-20-MG-TABLET | 0,161809 | STUK
28302 | LISINOPRIL/HYDROCHLOORTH DOUBLE-E TABL 20/12,5MG | HYDROCHLOROTHIAZIDE-12.5-MG-TABLET-LISINOPRIL-20-MG-TABLET | 0,160623 | STUK
30613 | LISINOPRIL/HYDROCHLOORTH MYLAN TABLET 20/12,5MG | HYDROCHLOROTHIAZIDE-12.5-MG-TABLET-LISINOPRIL-20-MG-TABLET | 0,169725 | STUK
29673 | LISINOPRIL/HYDROCHLOORTH SANDOZ TABLET 20/12,5MG | HYDROCHLOROTHIAZIDE-12.5-MG-TABLET-LISINOPRIL-20-MG-TABLET | 0,169725 | STUK
32433 | COZAAR PLUS TABLET OMHULD 100/12,5MG | HYDROCHLOROTHIAZIDE-12.5-MG-TABLET-LOSARTAN-100-MG-TABLET | 0,346362 | STUK
124848//19269 | HYZAAR TABLET 50/12,5MG | HYDROCHLOROTHIAZIDE-12.5-MG-TABLET-LOSARTAN-50-MG-TABLET | 0,236800 | STUK
125912//19269 | HYZAAR TABLET 50/12,5MG | HYDROCHLOROTHIAZIDE-12.5-MG-TABLET-LOSARTAN-50-MG-TABLET | 0,236800 | STUK
19269 | HYZAAR TABLET 50/12,5MG | HYDROCHLOROTHIAZIDE-12.5-MG-TABLET-LOSARTAN-50-MG-TABLET | 0,236800 | STUK
34061 | LOSARTAN KALIUM/HCT PCH TABLET FILMOMH 50/12,5MG | HYDROCHLOROTHIAZIDE-12.5-MG-TABLET-LOSARTAN-50-MG-TABLET | 0,236800 | STUK
117954 | OLMESARTANMEDOXOMIL/HCT AUROB TAB FILMOM 20/12,5MG | HYDROCHLOROTHIAZIDE-12.5-MG-TABLET-OLMESARTAN-20-MG-TABLET | 0,430510 | STUK
117439 | OLMESARTANMEDOXOMIL/HCT TEVA TAB FILMOM 20/12,5MG | HYDROCHLOROTHIAZIDE-12.5-MG-TABLET-OLMESARTAN-20-MG-TABLET | 0,430510 | STUK
32740 | OLMETEC HCTZ TABLET FILMOMHULD 20/12,5MG | HYDROCHLOROTHIAZIDE-12.5-MG-TABLET-OLMESARTAN-20-MG-TABLET | 0,430510 | STUK
117957 | OLMESARTANMEDOXOMIL/HCT AUROB TAB FILMOM 40/12,5MG | HYDROCHLOROTHIAZIDE-12.5-MG-TABLET-OLMESARTAN-40-MG-TABLET | 0,498994 | STUK
117444 | OLMESARTANMEDOXOMIL/HCT TEVA TAB FILMOM 40/12,5MG | HYDROCHLOROTHIAZIDE-12.5-MG-TABLET-OLMESARTAN-40-MG-TABLET | 0,498994 | STUK
104240 | OLMETEC HCTZ TABLET FILMOMHULD 40/12,5MG | HYDROCHLOROTHIAZIDE-12.5-MG-TABLET-OLMESARTAN-40-MG-TABLET | 0,498994 | STUK
30391 | QUINAPRIL/HYDROCHLOORTHIAZIDE AUR TABL 20/12,5MG | HYDROCHLOROTHIAZIDE-12.5-MG-TABLET-QUINAPRIL-20-MG-TABLET | 0,143069 | STUK
31412 | QUINAPRIL/HYDROCHLOORTHIAZIDE CF TABLET 20/12,5MG | HYDROCHLOROTHIAZIDE-12.5-MG-TABLET-QUINAPRIL-20-MG-TABLET | 0,143069 | STUK
EU/1/02/213/002 | MICARDISPLUS TABLET 40/12,5MG | HYDROCHLOROTHIAZIDE-12.5-MG-TABLET-TELMISARTAN-40-MG-TABLET | 0,357245 | STUK
111952 | TELMISARTAN/HCT SANDOZ TABLET OMHULD 40/12,5MG | HYDROCHLOROTHIAZIDE-12.5-MG-TABLET-TELMISARTAN-40-MG-TABLET | 0,357245 | STUK
EU/1/02/213/006 | MICARDISPLUS TABLET 80/12,5MG | HYDROCHLOROTHIAZIDE-12.5-MG-TABLET-TELMISARTAN-80-MG-TABLET | 0,425793 | STUK
EU/1/02/213/007 | MICARDISPLUS TABLET 80/12,5MG | HYDROCHLOROTHIAZIDE-12.5-MG-TABLET-TELMISARTAN-80-MG-TABLET | 0,437846 | STUK
111955 | TELMISARTAN/HCT SANDOZ TABLET OMHULD 80/12,5MG | HYDROCHLOROTHIAZIDE-12.5-MG-TABLET-TELMISARTAN-80-MG-TABLET | 0,437846 | STUK
29491 | CODIOVAN TABLET OMHULD 160/12,5MG | HYDROCHLOROTHIAZIDE-12.5-MG-TABLET-VALSARTAN-160-MG-TABLET | 0,350944 | STUK
102397 | VALSARTAN/HCT PCH TABL FILMOMHULD 160MG/12,5MG | HYDROCHLOROTHIAZIDE-12.5-MG-TABLET-VALSARTAN-160-MG-TABLET | 0,350944 | STUK
125580//22365 | CODIOVAN TABLET OMHULD 80/12,5MG | HYDROCHLOROTHIAZIDE-12.5-MG-TABLET-VALSARTAN-80-MG-TABLET | 0,344865 | STUK
125777//22365 | CODIOVAN TABLET OMHULD 80/12,5MG | HYDROCHLOROTHIAZIDE-12.5-MG-TABLET-VALSARTAN-80-MG-TABLET | 0,344865 | STUK
22365 | CODIOVAN TABLET OMHULD 80/12,5MG | HYDROCHLOROTHIAZIDE-12.5-MG-TABLET-VALSARTAN-80-MG-TABLET | 0,344865 | STUK
102399 | VALSARTAN/HCT PCH TABL FILMOMHULD 80MG/12,5MG | HYDROCHLOROTHIAZIDE-12.5-MG-TABLET-VALSARTAN-80-MG-TABLET | 0,344865 | STUK
9640 | HYDROCHLOORTHIAZIDE TEVA TABLET 25MG | HYDROCHLOROTHIAZIDE-25-MG-TABLET | 0,055451 | STUK
11803 | AMILORIDE HCL/HYDROCHLOORTHIAZIDE TEV TAB 2,5/25MG | HYDROCHLOROTHIAZIDE-25-MG-TABLET-AMILORIDE-2.5-MG-TABLET | 0,243839 | STUK
106674 | SEVIKAR HCT TABLET FILMOMHULD 40/10/25MG | HYDROCHLOROTHIAZIDE-25-MG-TABLET-AMLODIPINE-10-MG-TABLET-OLMESARTAN-40-MG-TABLET | 0,595209 | STUK
EU/1/09/569/037 | EXFORGE HCT TABLET FILMOMHULD 10/160/25MG | HYDROCHLOROTHIAZIDE-25-MG-TABLET-AMLODIPINE-10-MG-TABLET-VALSARTAN-160-MG-TABLET | 0,941832 | STUK
EU/1/09/569/038 | EXFORGE HCT TABLET FILMOMHULD 10/160/25MG | HYDROCHLOROTHIAZIDE-25-MG-TABLET-AMLODIPINE-10-MG-TABLET-VALSARTAN-160-MG-TABLET | 0,941832 | STUK
EU/1/09/569/050 | EXFORGE HCT TABLET FILMOMHULD 10/320/25MG | HYDROCHLOROTHIAZIDE-25-MG-TABLET-AMLODIPINE-10-MG-TABLET-VALSARTAN-320-MG-TABLET | 1,011180 | STUK
106673 | SEVIKAR HCT TABLET FILMOMHULD 40/ 5/25MG | HYDROCHLOROTHIAZIDE-25-MG-TABLET-AMLODIPINE-5-MG-TABLET-OLMESARTAN-40-MG-TABLET | 0,541138 | STUK
EU/1/09/569/026 | EXFORGE HCT TABLET FILMOMHULD 5/160/25MG | HYDROCHLOROTHIAZIDE-25-MG-TABLET-AMLODIPINE-5-MG-TABLET-VALSARTAN-160-MG-TABLET | 0,909602 | STUK
EU/1/98/086/024 | COAPROVEL TABLET FILMOMHULD 300/25MG | HYDROCHLOROTHIAZIDE-25-MG-TABLET-IRBESARTAN-300-MG-TABLET | 0,295434 | STUK
EU/1/98/086/031 | COAPROVEL TABLET FILMOMHULD 300/25MG | HYDROCHLOROTHIAZIDE-25-MG-TABLET-IRBESARTAN-300-MG-TABLET | 0,295434 | STUK
EU/1/98/086/034 | COAPROVEL TABLET FILMOMHULD 300/25MG | HYDROCHLOROTHIAZIDE-25-MG-TABLET-IRBESARTAN-300-MG-TABLET | 0,295434 | STUK
113592 | CONVERIDE TABLET FILMOMHULD 300/25MG | HYDROCHLOROTHIAZIDE-25-MG-TABLET-IRBESARTAN-300-MG-TABLET | 0,279928 | STUK
109813 | IRBESARTAN/HCT AUROBINDO TABLET FILMOMH 300/25MG | HYDROCHLOROTHIAZIDE-25-MG-TABLET-IRBESARTAN-300-MG-TABLET | 0,295434 | STUK
109459 | IRBESARTAN/HCT MYLAN TABLET 300/25MG | HYDROCHLOROTHIAZIDE-25-MG-TABLET-IRBESARTAN-300-MG-TABLET | 0,295434 | STUK
103788 | IRBESARTAN/HCT SANDOZ TABLET FILMOMHULD 300/25MG | HYDROCHLOROTHIAZIDE-25-MG-TABLET-IRBESARTAN-300-MG-TABLET | 0,295434 | STUK
EU/1/09/583/065 | IRBESARTAN/HCT TEVA TABLET FILMOMHULD 300/25MG | HYDROCHLOROTHIAZIDE-25-MG-TABLET-IRBESARTAN-300-MG-TABLET | 0,295434 | STUK
23597 | FORTZAAR TABLET OMHULD 100/25MG | HYDROCHLOROTHIAZIDE-25-MG-TABLET-LOSARTAN-100-MG-TABLET | 0,311948 | STUK
117956 | OLMESARTANMEDOXOMIL/HCT AUROB TAB FILMOM 20/25MG | HYDROCHLOROTHIAZIDE-25-MG-TABLET-OLMESARTAN-20-MG-TABLET | 0,431645 | STUK
117443 | OLMESARTANMEDOXOMIL/HCT TEVA TAB FILMOM 20/25MG | HYDROCHLOROTHIAZIDE-25-MG-TABLET-OLMESARTAN-20-MG-TABLET | 0,431645 | STUK
32741 | OLMETEC HCTZ TABLET FILMOMHULD 20/25MG | HYDROCHLOROTHIAZIDE-25-MG-TABLET-OLMESARTAN-20-MG-TABLET | 0,431645 | STUK
117958 | OLMESARTANMEDOXOMIL/HCT AUROB TAB FILMOM 40/25MG | HYDROCHLOROTHIAZIDE-25-MG-TABLET-OLMESARTAN-40-MG-TABLET | 0,357307 | STUK
117445 | OLMESARTANMEDOXOMIL/HCT TEVA TAB FILMOM 40/25MG | HYDROCHLOROTHIAZIDE-25-MG-TABLET-OLMESARTAN-40-MG-TABLET | 0,357307 | STUK
104241 | OLMETEC HCTZ TABLET FILMOMHULD 40/25MG | HYDROCHLOROTHIAZIDE-25-MG-TABLET-OLMESARTAN-40-MG-TABLET | 0,334547 | STUK
EU/1/02/213/018 | MICARDISPLUS TABLET 80/25MG | HYDROCHLOROTHIAZIDE-25-MG-TABLET-TELMISARTAN-80-MG-TABLET | 0,453981 | STUK
111956 | TELMISARTAN/HCT SANDOZ TABLET OMHULD 80/25MG | HYDROCHLOROTHIAZIDE-25-MG-TABLET-TELMISARTAN-80-MG-TABLET | 0,453981 | STUK
112013 | TELMISARTAN/HCT TEVA TABLET 80/25MG | HYDROCHLOROTHIAZIDE-25-MG-TABLET-TELMISARTAN-80-MG-TABLET | 0,453981 | STUK
125582//31122 | CODIOVAN TABLET OMHULD 160/25MG | HYDROCHLOROTHIAZIDE-25-MG-TABLET-VALSARTAN-160-MG-TABLET | 0,448962 | STUK
125779//31122 | CODIOVAN TABLET OMHULD 160/25MG | HYDROCHLOROTHIAZIDE-25-MG-TABLET-VALSARTAN-160-MG-TABLET | 0,448962 | STUK
31122 | CODIOVAN TABLET OMHULD 160/25MG | HYDROCHLOROTHIAZIDE-25-MG-TABLET-VALSARTAN-160-MG-TABLET | 0,448962 | STUK
102398 | VALSARTAN/HCT PCH TABL FILMOMHULD 160MG/25MG | HYDROCHLOROTHIAZIDE-25-MG-TABLET-VALSARTAN-160-MG-TABLET | 0,448962 | STUK
57555 | AMILORIDE HCL/HYDROCHLOORTHIAZIDE ACCORD TB 5/50MG | HYDROCHLOROTHIAZIDE-50-MG-TABLET-AMILORIDE-5-MG-TABLET | 0,080775 | STUK
11802 | AMILORIDE HCL/HYDROCHLOORTHIAZIDE PCH TABL 5/50MG | HYDROCHLOROTHIAZIDE-50-MG-TABLET-AMILORIDE-5-MG-TABLET | 0,080775 | STUK
57528 | AMILORIDE HCL/HYDROCHLOORTHIAZIDE SDZ TABL 5/50MG | HYDROCHLOROTHIAZIDE-50-MG-TABLET-AMILORIDE-5-MG-TABLET | 0,080775 | STUK
11802 | AMILORIDE HCL/HYDROCHLOORTHIAZIDE TEVA TABL 5/50MG | HYDROCHLOROTHIAZIDE-50-MG-TABLET-AMILORIDE-5-MG-TABLET | 0,080775 | STUK
608 | SOLU CORTEF INJECTIEPOEDER FLACON 100MG | HYDROCORTISONE-100-MG-POED. V. INJECTIE, FLACON | 2,161837 | STUK
14871 | SOLU CORTEF INJPDR 100MG + 2ML SOLV IN ACT O VIAL | HYDROCORTISONE-100-MG-POED. V. INJECTIE, FLACON | 2,161837 | STUK
33923 | HYDROCORTISON-VASELINECREME DMB 1% FNA CR 10MG/G | HYDROCORTISONE-10-MG/G-CREME, CUTAAN | 0,194498 | G
7342 | DAKTACORT CREME | HYDROCORTISONE-10-MG/G-CREME, CUTAAN-MICONAZOLE-20-MG/G-CREME, CUTAAN | 0,132755 | G
23868=15469 | MICONAZOLNITRAAT/HYDROC AUR HYDROF CREME 20/10MG/G | HYDROCORTISONE-10-MG/G-CREME, CUTAAN-MICONAZOLE-20-MG/G-CREME, CUTAAN | 0,132755 | G
20410 | MICONAZOLNITRAAT/HYDROC RP HYDROF CREME 20/10MG/G | HYDROCORTISONE-10-MG/G-CREME, CUTAAN-MICONAZOLE-20-MG/G-CREME, CUTAAN | 0,132755 | G
22847=15469 | MICONAZOLNITRAAT/HYDROC SANDOZ CREME 20/10MG/G | HYDROCORTISONE-10-MG/G-CREME, CUTAAN-MICONAZOLE-20-MG/G-CREME, CUTAAN | 0,132755 | G
15469 | MICONAZOLNITRAAT/HYDROC TEV HYDROF CREME 20/10MG/G | HYDROCORTISONE-10-MG/G-CREME, CUTAAN-MICONAZOLE-20-MG/G-CREME, CUTAAN | 0,132755 | G
5911 | LOCOID CREME 1MG/G | HYDROCORTISONE-1-MG/G-CREME, CUTAAN | 0,110662 | G
15680//5911 | LOCOID HYDROFIELE CREME 0,1% | HYDROCORTISONE-1-MG/G-CREME, CUTAAN | 0,110662 | G
23502//9344 | LOCOID VETCREME 1MG/G | HYDROCORTISONE-1-MG/G-CREME, CUTAAN | 0,110662 | G
9344 | LOCOID VETCREME 1MG/G | HYDROCORTISONE-1-MG/G-CREME, CUTAAN | 0,110662 | G
113647//5910 | LOCOID SCALP LOTION 1MG/ML | HYDROCORTISONE-1-MG/ML-APPLICATIEVLOEISTOF, VOOR CUTAAN GEBRUIK | 0,083409 | ML
113530//5910 | LOCOID SCALP LOTION 1MG/ML | HYDROCORTISONE-1-MG/ML-APPLICATIEVLOEISTOF, VOOR CUTAAN GEBRUIK | 0,101012 | ML
5910 | LOCOID SCALP LOTION 1MG/ML | HYDROCORTISONE-1-MG/ML-APPLICATIEVLOEISTOF, VOOR CUTAAN GEBRUIK | 0,101012 | ML
113408//16163 | LOCOID CRELO HUIDEMULSIE 1MG/G | HYDROCORTISONE-1-MG/ML-SMEERSEL/EMULSIE, ALS DERMATICUM | 0,092041 | G
16163 | LOCOID CRELO HUIDEMULSIE 1MG/G | HYDROCORTISONE-1-MG/ML-SMEERSEL/EMULSIE, ALS DERMATICUM | 0,092041 | G
50730 | HYDROCORTISON TIOFARMA TABLET 20MG | HYDROCORTISONE-20-MG-TABLET | 0,914492 | STUK
EU/1/11/715/002 | PLENADREN TABLET MGA 20MG | HYDROCORTISONE-20-MG-TABLET, MET GEREGULEERDE AFGIFTE | 10,903952 | STUK
116462 | SOFTACOR OOGDRUPPELS 3,35MG/ML MINIM 0,4ML | HYDROCORTISONE-3.35-MG/ML-OOGDRUPPELS UNITDOSE | 0,851309 | ML
104836 | PALLADON INJVLST 10MG/ML AMPUL 1ML | HYDROMORPHONE-10-MG/ML-INJ.VLOEISTOF AMPUL | 12,317188 | ML
123006//22164 | PALLADON SR CAPSULE MGA 16MG | HYDROMORPHONE-16-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 2,430366 | STUK
22164 | PALLADON SR CAPSULE MGA 16MG | HYDROMORPHONE-16-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 2,430366 | STUK
123008//22165 | PALLADON SR CAPSULE MGA 24MG | HYDROMORPHONE-24-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 3,521346 | STUK
22165 | PALLADON SR CAPSULE MGA 24MG | HYDROMORPHONE-24-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 3,521346 | STUK
123004//22162 | PALLADON SR CAPSULE MGA 4MG | HYDROMORPHONE-4-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,677545 | STUK
22162 | PALLADON SR CAPSULE MGA 4MG | HYDROMORPHONE-4-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,677545 | STUK
123005//22163 | PALLADON SR CAPSULE MGA 8MG | HYDROMORPHONE-8-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 1,292278 | STUK
22163 | PALLADON SR CAPSULE MGA 8MG | HYDROMORPHONE-8-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 1,292278 | STUK
EU/1/07/397/001 | SIKLOS TABLET FILMOMHULD 1000MG | HYDROXYCARBAMIDE-1000-MG-TABLET | 16,996606 | STUK
EU/1/07/397/002 | SIKLOS TABLET FILMOMHULD 100MG | HYDROXYCARBAMIDE-100-MG-TABLET | 1,553909 | STUK
118003//25876 | HYDREA CAPSULE 500MG | HYDROXYCARBAMIDE-500-MG-CAPSULE | 0,338789 | STUK
119922//25876 | HYDREA CAPSULE 500MG | HYDROXYCARBAMIDE-500-MG-CAPSULE | 0,338789 | STUK
124099//25876 | HYDREA CAPSULE 500MG | HYDROXYCARBAMIDE-500-MG-CAPSULE | 0,338789 | STUK
35100//25876 | HYDREA CAPSULE 500MG | HYDROXYCARBAMIDE-500-MG-CAPSULE | 0,338789 | STUK
125568//25876 | HYDROXYUREA EURECO-PHARMA CAPSULE 500MG | HYDROXYCARBAMIDE-500-MG-CAPSULE | 0,338789 | STUK
25876 | HYDROXYUREA MEDAC CAPSULE 500MG | HYDROXYCARBAMIDE-500-MG-CAPSULE | 0,338789 | STUK
50109 | HYDROXYZINI HCL TABLET OMHULD 10MG | HYDROXYZINE-10-MG-TABLET | 0,052323 | STUK
50110 | HYDROXYZINI HCL TABLET OMHULD 25MG | HYDROXYZINE-25-MG-TABLET | 0,082691 | STUK
19924 | MONOFREE HYPROMELLOSE OOGDR 3MG/ML MINIM 0,4ML | HYPROMELLOSE-3-MG/ML-OOGDRUPPELS UNITDOSE | 0,829417 | ML
EU/1/03/265/003 | BONVIVA TABLET FILMOMHULD 150MG | IBANDRONATE-150-MG-TABLET | 15,801249 | STUK
EU/1/03/265/004 | BONVIVA TABLET FILMOMHULD 150MG | IBANDRONATE-150-MG-TABLET | 15,801249 | STUK
EU/1/03/265/005 | BONVIVA INJVLST 1MG/ML WWSP 3ML | IBANDRONATE-1-MG/ML-INJ.VLOEISTOF, WWSP | 21,853567 | ML
EU/1/12/798/005 | IBANDRONIC ACID ACCORD INJVLST 1MG/ML WWSP 3ML | IBANDRONATE-1-MG/ML-INJ.VLOEISTOF, WWSP | 23,024617 | ML
EU/1/96/012/009 | BONDRONAT TABLET FILMOMHULD 50MG | IBANDRONATE-50-MG-TABLET | 6,359874 | STUK
EU/1/14/945/001 | IMBRUVICA CAPSULE 140MG | IBRUTINIB-140-MG-CAPSULE | 58,691099 | STUK
EU/1/14/945/002 | IMBRUVICA CAPSULE 140MG | IBRUTINIB-140-MG-CAPSULE | 58,691099 | STUK
EU/1/14/945/007 | IMBRUVICA TABLET FILMOMHULD 140MG | IBRUTINIB-140-MG-TABLET | 61,090873 | STUK
EU/1/14/945/008 | IMBRUVICA TABLET FILMOMHULD 140MG | IBRUTINIB-140-MG-TABLET | 61,090873 | STUK
EU/1/14/945/009 | IMBRUVICA TABLET FILMOMHULD 280MG | IBRUTINIB-280-MG-TABLET | 121,910903 | STUK
EU/1/14/945/010 | IMBRUVICA TABLET FILMOMHULD 280MG | IBRUTINIB-280-MG-TABLET | 121,910903 | STUK
EU/1/14/945/005 | IMBRUVICA TABLET FILMOMHULD 420MG | IBRUTINIB-420-MG-TABLET | 182,730943 | STUK
EU/1/14/945/011 | IMBRUVICA TABLET FILMOMHULD 420MG | IBRUTINIB-420-MG-TABLET | 182,730943 | STUK
EU/1/14/945/006 | IMBRUVICA TABLET FILMOMHULD 560MG | IBRUTINIB-560-MG-TABLET | 243,550973 | STUK
EU/1/14/945/012 | IMBRUVICA TABLET FILMOMHULD 560MG | IBRUTINIB-560-MG-TABLET | 243,550973 | STUK
EU/1/04/284/001 | PEDEA INJVLST 5MG/ML AMPUL 2ML | IBUPROFEN-5-MG/ML-INJ.VLOEISTOF AMPUL | 56,202958 | ML
13331 | BRUFEN BRUIS 600MG BRUISGRANULAAT IN SACHET | IBUPROFEN-600-MG-BRUISPOEDER/BRUISGRANULAAT | 0,337587 | STUK
101715 | IBUPROFEN TEVA BRUISGRANULAAT 600MG IN SACHET | IBUPROFEN-600-MG-BRUISPOEDER/BRUISGRANULAAT | 0,337587 | STUK
10895 | IBUPROFEN PCH TABLET 600MG | IBUPROFEN-600-MG-TABLET | 0,075340 | STUK
18545 | IBUPROFENUM TABLET 600MG | IBUPROFEN-600-MG-TABLET | 0,059586 | STUK
13478 | BRUFEN RETARD TABLET MGA 800MG | IBUPROFEN-800-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,148555 | STUK
105232 | IDARUBICINE HCL SANDOZ INFVLST CONC 1MG/ML FL 5ML | IDARUBICIN-1-MG/ML-INFUUSVLOEISTOF, FLACON | 13,322733 | ML
105232 | IDARUBICINE HCL SANDOZ INFVLST CONC 1MG/ML FL 10ML | IDARUBICIN-1-MG/ML-INFUUSVLOEISTOF, FLACON | 13,322733 | ML
105232 | IDARUBICINE HCL SANDOZ INFVLST CONC 1MG/ML FL 20ML | IDARUBICIN-1-MG/ML-INFUUSVLOEISTOF, FLACON | 13,322733 | ML
EU/1/15/1056/001 | PRAXBIND INFVLST 50MG/ML FLACON 50ML | IDARUCIZUMAB-2500-MG-INJECTIEVLOEISTOF, FLAC | 1336,290518 | STUK
EU/1/06/365/001 | ELAPRASE INFVLST CONC 2MG/ML FLACON 3ML | IDURSULFASE-2-MG/ML-INFUUSVLOEISTOF, FLACON | 798,060905 | ML
7622 | HOLOXAN INJECTIEPOEDER FLACON 1000MG | IFOSFAMIDE-1000-MG-POED. V. INFUSIE,FLACON | 70,997855 | STUK
7622 | HOLOXAN INJECTIEPOEDER FLACON 2000MG | IFOSFAMIDE-2000-MG-POED. V. INFUSIE,FLACON | 186,728627 | STUK
EU/1/03/255/004 | VENTAVIS VERNEVELOPLOSSING 10MCG/ML AMPUL 1ML | ILOPROST-.01-MG/ML-INHALATIEVLOEISTOF UNITDOSE | 13,975450 | ML
EU/1/03/255/005 | VENTAVIS VERNEVELOPLOSSING 10MCG/ML AMPUL 1ML | ILOPROST-.01-MG/ML-INHALATIEVLOEISTOF UNITDOSE | 13,975450 | ML
EU/1/01/198/005 | GLIVEC CAPSULE 100MG | IMATINIB-100-MG-CAPSULE | 12,142421 | STUK
EU/1/01/198/008 | GLIVEC TABLET FILMOMHULD 100MG | IMATINIB-100-MG-TABLET | 12,565277 | STUK
EU/1/01/198/011 | GLIVEC TABLET FILMOMHULD 100MG | IMATINIB-100-MG-TABLET | 12,565277 | STUK
118822 | IMATINIB AMAROX TABLET FILMOMHULD 100MG | IMATINIB-100-MG-TABLET | 8,914181 | STUK
111120 | IMATINIB MYLAN TABLET FILMOMHULD 100MG | IMATINIB-100-MG-TABLET | 8,914181 | STUK
116272 | IMATINIB SANDOZ TABLET FILMOMHULD 100MG | IMATINIB-100-MG-TABLET | 8,962138 | STUK
EU/1/12/808/009 | IMATINIB TEVA TABLET FILMOMHULD 100MG | IMATINIB-100-MG-TABLET | 9,647939 | STUK
EU/1/01/198/010 | GLIVEC TABLET FILMOMHULD 400MG | IMATINIB-400-MG-TABLET | 43,995324 | STUK
EU/1/13/845/020 | IMATINIB ACCORD TABLET FILMOMHULD 400MG | IMATINIB-400-MG-TABLET | 34,679754 | STUK
118823 | IMATINIB AMAROX TABLET FILMOMHULD 400MG | IMATINIB-400-MG-TABLET | 34,679754 | STUK
118761 | IMATINIB AUROBINDO TABLET FILMOMHULD 400MG | IMATINIB-400-MG-TABLET | 37,122679 | STUK
116275 | IMATINIB SANDOZ TABLET FILMOMHULD 400MG | IMATINIB-400-MG-TABLET | 34,679754 | STUK
EU/1/12/808/018 | IMATINIB TEVA TABLET FILMOMHULD 400MG | IMATINIB-400-MG-TABLET | 34,679754 | STUK
EU/1/97/053/003 | CEREZYME INFUSIEPOEDER FLACON 400E | IMIGLUCERASE-400-IE-POED. V. INFUSIE,FLACON | 1324,108881 | STUK
50116 | IMIPRAMINE HCL CF DRAGEE 25MG | IMIPRAMINE-25-MG-TABLET | 0,117980 | STUK
EU/1/12/783/002 | ZYCLARA CREME 37,5MG/G IN SACHET | IMIQUIMOD-37.5-MG/G-CREME, CUTAAN | 12,316733 | G
EU/1/98/080/001 | ALDARA CREME 50MG/G IN SACHET | IMIQUIMOD-50-MG/G-CREME, CUTAAN | 18,519147 | G
EU/1/09/594/002 | HIROBRIZ BREEZHALER INHALPDR 150MCG MET BREEZHALER | INDACATEROL-0.15-MG-INHALATIEPOEDER INCL INHALER | 1,032019 | STUK
EU/1/09/593/001 | ONBREZ BREEZHALER INHALPDR 150MCG MET BREEZHALER | INDACATEROL-0.15-MG-INHALATIEPOEDER INCL INHALER | 1,032019 | STUK
EU/1/09/593/002 | ONBREZ BREEZHALER INHALPDR 150MCG MET BREEZHALER | INDACATEROL-0.15-MG-INHALATIEPOEDER INCL INHALER | 1,032019 | STUK
EU/1/09/594/007 | HIROBRIZ BREEZHALER INHALPDR 300MCG MET BREEZHALER | INDACATEROL-0.3-MG-INHALATIEPOEDER INCL INHALER | 1,079859 | STUK
EU/1/09/593/007 | ONBREZ BREEZHALER INHALPDR 300MCG MET BREEZHALER | INDACATEROL-0.3-MG-INHALATIEPOEDER INCL INHALER | 1,079859 | STUK
EU/1/09/593/006 | ONBREZ BREEZHALER INHALPDR 300MCG MET BREEZHALER | INDACATEROL-0.3-MG-INHALATIEPOEDER INCL INHALER | 1,079859 | STUK
110390//33663 | COVERSYL PLUS ARG TABLET FILMOMHULD 5/1,25MG | INDAPAMIDE-1.25-MG-TABLET-PERINDOPRIL-5-MG-TABLET | 0,307499 | STUK
33663 | COVERSYL PLUS ARG TABLET FILMOMHULD 5/1,25MG | INDAPAMIDE-1.25-MG-TABLET-PERINDOPRIL-5-MG-TABLET | 0,307499 | STUK
110898 | PERINDOPRIL TOSILAAT/INDAPAMIDE TEVA TABL 5/1,25MG | INDAPAMIDE-1.25-MG-TABLET-PERINDOPRIL-5-MG-TABLET | 0,307499 | STUK
57417 | INDAPAMIDE CF TABLET OMHULD 2,5MG | INDAPAMIDE-2.5-MG-TABLET | 0,170835 | STUK
102257 | COVERSYL PLUS ARG TABLET FILMOMHULD 10/2,5MG | INDAPAMIDE-2.5-MG-TABLET-PERINDOPRIL-10-MG-TABLET | 0,320016 | STUK
110790//102257 | COVERSYL PLUS ARG TABLET FILMOMHULD 10/2,5MG | INDAPAMIDE-2.5-MG-TABLET-PERINDOPRIL-10-MG-TABLET | 0,320016 | STUK
121478//102268 | PERINDOPRIL ARG/INDAPAMIDE MEDCOR TABL FO 10/2,5MG | INDAPAMIDE-2.5-MG-TABLET-PERINDOPRIL-10-MG-TABLET | 0,245577 | STUK
55712 | INDOMETACINE CF ZETPIL 100MG | INDOMETACIN-100-MG-ZETPIL | 0,973677 | STUK
16363 | INDOCOLLYRE OOGDRUPPELS 1MG/ML FLACON 5ML | INDOMETACIN-1-MG/ML-OOGDRUPPELS | 0,630050 | ML
21813 | INDOMETACINE AUROBINDO CAPSULE 25MG | INDOMETACIN-25-MG-CAPSULE | 0,079703 | STUK
55652 | INDOMETACINE CF CAPSULE 25MG | INDOMETACIN-25-MG-CAPSULE | 0,079703 | STUK
EU/1/16/1106/001 | FLIXABI INFPDR FLACON 100MG | INFLIXIMAB-100-MG-POED. V. INFUSIE,FLACON | 392,186106 | STUK
EU/1/13/854/001 | INFLECTRA INFUSIEPOEDER FLACON 100MG | INFLIXIMAB-100-MG-POED. V. INFUSIE,FLACON | 392,186106 | STUK
EU/1/13/854/003 | INFLECTRA INFUSIEPOEDER FLACON 100MG | INFLIXIMAB-100-MG-POED. V. INFUSIE,FLACON | 392,186106 | STUK
EU/1/99/116/001 | REMICADE INFUSIEPOEDER FLACON 100MG | INFLIXIMAB-100-MG-POED. V. INFUSIE,FLACON | 392,186106 | STUK
EU/1/99/116/003 | REMICADE INFUSIEPOEDER FLACON 100MG | INFLIXIMAB-100-MG-POED. V. INFUSIE,FLACON | 392,186106 | STUK
EU/1/13/853/001 | REMSIMA INFUSIEPOEDER FLACON 100MG | INFLIXIMAB-100-MG-POED. V. INFUSIE,FLACON | 392,186106 | STUK
EU/1/18/1280/001 | ZESSLY INFPDR FLACON 100MG | INFLIXIMAB-100-MG-POED. V. INFUSIE,FLACON | 392,186106 | STUK
EU/1/12/807/007 | TRESIBA PENFILL INJVLST 100E/ML PATROON 3ML | INSULIN DEGLUDEC-100-IE/ML-INJ.VLOEISTOF PATR | 3,249867 | ML
EU/1/12/807/004 | TRESIBA FLEXTOUCH INJVLST 100E/ML PEN 3ML | INSULIN DEGLUDEC-100-IE/ML-INJ.VLOEISTOF WWSP | 3,902359 | ML
EU/1/12/807/013 | TRESIBA FLEXTOUCH INJVLST 200E/ML PEN 3ML | INSULIN DEGLUDEC-200-IE/ML-INJ.VLOEISTOF WWSP | 6,485121 | ML
EU/1/12/807/016 | TRESIBA FLEXTOUCH INJVLST 200E/ML PEN 3ML | INSULIN DEGLUDEC-200-IE/ML-INJ.VLOEISTOF WWSP | 6,485121 | ML
EU/1/99/119/001 | NOVORAPID INJVLST 100E/ML FLACON 10ML | INSULINS, ASPART-100-IE/ML-INJ.VLOEISTOF FLACON | 1,732836 | ML
EU/1/99/119/003 | NOVORAPID PENFILL INJVLST 100E/ML PATROON 3ML | INSULINS, ASPART-100-IE/ML-INJ.VLOEISTOF PATR | 2,017010 | ML
EU/1/99/119/006 | NOVORAPID PENFILL INJVLST 100E/ML PATROON 3ML | INSULINS, ASPART-100-IE/ML-INJ.VLOEISTOF PATR | 2,017010 | ML
EU/1/99/119/024 | NOVORAPID PUMPCART INJVLST 100E/ML PATROON 1,6ML | INSULINS, ASPART-100-IE/ML-INJ.VLOEISTOF PATR | 2,017010 | ML
EU/1/99/119/009 | NOVORAPID FLEXPEN INJVLST 100E/ML PEN 3ML | INSULINS, ASPART-100-IE/ML-INJ.VLOEISTOF WWSP | 2,226373 | ML
EU/1/99/119/010 | NOVORAPID FLEXPEN INJVLST 100E/ML PEN 3ML | INSULINS, ASPART-100-IE/ML-INJ.VLOEISTOF WWSP | 2,226373 | ML
EU/1/99/119/005 | NOVORAPID NOVOLET INJVLST 100E/ML PEN 3ML | INSULINS, ASPART-100-IE/ML-INJ.VLOEISTOF WWSP | 2,226373 | ML
EU/1/00/142/004 | NOVOMIX 30 PENFILL INJ 100E/ML PATROON 3ML | INSULINS, ASPART-30-IE/ML-INJ.VLOEISTOF PATR-INSULINS, ASPART INTERM-70-IE/ML-INJ.VLOEISTOF PATR | 2,088450 | ML
EU/1/00/142/005 | NOVOMIX 30 PENFILL INJ 100E/ML PATROON 3ML | INSULINS, ASPART-30-IE/ML-INJ.VLOEISTOF PATR-INSULINS, ASPART INTERM-70-IE/ML-INJ.VLOEISTOF PATR | 2,088450 | ML
EU/1/00/142/009 | NOVOMIX 30 FLEXPEN INJ 100E/ML PEN 3ML | INSULINS, ASPART-30-IE/ML-INJ.VLOEISTOF WWSP-INSULINS, ASPART INTERM-70-IE/ML-INJ.VLOEISTOF WWSP | 2,289129 | ML
EU/1/00/142/010 | NOVOMIX 30 FLEXPEN INJ 100E/ML PEN 3ML | INSULINS, ASPART-30-IE/ML-INJ.VLOEISTOF WWSP-INSULINS, ASPART INTERM-70-IE/ML-INJ.VLOEISTOF WWSP | 2,289129 | ML
EU/1/00/142/015 | NOVOMIX 50 FLEXPEN INJ 100E/ML PEN 3ML | INSULINS, ASPART-50-IE/ML-INJ.VLOEISTOF WWSP-INSULINS, ASPART INTERM-50-IE/ML-INJ.VLOEISTOF WWSP | 2,172880 | ML
EU/1/00/142/021 | NOVOMIX 70 FLEXPEN INJ 100E/ML PEN 3ML | INSULINS, ASPART-70-IE/ML-INJ.VLOEISTOF WWSP-INSULINS, ASPART INTERM-30-IE/ML-INJ.VLOEISTOF WWSP | 2,172880 | ML
EU/1/04/278/002 | LEVEMIR PENFILL INJ 100E/ML PATROON 3ML | INSULINS, DETEMIR-100-IE/ML-INJ.VLOEISTOF PATR | 3,311497 | ML
EU/1/04/278/003 | LEVEMIR PENFILL INJ 100E/ML PATROON 3ML | INSULINS, DETEMIR-100-IE/ML-INJ.VLOEISTOF PATR | 3,311497 | ML
EU/1/04/278/005 | LEVEMIR FLEXPEN INJ 100E/ML PEN 3ML | INSULINS, DETEMIR-100-IE/ML-INJ.VLOEISTOF WWSP | 3,350573 | ML
EU/1/04/278/008 | LEVEMIR INNOLET INJ 100E/ML PEN 3ML | INSULINS, DETEMIR-100-IE/ML-INJ.VLOEISTOF WWSP | 3,350573 | ML
EU/1/97/030/054 | INSUMAN INFUSAT INJ 100IE/ML PATR 3,15ML | INSULINS, FAST-ACTING-100-IE/ML-INFUUSVLOEISTOF, PATROON | 8,461413 | ML
EU/1/02/230/003 | ACTRAPID INJ 100IE/ML FLACON 10ML | INSULINS, FAST-ACTING-100-IE/ML-INJ.VLOEISTOF FLACON | 1,322003 | ML
EU/1/97/030/028 | INSUMAN RAPID INJ 100IE/ML FLACON 5ML | INSULINS, FAST-ACTING-100-IE/ML-INJ.VLOEISTOF FLACON | 2,153458 | ML
EU/1/02/230/006 | ACTRAPID PENFILL INJ 100IE/ML PATR 3ML | INSULINS, FAST-ACTING-100-IE/ML-INJ.VLOEISTOF PATR | 1,750519 | ML
115007//13040 | HUMULINE REGULAR INJ 100IE/ML PATROON 3ML | INSULINS, FAST-ACTING-100-IE/ML-INJ.VLOEISTOF PATR | 1,575467 | ML
113922//13040 | HUMULINE REGULAR INJ 100IE/ML PATROON 3ML | INSULINS, FAST-ACTING-100-IE/ML-INJ.VLOEISTOF PATR | 1,750519 | ML
115445 | HUMULINE REGULAR INJ 100IE/ML PATROON 3ML | INSULINS, FAST-ACTING-100-IE/ML-INJ.VLOEISTOF PATR | 1,750519 | ML
118239//13040 | HUMULINE REGULAR INJ 100IE/ML PATROON 3ML | INSULINS, FAST-ACTING-100-IE/ML-INJ.VLOEISTOF PATR | 1,750519 | ML
EU/1/97/030/030 | INSUMAN RAPID INJ 100IE/ML PATROON 3ML | INSULINS, FAST-ACTING-100-IE/ML-INJ.VLOEISTOF PATR | 1,750519 | ML
EU/1/97/030/045 | INSUMAN COMB 25 INJ 100IE/ML PATROON 3ML | INSULINS, FAST-ACTING-25-IE/ML-INJ.VLOEISTOF PATR-INSULINS, INTERMEDIATE-ACTING-75-IE/ML-INJ.VLOEISTOF PATR | 1,813607 | ML
EU/1/02/231/003 | MIXTARD 30 INJVLST 100IE/ML FLACON 10ML | INSULINS, FAST-ACTING-30-IE/ML-INJ.VLOEISTOF FLACON-INSULINS, INTERMEDIATE-ACTING-70-IE/ML-INJ.VLOEISTOF FLACON | 1,517397 | ML
EU/1/02/229/012 | ACTRAPHANE 30 PENFILL INJSUSP 100IE/ML PATROON 3ML | INSULINS, FAST-ACTING-30-IE/ML-INJ.VLOEISTOF PATR-INSULINS, INTERMEDIATE-ACTING-70-IE/ML-INJ.VLOEISTOF PATR | 1,616497 | ML
112642//14894 | HUMULINE 30/70 INJ 100IE/ML PATROON 3ML | INSULINS, FAST-ACTING-30-IE/ML-INJ.VLOEISTOF PATR-INSULINS, INTERMEDIATE-ACTING-70-IE/ML-INJ.VLOEISTOF PATR | 1,616497 | ML
123221//115491 | HUMULINE 30/70 INJ 100IE/ML PATROON 3ML | INSULINS, FAST-ACTING-30-IE/ML-INJ.VLOEISTOF PATR-INSULINS, INTERMEDIATE-ACTING-70-IE/ML-INJ.VLOEISTOF PATR | 1,616497 | ML
33007//14894 | HUMULINE 30/70 INJ 100IE/ML PATROON 3ML | INSULINS, FAST-ACTING-30-IE/ML-INJ.VLOEISTOF PATR-INSULINS, INTERMEDIATE-ACTING-70-IE/ML-INJ.VLOEISTOF PATR | 1,616497 | ML
115491 | HUMULINE 30/70 INJ 100IE/ML PATROON 3ML | INSULINS, FAST-ACTING-30-IE/ML-INJ.VLOEISTOF PATR-INSULINS, INTERMEDIATE-ACTING-70-IE/ML-INJ.VLOEISTOF PATR | 1,777784 | ML
EU/1/02/231/012 | MIXTARD 30 PENFILL 100IE/ML PATROON 3ML | INSULINS, FAST-ACTING-30-IE/ML-INJ.VLOEISTOF PATR-INSULINS, INTERMEDIATE-ACTING-70-IE/ML-INJ.VLOEISTOF PATR | 1,616497 | ML
EU/1/02/229/024 | ACTRAPHANE 30 NOVOLET INJSUSP 100IE/ML PEN 3ML | INSULINS, FAST-ACTING-30-IE/ML-INJ.VLOEISTOF WWSP-INSULINS, INTERMEDIATE-ACTING-70-IE/ML-INJ.VLOEISTOF WWSP | 1,856713 | ML
EU/1/02/229/018 | ACTRAPHANE 50 PENFILL INJSUSP 100IE/ML PATROON 3ML | INSULINS, FAST-ACTING-50-IE/ML-INJ.VLOEISTOF PATR-INSULINS, INTERMEDIATE-ACTING-50-IE/ML-INJ.VLOEISTOF PATR | 1,440866 | ML
EU/1/02/231/018 | MIXTARD 50 PENFILL 100IE/ML PATROON 3ML | INSULINS, FAST-ACTING-50-IE/ML-INJ.VLOEISTOF PATR-INSULINS, INTERMEDIATE-ACTING-50-IE/ML-INJ.VLOEISTOF PATR | 1,440866 | ML
EU/1/00/134/006 | LANTUS INJ 100E/ML PATROON 3ML | INSULINS, GLARGINE-100-IE/ML-INJ.VLOEISTOF PATR | 2,790730 | ML
EU/1/00/134/025 | LANTUS OPTICLIK INJ 100E/ML PATROON 3ML | INSULINS, GLARGINE-100-IE/ML-INJ.VLOEISTOF PATR | 2,790730 | ML
EU/1/14/944/007 | ABASAGLAR INJVLST 100E/ML PEN 3ML | INSULINS, GLARGINE-100-IE/ML-INJ.VLOEISTOF WWSP | 2,722662 | ML
EU/1/14/944/008 | ABASAGLAR INJVLST 100E/ML PEN 3ML | INSULINS, GLARGINE-100-IE/ML-INJ.VLOEISTOF WWSP | 2,722662 | ML
EU/1/14/944/012 | ABASAGLAR INJVLST 100E/ML PEN 3ML | INSULINS, GLARGINE-100-IE/ML-INJ.VLOEISTOF WWSP | 2,722662 | ML
EU/1/00/134/010 | LANTUS OPTISET INJ 100E/ML PEN 3ML | INSULINS, GLARGINE-100-IE/ML-INJ.VLOEISTOF WWSP | 2,722662 | ML
EU/1/00/134/033 | LANTUS SOLOSTAR INJ 100E/ML PEN 3ML | INSULINS, GLARGINE-100-IE/ML-INJ.VLOEISTOF WWSP | 2,722662 | ML
EU/1/16/1157/003 | SULIQUA 30-60 INJVLST 100E/33MCG/ML PEN 3ML | INSULINS, GLARGINE-100-IE/ML-INJ.VLOEISTOF WWSP-LIXISENATIDE-0.033-MG/ML-INJ.VLOEISTOF WWSP | 6,996047 | ML
EU/1/16/1157/001 | SULIQUA 10-40 INJVLST 100E/50MCG/ML PEN 3ML | INSULINS, GLARGINE-100-IE/ML-INJ.VLOEISTOF WWSP-LIXISENATIDE-0.05-MG/ML-INJ.VLOEISTOF WWSP | 9,376577 | ML
EU/1/00/133/038 | TOUJEO DOUBLESTAR INJ 300E/ML PEN 3ML | INSULINS, GLARGINE-300-IE/ML-INJ.VLOEISTOF WWSP | 8,368653 | ML
EU/1/00/133/034 | TOUJEO SOLOSTAR INJ 300E/ML PEN 1,5ML | INSULINS, GLARGINE-300-IE/ML-INJ.VLOEISTOF WWSP | 8,368653 | ML
EU/1/00/133/035 | TOUJEO SOLOSTAR INJ 300E/ML PEN 1,5ML | INSULINS, GLARGINE-300-IE/ML-INJ.VLOEISTOF WWSP | 8,368653 | ML
EU/1/04/285/008 | APIDRA INJ 100E/ML PATROON 3ML | INSULINS, GLULISIN-100-IE/ML-INJ.VLOEISTOF PATR | 2,227191 | ML
EU/1/04/285/030 | APIDRA SOLOSTAR INJ 100E/ML PEN 3ML | INSULINS, GLULISIN-100-IE/ML-INJ.VLOEISTOF WWSP | 2,138925 | ML
EU/1/04/285/032 | APIDRA SOLOSTAR INJ 100E/ML PEN 3ML | INSULINS, GLULISIN-100-IE/ML-INJ.VLOEISTOF WWSP | 2,138925 | ML
EU/1/02/233/003 | INSULATARD INJ 100IE/ML FLACON 10ML | INSULINS, INTERMEDIATE-ACTING-100-IE/ML-INJ.VLOEISTOF FLACON | 1,588425 | ML
112641//14896 | HUMULINE NPH INJ 100IE/ML PATROON 3ML | INSULINS, INTERMEDIATE-ACTING-100-IE/ML-INJ.VLOEISTOF PATR | 1,595351 | ML
109254//14896 | HUMULINE NPH INJ 100IE/ML PATROON 3ML | INSULINS, INTERMEDIATE-ACTING-100-IE/ML-INJ.VLOEISTOF PATR | 1,756335 | ML
115443 | HUMULINE NPH INJ 100IE/ML PATROON 3ML | INSULINS, INTERMEDIATE-ACTING-100-IE/ML-INJ.VLOEISTOF PATR | 1,756335 | ML
118236//14896 | HUMULINE NPH INJ 100IE/ML PATROON 3ML | INSULINS, INTERMEDIATE-ACTING-100-IE/ML-INJ.VLOEISTOF PATR | 1,756335 | ML
EU/1/02/233/006 | INSULATARD PENFILL INJ 100IE/ML PATR 3ML | INSULINS, INTERMEDIATE-ACTING-100-IE/ML-INJ.VLOEISTOF PATR | 1,756335 | ML
EU/1/97/030/035 | INSUMAN BASAL INJ 100IE/ML PATROON 3ML | INSULINS, INTERMEDIATE-ACTING-100-IE/ML-INJ.VLOEISTOF PATR | 1,756335 | ML
115444 | HUMULINE NPH KWIKPEN INJVLST 100IE/ML WWSP 3ML | INSULINS, INTERMEDIATE-ACTING-100-IE/ML-INJ.VLOEISTOF WWSP | 1,861595 | ML
EU/1/02/233/014 | INSULATARD FLEXPEN INJ 100IE/ML PEN 3ML | INSULINS, INTERMEDIATE-ACTING-100-IE/ML-INJ.VLOEISTOF WWSP | 1,661263 | ML
EU/1/97/030/148 | INSUMAN BASAL SOLOSTAR INJ 100IE/ML PEN 3ML | INSULINS, INTERMEDIATE-ACTING-100-IE/ML-INJ.VLOEISTOF WWSP | 1,861595 | ML
EU/1/96/007/002 | HUMALOG INJVLST 100E/ML FLACON 10ML | INSULINS, LISPRO-100-IE/ML-INJ.VLOEISTOF FLACON | 1,747242 | ML
EU/1/96/007/004 | HUMALOG INJVLST 100E/ML PATROON 3ML | INSULINS, LISPRO-100-IE/ML-INJ.VLOEISTOF PATR | 1,972931 | ML
EU/1/96/007/003 | HUMALOG INJVLST 100E/ML PATROON 1,5ML | INSULINS, LISPRO-100-IE/ML-INJ.VLOEISTOF PATR | 2,013220 | ML
EU/1/96/007/044 | HUMALOG JUNIOR KWIKPEN INJVLST 100E/ML PEN 3ML | INSULINS, LISPRO-100-IE/ML-INJ.VLOEISTOF WWSP | 2,138926 | ML
EU/1/96/007/031 | HUMALOG KWIKPEN INJVLST 100E/ML PEN 3ML | INSULINS, LISPRO-100-IE/ML-INJ.VLOEISTOF WWSP | 2,138926 | ML
EU/1/96/007/041 | HUMALOG KWIKPEN INJVLST 200E/ML PEN 3ML | INSULINS, LISPRO-200-IE/ML-INJ.VLOEISTOF WWSP | 4,441242 | ML
EU/1/98/063/008 | REBIF 22MCG/0,5ML INJ 44MCG/ML (12ME/ML)PATR 1,5ML | INTERFERON BETA 1A-0.044-MG/ML-INJ.VLOEISTOF AMPUL | 105,311333 | ML
EU/1/98/063/002 | REBIF 22 INJVLST 44MCG/ML (12ME/ML)WWSP 0,5ML | INTERFERON BETA 1A-0.044-MG/ML-INJ.VLOEISTOF, WWSP | 107,090135 | ML
EU/1/98/063/003 | REBIF 22 INJVLST 44MCG/ML (12ME/ML)WWSP 0,5ML | INTERFERON BETA 1A-0.044-MG/ML-INJ.VLOEISTOF, WWSP | 120,060973 | ML
EU/1/98/063/007 | REBIF STARTVP INJVLS(6X8,8MCG/0,2+6X22MCG/0,5ML) | INTERFERON BETA 1A-0.044-MG/ML-INJ.VLOEISTOF, WWSP-INTERFERON BETA 1A FASE-2-0.044-MG/ML-INJ.VLOEISTOF, WWSP | 151,326336 | ML
EU/1/97/033/005 | AVONEX 30 INJECTIEVLOEISTOF 60MCG/ML PEN 0,5ML | INTERFERON BETA 1A-0.06-MG/ML-INJ.VLOEISTOF, WWSP | 336,608105 | ML
EU/1/97/033/006 | AVONEX 30 INJECTIEVLOEISTOF 60MCG/ML PEN 0,5ML | INTERFERON BETA 1A-0.06-MG/ML-INJ.VLOEISTOF, WWSP | 336,608105 | ML
EU/1/97/033/004 | AVONEX 30 INJECTIEVLOEISTOF 60MCG/ML WWSP 0,5ML | INTERFERON BETA 1A-0.06-MG/ML-INJ.VLOEISTOF, WWSP | 336,608105 | ML
EU/1/97/033/003 | AVONEX 30 INJECTIEVLOEISTOF 60MCG/ML WWSP 0,5ML | INTERFERON BETA 1A-0.06-MG/ML-INJ.VLOEISTOF, WWSP | 381,966348 | ML
EU/1/98/063/009 | REBIF 44MCG/0,5ML INJ 88MCG/ML (24ME/ML)PATR 1,5ML | INTERFERON BETA 1A-0.088-MG/ML-INJ.VLOEISTOF AMPUL | 130,316254 | ML
EU/1/98/063/005 | REBIF 44 INJVLST 88MCG/ML (24ME/ML)WWSP 0,5ML | INTERFERON BETA 1A-0.088-MG/ML-INJ.VLOEISTOF, WWSP | 133,812444 | ML
EU/1/98/063/006 | REBIF 44 INJVLST 88MCG/ML (24ME/ML)WWSP 0,5ML | INTERFERON BETA 1A-0.088-MG/ML-INJ.VLOEISTOF, WWSP | 146,274128 | ML
EU/1/95/003/005 | BETAFERON INJPDR FL 9.600.000IE+SOLV 1,2ML + TOEBH | INTERFERON BETA 1B-0.3-MG-POED. V. INJECTIE, FLACON | 42,387445 | STUK
EU/1/95/003/007 | BETAFERON INJPDR FL 9.600.000IE+SOLV 1,2ML 3MND VP | INTERFERON BETA 1B-0.3-MG-POED. V. INJECTIE, FLACON | 42,387445 | STUK
15195 | IMMUKINE INJVLST 0,2MG/ML FLACON 0,5ML | INTERFERON GAMMA 1B-0.2-MG/ML-INJECTIEVLOEISTOF, FLAC | 289,280122 | ML
17664 | VISIPAQUE INJVLST 270MGI/ML FLACON 20ML GLAS | IODIXANOL-550-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,257533 | ML
17664 | VISIPAQUE INJVLST 270MGI/ML FLACON 50ML KUNSTSTOF | IODIXANOL-550-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,257533 | ML
17664 | VISIPAQUE INJVLST 270MGI/ML FLACON 100ML KUNSTSTOF | IODIXANOL-550-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,257533 | ML
17664 | VISIPAQUE INJVLST 270MGI/ML FLACON 200ML KUNSTSTOF | IODIXANOL-550-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,257533 | ML
17664 | VISIPAQUE INJVLST 270MGI/ML FLACON 500ML KUNSTSTOF | IODIXANOL-550-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,257533 | ML
17665 | VISIPAQUE INJVLST 320MGI/ML FLACON 20ML GLAS | IODIXANOL-652-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,295873 | ML
17665 | VISIPAQUE INJVLST 320MGI/ML FLACON 50ML KUNSTSTOF | IODIXANOL-652-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,295873 | ML
17665 | VISIPAQUE INJVLST 320MGI/ML FLACON 100ML KUNSTSTOF | IODIXANOL-652-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,295873 | ML
17665 | VISIPAQUE INJVLST 320MGI/ML FLACON 200ML KUNSTSTOF | IODIXANOL-652-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,295873 | ML
17665 | VISIPAQUE INJVLST 320MGI/ML FLACON 500ML KUNSTSTOF | IODIXANOL-652-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,295873 | ML
9819 | OMNIPAQUE INJVLST 240MGI/ML FLACON 10ML GLAS | IOHEXOL-518-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,255904 | ML
9819 | OMNIPAQUE INJVLST 240MGI/ML FLACON 50ML KUNSTSTOF | IOHEXOL-518-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,255904 | ML
9820 | OMNIPAQUE INJVLST 300MGI/ML FLACON 10ML GLAS | IOHEXOL-647-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,346666 | ML
9820 | OMNIPAQUE INJVLST 300MGI/ML FLACON 20ML GLAS | IOHEXOL-647-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,346666 | ML
9820 | OMNIPAQUE INJVLST 300MGI/ML FLACON 50ML KUNSTSTOF | IOHEXOL-647-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,346666 | ML
9820 | OMNIPAQUE INJVLST 300MGI/ML FLACON 100ML KUNSTSTOF | IOHEXOL-647-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,346666 | ML
9820 | OMNIPAQUE INJVLST 300MGI/ML FLACON 200ML KUNSTSTOF | IOHEXOL-647-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,346666 | ML
9820 | OMNIPAQUE INJVLST 300MGI/ML FLACON 500ML KUNSTSTOF | IOHEXOL-647-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,346666 | ML
9821 | OMNIPAQUE INJVLST 350MGI/ML FLACON 50ML KUNSTSTOF | IOHEXOL-755-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,371232 | ML
9821 | OMNIPAQUE INJVLST 350MGI/ML FLACON 100ML KUNSTSTOF | IOHEXOL-755-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,371232 | ML
9821 | OMNIPAQUE INJVLST 350MGI/ML FLACON 500ML KUNSTSTOF | IOHEXOL-755-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,371232 | ML
16917 | IOMERON INJVLST 300MGI/ML FLACON 20ML | IOMEPROL-612-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,299434 | ML
16917 | IOMERON INJVLST 300MGI/ML FLACON 50ML | IOMEPROL-612-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,299434 | ML
16917 | IOMERON INJVLST 300MGI/ML FLACON 100ML | IOMEPROL-612-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,299434 | ML
16917 | IOMERON INJVLST 300MGI/ML FLACON 200ML | IOMEPROL-612-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,299434 | ML
16917 | IOMERON INJVLST 300MGI/ML FLACON 500ML | IOMEPROL-612-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,299434 | ML
16918 | IOMERON INJVLST 350MGI/ML FLACON 50ML | IOMEPROL-714-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,320726 | ML
16918 | IOMERON INJVLST 350MGI/ML FLACON 100ML | IOMEPROL-714-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,320726 | ML
16918 | IOMERON INJVLST 350MGI/ML FLACON 200ML | IOMEPROL-714-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,320726 | ML
16918 | IOMERON INJVLST 350MGI/ML FLACON 500ML | IOMEPROL-714-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,320726 | ML
16919 | IOMERON INJVLST 400MGI/ML FLACON 50ML | IOMEPROL-816-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,380711 | ML
16919 | IOMERON INJVLST 400MGI/ML FLACON 75ML | IOMEPROL-816-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,380711 | ML
16919 | IOMERON INJVLST 400MGI/ML FLACON 100ML | IOMEPROL-816-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,380711 | ML
16919 | IOMERON INJVLST 400MGI/ML FLACON 150ML | IOMEPROL-816-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,380711 | ML
16919 | IOMERON INJVLST 400MGI/ML FLACON 200ML | IOMEPROL-816-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,380711 | ML
16919 | IOMERON INJVLST 400MGI/ML FLACON 250ML | IOMEPROL-816-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,380711 | ML
16919 | IOMERON INJVLST 400MGI/ML FLACON 500ML | IOMEPROL-816-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,380711 | ML
11408 | ULTRAVIST INJVLST 240MGI/ML FLACON 50ML | IOPROMIDE-499-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,421960 | ML
11409 | ULTRAVIST INJVLST 300MGI/ML FLACON 20ML | IOPROMIDE-623-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,294372 | ML
11409 | ULTRAVIST INJVLST 300MGI/ML FLACON 50ML | IOPROMIDE-623-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,294372 | ML
11409 | ULTRAVIST INJVLST 300MGI/ML FLACON 100ML | IOPROMIDE-623-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,294372 | ML
11409 | ULTRAVIST INJVLST 300MGI/ML FLACON 500ML | IOPROMIDE-623-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,294372 | ML
11410 | ULTRAVIST INJVLST 370MGI/ML FLACON 50ML | IOPROMIDE-769-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,342980 | ML
11410 | ULTRAVIST INJVLST 370MGI/ML FLACON 100ML | IOPROMIDE-769-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,342980 | ML
11410 | ULTRAVIST INJVLST 370MGI/ML FLACON 500ML | IOPROMIDE-769-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,342980 | ML
13346 | OPTIRAY 240 INJVLST 240MGI/ML FLACON 50ML | IOVERSOL-509-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,534862 | ML
15717 | OPTIRAY 300 INJVLST 300MGI/ML HP WWSP 75ML | IOVERSOL-636-MG/ML-INJ.VLOEISTOF, WWSP | 0,433721 | ML
15717 | OPTIRAY 300 INJVLST 300MGI/ML HP WWSP 100ML | IOVERSOL-636-MG/ML-INJ.VLOEISTOF, WWSP | 0,433721 | ML
15717 | OPTIRAY 300 INJVLST 300MGI/ML HP WWSP 125ML | IOVERSOL-636-MG/ML-INJ.VLOEISTOF, WWSP | 0,372618 | ML
15717 | OPTIRAY 300 INJVLST 300MGI/ML FLACON 20ML | IOVERSOL-636-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,372618 | ML
15717 | OPTIRAY 300 INJVLST 300MGI/ML FLACON 50ML | IOVERSOL-636-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,372618 | ML
15717 | OPTIRAY 300 INJVLST 300MGI/ML FLACON 100ML | IOVERSOL-636-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,372618 | ML
15717 | OPTIRAY 300 INJVLST 300MGI/ML FLACON 500ML | IOVERSOL-636-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,372618 | ML
15718 | OPTIRAY 350 INJVLST 350MGI/ML HP WWSP 75ML | IOVERSOL-742-MG/ML-INJ.VLOEISTOF, WWSP | 0,519360 | ML
15718 | OPTIRAY 350 INJVLST 350MGI/ML HP WWSP 100ML | IOVERSOL-742-MG/ML-INJ.VLOEISTOF, WWSP | 0,519360 | ML
15718 | OPTIRAY 350 INJVLST 350MGI/ML HP WWSP 125ML | IOVERSOL-742-MG/ML-INJ.VLOEISTOF, WWSP | 0,404310 | ML
15718 | OPTIRAY 350 INJVLST 350MGI/ML FLACON 100ML | IOVERSOL-742-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,404310 | ML
15718 | OPTIRAY 350 INJVLST 350MGI/ML FLACON 200ML | IOVERSOL-742-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,404310 | ML
15718 | OPTIRAY 350 INJVLST 350MGI/ML FLACON 500ML | IOVERSOL-742-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,404310 | ML
13350 | TELEBRIX GASTRO OPLOSSING 300MGI/ML | IOXITALAMAAT MEGLUMINE-660-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,105973 | ML
EU/1/11/698/001 | YERVOY INFVLST CONC 5MG/ML FLACON 10ML | IPILIMUMAB-5-MG/ML-INFUUSVLOEISTOF, FLACON | 422,261340 | ML
EU/1/11/698/002 | YERVOY INFVLST CONC 5MG/ML FLACON 40ML | IPILIMUMAB-5-MG/ML-INFUUSVLOEISTOF, FLACON | 422,261340 | ML
127895=114333 | IPRATROPIUMBROMIDE 1A P AER 20MCG/DO SPB 200DO+INH | IPRATROPIUM BROMIDE-.02-MG-AEROSOL | 0,029347 | DOSIS
20233 | COMBIVENT UNIT DOSE VERNEVELOPLOSSING FLACON 2,5ML | IPRATROPIUM BROMIDE-.2-MG/ML-INHALATIEVLOEISTOF UNITDOSE-SALBUTAMOL-1-MG/ML-INHALATIEVLOEISTOF UNITDOSE | 0,138997 | ML
33224 | IPRAMOL STERI-NEB VERNEVELOPL 0,2/1MG/ML FL2,5ML | IPRATROPIUM BROMIDE-.2-MG/ML-INHALATIEVLOEISTOF UNITDOSE-SALBUTAMOL-1-MG/ML-INHALATIEVLOEISTOF UNITDOSE | 0,138997 | ML
114132 | IPRATRO BR/SALBUT CIP UD VERNOPL 0,5/2,5MG FL2,5ML | IPRATROPIUM BROMIDE-.2-MG/ML-INHALATIEVLOEISTOF UNITDOSE-SALBUTAMOL-1-MG/ML-INHALATIEVLOEISTOF UNITDOSE | 0,148104 | ML
100362 | IPRATRO BR/SALBUT SDZ UD VERNOPL 0,5/2,5MG FL2,5ML | IPRATROPIUM BROMIDE-.2-MG/ML-INHALATIEVLOEISTOF UNITDOSE-SALBUTAMOL-1-MG/ML-INHALATIEVLOEISTOF UNITDOSE | 0,138997 | ML
EU/1/97/046/004 | APROVEL TABLET 150MG | IRBESARTAN-150-MG-TABLET | 0,258803 | STUK
EU/1/97/046/022 | APROVEL TABLET FILMOMHULD 150MG | IRBESARTAN-150-MG-TABLET | 0,286210 | STUK
EU/1/97/046/035 | APROVEL TABLET FILMOMHULD 150MG | IRBESARTAN-150-MG-TABLET | 0,286210 | STUK
EU/1/97/046/038 | APROVEL TABLET FILMOMHULD 150MG | IRBESARTAN-150-MG-TABLET | 0,286210 | STUK
106371 | IRBESARTAN AUROBINDO TABLET 150MG | IRBESARTAN-150-MG-TABLET | 0,286210 | STUK
107324 | IRBESARTAN MYLAN TABLET 150MG | IRBESARTAN-150-MG-TABLET | 0,254662 | STUK
101865 | IRBESARTAN SANDOZ TABLET FILMOMHULD 150MG | IRBESARTAN-150-MG-TABLET | 0,286210 | STUK
EU/1/09/576/016 | IRBESARTAN TEVA TABLET FILMOMHULD 150MG | IRBESARTAN-150-MG-TABLET | 0,258803 | STUK
EU/1/97/046/007 | APROVEL TABLET 300MG | IRBESARTAN-300-MG-TABLET | 0,263437 | STUK
EU/1/97/046/039 | APROVEL TABLET FILMOMHULD 300MG | IRBESARTAN-300-MG-TABLET | 0,263437 | STUK
EU/1/97/046/027 | APROVEL TABLET FILMOMHULD 300MG | IRBESARTAN-300-MG-TABLET | 0,281842 | STUK
EU/1/97/046/036 | APROVEL TABLET FILMOMHULD 300MG | IRBESARTAN-300-MG-TABLET | 0,281842 | STUK
106372 | IRBESARTAN AUROBINDO TABLET 300MG | IRBESARTAN-300-MG-TABLET | 0,281842 | STUK
107325 | IRBESARTAN MYLAN TABLET 300MG | IRBESARTAN-300-MG-TABLET | 0,263437 | STUK
101866 | IRBESARTAN SANDOZ TABLET FILMOMHULD 300MG | IRBESARTAN-300-MG-TABLET | 0,281842 | STUK
EU/1/09/576/029 | IRBESARTAN TEVA TABLET FILMOMHULD 300MG | IRBESARTAN-300-MG-TABLET | 0,263437 | STUK
EU/1/97/046/017 | APROVEL TABLET FILMOMHULD 75MG | IRBESARTAN-75-MG-TABLET | 0,275277 | STUK
117260 | IRINOTECAN HCL TRIHYDR ACC INF CON 20MG/ML FL 2ML | IRINOTECAN-20-MG/ML-INFUUSVLOEISTOF, FLACON | 19,371092 | ML
117260 | IRINOTECAN HCL TRIHYDR ACC INF CON 20MG/ML FL 5ML | IRINOTECAN-20-MG/ML-INFUUSVLOEISTOF, FLACON | 19,371092 | ML
117260 | IRINOTECAN HCL TRIHYDR ACC INF CON 20MG/ML FL 15ML | IRINOTECAN-20-MG/ML-INFUUSVLOEISTOF, FLACON | 19,371092 | ML
117260 | IRINOTECAN HCL TRIHYDR ACC INF CON 20MG/ML FL 25ML | IRINOTECAN-20-MG/ML-INFUUSVLOEISTOF, FLACON | 19,371092 | ML
34947 | IRINOTECAN HCL TRIHYDR FRES INF CON 20MG/ML FL 2ML | IRINOTECAN-20-MG/ML-INFUUSVLOEISTOF, FLACON | 19,371092 | ML
34947 | IRINOTECAN HCL TRIHYDR FRES INF CON 20MG/ML FL 5ML | IRINOTECAN-20-MG/ML-INFUUSVLOEISTOF, FLACON | 19,371092 | ML
34947 | IRINOTECAN HCL TRIHYDR FRES INF CON 20MG/ML FL15ML | IRINOTECAN-20-MG/ML-INFUUSVLOEISTOF, FLACON | 19,371092 | ML
34947 | IRINOTECAN HCL TRIHYDR FRES INF CON 20MG/ML FL25ML | IRINOTECAN-20-MG/ML-INFUUSVLOEISTOF, FLACON | 19,371092 | ML
105025 | IRINOTECAN HCL TRIHYDR HIKMA INFV C 20MG/ML FL 2ML | IRINOTECAN-20-MG/ML-INFUUSVLOEISTOF, FLACON | 19,371092 | ML
105025 | IRINOTECAN HCL TRIHYDR HIKMA INFV C 20MG/ML FL 5ML | IRINOTECAN-20-MG/ML-INFUUSVLOEISTOF, FLACON | 19,371092 | ML
105025 | IRINOTECAN HCL TRIHYDR HIKMA INFV C 20MG/ML FL15ML | IRINOTECAN-20-MG/ML-INFUUSVLOEISTOF, FLACON | 19,371092 | ML
105025 | IRINOTECAN HCL TRIHYDR HIKMA INFV C 20MG/ML FL25ML | IRINOTECAN-20-MG/ML-INFUUSVLOEISTOF, FLACON | 19,371092 | ML
EU/1/15/1036/002 | CRESEMBA CAPSULE 100MG | ISAVUCONAZOL-100-MG-CAPSULE | 44,555203 | STUK
EU/1/15/1036/001 | CRESEMBA INFUSIEPOEDER FLACON 200MG | ISAVUCONAZOL-200-MG-POED. V. INFUSIE,FLACON | 364,371127 | STUK
118586//15460 | RIFINAH TABLET FILMOMHULD 300/150MG | ISONIAZID-150-MG-TABLET-RIFAMPICIN-300-MG-TABLET | 0,572849 | STUK
119683//15460 | RIFINAH TABLET FILMOMHULD 300/150MG | ISONIAZID-150-MG-TABLET-RIFAMPICIN-300-MG-TABLET | 0,572849 | STUK
120918//15460 | RIFINAH TABLET FILMOMHULD 300/150MG | ISONIAZID-150-MG-TABLET-RIFAMPICIN-300-MG-TABLET | 0,572849 | STUK
15460 | RIFINAH TABLET FILMOMHULD 300/150MG | ISONIAZID-150-MG-TABLET-RIFAMPICIN-300-MG-TABLET | 0,572849 | STUK
56948 | ISOSORBIDEMONONITRAAT ACCORD TABLET 20MG | ISOSORBIDE MONONITRATE-20-MG-TABLET | 0,071030 | STUK
105346//17289 | ISOSORBIDEMONONITRAAT ERC RETARD CAPSULE 25MG | ISOSORBIDE MONONITRATE-25-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,154988 | STUK
17289 | MONO CEDOCARD RETARD CAPSULE MGA 25MG | ISOSORBIDE MONONITRATE-25-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,154988 | STUK
32718//13645 | ISOSORBIDEMONONITRAAT RETARD CAPSULE MGA 50MG | ISOSORBIDE MONONITRATE-50-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,214721 | STUK
13645 | MONO CEDOCARD RETARD CAPSULE MGA 50MG | ISOSORBIDE MONONITRATE-50-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,214721 | STUK
23515 | ISOSORBIDEMONONITRAAT AUROB RETARD TABLET MGA 60MG | ISOSORBIDE MONONITRATE-60-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,321338 | STUK
27105 | ISOSORBIDEMONONITRAAT MYLAN RETARD TABLET MGA 60MG | ISOSORBIDE MONONITRATE-60-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,321338 | STUK
29829 | ISOSORBIDEMONONITRAAT SANDOZ RETARD TABL MGA 60MG | ISOSORBIDE MONONITRATE-60-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,321338 | STUK
100635 | ISOSORBIDEMONONITRAAT TEVA RETARD TABLET MGA 60MG | ISOSORBIDE MONONITRATE-60-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,321338 | STUK
11396 | PROMOCARD DURETTE TABLET MGA 60MG | ISOSORBIDE MONONITRATE-60-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,321338 | STUK
27577 | ISOTRETINOINE AUROBINDO CAPSULE 10MG | ISOTRETINOIN-10-MG-CAPSULE | 0,417483 | STUK
27578 | ISOTRETINOINE AUROBINDO CAPSULE 20MG | ISOTRETINOIN-20-MG-CAPSULE | 0,592748 | STUK
27574 | ISOTRETINOINE MYLAN CAPSULE 20MG | ISOTRETINOIN-20-MG-CAPSULE | 0,592748 | STUK
28430 | ITRACONAZOL CF CAPSULE 100MG | ITRACONAZOLE-100-MG-CAPSULE | 1,114504 | STUK
28431 | ITRACONAZOL MYLAN CAPSULE 100MG | ITRACONAZOLE-100-MG-CAPSULE | 1,114504 | STUK
123454//21024 | TRISPORAL OS DRANK 10MG/ML | ITRACONAZOLE-10-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,427980 | ML
21024 | TRISPORAL OS DRANK 10MG/ML | ITRACONAZOLE-10-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,454682 | ML
EU/1/05/317/003 | CORLENTOR TABLET FILMOMHULD 5MG | IVABRADIN-5-MG-TABLET | 0,461026 | STUK
EU/1/17/1190/003 | IVABRADINE ACCORD TABLET FILMOMHULD 5MG | IVABRADIN-5-MG-TABLET | 0,461026 | STUK
118311 | IVABRADINE CF TABLET FILMOMHULD 5MG | IVABRADIN-5-MG-TABLET | 0,461026 | STUK
118300 | IVABRADINE GLENMARK TABLET FILMOMHULD 5MG | IVABRADIN-5-MG-TABLET | 0,461026 | STUK
119248 | IVABRADINE MYLAN TABLET FILMOMHULD 5MG | IVABRADIN-5-MG-TABLET | 0,461026 | STUK
EU/1/05/316/003 | PROCORALAN TABLET FILMOMHULD 5MG | IVABRADIN-5-MG-TABLET | 0,461026 | STUK
EU/1/05/317/010 | CORLENTOR TABLET FILMOMHULD 7,5MG | IVABRADIN-7.5-MG-TABLET | 0,452335 | STUK
EU/1/17/1190/010 | IVABRADINE ACCORD TABLET FILMOMHULD 7,5MG | IVABRADIN-7.5-MG-TABLET | 0,452335 | STUK
118320 | IVABRADINE AUROBINDO TABLET FILMOMHULD 7,5MG | IVABRADIN-7.5-MG-TABLET | 0,466264 | STUK
118312 | IVABRADINE CF TABLET FILMOMHULD 7,5MG | IVABRADIN-7.5-MG-TABLET | 0,452335 | STUK
118301 | IVABRADINE GLENMARK TABLET FILMOMHULD 7,5MG | IVABRADIN-7.5-MG-TABLET | 0,452335 | STUK
119249 | IVABRADINE MYLAN TABLET FILMOMHULD 7,5MG | IVABRADIN-7.5-MG-TABLET | 0,466264 | STUK
118269 | IVABRADINE SANDOZ TABLET FILMOMHULD 7,5MG | IVABRADIN-7.5-MG-TABLET | 0,466264 | STUK
EU/1/05/316/010 | PROCORALAN TABLET FILMOMHULD 7,5MG | IVABRADIN-7.5-MG-TABLET | 0,452335 | STUK
EU/1/15/1059/006 | ORKAMBI GRANULAAT IN SACHET 100/125MG | IVACAFTOR-125-MG-POEDER/GRANULAAT, ORAAL-LUMACAFTOR-100-MG-POEDER/GRANULAAT, ORAAL | 182,913012 | STUK
EU/1/15/1059/005 | ORKAMBI TABLET FILMOMHULD 100/125MG | IVACAFTOR-125-MG-TABLET-LUMACAFTOR-100-MG-TABLET | 91,529509 | STUK
EU/1/15/1059/001 | ORKAMBI TABLET FILMOMHULD 200/125MG | IVACAFTOR-125-MG-TABLET-LUMACAFTOR-200-MG-TABLET | 92,741220 | STUK
EU/1/12/782/002 | KALYDECO TABLET FILMOMHULD 150MG | IVACAFTOR-150-MG-TABLET | 271,062071 | STUK
EU/1/18/1306/001 | SYMKEVI TABLET FILMOMHULD 100/150MG | IVACAFTOR-150-MG-TABLET-TEZACAFTOR-100-MG-TABLET | 220,629841 | STUK
EU/1/15/1059/007 | ORKAMBI GRANULAAT IN SACHET 150/188MG | IVACAFTOR-188-MG-POEDER/GRANULAAT, ORAAL-LUMACAFTOR-150-MG-POEDER/GRANULAAT, ORAAL | 182,913012 | STUK
EU/1/12/782/003 | KALYDECO GRANULAAT IN SACHET 50MG | IVACAFTOR-50-MG-POEDER/GRANULAAT, ORAAL | 299,571808 | STUK
EU/1/12/782/004 | KALYDECO GRANULAAT IN SACHET 75MG | IVACAFTOR-75-MG-POEDER/GRANULAAT, ORAAL | 299,571808 | STUK
125667//115310 | SOOLANTRA CREME 10MG/G | IVERMECTIN-10-MG/G-CREME, CUTAAN | 0,714062 | G
115310 | SOOLANTRA CREME 10MG/G | IVERMECTIN-10-MG/G-CREME, CUTAAN | 0,752578 | G
EU/1/16/1094/001 | NINLARO CAPSULE 2,3MG | IXAZOMIB-2.3-MG-CAPSULE | 2185,696053 | STUK
EU/1/16/1094/002 | NINLARO CAPSULE 3MG | IXAZOMIB-3-MG-CAPSULE | 2185,696053 | STUK
EU/1/16/1094/003 | NINLARO CAPSULE 4MG | IXAZOMIB-4-MG-CAPSULE | 2185,696053 | STUK
EU/1/15/1085/001 | TALTZ INJVLST 80MG/ML PEN 1ML | IXEKIZUMAB-80-MG-INJ.VLOEISTOF, WWSP | 1083,651464 | STUK
EU/1/15/1085/004 | TALTZ INJVLST 80MG/ML WWSP 1ML | IXEKIZUMAB-80-MG-INJ.VLOEISTOF, WWSP | 1083,651464 | STUK
18284 | XENETIX INJVLST 300MGI/ML FLACON 20ML | JOBITRIDOL-658-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,253584 | ML
18284 | XENETIX INJVLST 300MGI/ML FLACON 50ML | JOBITRIDOL-658-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,253584 | ML
18284 | XENETIX INJVLST 300MGI/ML FLACON 100ML | JOBITRIDOL-658-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,253584 | ML
18284 | XENETIX INJVLST 300MGI/ML FLACON 200ML | JOBITRIDOL-658-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,253584 | ML
18284 | XENETIX INJVLST 300MGI/ML FLACON 500ML | JOBITRIDOL-658-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,253584 | ML
18284 | XENETIX INJVLST 300MGI/ML ZAK 100ML | JOBITRIDOL-658-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,253584 | ML
18284 | XENETIX INJVLST 300MGI/ML ZAK 500ML | JOBITRIDOL-658-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,253584 | ML
18285 | XENETIX INJVLST 350MGI/ML FLACON 50ML | JOBITRIDOL-768-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,305381 | ML
18285 | XENETIX INJVLST 350MGI/ML FLACON 100ML | JOBITRIDOL-768-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,305381 | ML
18285 | XENETIX INJVLST 350MGI/ML FLACON 200ML | JOBITRIDOL-768-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,305381 | ML
18285 | XENETIX INJVLST 350MGI/ML FLACON 500ML | JOBITRIDOL-768-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,305381 | ML
18285 | XENETIX INJVLST 350MGI/ML ZAK 200ML | JOBITRIDOL-768-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,305381 | ML
18285 | XENETIX INJVLST 350MGI/ML ZAK 500ML | JOBITRIDOL-768-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,305381 | ML
22750=10470 | KETOCONAZOL JC CREME 20MG/G | KETOCONAZOLE-20-MG/G-CREME, CUTAAN | 0,196056 | G
24760//10470 | NIZORAL CREME 20MG/G | KETOCONAZOLE-20-MG/G-CREME, CUTAAN | 0,196056 | G
10470 | NIZORAL CREME 20MG/G | KETOCONAZOLE-20-MG/G-CREME, CUTAAN | 0,210255 | G
110800//10470 | NIZORAL CREME 20MG/G | KETOCONAZOLE-20-MG/G-CREME, CUTAAN | 0,210255 | G
23836 | KETOCONAZOL APOTEX SHAMPOO 20MG/G | KETOCONAZOLE-20-MG/G-SHAMPOO | 0,076443 | ML
25724 | KETOCONAZOL AUROBINDO SHAMPOO 20MG/G | KETOCONAZOLE-20-MG/G-SHAMPOO | 0,076443 | ML
32510 | KETOCONAZOL MYLAN SHAMPOO 20MG/G | KETOCONAZOLE-20-MG/G-SHAMPOO | 0,076443 | ML
24663//13381 | ACULAR OOGDRUPPELS 5MG/ML FLACON 5ML | KETOROLAC-5-MG/ML-OOGDRUPPELS | 0,778083 | ML
13381 | ACULAR OOGDRUPPELS 5MG/ML FLACON 5ML | KETOROLAC-5-MG/ML-OOGDRUPPELS | 0,864537 | ML
105250 | ALTRIABAK OOGDRUPPELS 0,25MG/ML FLACON 5ML | KETOTIFEN-.25-MG/ML-OOGDRUPPELS | 1,678668 | ML
122878//105250 | ALTRIABAK OOGDRUPPELS 0,25MG/ML FLACON 5ML | KETOTIFEN-.25-MG/ML-OOGDRUPPELS | 1,678668 | ML
124474//105250 | ALTRIABAK OOGDRUPPELS 0,25MG/ML FLACON 5ML | KETOTIFEN-.25-MG/ML-OOGDRUPPELS | 1,678668 | ML
111380//25726 | ZADITEN OOGDRUPPELS 0,25MG/ML FLACON 5ML | KETOTIFEN-.25-MG/ML-OOGDRUPPELS | 1,678668 | ML
121176//25726 | ZADITEN OOGDRUPPELS 0,25MG/ML FLACON 5ML | KETOTIFEN-.25-MG/ML-OOGDRUPPELS | 1,678668 | ML
125184//25726 | ZADITEN OOGDRUPPELS 0,25MG/ML FLACON 5ML | KETOTIFEN-.25-MG/ML-OOGDRUPPELS | 1,678668 | ML
25726 | ZADITEN OOGDRUPPELS 0,25MG/ML FLACON 5ML | KETOTIFEN-.25-MG/ML-OOGDRUPPELS | 1,678668 | ML
110580 | KETOTIFEN STULLN UNI DO OOGDR 0,25MG/ML TUBE 0,4ML | KETOTIFEN-.25-MG/ML-OOGDRUPPELS UNITDOSE | 0,651284 | ML
25727 | ZADITEN UNIDOSE OOGDRUPPELS 0,25MG/ML TUBE 0,4ML | KETOTIFEN-.25-MG/ML-OOGDRUPPELS UNITDOSE | 0,651284 | ML
24217=14771 | KETOTIFEN APOTEX SUIKERVRIJ STROOP 0,2MG/ML | KETOTIFEN-.2-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,034968 | ML
14771 | KETOTIFEN TEVA SUIKERVRIJ STROOP 0,2MG/ML | KETOTIFEN-.2-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,034968 | ML
24103=11106 | LABETALOL HCL MYLAN TABLET 100MG | LABETALOL-100-MG-TABLET | 0,125039 | STUK
13949 | LABETALOL HCL TEVA TABLET 100MG | LABETALOL-100-MG-TABLET | 0,125039 | STUK
24104=11107 | LABETALOL HCL MYLAN TABLET 200MG | LABETALOL-200-MG-TABLET | 0,177534 | STUK
13950 | LABETALOL HCL TEVA TABLET 200MG | LABETALOL-200-MG-TABLET | 0,177534 | STUK
115291//7879 | TRANDATE INJVLST 5MG/ML AMPUL 20ML | LABETALOL-5-MG/ML-INJ.VLOEISTOF AMPUL | 0,595241 | ML
116400//7879 | TRANDATE INJVLST 5MG/ML AMPUL 20ML | LABETALOL-5-MG/ML-INJ.VLOEISTOF AMPUL | 0,595241 | ML
117413//7879 | TRANDATE INJVLST 5MG/ML AMPUL 20ML | LABETALOL-5-MG/ML-INJ.VLOEISTOF AMPUL | 0,595241 | ML
7879 | TRANDATE INJVLST 5MG/ML AMPUL 20ML | LABETALOL-5-MG/ML-INJ.VLOEISTOF AMPUL | 0,595241 | ML
EU/1/08/470/016 | VIMPAT INFVLST 10MG/ML FLACON 20ML | LACOSAMIDE-10-MG/ML-INFUUSVLOEISTOF, FLACON | 2,093869 | ML
EU/1/08/470/008 | VIMPAT TABLET OMHULD 150MG | LACOSAMIDE-150-MG-TABLET | 2,344661 | STUK
EU/1/08/470/022 | VIMPAT TABLET OMHULD 150MG | LACOSAMIDE-150-MG-TABLET | 2,344661 | STUK
EU/1/08/470/002 | VIMPAT TABLET OMHULD 50MG | LACOSAMIDE-50-MG-TABLET | 0,735145 | STUK
EU/1/08/470/020 | VIMPAT TABLET OMHULD 50MG | LACOSAMIDE-50-MG-TABLET | 0,735145 | STUK
EU/1/99/114/001 | ZEFFIX TABLET FILMOMHULD 100MG | LAMIVUDINE-100-MG-TABLET | 2,239475 | STUK
EU/1/99/114/002 | ZEFFIX TABLET FILMOMHULD 100MG | LAMIVUDINE-100-MG-TABLET | 2,239475 | STUK
EU/1/96/015/002 | EPIVIR DRANK 10MG/ML | LAMIVUDINE-10-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,176469 | ML
EU/1/96/015/001 | EPIVIR TABLET FILMOMHULD 150MG | LAMIVUDINE-150-MG-TABLET | 1,636909 | STUK
111864 | LAMIVUDINE ACCORD TABLET FILMOMHULD 150MG | LAMIVUDINE-150-MG-TABLET | 1,423737 | STUK
EU/1/09/596/007 | LAMIVUDINE TEVA TABLET FILMOMHULD 150MG | LAMIVUDINE-150-MG-TABLET | 1,636909 | STUK
EU/1/96/015/003 | EPIVIR TABLET FILMOMHULD 300MG | LAMIVUDINE-300-MG-TABLET | 3,389975 | STUK
EU/1/09/596/014 | LAMIVUDINE TEVA TABLET FILMOMHULD 300MG | LAMIVUDINE-300-MG-TABLET | 3,389975 | STUK
119924 | ABACAVIR/LAMIVUDINE GLENMARK TAB FILMOMH 600/300MG | LAMIVUDINE-300-MG-TABLET-ABACAVIR-600-MG-TABLET | 9,204939 | STUK
116726 | ABACAVIR/LAMIVUDINE MYLAN TABL FILMOMH 600/300MG | LAMIVUDINE-300-MG-TABLET-ABACAVIR-600-MG-TABLET | 7,404414 | STUK
116725 | ABACAVIR/LAMIVUDINE SANDOZ TABL FILMOMH 600/300MG | LAMIVUDINE-300-MG-TABLET-ABACAVIR-600-MG-TABLET | 9,204939 | STUK
116893 | ABACAVIR/LAMIVUDINE TEVA TABL FILMOMH 600/300MG | LAMIVUDINE-300-MG-TABLET-ABACAVIR-600-MG-TABLET | 9,204939 | STUK
EU/1/04/298/002 | KIVEXA TABLET FILMOMHULD | LAMIVUDINE-300-MG-TABLET-ABACAVIR-600-MG-TABLET | 9,204939 | STUK
EU/1/14/940/001 | TRIUMEQ TABLET FILMOMHULD | LAMIVUDINE-300-MG-TABLET-ABACAVIR-600-MG-TABLET-DOLUTEGRAVIR-50-MG-TABLET | 28,286821 | STUK
EU/1/14/940/002 | TRIUMEQ TABLET FILMOMHULD | LAMIVUDINE-300-MG-TABLET-ABACAVIR-600-MG-TABLET-DOLUTEGRAVIR-50-MG-TABLET | 28,286821 | STUK
EU/1/99/114/003 | ZEFFIX DRANK 5MG/ML | LAMIVUDINE-5-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,114165 | ML
126942//19117 | LAMICTAL DISPERS KAUW/DISPERGEERBARE TABLET 100MG | LAMOTRIGINE-100-MG-BRUISTABLET | 0,445056 | STUK
122538//19117 | LAMICTAL DISPERS KAUW/DISPERGEERBARE TABLET 100MG | LAMOTRIGINE-100-MG-BRUISTABLET | 0,458199 | STUK
19117 | LAMICTAL DISPERS KAUW/DISPERGEERBARE TABLET 100MG | LAMOTRIGINE-100-MG-BRUISTABLET | 0,458199 | STUK
105242 | LAMOTRIGINE AUROBINDO DISPERGEERBAAR TABLET 100MG | LAMOTRIGINE-100-MG-BRUISTABLET | 0,458199 | STUK
29668 | LAMOTRIGINE CF DISPERS TABLET 100MG | LAMOTRIGINE-100-MG-BRUISTABLET | 0,455316 | STUK
30304 | LAMOTRIGINE MYLAN DISPERS TABLET 100MG | LAMOTRIGINE-100-MG-BRUISTABLET | 0,458199 | STUK
29548 | LAMOTRIGINE SANDOZ DISPERS TABLET 100MG | LAMOTRIGINE-100-MG-BRUISTABLET | 0,455316 | STUK
20927 | LAMICTAL DISPERS KAUW/DISPERGEERBARE TABLET 200MG | LAMOTRIGINE-200-MG-BRUISTABLET | 0,574225 | STUK
105243 | LAMOTRIGINE AUROBINDO DISPERGEERBAAR TABLET 200MG | LAMOTRIGINE-200-MG-BRUISTABLET | 0,574225 | STUK
29669 | LAMOTRIGINE CF DISPERS TABLET 200MG | LAMOTRIGINE-200-MG-BRUISTABLET | 0,538418 | STUK
30305 | LAMOTRIGINE MYLAN DISPERS TABLET 200MG | LAMOTRIGINE-200-MG-BRUISTABLET | 0,574225 | STUK
29549 | LAMOTRIGINE SANDOZ DISPERS TABLET 200MG | LAMOTRIGINE-200-MG-BRUISTABLET | 0,538418 | STUK
19116 | LAMICTAL DISPERS KAUW/DISPERGEERBARE TABLET 25MG | LAMOTRIGINE-25-MG-BRUISTABLET | 0,190066 | STUK
105240 | LAMOTRIGINE AUROBINDO DISPERGEERBAAR TABLET 25MG | LAMOTRIGINE-25-MG-BRUISTABLET | 0,190066 | STUK
29666 | LAMOTRIGINE CF DISPERS TABLET 25MG | LAMOTRIGINE-25-MG-BRUISTABLET | 0,190066 | STUK
30302 | LAMOTRIGINE MYLAN DISPERS TABLET 25MG | LAMOTRIGINE-25-MG-BRUISTABLET | 0,190066 | STUK
29546 | LAMOTRIGINE SANDOZ DISPERS TABLET 25MG | LAMOTRIGINE-25-MG-BRUISTABLET | 0,190066 | STUK
119853//20926 | LAMICTAL DISPERS KAUW/DISPERGEERBARE TABLET 50MG | LAMOTRIGINE-50-MG-BRUISTABLET | 0,219525 | STUK
20926 | LAMICTAL DISPERS KAUW/DISPERGEERBARE TABLET 50MG | LAMOTRIGINE-50-MG-BRUISTABLET | 0,225689 | STUK
105241 | LAMOTRIGINE AUROBINDO DISPERGEERBAAR TABLET 50MG | LAMOTRIGINE-50-MG-BRUISTABLET | 0,225689 | STUK
29667 | LAMOTRIGINE CF DISPERS TABLET 50MG | LAMOTRIGINE-50-MG-BRUISTABLET | 0,219525 | STUK
30303 | LAMOTRIGINE MYLAN DISPERS TABLET 50MG | LAMOTRIGINE-50-MG-BRUISTABLET | 0,225689 | STUK
19115 | LAMICTAL DISPERS KAUW/DISPERGEERBARE TABLET 5MG | LAMOTRIGINE-5-MG-BRUISTABLET | 0,182242 | STUK
29665 | LAMOTRIGINE CF DISPERS TABLET 5MG | LAMOTRIGINE-5-MG-BRUISTABLET | 0,182242 | STUK
32791 | LANSOPRAZOL MYLAN CAPSULE MSR 15MG | LANSOPRAZOLE-15-MG-CAPSULE, MAAGSAPRESISTENT | 0,185068 | STUK
32792 | LANSOPRAZOL MYLAN CAPSULE MSR 30MG | LANSOPRAZOLE-30-MG-CAPSULE, MAAGSAPRESISTENT | 0,306024 | STUK
15420 | PREZAL CAPSULE MSR 30MG | LANSOPRAZOLE-30-MG-CAPSULE, MAAGSAPRESISTENT | 0,306024 | STUK
118969//31930 | FOSRENOL KAUWTABLET 1000MG | LANTHAAN CARBONAAT-1000-MG-KAUWDRAGEE/KAUWTABLET | 2,427701 | STUK
120155//31930 | FOSRENOL KAUWTABLET 1000MG | LANTHAAN CARBONAAT-1000-MG-KAUWDRAGEE/KAUWTABLET | 2,427701 | STUK
122251//31930 | FOSRENOL KAUWTABLET 1000MG | LANTHAAN CARBONAAT-1000-MG-KAUWDRAGEE/KAUWTABLET | 2,427701 | STUK
31930 | FOSRENOL KAUWTABLET 1000MG | LANTHAAN CARBONAAT-1000-MG-KAUWDRAGEE/KAUWTABLET | 2,427701 | STUK
109379 | FOSRENOL POEDER IN SACHET 1000MG | LANTHAAN CARBONAAT-1000-MG-POEDER/GRANULAAT, ORAAL | 2,422323 | STUK
107844//31928 | FOSRENOL KAUWTABLET 500MG | LANTHAAN CARBONAAT-500-MG-KAUWDRAGEE/KAUWTABLET | 1,636754 | STUK
108617//31928 | FOSRENOL KAUWTABLET 500MG | LANTHAAN CARBONAAT-500-MG-KAUWDRAGEE/KAUWTABLET | 1,636754 | STUK
124687//31928 | FOSRENOL KAUWTABLET 500MG | LANTHAAN CARBONAAT-500-MG-KAUWDRAGEE/KAUWTABLET | 1,636754 | STUK
31928 | FOSRENOL KAUWTABLET 500MG | LANTHAAN CARBONAAT-500-MG-KAUWDRAGEE/KAUWTABLET | 1,636754 | STUK
107878//31929 | FOSRENOL KAUWTABLET 750MG | LANTHAAN CARBONAAT-750-MG-KAUWDRAGEE/KAUWTABLET | 2,210236 | STUK
108618//31929 | FOSRENOL KAUWTABLET 750MG | LANTHAAN CARBONAAT-750-MG-KAUWDRAGEE/KAUWTABLET | 2,210236 | STUK
120713//31929 | FOSRENOL KAUWTABLET 750MG | LANTHAAN CARBONAAT-750-MG-KAUWDRAGEE/KAUWTABLET | 2,210236 | STUK
121855//31929 | FOSRENOL KAUWTABLET 750MG | LANTHAAN CARBONAAT-750-MG-KAUWDRAGEE/KAUWTABLET | 2,210236 | STUK
122252//31929 | FOSRENOL KAUWTABLET 750MG | LANTHAAN CARBONAAT-750-MG-KAUWDRAGEE/KAUWTABLET | 2,210236 | STUK
31929 | FOSRENOL KAUWTABLET 750MG | LANTHAAN CARBONAAT-750-MG-KAUWDRAGEE/KAUWTABLET | 2,210236 | STUK
109377 | FOSRENOL POEDER IN SACHET 750MG | LANTHAAN CARBONAAT-750-MG-POEDER/GRANULAAT, ORAAL | 2,215190 | STUK
EU/1/07/440/005 | TYVERB TABLET OMHULD 250MG | LAPATINIB-250-MG-TABLET | 16,404194 | STUK
EU/1/03/253/001 | ALDURAZYME INFVLST CONC 100U/ML FLACON 5ML | LARONIDASE-100-IE/ML-INFUUSVLOEISTOF, FLACON | 110,264935 | ML
102638 | LATANOPROST MYLAN OOGDRUPPELS 50MCG/ML FLAC 2,5ML | LATANOPROST-.05-MG/ML-OOGDRUPPELS | 2,638759 | ML
107918 | LATANOPROST PFIZER OOGDRUPPELS 50MCG/ML FLAC 2,5ML | LATANOPROST-.05-MG/ML-OOGDRUPPELS | 2,638759 | ML
21304 | XALATAN OOGDRUPPELS 50MCG/ML FLACON 2,5ML | LATANOPROST-.05-MG/ML-OOGDRUPPELS | 3,148828 | ML
110246 | MONOPROST OOGDRUPPELS 50MCG/ML MINIM 0,2ML | LATANOPROST-0.05-MG/ML-OOGDRUPPELS UNITDOSE | 1,524027 | ML
122512//110246 | MONOPROST OOGDRUPPELS 50MCG/ML MINIM 0,2ML | LATANOPROST-0.05-MG/ML-OOGDRUPPELS UNITDOSE | 1,524027 | ML
115290 | XALMONO UNIT DOSE OOGDRUPPELS 0,05MG/ML TUB 0,2 ML | LATANOPROST-0.05-MG/ML-OOGDRUPPELS UNITDOSE | 1,693363 | ML
126931//118920 | XALOF UNIT DOSE OOGDRUPPELS 0,05MG/ML TUBE 0,2ML | LATANOPROST-0.05-MG/ML-OOGDRUPPELS UNITDOSE | 1,468852 | ML
126246//120174 | FIXAPROST OOGDRUPPELS 50MCG/5MG/ML MINIM 0,2ML | LATANOPROST-0.05-MG/ML-OOGDRUPPELS UNITDOSE-TIMOLOL-5-MG/ML-OOGDRUPPELS UNITDOSE | 2,878365 | ML
EU/1/99/118/009 | ARAVA TABLET OMHULD 100MG | LEFLUNOMIDE-100-MG-TABLET | 10,177638 | STUK
EU/1/99/118/003 | ARAVA TABLET OMHULD 10MG | LEFLUNOMIDE-10-MG-TABLET | 1,106996 | STUK
EU/1/10/637/001 | LEFLUNOMIDE MEDAC TABLET FILMOMHULD 10MG | LEFLUNOMIDE-10-MG-TABLET | 1,094688 | STUK
106344 | LEFLUNOMIDE MYLAN TABLET FILMOMHULD 10MG | LEFLUNOMIDE-10-MG-TABLET | 1,106996 | STUK
EU/1/10/654/001 | LEFLUNOMIDE RP TABLET FILMOMHULD 10MG | LEFLUNOMIDE-10-MG-TABLET | 1,106996 | STUK
EU/1/99/118/007 | ARAVA TABLET OMHULD 20MG | LEFLUNOMIDE-20-MG-TABLET | 1,352067 | STUK
EU/1/10/637/006 | LEFLUNOMIDE MEDAC TABLET FILMOMHULD 20MG | LEFLUNOMIDE-20-MG-TABLET | 1,169117 | STUK
106346 | LEFLUNOMIDE MYLAN TABLET FILMOMHULD 20MG | LEFLUNOMIDE-20-MG-TABLET | 1,169117 | STUK
EU/1/10/654/003 | LEFLUNOMIDE RP TABLET FILMOMHULD 20MG | LEFLUNOMIDE-20-MG-TABLET | 1,216860 | STUK
EU/1/07/391/002 | REVLIMID CAPSULE 10MG | LENALIDOMIDE-10-MG-CAPSULE | 228,703410 | STUK
EU/1/07/391/003 | REVLIMID CAPSULE 15MG | LENALIDOMIDE-15-MG-CAPSULE | 236,252133 | STUK
EU/1/07/391/005 | REVLIMID CAPSULE 2,5MG | LENALIDOMIDE-2.5-MG-CAPSULE | 216,968288 | STUK
EU/1/07/391/009 | REVLIMID CAPSULE 20MG | LENALIDOMIDE-20-MG-CAPSULE | 245,673803 | STUK
EU/1/07/391/004 | REVLIMID CAPSULE 25MG | LENALIDOMIDE-25-MG-CAPSULE | 252,697092 | STUK
EU/1/07/391/001 | REVLIMID CAPSULE 5MG | LENALIDOMIDE-5-MG-CAPSULE | 220,375771 | STUK
EU/1/07/391/006 | REVLIMID CAPSULE 7,5MG | LENALIDOMIDE-7.5-MG-CAPSULE | 226,502572 | STUK
EU/1/16/1128/002 | KISPLYX CAPSULE 10MG | LENVATINIB-10-MG-CAPSULE | 59,337554 | STUK
EU/1/15/1002/002 | LENVIMA CAPSULE 10MG | LENVATINIB-10-MG-CAPSULE | 59,337554 | STUK
EU/1/16/1128/001 | KISPLYX CAPSULE 4MG | LENVATINIB-4-MG-CAPSULE | 60,160471 | STUK
EU/1/15/1002/001 | LENVIMA CAPSULE 4MG | LENVATINIB-4-MG-CAPSULE | 60,160471 | STUK
101997 | LERCANIDIPINE HCL AUROBINDO TABLET OMHULD 10MG | LERCANIDIPINE-10-MG-TABLET | 0,254090 | STUK
102330 | LERCANIDIPINE HCL MYLAN TABLET OMHULD 10MG | LERCANIDIPINE-10-MG-TABLET | 0,254090 | STUK
103614 | LERCANIDIPINE HCL PCH TABLET OMHULD 10MG | LERCANIDIPINE-10-MG-TABLET | 0,206462 | STUK
102327 | LERCANIDIPINE HCL SANDOZ TABLET OMHULD 10MG | LERCANIDIPINE-10-MG-TABLET | 0,254090 | STUK
20813 | LERDIP TABLET OMHULD 10MG | LERCANIDIPINE-10-MG-TABLET | 0,254090 | STUK
101998 | LERCANIDIPINE HCL ACTAVIS TABLET OMHULD 20MG | LERCANIDIPINE-20-MG-TABLET | 0,345436 | STUK
101998 | LERCANIDIPINE HCL AUROBINDO TABLET OMHULD 20MG | LERCANIDIPINE-20-MG-TABLET | 0,345436 | STUK
102333 | LERCANIDIPINE HCL MYLAN TABLET OMHULD 20MG | LERCANIDIPINE-20-MG-TABLET | 0,345436 | STUK
103615 | LERCANIDIPINE HCL PCH TABLET OMHULD 20MG | LERCANIDIPINE-20-MG-TABLET | 0,291681 | STUK
102328 | LERCANIDIPINE HCL SANDOZ TABLET OMHULD 20MG | LERCANIDIPINE-20-MG-TABLET | 0,345436 | STUK
28644 | LERDIP TABLET OMHULD 20MG | LERCANIDIPINE-20-MG-TABLET | 0,345436 | STUK
20755 | FEMARA TABLET OMHULD 2,5MG | LETROZOLE-2.5-MG-TABLET | 1,280689 | STUK
104889 | LETROMAN TABLET FILMOMHULD 2,5MG | LETROZOLE-2.5-MG-TABLET | 1,280689 | STUK
102441 | LETROZOL ACCORD TABLET FILMOMHULD 2,5MG | LETROZOLE-2.5-MG-TABLET | 1,280689 | STUK
106321 | LETROZOL SANDOZ TABLET FILMOMHULD 2,5MG | LETROZOLE-2.5-MG-TABLET | 1,280689 | STUK
116088//30198 | LEUPRORELINE-AC EUR-PH PDS DEP INJP WWS 11,25MG+SV | LEUPRORELIN-11.25-MG-POED. V. INJECTIE, WWSP | 277,965616 | STUK
123756//30198 | LEUPRORELINE-AC FISHER PDS DEP INJP WWS 11,25MG+SV | LEUPRORELIN-11.25-MG-POED. V. INJECTIE, WWSP | 277,965616 | STUK
105210//30198 | LUCRIN PDS DEPOT INJPDR WWSP 11,25MG + SOLVENS 1ML | LEUPRORELIN-11.25-MG-POED. V. INJECTIE, WWSP | 277,965616 | STUK
109620//30198 | LUCRIN PDS DEPOT INJPDR WWSP 11,25MG + SOLVENS 1ML | LEUPRORELIN-11.25-MG-POED. V. INJECTIE, WWSP | 277,965616 | STUK
120930//30198 | LUCRIN PDS DEPOT INJPDR WWSP 11,25MG + SOLVENS 1ML | LEUPRORELIN-11.25-MG-POED. V. INJECTIE, WWSP | 277,965616 | STUK
30198 | LUCRIN PDS DEPOT INJPDR WWSP 11,25MG + SOLVENS 1ML | LEUPRORELIN-11.25-MG-POED. V. INJECTIE, WWSP | 277,965616 | STUK
125089//31669 | ELIGARD INJPDR WWSP 22,5MG + SOLVENS | LEUPRORELIN-22.5-MG-POED. V. INJECTIE, WWSP | 225,633963 | STUK
119428//31669 | ELIGARD INJPDR WWSP 22,5MG + SOLVENS | LEUPRORELIN-22.5-MG-POED. V. INJECTIE, WWSP | 265,506804 | STUK
116050//30197 | LEUPRORELINE-AC EUR-PH PDS DEP INJP WWS 3,75MG+SV | LEUPRORELIN-3.75-MG-POED. V. INJECTIE, WWSP | 100,537419 | STUK
109619//30197 | LUCRIN PDS DEPOT INJPDR WWSP 3,75MG + SOLVENS 1ML | LEUPRORELIN-3.75-MG-POED. V. INJECTIE, WWSP | 100,537419 | STUK
100350//30197 | LUCRIN PDS DEPOT INJPDR WWSP 3,75MG + SOLVENS 1ML | LEUPRORELIN-3.75-MG-POED. V. INJECTIE, WWSP | 109,769306 | STUK
30197 | LUCRIN PDS DEPOT INJPDR WWSP 3,75MG + SOLVENS 1ML | LEUPRORELIN-3.75-MG-POED. V. INJECTIE, WWSP | 109,769306 | STUK
115653//100696 | LEUPRORELINE-AC EUR-PH PDS DEP INJP WWS 30MG+SV | LEUPRORELIN-30-MG-POED. V. INJECTIE, WWSP | 516,963588 | STUK
100696 | LUCRIN PDS DEPOT INJPDR WWSP 30MG + SOLVENS 1ML | LEUPRORELIN-30-MG-POED. V. INJECTIE, WWSP | 516,963588 | STUK
117458//100696 | LUCRIN PDS DEPOT INJPDR WWSP 30MG + SOLVENS 1ML | LEUPRORELIN-30-MG-POED. V. INJECTIE, WWSP | 516,963588 | STUK
118000//100696 | LUCRIN PDS DEPOT INJPDR WWSP 30MG + SOLVENS 1ML | LEUPRORELIN-30-MG-POED. V. INJECTIE, WWSP | 516,963588 | STUK
121929//100696 | LUCRIN PDS DEPOT INJPDR WWSP 30MG + SOLVENS 1ML | LEUPRORELIN-30-MG-POED. V. INJECTIE, WWSP | 516,963588 | STUK
123209//100696 | LUCRIN PDS DEPOT INJPDR WWSP 30MG + SOLVENS 1ML | LEUPRORELIN-30-MG-POED. V. INJECTIE, WWSP | 516,963588 | STUK
125196//100696 | LUCRIN PDS DEPOT INJPDR WWSP 30MG + SOLVENS 1ML | LEUPRORELIN-30-MG-POED. V. INJECTIE, WWSP | 516,963588 | STUK
122650//35313 | ELIGARD DEPOT 6MND INJPDR WWSP 45MG + SOLVENS | LEUPRORELIN-45-MG-POED. V. INJECTIE, WWSP | 446,562793 | STUK
122710//35313 | ELIGARD DEPOT 6MND INJPDR WWSP 45MG + SOLVENS | LEUPRORELIN-45-MG-POED. V. INJECTIE, WWSP | 446,562793 | STUK
125780//35313 | ELIGARD DEPOT 6MND INJPDR WWSP 45MG + SOLVENS | LEUPRORELIN-45-MG-POED. V. INJECTIE, WWSP | 446,562793 | STUK
126257//35313 | ELIGARD DEPOT 6MND INJPDR WWSP 45MG + SOLVENS | LEUPRORELIN-45-MG-POED. V. INJECTIE, WWSP | 446,562793 | STUK
126718//35313 | ELIGARD DEPOT 6MND INJPDR WWSP 45MG + SOLVENS | LEUPRORELIN-45-MG-POED. V. INJECTIE, WWSP | 446,562793 | STUK
126904//35313 | ELIGARD DEPOT 6MND INJPDR WWSP 45MG + SOLVENS | LEUPRORELIN-45-MG-POED. V. INJECTIE, WWSP | 446,562793 | STUK
35313 | ELIGARD DEPOT 6MND INJPDR WWSP 45MG + SOLVENS | LEUPRORELIN-45-MG-POED. V. INJECTIE, WWSP | 446,562793 | STUK
121505//35313 | ELIGARD INJPDR WWSP 45MG + SOLVENS | LEUPRORELIN-45-MG-POED. V. INJECTIE, WWSP | 446,562793 | STUK
122246//35313 | ELIGARD INJPDR WWSP 45MG + SOLVENS | LEUPRORELIN-45-MG-POED. V. INJECTIE, WWSP | 446,562793 | STUK
122650//35313 | ELIGARD INJPDR WWSP 45MG + SOLVENS | LEUPRORELIN-45-MG-POED. V. INJECTIE, WWSP | 446,562793 | STUK
123808//35313 | ELIGARD INJPDR WWSP 45MG + SOLVENS | LEUPRORELIN-45-MG-POED. V. INJECTIE, WWSP | 446,562793 | STUK
124178//35313 | ELIGARD INJPDR WWSP 45MG + SOLVENS | LEUPRORELIN-45-MG-POED. V. INJECTIE, WWSP | 446,562793 | STUK
118930//35313 | ELIGARD INJPDR WWSP 45MG + SOLVENS | LEUPRORELIN-45-MG-POED. V. INJECTIE, WWSP | 464,935689 | STUK
121167//35313 | ELIGARD INJPDR WWSP 45MG + SOLVENS | LEUPRORELIN-45-MG-POED. V. INJECTIE, WWSP | 464,935689 | STUK
30594 | LEUPRORELINE SANDOZ DEPOT 3 MND IMPL 5MG IN WWSP | LEUPRORELIN-5-MG-IMPLANTATEN | 263,015000 | STUK
125102//31668 | ELIGARD DEPOT 1MND INJPDR WWSP 7,5MG + SOLVENS | LEUPRORELIN-7.5-MG-POED. V. INJECTIE, WWSP | 91,719239 | STUK
31668 | ELIGARD DEPOT 1MND INJPDR WWSP 7,5MG + SOLVENS | LEUPRORELIN-7.5-MG-POED. V. INJECTIE, WWSP | 104,992237 | STUK
EU/1/00/146/022 | KEPPRA TABLET FILMOMHULD 1000MG | LEVETIRACETAM-1000-MG-TABLET | 0,766349 | STUK
EU/1/00/146/024 | KEPPRA TABLET FILMOMHULD 1000MG | LEVETIRACETAM-1000-MG-TABLET | 0,766349 | STUK
108585 | LEVETIRACETAM AUROBINDO TABLET FILMOMHULD 1000MG | LEVETIRACETAM-1000-MG-TABLET | 0,766349 | STUK
108493 | LEVETIRACETAM SANDOZ TABLET FILMOMHULD 1000MG | LEVETIRACETAM-1000-MG-TABLET | 0,766349 | STUK
EU/1/11/701/025 | LEVETIRACETAM TEVA TABLET FILMOMHULD 1000MG | LEVETIRACETAM-1000-MG-TABLET | 0,766349 | STUK
EU/1/11/711/025 | MATEVER TABLET FILMOMHULD 1000MG | LEVETIRACETAM-1000-MG-TABLET | 0,760623 | STUK
EU/1/00/146/033 | KEPPRA INFVLST CONC 100MG/ML FLACON 5ML | LEVETIRACETAM-100-MG/ML-INFUUSVLOEISTOF, FLACON | 2,599922 | ML
123750 | LEVETIRACETAM ALTAN INFVLST CONC 100MG/ML FL 5ML | LEVETIRACETAM-100-MG/ML-INFUUSVLOEISTOF, FLACON | 2,439129 | ML
EU/1/13/889/001 | LEVETIRACETAM HOSPIRA INFVLST CONC 100MG/ML FL 5ML | LEVETIRACETAM-100-MG/ML-INFUUSVLOEISTOF, FLACON | 2,599922 | ML
EU/1/00/146/032 | KEPPRA OPL VOOR ORAAL GEBRUIK 100MG/ML+DOS SP 1ML | LEVETIRACETAM-100-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,138537 | ML
EU/1/00/146/031 | KEPPRA OPL VOOR ORAAL GEBRUIK 100MG/ML+DOS SP 3ML | LEVETIRACETAM-100-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,138537 | ML
EU/1/00/146/027 | KEPPRA OPLOSSING VOOR ORAAL GEBRUIK 100MG/ML | LEVETIRACETAM-100-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,138537 | ML
108783 | LEVETIRACETAM AUROBINDO DRANK 100MG/ML | LEVETIRACETAM-100-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,138537 | ML
EU/1/11/702/001 | LEVETIRACETAM RP DRANK 100MG/ML | LEVETIRACETAM-100-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,138537 | ML
EU/1/00/146/002 | KEPPRA TABLET FILMOMHULD 250MG | LEVETIRACETAM-250-MG-TABLET | 0,274775 | STUK
EU/1/00/146/004 | KEPPRA TABLET FILMOMHULD 250MG | LEVETIRACETAM-250-MG-TABLET | 0,274775 | STUK
EU/1/00/146/005 | KEPPRA TABLET FILMOMHULD 250MG | LEVETIRACETAM-250-MG-TABLET | 0,274775 | STUK
108582 | LEVETIRACETAM AUROBINDO TABLET FILMOMHULD 250MG | LEVETIRACETAM-250-MG-TABLET | 0,274775 | STUK
108472 | LEVETIRACETAM CF TABLET FILMOMHULD 250MG | LEVETIRACETAM-250-MG-TABLET | 0,274775 | STUK
108489 | LEVETIRACETAM SANDOZ TABLET FILMOMHULD 250MG | LEVETIRACETAM-250-MG-TABLET | 0,274775 | STUK
EU/1/11/701/004 | LEVETIRACETAM TEVA TABLET FILMOMHULD 250MG | LEVETIRACETAM-250-MG-TABLET | 0,274775 | STUK
EU/1/11/711/004 | MATEVER TABLET FILMOMHULD 250MG | LEVETIRACETAM-250-MG-TABLET | 0,274775 | STUK
EU/1/00/146/009 | KEPPRA TABLET FILMOMHULD 500MG | LEVETIRACETAM-500-MG-TABLET | 0,449884 | STUK
EU/1/00/146/010 | KEPPRA TABLET FILMOMHULD 500MG | LEVETIRACETAM-500-MG-TABLET | 0,449884 | STUK
EU/1/00/146/011 | KEPPRA TABLET FILMOMHULD 500MG | LEVETIRACETAM-500-MG-TABLET | 0,449884 | STUK
108583 | LEVETIRACETAM AUROBINDO TABLET FILMOMHULD 500MG | LEVETIRACETAM-500-MG-TABLET | 0,449884 | STUK
108475 | LEVETIRACETAM CF TABLET FILMOMHULD 500MG | LEVETIRACETAM-500-MG-TABLET | 0,449884 | STUK
108491 | LEVETIRACETAM SANDOZ TABLET FILMOMHULD 500MG | LEVETIRACETAM-500-MG-TABLET | 0,449884 | STUK
EU/1/11/701/011 | LEVETIRACETAM TEVA TABLET FILMOMHULD 500MG | LEVETIRACETAM-500-MG-TABLET | 0,449884 | STUK
EU/1/11/711/011 | MATEVER TABLET FILMOMHULD 500MG | LEVETIRACETAM-500-MG-TABLET | 0,449884 | STUK
123674//13968 | LEVOCABASTINE BMODESTO OOGDRUPPELS 0,5MG/ML FL 4ML | LEVOCABASTINE-.5-MG/ML-OOGDRUPPELS | 1,687004 | ML
123484//13968 | LIVOCAB OOGDRUPPELS 0,5MG/ML FLACON 4ML | LEVOCABASTINE-.5-MG/ML-OOGDRUPPELS | 1,687004 | ML
13968 | LIVOCAB OOGDRUPPELS 0,5MG/ML FLACON 4ML | LEVOCABASTINE-.5-MG/ML-OOGDRUPPELS | 1,687004 | ML
11193 | CARNITENE DRANK 100MG/ML | LEVOCARNITINE-100-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,263488 | ML
100232//11193 | LEVOCARNITINE DRANK 100MG/ML | LEVOCARNITINE-100-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,263488 | ML
102436//11193 | LEVOCARNITINE ERC DRANK 100MG/ML | LEVOCARNITINE-100-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,263488 | ML
120202//33414 | LEVOCETIRIZINE DIHCL FISHER DRANK 0,5MG/ML | LEVOCETIRIZINE-0.5-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,082519 | ML
103683//33414 | XYZAL DRANK 0,5MG/ML | LEVOCETIRIZINE-0.5-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,039173 | ML
119958//33414 | XYZAL DRANK 0,5MG/ML | LEVOCETIRIZINE-0.5-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,039173 | ML
123258//33414 | XYZAL DRANK 0,5MG/ML | LEVOCETIRIZINE-0.5-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,091688 | ML
33414 | XYZAL DRANK 0,5MG/ML | LEVOCETIRIZINE-0.5-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,091688 | ML
102860 | LEVOCETIRIZINE DIHCL AUROBINDO TABLET FO 5MG | LEVOCETIRIZINE-5-MG-TABLET | 0,181039 | STUK
101132 | LEVOCETIRIZINE DIHCL MYLAN TABLET 5MG | LEVOCETIRIZINE-5-MG-TABLET | 0,169928 | STUK
34946 | LEVOCETIRIZINE DIHCL PCH TABLET FO 5MG | LEVOCETIRIZINE-5-MG-TABLET | 0,181039 | STUK
102859 | LEVOCETIRIZINE DIHCL SANDOZ TABLET FO 5MG | LEVOCETIRIZINE-5-MG-TABLET | 0,181039 | STUK
26770 | XYZAL TABLET FILMOMHULD 5MG | LEVOCETIRIZINE-5-MG-TABLET | 0,181039 | STUK
118062//12489 | MADOPAR HBS CAPSULE MGA 125MG | LEVODOPA-100-MG-CAPSULE, MET GEREGULEERDE AFGIFTE-BENSERAZIDE-25-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,136590 | STUK
123170//12489 | MADOPAR HBS CAPSULE MGA 125MG | LEVODOPA-100-MG-CAPSULE, MET GEREGULEERDE AFGIFTE-BENSERAZIDE-25-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,136590 | STUK
123360//12489 | MADOPAR HBS CAPSULE MGA 125MG | LEVODOPA-100-MG-CAPSULE, MET GEREGULEERDE AFGIFTE-BENSERAZIDE-25-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,136590 | STUK
12489 | MADOPAR HBS CAPSULE MGA 125MG | LEVODOPA-100-MG-CAPSULE, MET GEREGULEERDE AFGIFTE-BENSERAZIDE-25-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,136590 | STUK
23344//12489 | MADOPAR HBS CAPSULE MGA 125MG | LEVODOPA-100-MG-CAPSULE, MET GEREGULEERDE AFGIFTE-BENSERAZIDE-25-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,136590 | STUK
34753 | LEVODOPA/BENSERAZIDE PCH CAPSULE 100/25MG | LEVODOPA-100-MG-CAPSULE-BENSERAZIDE-25-MG-CAPSULE | 0,101961 | STUK
26892 | LEVODOPA/CARBIDOPA SDZ 125 RET TABLET MGA 100/25MG | LEVODOPA-100-MG-TABLET, MET GEREGULEERDE AFGIFTE-CARBIDOPA-25-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,184222 | STUK
27059 | LEVODOPA/CARBIDOPA TEV 125 RET TABLET MGA 100/25MG | LEVODOPA-100-MG-TABLET, MET GEREGULEERDE AFGIFTE-CARBIDOPA-25-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,184222 | STUK
108381//15175 | SINEMET CR 125 TABLET MGA 100/25MG | LEVODOPA-100-MG-TABLET, MET GEREGULEERDE AFGIFTE-CARBIDOPA-25-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,171105 | STUK
109322//15175 | SINEMET CR 125 TABLET MGA 100/25MG | LEVODOPA-100-MG-TABLET, MET GEREGULEERDE AFGIFTE-CARBIDOPA-25-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,171105 | STUK
114253 | CARBIDOPA/LEVODOPA BRISTOL 110 TABLET 10/100MG | LEVODOPA-100-MG-TABLET-CARBIDOPA-10-MG-TABLET | 0,096846 | STUK
21676 | LEVODOPA/CARBIDOPA PCH 110 TABLET 100/10MG | LEVODOPA-100-MG-TABLET-CARBIDOPA-10-MG-TABLET | 0,109903 | STUK
114255 | CARBIDOPA/LEVODOPA BRISTOL 125 TABLET 25/100MG | LEVODOPA-100-MG-TABLET-CARBIDOPA-25-MG-TABLET | 0,172385 | STUK
115381 | CARBIDOPA/LEVODOPA FAIR-MED 125 TABLET 25/100MG | LEVODOPA-100-MG-TABLET-CARBIDOPA-25-MG-TABLET | 0,185602 | STUK
110061 | LEVODOPA/CARBIDOPA MYLAN 125 TABLET 100/25MG | LEVODOPA-100-MG-TABLET-CARBIDOPA-25-MG-TABLET | 0,172385 | STUK
21677 | LEVODOPA/CARBIDOPA PCH 125 TABLET 100/25MG | LEVODOPA-100-MG-TABLET-CARBIDOPA-25-MG-TABLET | 0,172385 | STUK
120455//8740 | SINEMET 125 TABLET 100/25MG | LEVODOPA-100-MG-TABLET-CARBIDOPA-25-MG-TABLET | 0,172385 | STUK
127026//8740 | SINEMET 125 TABLET 100/25MG | LEVODOPA-100-MG-TABLET-CARBIDOPA-25-MG-TABLET | 0,172385 | STUK
123353//8740 | SINEMET 125 TABLET 100/25MG | LEVODOPA-100-MG-TABLET-CARBIDOPA-25-MG-TABLET | 0,172854 | STUK
107627//8740 | SINEMET 125 TABLET 100/25MG | LEVODOPA-100-MG-TABLET-CARBIDOPA-25-MG-TABLET | 0,185602 | STUK
8740 | SINEMET 125 TABLET 100/25MG | LEVODOPA-100-MG-TABLET-CARBIDOPA-25-MG-TABLET | 0,185602 | STUK
EU/1/13/859/014 | CORBILTA TABLET FILMOMHULD 100/25/200MG | LEVODOPA-100-MG-TABLET-CARBIDOPA-25-MG-TABLET-ENTACAPON-200-MG-TABLET | 0,545377 | STUK
114515 | LEVODOPA/CARBIDOPA/ENTACAP AUR T F 100/25/200MG | LEVODOPA-100-MG-TABLET-CARBIDOPA-25-MG-TABLET-ENTACAPON-200-MG-TABLET | 0,545377 | STUK
116868 | LEVODOPA/CARBIDOPA/ENTACAP MYL T F 100/25/200MG | LEVODOPA-100-MG-TABLET-CARBIDOPA-25-MG-TABLET-ENTACAPON-200-MG-TABLET | 0,545377 | STUK
114522 | LEVODOPA/CARBIDOPA/ENTACAP TEV T F 100/25/200MG | LEVODOPA-100-MG-TABLET-CARBIDOPA-25-MG-TABLET-ENTACAPON-200-MG-TABLET | 0,545377 | STUK
EU/1/03/260/006 | STALEVO TABLET FILMOMHULD 100/25/200MG | LEVODOPA-100-MG-TABLET-CARBIDOPA-25-MG-TABLET-ENTACAPON-200-MG-TABLET | 0,490839 | STUK
EU/1/03/260/007 | STALEVO TABLET FILMOMHULD 100/25/200MG | LEVODOPA-100-MG-TABLET-CARBIDOPA-25-MG-TABLET-ENTACAPON-200-MG-TABLET | 0,545377 | STUK
EU/1/13/859/020 | CORBILTA TABLET FILMOMHULD 125/31,25/200MG | LEVODOPA-125-MG-TABLET-CARBIDOPA-31.25-MG-TABLET-ENTACAPON-200-MG-TABLET | 0,582777 | STUK
114516 | LEVODOPA/CARBIDOPA/ENTACAP AUR T F 125/31,25/200MG | LEVODOPA-125-MG-TABLET-CARBIDOPA-31.25-MG-TABLET-ENTACAPON-200-MG-TABLET | 0,582777 | STUK
116869 | LEVODOPA/CARBIDOPA/ENTACAP MYL T F 125/31,25/200MG | LEVODOPA-125-MG-TABLET-CARBIDOPA-31.25-MG-TABLET-ENTACAPON-200-MG-TABLET | 0,582777 | STUK
114523 | LEVODOPA/CARBIDOPA/ENTACAP TEV T F 125/31,25/200MG | LEVODOPA-125-MG-TABLET-CARBIDOPA-31.25-MG-TABLET-ENTACAPON-200-MG-TABLET | 0,582777 | STUK
EU/1/03/260/031 | STALEVO TABLET FILMOMHULD 125/31,25/200MG | LEVODOPA-125-MG-TABLET-CARBIDOPA-31.25-MG-TABLET-ENTACAPON-200-MG-TABLET | 0,582777 | STUK
EU/1/13/859/025 | CORBILTA TABLET FILMOMHULD 150/37,5/200MG | LEVODOPA-150-MG-TABLET-CARBIDOPA-37.5-MG-TABLET-ENTACAPON-200-MG-TABLET | 0,556088 | STUK
114517 | LEVODOPA/CARBIDOPA/ENTACAP AUR T F 150/37,5/200MG | LEVODOPA-150-MG-TABLET-CARBIDOPA-37.5-MG-TABLET-ENTACAPON-200-MG-TABLET | 0,556088 | STUK
116870 | LEVODOPA/CARBIDOPA/ENTACAP MYL T F 150/37,5/200MG | LEVODOPA-150-MG-TABLET-CARBIDOPA-37.5-MG-TABLET-ENTACAPON-200-MG-TABLET | 0,556088 | STUK
114524 | LEVODOPA/CARBIDOPA/ENTACAP TEV T F 150/37,5/200MG | LEVODOPA-150-MG-TABLET-CARBIDOPA-37.5-MG-TABLET-ENTACAPON-200-MG-TABLET | 0,556088 | STUK
EU/1/03/260/010 | STALEVO TABLET FILMOMHULD 150/37,5/200MG | LEVODOPA-150-MG-TABLET-CARBIDOPA-37.5-MG-TABLET-ENTACAPON-200-MG-TABLET | 0,500479 | STUK
EU/1/03/260/011 | STALEVO TABLET FILMOMHULD 150/37,5/200MG | LEVODOPA-150-MG-TABLET-CARBIDOPA-37.5-MG-TABLET-ENTACAPON-200-MG-TABLET | 0,556088 | STUK
26893 | LEVODOPA/CARBIDOPA SDZ 250 RET TABLET MGA 200/50MG | LEVODOPA-200-MG-TABLET, MET GEREGULEERDE AFGIFTE-CARBIDOPA-50-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,269363 | STUK
27060 | LEVODOPA/CARBIDOPA TEV 250 RET TABLET MGA 200/50MG | LEVODOPA-200-MG-TABLET, MET GEREGULEERDE AFGIFTE-CARBIDOPA-50-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,269363 | STUK
125754//13706 | SINEMET CR 250 TABLET MGA 200/50MG | LEVODOPA-200-MG-TABLET, MET GEREGULEERDE AFGIFTE-CARBIDOPA-50-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,206908 | STUK
EU/1/13/859/036 | CORBILTA TABLET FILMOMHULD 200/50/200MG | LEVODOPA-200-MG-TABLET-CARBIDOPA-50-MG-TABLET-ENTACAPON-200-MG-TABLET | 0,566285 | STUK
114519 | LEVODOPA/CARBIDOPA/ENTACAP AUR T F 200/50/200MG | LEVODOPA-200-MG-TABLET-CARBIDOPA-50-MG-TABLET-ENTACAPON-200-MG-TABLET | 0,566285 | STUK
116872 | LEVODOPA/CARBIDOPA/ENTACAP MYL T F 200/50/200MG | LEVODOPA-200-MG-TABLET-CARBIDOPA-50-MG-TABLET-ENTACAPON-200-MG-TABLET | 0,566285 | STUK
114526 | LEVODOPA/CARBIDOPA/ENTACAP TEV T F 200/50/200MG | LEVODOPA-200-MG-TABLET-CARBIDOPA-50-MG-TABLET-ENTACAPON-200-MG-TABLET | 0,566285 | STUK
EU/1/03/260/021 | STALEVO TABLET FILMOMHULD 200/50/200MG | LEVODOPA-200-MG-TABLET-CARBIDOPA-50-MG-TABLET-ENTACAPON-200-MG-TABLET | 0,566285 | STUK
30589 | DUODOPA INTESTINALE GEL 20/5MG/ML ZAK 100ML | LEVODOPA-20-MG/ML-GEL, ORAAL-CARBIDOPA-5-MG/ML-GEL, ORAAL | 0,951504 | ML
21678 | LEVODOPA/CARBIDOPA PCH 275 TABLET 250/25MG | LEVODOPA-250-MG-TABLET-CARBIDOPA-25-MG-TABLET | 0,280700 | STUK
126490//6707 | SINEMET 275 TABLET 250/25MG | LEVODOPA-250-MG-TABLET-CARBIDOPA-25-MG-TABLET | 0,257762 | STUK
123354//6707 | SINEMET 275 TABLET 250/25MG | LEVODOPA-250-MG-TABLET-CARBIDOPA-25-MG-TABLET | 0,274189 | STUK
118807//6707 | SINEMET 275 TABLET 250/25MG | LEVODOPA-250-MG-TABLET-CARBIDOPA-25-MG-TABLET | 0,280700 | STUK
6707 | SINEMET 275 TABLET 250/25MG | LEVODOPA-250-MG-TABLET-CARBIDOPA-25-MG-TABLET | 0,280700 | STUK
34752 | LEVODOPA/BENSERAZIDE PCH CAPSULE 50/12,5MG | LEVODOPA-50-MG-CAPSULE-BENSERAZIDE-12.5-MG-CAPSULE | 0,062916 | STUK
8475 | MADOPAR CAPSULE 62,5MG | LEVODOPA-50-MG-CAPSULE-BENSERAZIDE-12.5-MG-CAPSULE | 0,059052 | STUK
8475 | MADOPAR CAPSULE 62,5MG | LEVODOPA-50-MG-CAPSULE-BENSERAZIDE-12.5-MG-CAPSULE | 0,059052 | STUK
114254 | CARBIDOPA/LEVODOPA BRISTOL 62,5 TABLET 12,5/50MG | LEVODOPA-50-MG-TABLET-CARBIDOPA-12.5-MG-TABLET | 0,135808 | STUK
12858 | SINEMET 62,5 TABLET | LEVODOPA-50-MG-TABLET-CARBIDOPA-12.5-MG-TABLET | 0,135808 | STUK
112452//12858 | SINEMET 62,5 TABLET 50/12,5MG | LEVODOPA-50-MG-TABLET-CARBIDOPA-12.5-MG-TABLET | 0,135808 | STUK
122805//12858 | SINEMET 62,5 TABLET 50/12,5MG | LEVODOPA-50-MG-TABLET-CARBIDOPA-12.5-MG-TABLET | 0,135808 | STUK
12858 | SINEMET 62,5 TABLET 50/12,5MG | LEVODOPA-50-MG-TABLET-CARBIDOPA-12.5-MG-TABLET | 0,135808 | STUK
EU/1/13/859/003 | CORBILTA TABLET FILMOMHULD 50/12,5/200MG | LEVODOPA-50-MG-TABLET-CARBIDOPA-12.5-MG-TABLET-ENTACAPON-200-MG-TABLET | 0,530784 | STUK
116866 | LEVODOPA/CARBIDOPA/ENTACAP MYL T F 50/12,5/200MG | LEVODOPA-50-MG-TABLET-CARBIDOPA-12.5-MG-TABLET-ENTACAPON-200-MG-TABLET | 0,530784 | STUK
114520 | LEVODOPA/CARBIDOPA/ENTACAP TEV T F 50/12,5/200MG | LEVODOPA-50-MG-TABLET-CARBIDOPA-12.5-MG-TABLET-ENTACAPON-200-MG-TABLET | 0,530784 | STUK
EU/1/03/260/003 | STALEVO TABLET FILMOMHULD 50/12,5/200MG | LEVODOPA-50-MG-TABLET-CARBIDOPA-12.5-MG-TABLET-ENTACAPON-200-MG-TABLET | 0,530784 | STUK
EU/1/13/859/009 | CORBILTA TABLET FILMOMHULD 75/18,75/200MG | LEVODOPA-75-MG-TABLET-CARBIDOPA-18.75-MG-TABLET-ENTACAPON-200-MG-TABLET | 0,576653 | STUK
116867 | LEVODOPA/CARBIDOPA/ENTACAP MYL T F 75/18,75/200MG | LEVODOPA-75-MG-TABLET-CARBIDOPA-18.75-MG-TABLET-ENTACAPON-200-MG-TABLET | 0,576653 | STUK
114521 | LEVODOPA/CARBIDOPA/ENTACAP TEV T F 75/18,75/200MG | LEVODOPA-75-MG-TABLET-CARBIDOPA-18.75-MG-TABLET-ENTACAPON-200-MG-TABLET | 0,576653 | STUK
EU/1/03/260/026 | STALEVO TABLET FILMOMHULD 75/18,75/200MG | LEVODOPA-75-MG-TABLET-CARBIDOPA-18.75-MG-TABLET-ENTACAPON-200-MG-TABLET | 0,576653 | STUK
EU/1/14/973/001 | QUINSAIR VERNOPL 100MG/ML AMP 2,4ML+ZIRELA VERNEV | LEVOFLOXACINE-100-MG/ML-INHALATIEVLOEISTOF UNITDOSE | 18,929367 | ML
102704 | LEVOFLOXACINE PCH TABLET FILMOMHULD 250MG | LEVOFLOXACINE-250-MG-TABLET | 1,093372 | STUK
100799 | LEVOFLOXACINE SANDOZ TABLET FILMOMHULD 250MG | LEVOFLOXACINE-250-MG-TABLET | 1,093372 | STUK
102705 | LEVOFLOXACINE PCH TABLET FILMOMHULD 500MG | LEVOFLOXACINE-500-MG-TABLET | 1,944379 | STUK
100802 | LEVOFLOXACINE SANDOZ TABLET FILMOMHULD 500MG | LEVOFLOXACINE-500-MG-TABLET | 1,944379 | STUK
108785 | LEVOFLOXACINE CLARIS INFVLST 5MG/ML FLACON 100ML | LEVOFLOXACINE-5-MG/ML-INFUUSVLOEISTOF, FLACON | 0,221245 | ML
108785 | LEVOFLOXACINE CLARIS INFVLST 5MG/ML ZAK 100ML | LEVOFLOXACINE-5-MG/ML-INFUUSVLOEISTOF, FLACON | 0,221245 | ML
102216 | LEVOFLOXACINE FRES KABI INFVLST 5MG/ML ZAK 100ML | LEVOFLOXACINE-5-MG/ML-INFUUSVLOEISTOF, FLACON | 0,221245 | ML
109166 | LEVOFLOXACINE HIKMA INFVLST 5MG/ML FLACON 100ML | LEVOFLOXACINE-5-MG/ML-INFUUSVLOEISTOF, FLACON | 0,221245 | ML
109166 | LEVOFLOXACINE HIKMA INFVLST 5MG/ML ZAK 100ML | LEVOFLOXACINE-5-MG/ML-INFUUSVLOEISTOF, FLACON | 0,221245 | ML
21810 | TAVANIC INFUSIEVLOEISTOF 5MG/ML FLACON 100ML | LEVOFLOXACINE-5-MG/ML-INFUUSVLOEISTOF, FLACON | 0,240777 | ML
11718 | EUTHYROX TABLET 25MCG | LEVOTHYROXINE SODIUM-.025-MG-TABLET | 0,040438 | STUK
9334 | THYRAX DUOTAB TABLET 0,025MG | LEVOTHYROXINE SODIUM-.025-MG-TABLET | 0,040438 | STUK
9334 | THYRAX TABLET 0,025MG | LEVOTHYROXINE SODIUM-.025-MG-TABLET | 0,040438 | STUK
8451 | ELTROXIN 50 TABLET 50MCG | LEVOTHYROXINE SODIUM-.05-MG-TABLET | 0,035562 | STUK
11344 | EUTHYROX TABLET 50MCG | LEVOTHYROXINE SODIUM-.05-MG-TABLET | 0,035562 | STUK
57234 | LEVOTHYROXINE NYCOMED TABLET 50MCG | LEVOTHYROXINE SODIUM-.05-MG-TABLET | 0,035562 | STUK
21494 | EUTHYROX TABLET 75MCG | LEVOTHYROXINE SODIUM-.075-MG-TABLET | 0,057509 | STUK
114981//15468 | EUTHYROX TABLET 125MCG | LEVOTHYROXINE SODIUM-.125-MG-TABLET | 0,047090 | STUK
121052//15468 | EUTHYROX TABLET 125MCG | LEVOTHYROXINE SODIUM-.125-MG-TABLET | 0,047090 | STUK
15468 | EUTHYROX TABLET 125MCG | LEVOTHYROXINE SODIUM-.125-MG-TABLET | 0,047090 | STUK
108557 | LEVOTHYROXINENATRIUM TEVA TABLET 125MCG | LEVOTHYROXINE SODIUM-.125-MG-TABLET | 0,052411 | STUK
11345 | EUTHYROX TABLET 150MCG | LEVOTHYROXINE SODIUM-.15-MG-TABLET | 0,052958 | STUK
108558 | LEVOTHYROXINENATRIUM TEVA TABLET 150MCG | LEVOTHYROXINE SODIUM-.15-MG-TABLET | 0,063501 | STUK
13683 | THYRAX DUOTAB TABLET 0,150MG | LEVOTHYROXINE SODIUM-.15-MG-TABLET | 0,063501 | STUK
26173 | EUTHYROX TABLET 175MCG | LEVOTHYROXINE SODIUM-.175-MG-TABLET | 0,059225 | STUK
108559 | LEVOTHYROXINENATRIUM TEVA TABLET 175MCG | LEVOTHYROXINE SODIUM-.175-MG-TABLET | 0,067621 | STUK
8452 | ELTROXIN 100 TABLET 100MCG | LEVOTHYROXINE SODIUM-.1-MG-TABLET | 0,046440 | STUK
9009 | EUTHYROX TABLET 100MCG | LEVOTHYROXINE SODIUM-.1-MG-TABLET | 0,046440 | STUK
8389 | THYRAX DUOTAB TABLET 0,100MG | LEVOTHYROXINE SODIUM-.1-MG-TABLET | 0,046440 | STUK
8389 | THYRAX TABLET 0,1MG | LEVOTHYROXINE SODIUM-.1-MG-TABLET | 0,046440 | STUK
26174 | EUTHYROX TABLET 200MCG | LEVOTHYROXINE SODIUM-.2-MG-TABLET | 0,064497 | STUK
121815 | LEVOTHYROXINENATRIUM ARISTO TABLET 200MCG | LEVOTHYROXINE SODIUM-.2-MG-TABLET | 0,064497 | STUK
108560 | LEVOTHYROXINENATRIUM TEVA TABLET 200MCG | LEVOTHYROXINE SODIUM-.2-MG-TABLET | 0,074127 | STUK
115964//11015 | EMLA HYDROFIELE CREME 50MG/G | LIDOCAINE-25-MG/G-CREME, CUTAAN-PRILOCAINE-25-MG/G-CREME, CUTAAN | 0,639405 | G
125330//11015 | EMLA HYDROFIELE CREME 50MG/G | LIDOCAINE-25-MG/G-CREME, CUTAAN-PRILOCAINE-25-MG/G-CREME, CUTAAN | 0,639405 | G
100630//11015 | EMLA HYDROFIELE CREME 50MG/G | LIDOCAINE-25-MG/G-CREME, CUTAAN-PRILOCAINE-25-MG/G-CREME, CUTAAN | 0,645505 | G
11015 | EMLA HYDROFIELE CREME 50MG/G | LIDOCAINE-25-MG/G-CREME, CUTAAN-PRILOCAINE-25-MG/G-CREME, CUTAAN | 0,645505 | G
32297//11015 | EMLA HYDROFIELE CREME 50MG/G | LIDOCAINE-25-MG/G-CREME, CUTAAN-PRILOCAINE-25-MG/G-CREME, CUTAAN | 0,645505 | G
35253//11015 | EMLA HYDROFIELE CREME 50MG/G | LIDOCAINE-25-MG/G-CREME, CUTAAN-PRILOCAINE-25-MG/G-CREME, CUTAAN | 0,645505 | G
115128 | LIDOCAINE/PRILOCAINE TEVA CREME 25/25MG/G | LIDOCAINE-25-MG/G-CREME, CUTAAN-PRILOCAINE-25-MG/G-CREME, CUTAAN | 0,639405 | G
EU/1/11/707/003 | TRAJENTA TABLET 5MG | LINAGLIPTINE-5-MG-TABLET | 1,280060 | STUK
EU/1/11/707/004 | TRAJENTA TABLET 5MG | LINAGLIPTINE-5-MG-TABLET | 1,280060 | STUK
EU/1/11/707/008 | TRAJENTA TABLET 5MG | LINAGLIPTINE-5-MG-TABLET | 1,280060 | STUK
126780//26567 | LINEZOLID EURECO-PHARMA INFVLST 2MG/ML ZAK 300ML | LINEZOLIDE-2-MG/ML-INFUUSVLOEISTOF, FLACON | 0,131803 | ML
26567 | ZYVOXID INFUSIEVLOEISTOF 2MG/ML ZAK 300ML | LINEZOLIDE-2-MG/ML-INFUUSVLOEISTOF, FLACON | 0,132361 | ML
26569 | ZYVOXID TABLET FILMOMHULD 600MG | LINEZOLIDE-600-MG-TABLET | 38,139095 | STUK
EU/1/13/856/001 | LONQUEX INJVLST 10MG/ML WWSP 0,6ML | LIPEGFILGRASTIM-10-MG/ML-INJ.VLOEISTOF, WWSP | 1135,530984 | ML
EU/1/14/947/002 | XULTOPHY INJVLST 100E/3,6MG/ML PEN 3ML | LIRAGLUTIDE-3.6-MG/ML-INJ.VLOEISTOF WWSP-INSULIN DEGLUDEC-100-IE/ML-INJ.VLOEISTOF WWSP | 11,690034 | ML
EU/1/14/947/003 | XULTOPHY INJVLST 100E/3,6MG/ML PEN 3ML | LIRAGLUTIDE-3.6-MG/ML-INJ.VLOEISTOF WWSP-INSULIN DEGLUDEC-100-IE/ML-INJ.VLOEISTOF WWSP | 11,690034 | ML
EU/1/15/992/003 | SAXENDA INJVLST 6MG/ML PEN 3ML | LIRAGLUTIDE-6-MG/ML-INJ.VLOEISTOF, WWSP | 15,156846 | ML
EU/1/09/529/002 | VICTOZA INJVLST 6MG/ML WWSP 3ML | LIRAGLUTIDE-6-MG/ML-INJ.VLOEISTOF, WWSP | 15,156846 | ML
EU/1/09/529/003 | VICTOZA INJVLST 6MG/ML WWSP 3ML | LIRAGLUTIDE-6-MG/ML-INJ.VLOEISTOF, WWSP | 15,156846 | ML
124498 | ELVANSE CAPSULE 20MG | LISDEXAMFETAMINE-20-MG-CAPSULE | 2,370389 | STUK
124489 | ELVANSE CAPSULE 30MG | LISDEXAMFETAMINE-30-MG-CAPSULE | 2,506458 | STUK
124496 | ELVANSE CAPSULE 50MG | LISDEXAMFETAMINE-50-MG-CAPSULE | 2,862557 | STUK
27122 | LISINOPRIL APOTEX TABLET 10MG | LISINOPRIL-10-MG-TABLET | 0,118957 | STUK
26362 | LISINOPRIL CF TABLET 10MG | LISINOPRIL-10-MG-TABLET | 0,118957 | STUK
27913 | LISINOPRIL MYLAN TABLET 10MG | LISINOPRIL-10-MG-TABLET | 0,118210 | STUK
28425 | LISINOPRIL SANDOZ TABLET 10MG | LISINOPRIL-10-MG-TABLET | 0,118957 | STUK
26332 | LISINOPRIL TEVA TABLET 10MG | LISINOPRIL-10-MG-TABLET | 0,118957 | STUK
26363 | LISINOPRIL CF TABLET 20MG | LISINOPRIL-20-MG-TABLET | 0,150805 | STUK
27914 | LISINOPRIL MYLAN TABLET 20MG | LISINOPRIL-20-MG-TABLET | 0,137861 | STUK
28426 | LISINOPRIL SANDOZ TABLET 20MG | LISINOPRIL-20-MG-TABLET | 0,150805 | STUK
26333 | LISINOPRIL TEVA TABLET 20MG | LISINOPRIL-20-MG-TABLET | 0,150805 | STUK
12562 | ZESTRIL TABLET 20MG | LISINOPRIL-20-MG-TABLET | 0,137861 | STUK
26361 | LISINOPRIL CF TABLET 5MG | LISINOPRIL-5-MG-TABLET | 0,084774 | STUK
28424 | LISINOPRIL SANDOZ TABLET 5MG | LISINOPRIL-5-MG-TABLET | 0,085195 | STUK
26331 | LISINOPRIL TEVA TABLET 5MG | LISINOPRIL-5-MG-TABLET | 0,085195 | STUK
9013 | CAMCOLIT TABLET 400MG | LITHIUM-400-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,216882 | STUK
55992 | LITHIUMCARBONAAT TEVA TABLET 400MG | LITHIUM-400-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,216882 | STUK
5821 | PRIADEL TABLET MGA 400MG | LITHIUM-400-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,216882 | STUK
EU/1/12/811/003 | LYXUMIA 20 INJVLST 100MCG/ML PEN 3ML | LIXISENATIDE-0.1-MG/ML-INJ.VLOEISTOF, WWSP | 12,018661 | ML
EU/1/13/851/002 | LOJUXTA CAPSULE 10MG | LOMITAPIDE-10-MG-CAPSULE | 746,668278 | STUK
EU/1/13/851/003 | LOJUXTA CAPSULE 20MG | LOMITAPIDE-20-MG-CAPSULE | 746,668278 | STUK
EU/1/13/851/001 | LOJUXTA CAPSULE 5MG | LOMITAPIDE-5-MG-CAPSULE | 746,668278 | STUK
7439 | BELUSTINE CAPSULE 40MG | LOMUSTINE-40-MG-CAPSULE | 38,561869 | STUK
9882 | DORMONOCT TABLET 1MG | LOPRAZOLAM-1-MG-TABLET | 0,444861 | STUK
57547 | LORAZEPAM APOTEX TABLET 1MG | LORAZEPAM-1-MG-TABLET | 0,101761 | STUK
55938 | LORAZEPAM CF TABLET 1MG | LORAZEPAM-1-MG-TABLET | 0,101761 | STUK
28844=19695 | LORAZEPAM MYLAN TABLET 1MG | LORAZEPAM-1-MG-TABLET | 0,101761 | STUK
119556 | LORAZEPAM PROLEPHA TABLET 1MG | LORAZEPAM-1-MG-TABLET | 0,101761 | STUK
57548 | LORAZEPAM APOTEX TABLET 2,5MG | LORAZEPAM-2.5-MG-TABLET | 0,182578 | STUK
28845=19696 | LORAZEPAM MYLAN TABLET 2,5MG | LORAZEPAM-2.5-MG-TABLET | 0,182578 | STUK
119557 | LORAZEPAM PROLEPHA TABLET 2,5MG | LORAZEPAM-2.5-MG-TABLET | 0,182578 | STUK
8192 | TEMESTA INJVLST 4MG/ML AMPUL 1ML | LORAZEPAM-4-MG/ML-INJ.VLOEISTOF AMPUL | 6,784327 | ML
EU/1/19/1355/002 | LORVIQUA TABLET FILMOMHULD 100MG | LORLATINIB-100-MG-TABLET | 181,271123 | STUK
EU/1/19/1355/003 | LORVIQUA TABLET FILMOMHULD 25MG | LORLATINIB-25-MG-TABLET | 60,423707 | STUK
24657 | LORMETAZEPAM APOTEX TABLET 1MG | LORMETAZEPAM-1-MG-TABLET | 0,275650 | STUK
25956=23458 | LORMETAZEPAM MYLAN TABLET 1MG | LORMETAZEPAM-1-MG-TABLET | 0,275650 | STUK
16364 | LORMETAZEPAM SANDOZ TABLET 1MG | LORMETAZEPAM-1-MG-TABLET | 0,275650 | STUK
56771 | LORMETAZEPAM TEVA TABLET 1MG | LORMETAZEPAM-1-MG-TABLET | 0,275650 | STUK
24658 | LORMETAZEPAM APOTEX TABLET 2MG | LORMETAZEPAM-2-MG-TABLET | 0,170962 | STUK
25957=23459 | LORMETAZEPAM MYLAN TABLET 2MG | LORMETAZEPAM-2-MG-TABLET | 0,170962 | STUK
16365 | LORMETAZEPAM SANDOZ TABLET 2MG | LORMETAZEPAM-2-MG-TABLET | 0,155645 | STUK
56772 | LORMETAZEPAM TEVA TABLET 2MG | LORMETAZEPAM-2-MG-TABLET | 0,155645 | STUK
26791 | COZAAR TABLET FILMOMHULD 100MG | LOSARTAN-100-MG-TABLET | 0,243748 | STUK
31871 | KALIUMLOSARTAN SANDOZ TABLET FILMOMHULD 100MG | LOSARTAN-100-MG-TABLET | 0,243748 | STUK
105819 | LOSARTAN KALIUM AUROBINDO TABLET OMHULD 100MG | LOSARTAN-100-MG-TABLET | 0,243748 | STUK
33986 | LOSARTAN KALIUM MYLAN TABLET OMHULD 100MG | LOSARTAN-100-MG-TABLET | 0,227267 | STUK
34190 | LOSARTAN KALIUM PCH TABLET OMHULD 100MG | LOSARTAN-100-MG-TABLET | 0,227267 | STUK
111522//17617 | COZAAR TABLET FILMOMHULD 50MG | LOSARTAN-50-MG-TABLET | 0,202062 | STUK
17617 | COZAAR TABLET FILMOMHULD 50MG | LOSARTAN-50-MG-TABLET | 0,202062 | STUK
31869 | KALIUMLOSARTAN SANDOZ TABLET FILMOMHULD 50MG | LOSARTAN-50-MG-TABLET | 0,202062 | STUK
34189 | LOSARTAN KALIUM PCH TABLET OMHULD 50MG | LOSARTAN-50-MG-TABLET | 0,183689 | STUK
EU/1/13/893/002 | OPSUMIT TABLET FILMOMHULD 10MG | MACITENTAN-10-MG-TABLET | 89,596377 | STUK
EU/1/07/418/003 | CELSENTRI TABLET FILMOMHULD 150MG | MARAVIROC-150-MG-TABLET | 12,392238 | STUK
EU/1/07/418/011 | CELSENTRI TABLET FILMOMHULD 25MG | MARAVIROC-25-MG-TABLET | 1,871992 | STUK
EU/1/07/418/008 | CELSENTRI TABLET FILMOMHULD 300MG | MARAVIROC-300-MG-TABLET | 12,393563 | STUK
EU/1/07/418/012 | CELSENTRI TABLET FILMOMHULD 75MG | MARAVIROC-75-MG-TABLET | 5,650697 | STUK
11657 | DUSPATAL RETARD CAPSULE MGA 200MG | MEBEVERINE-200-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,216499 | STUK
119122 | MEBEVERINE HCL AUROBINDO RETARD CAPS MGA 200MG | MEBEVERINE-200-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,216499 | STUK
EU/1/07/402/001 | INCRELEX INJVLST 10MG/ML FLACON 4ML | MECASERMIN-10-MG/ML-INJECTIEVLOEISTOF, FLAC | 158,626627 | ML
9986 | PROVERA TABLET 10MG | MEDROXYPROGESTERONE-10-MG-TABLET | 0,249664 | STUK
6602 | DEPO PROVERA 150 INJSUSP 150MG/ML WWSP 1ML | MEDROXYPROGESTERONE-150-MG/ML-INJ.VLOEISTOF, WWSP | 5,147140 | ML
9049 | DEPO PROVERA 500 INJSUSP 150MG/ML FLACON 3,3ML | MEDROXYPROGESTERONE-150-MG/ML-INJECTIEVLOEISTOF, FLAC | 5,518939 | ML
125081//106064 | SAYANA PRESS INJSUSP 160MG/ML WWSP 0,65ML | MEDROXYPROGESTERONE-160-MG/ML-INJ.VLOEISTOF, WWSP | 21,036325 | ML
601 | PROVERA TABLET 5MG | MEDROXYPROGESTERONE-5-MG-TABLET | 0,121659 | STUK
109318//11154 | LARIAM TABLET 250MG | MEFLOQUINE-250-MG-TABLET | 2,658543 | STUK
113048//11154 | LARIAM TABLET 250MG | MEFLOQUINE-250-MG-TABLET | 2,658543 | STUK
124833//11154 | LARIAM TABLET 250MG | MEFLOQUINE-250-MG-TABLET | 2,658543 | STUK
25365//11154 | LARIAM TABLET 250MG | MEFLOQUINE-250-MG-TABLET | 2,658543 | STUK
15579 | MEGESTROLACETAAT PCH TABLET 160MG | MEGESTROL-160-MG-TABLET | 3,613384 | STUK
20077 | UROGRAFIN INFUSIEVLOEISTOF 300MG/ML FLACON 250ML | MEGLUMINEAMIDOTRIZOAAT-260-MG/ML-INFUUSVLOEISTOF, FLACON-NATRIUMAMIDOTRIZOAAT-40-MG/ML-INFUUSVLOEISTOF, FLACON | 0,103808 | ML
20018 | GASTROGRAFIN DRANK/CONC V KLYSMA 370MGI/ML | MEGLUMINEAMIDOTRIZOAAT-660-MG/ML-OPLOSSING/SUSPENSIE, ORAAL-NATRIUMAMIDOTRIZOAAT-100-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,164984 | ML
32716 | MELOXICAM SANDOZ TABLET 15MG | MELOXICAM-15-MG-TABLET | 0,271376 | STUK
100512 | MELOXICAM UNICHEM TABLET 15MG | MELOXICAM-15-MG-TABLET | 0,271376 | STUK
32715 | MELOXICAM SANDOZ TABLET 7,5MG | MELOXICAM-7.5-MG-TABLET | 0,184001 | STUK
100494 | MELOXICAM UNICHEM TABLET 7,5MG | MELOXICAM-7.5-MG-TABLET | 0,184001 | STUK
125379//4473 | ALKERAN TABLET FILMOMHULD 2MG | MELPHALAN-2-MG-TABLET | 1,500752 | STUK
126086//4473 | ALKERAN TABLET FILMOMHULD 2MG | MELPHALAN-2-MG-TABLET | 1,500752 | STUK
4473 | ALKERAN TABLET FILMOMHULD 2MG | MELPHALAN-2-MG-TABLET | 2,369788 | STUK
6690 | ALKERAN INFUSIEPOEDER FLACON 50MG + SOLVENS 10ML | MELPHALAN-50-MG-POED. V. INFUSIE,FLACON | 150,907748 | STUK
120933 | MELFALAN HCL SUN INJ/INFUSIEPOEDER FL 50MG+SV 10ML | MELPHALAN-50-MG-POED. V. INFUSIE,FLACON | 150,907748 | STUK
121181 | MELFALAN HCL TEVA INJ/INFUSIEPOEDER FL50MG+SV 10ML | MELPHALAN-50-MG-POED. V. INFUSIE,FLACON | 179,407715 | STUK
122983 | MELFALAN TILLOMED INJ/INFUSIEPDR FL50MG+SV 10ML | MELPHALAN-50-MG-POED. V. INFUSIE,FLACON | 150,907748 | STUK
EU/1/02/219/005 | EBIXA OPLOSSING 5MG/POMPDOSIS 0,5ML | MEMANTINE-10-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 1,076172 | ML
EU/1/02/219/002 | EBIXA TABLET FILMOMHULD 10MG | MEMANTINE-10-MG-TABLET | 0,511684 | STUK
EU/1/02/219/003 | EBIXA TABLET FILMOMHULD 10MG | MEMANTINE-10-MG-TABLET | 0,511684 | STUK
EU/1/02/219/009 | EBIXA TABLET FILMOMHULD 10MG | MEMANTINE-10-MG-TABLET | 0,511684 | STUK
EU/1/02/219/017 | EBIXA TABLET FILMOMHULD 10MG | MEMANTINE-10-MG-TABLET | 0,511684 | STUK
EU/1/02/219/020 | EBIXA TABLET FILMOMHULD 10MG | MEMANTINE-10-MG-TABLET | 0,511684 | STUK
EU/1/02/219/008 | EBIXA TABLET FILMOMHULD 10MG | MEMANTINE-10-MG-TABLET | 0,530506 | STUK
EU/1/02/219/031 | EBIXA TABLET FILMOMHULD 20MG | MEMANTINE-20-MG-TABLET | 0,946102 | STUK
EU/1/02/219/024 | EBIXA TABLET FILMOMHULD 20MG | MEMANTINE-20-MG-TABLET | 1,022963 | STUK
EU/1/02/219/027 | EBIXA TABLET FILMOMHULD 20MG | MEMANTINE-20-MG-TABLET | 1,022963 | STUK
EU/1/13/824/014 | NEMDATINE TABLET FILMOMHULD 20MG | MEMANTINE-20-MG-TABLET | 1,022963 | STUK
EU/1/02/219/022 | EBIXA STARTVERPAKKING (7X5MG+7X10MG+7X15MG+7X20MG) | MEMANTINE-5-MG-TABLET-MEMANTINE FASE 2-10-MG-TABLET-MEMANTINE FASE 3-15-MG-TABLET-MEMANTINE FASE 4-20-MG-TABLET | 1,570210 | STUK
EU/1/15/1043/003 | NUCALA INJVLST 100MG/ML PEN 1ML | MEPOLIZUMAB-100-MG-INJ.VLOEISTOF, WWSP | 994,899564 | STUK
EU/1/15/1043/001 | NUCALA INJECTIEPOEDER FLACON 100MG | MEPOLIZUMAB-100-MG-POED. V. INJECTIE, FLACON | 1042,762027 | STUK
EU/1/97/039/003 | CYSTAGON CAPSULE 150MG | MERCAPTAMINE-150-MG-CAPSULE | 2,277397 | STUK
EU/1/15/1049/001 | CYSTADROPS OOGDRUPPELS 3,8MG/ML FLACON 5ML | MERCAPTAMINE-3.8-MG/ML-OOGDRUPPELS | 210,077352 | ML
EU/1/97/039/001 | CYSTAGON CAPSULE 50MG | MERCAPTAMINE-50-MG-CAPSULE | 0,880110 | STUK
123271//859 | MERCAPTOPURINE BMODESTO TABLET 50MG | MERCAPTOPURINE-50-MG-TABLET | 1,318584 | STUK
103686//859 | PURINETHOL TABLET 50MG | MERCAPTOPURINE-50-MG-TABLET | 1,318584 | STUK
123693//859 | PURINETHOL TABLET 50MG | MERCAPTOPURINE-50-MG-TABLET | 1,318584 | STUK
125552//859 | PURINETHOL TABLET 50MG | MERCAPTOPURINE-50-MG-TABLET | 1,318584 | STUK
125569//859 | PURINETHOL TABLET 50MG | MERCAPTOPURINE-50-MG-TABLET | 1,318584 | STUK
859 | PURINETHOL TABLET 50MG | MERCAPTOPURINE-50-MG-TABLET | 1,318584 | STUK
119963 | MEROPENEM BRADEX INF/INJPDR FLACON 1000MG | MEROPENEM-1000-MG-POED. V. INJECTIE, FLACON | 16,165119 | STUK
109675 | MEROPENEM CF INF/INJPDR FLACON 1000MG | MEROPENEM-1000-MG-POED. V. INJECTIE, FLACON | 18,133393 | STUK
126244//106296 | MEROPENEM EURECO-PHARMA INF/INJPDR FLACON 1000MG | MEROPENEM-1000-MG-POED. V. INJECTIE, FLACON | 16,165119 | STUK
105441 | MEROPENEM FRESENIUS KABI INF/INJPDR FLACON 1000MG | MEROPENEM-1000-MG-POED. V. INJECTIE, FLACON | 16,165119 | STUK
102987 | MEROPENEM HIKMA INF/INJPDR FLACON 1000MG | MEROPENEM-1000-MG-POED. V. INJECTIE, FLACON | 16,165119 | STUK
119962 | MEROPENEM BRADEX INF/INJPDR FLACON 500MG | MEROPENEM-500-MG-POED. V. INJECTIE, FLACON | 8,839731 | STUK
126242//106294 | MEROPENEM EURECO-PHARMA INF/INJPDR FLACON 500MG | MEROPENEM-500-MG-POED. V. INJECTIE, FLACON | 8,839731 | STUK
105437 | MEROPENEM FRESENIUS KABI INF/INJPDR FLACON 500MG | MEROPENEM-500-MG-POED. V. INJECTIE, FLACON | 8,839731 | STUK
102986 | MEROPENEM HIKMA INF/INJPDR FLACON 500MG | MEROPENEM-500-MG-POED. V. INJECTIE, FLACON | 8,839731 | STUK
118906//18706 | PENTASA COMPACT GRANULAAT MVA 1G IN SACHET | MESALAZINE-1000-MG-GRANULAAT MET GEREGULEERDE AFGIFTE, VERDEELD | 0,648337 | STUK
18706 | PENTASA COMPACT GRANULAAT MVA 1G IN SACHET | MESALAZINE-1000-MG-GRANULAAT MET GEREGULEERDE AFGIFTE, VERDEELD | 0,684513 | STUK
120181//18706 | PENTASA GRANULAAT MVA 1G IN SACHET | MESALAZINE-1000-MG-GRANULAAT MET GEREGULEERDE AFGIFTE, VERDEELD | 0,684513 | STUK
116434//28179 | SALOFALK SCHUIM 1G/DO FLACON 14DO | MESALAZINE-1000-MG-SCHUIM, RECTAAL | 2,534470 | DOSIS
28179 | SALOFALK SCHUIM 1G/DO FLACON 14DO | MESALAZINE-1000-MG-SCHUIM, RECTAAL | 2,534470 | DOSIS
105712 | PENTASA TABLET MVA 1G | MESALAZINE-1000-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,726043 | STUK
119164//15064 | PENTASA ZETPIL 1G | MESALAZINE-1000-MG-ZETPIL | 1,316308 | STUK
124870//15064 | PENTASA ZETPIL 1G | MESALAZINE-1000-MG-ZETPIL | 1,316308 | STUK
15064 | PENTASA ZETPIL 1G | MESALAZINE-1000-MG-ZETPIL | 1,316308 | STUK
102870 | SALOFALK ZETPIL 1G | MESALAZINE-1000-MG-ZETPIL | 1,703946 | STUK
11782 | PENTASA KLYSMA 10MG/ML FLACON 100ML | MESALAZINE-10-MG/G-KLYSMA | 0,031790 | ML
110055//33600 | MESALAZINE ERC TABLET MVA 1200MG | MESALAZINE-1200-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,966224 | STUK
110161//33600 | MEZAVANT TABLET MVA 1200MG | MESALAZINE-1200-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,966224 | STUK
33600 | MEZAVANT TABLET MVA 1200MG | MESALAZINE-1200-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,966224 | STUK
100059 | SALOFALK GRANU-STIX GRANULAAT MGA 1,5G IN SACHET | MESALAZINE-1500-MG-GRANULAAT, MAAGSAPRESISTENT, VERDEELD | 0,941575 | STUK
109359//100059 | SALOFALK GRANU-STIX GRANULAAT MGA 1,5G IN SACHET | MESALAZINE-1500-MG-GRANULAAT, MAAGSAPRESISTENT, VERDEELD | 0,941575 | STUK
116923//100059 | SALOFALK GRANU-STIX GRANULAAT MGA 1,5G IN SACHET | MESALAZINE-1500-MG-GRANULAAT, MAAGSAPRESISTENT, VERDEELD | 0,941575 | STUK
125934//31379 | PENTASA COMPACT GRANULAAT MVA 2G IN SACHET | MESALAZINE-2000-MG-GRANULAAT MET GEREGULEERDE AFGIFTE, VERDEELD | 1,284841 | STUK
31379 | PENTASA COMPACT GRANULAAT MVA 2G IN SACHET | MESALAZINE-2000-MG-GRANULAAT MET GEREGULEERDE AFGIFTE, VERDEELD | 1,284841 | STUK
120180//31379 | PENTASA GRANULAAT MVA 2G IN SACHET | MESALAZINE-2000-MG-GRANULAAT MET GEREGULEERDE AFGIFTE, VERDEELD | 1,284841 | STUK
26915 | MESALAZINE SANDOZ TABLET MSR 250MG | MESALAZINE-250-MG-TABLET, MAAGSAPRESISTENT | 0,182561 | STUK
25544 | MESALAZINE TEVA EC TABLET MSR 250MG | MESALAZINE-250-MG-TABLET, MAAGSAPRESISTENT | 0,182561 | STUK
107302 | SALOFALK GRANU-STIX GRANULAAT MGA 3G IN SACHET | MESALAZINE-3000-MG-GRANULAAT, MAAGSAPRESISTENT, VERDEELD | 1,709665 | STUK
120906//107302 | SALOFALK GRANU-STIX GRANULAAT MGA 3G IN SACHET | MESALAZINE-3000-MG-GRANULAAT, MAAGSAPRESISTENT, VERDEELD | 1,709665 | STUK
15845 | SALOFALK KLYSMA 2G/60G FLACON 60G | MESALAZINE-33.3-MG/G-KLYSMA | 0,073187 | G
114015 | PENTASA COMPACT GRANULAAT MVA 4G IN SACHET | MESALAZINE-4000-MG-GRANULAAT MET GEREGULEERDE AFGIFTE, VERDEELD | 2,572351 | STUK
123514//114015 | PENTASA COMPACT GRANULAAT MVA 4G IN SACHET | MESALAZINE-4000-MG-GRANULAAT MET GEREGULEERDE AFGIFTE, VERDEELD | 2,572351 | STUK
123466//114015 | PENTASA GRANULAAT MVA 4G IN SACHET | MESALAZINE-4000-MG-GRANULAAT MET GEREGULEERDE AFGIFTE, VERDEELD | 2,572351 | STUK
11737 | ASACOL TABLET MSR 400MG | MESALAZINE-400-MG-TABLET, MAAGSAPRESISTENT | 0,316433 | STUK
27072 | MESALAZINE AUROBINDO EC TABLET MSR 500MG | MESALAZINE-500-MG-TABLET, MAAGSAPRESISTENT | 0,322918 | STUK
25545 | MESALAZINE TEVA EC TABLET MSR 500MG | MESALAZINE-500-MG-TABLET, MAAGSAPRESISTENT | 0,293621 | STUK
25545 | MESALAZINE TEVA TABLET MSR 500MG | MESALAZINE-500-MG-TABLET, MAAGSAPRESISTENT | 0,293621 | STUK
12144 | SALOFALK TABLET MSR 500MG | MESALAZINE-500-MG-TABLET, MAAGSAPRESISTENT | 0,293621 | STUK
14797 | PENTASA TABLET MVA 500MG | MESALAZINE-500-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,350049 | STUK
24112 | MESALAZINE AUROBINDO ZETPIL 500MG | MESALAZINE-500-MG-ZETPIL | 0,726670 | STUK
26914 | MESALAZINE SANDOZ ZETPIL 500MG | MESALAZINE-500-MG-ZETPIL | 0,726670 | STUK
26918 | MESALAZINE TEVA ZETPIL 500MG | MESALAZINE-500-MG-ZETPIL | 0,726670 | STUK
11836 | SALOFALK ZETPIL 500MG | MESALAZINE-500-MG-ZETPIL | 0,726670 | STUK
18636 | ASACOL TABLET MSR 800MG | MESALAZINE-800-MG-TABLET, MAAGSAPRESISTENT | 0,632123 | STUK
30293 | METFORMINE HCL SANDOZ TABLET FILMOMHULD 1000MG | METFORMIN-1000-MG-TABLET | 0,183662 | STUK
30827 | METFORMINE HCL TEVA TABLET 1000MG | METFORMIN-1000-MG-TABLET | 0,183662 | STUK
EU/1/13/900/009 | XIGDUO TABLET FILMOMHULD 5/1000MG | METFORMIN-1000-MG-TABLET-DAPAGLIFLOZIN-5-MG-TABLET | 0,722447 | STUK
EU/1/13/900/010 | XIGDUO TABLET FILMOMHULD 5/1000MG | METFORMIN-1000-MG-TABLET-DAPAGLIFLOZIN-5-MG-TABLET | 0,722447 | STUK
EU/1/15/1003/014 | SYNJARDY TABLET FILMOMHULD 5/1000MG | METFORMIN-1000-MG-TABLET-EMPAGLIFLOZINE-5-MG-TABLET | 0,751605 | STUK
EU/1/12/780/020 | JENTADUETO TABLET FILMOMHULD 2,5MG/1000MG | METFORMIN-1000-MG-TABLET-LINAGLIPTINE-2.5-MG-TABLET | 0,765597 | STUK
EU/1/08/455/009 | JANUMET TABLET FILMOMHULD 50MG/1000MG | METFORMIN-1000-MG-TABLET-SITAGLIPTIN-50-MG-TABLET | 0,603194 | STUK
EU/1/08/455/010 | JANUMET TABLET FILMOMHULD 50MG/1000MG | METFORMIN-1000-MG-TABLET-SITAGLIPTIN-50-MG-TABLET | 0,603194 | STUK
EU/1/07/425/026 | EUCREAS TABLET OMHULD 50/1000MG | METFORMIN-1000-MG-TABLET-VILDAGLIPTIN-50-MG-TABLET | 0,596561 | STUK
EU/1/07/425/008 | EUCREAS TABLET OMHULD 50/1000MG | METFORMIN-1000-MG-TABLET-VILDAGLIPTIN-50-MG-TABLET | 0,648283 | STUK
EU/1/07/425/009 | EUCREAS TABLET OMHULD 50/1000MG | METFORMIN-1000-MG-TABLET-VILDAGLIPTIN-50-MG-TABLET | 0,648283 | STUK
103638 | METFORMINE HCL MYLAN TABLET 500MG | METFORMIN-500-MG-TABLET | 0,040898 | STUK
10500 | METFORMINE HCL TEVA TABLET 500MG | METFORMIN-500-MG-TABLET | 0,040898 | STUK
26048 | METFORMINE HCL TEVA TABLET 850MG | METFORMIN-850-MG-TABLET | 0,053779 | STUK
EU/1/13/900/003 | XIGDUO TABLET FILMOMHULD 5/ 850MG | METFORMIN-850-MG-TABLET-DAPAGLIFLOZIN-5-MG-TABLET | 0,725524 | STUK
EU/1/13/900/004 | XIGDUO TABLET FILMOMHULD 5/ 850MG | METFORMIN-850-MG-TABLET-DAPAGLIFLOZIN-5-MG-TABLET | 0,725524 | STUK
EU/1/15/1003/005 | SYNJARDY TABLET FILMOMHULD 5/ 850MG | METFORMIN-850-MG-TABLET-EMPAGLIFLOZINE-5-MG-TABLET | 0,751605 | STUK
EU/1/12/780/006 | JENTADUETO TABLET FILMOMHULD 2,5MG/ 850MG | METFORMIN-850-MG-TABLET-LINAGLIPTINE-2.5-MG-TABLET | 0,687853 | STUK
EU/1/06/354/005 | COMPETACT TABLET FILMOMHULD 15/850MG | METFORMIN-850-MG-TABLET-PIOGLITAZON-15-MG-TABLET | 0,655837 | STUK
EU/1/08/455/002 | JANUMET TABLET FILMOMHULD 50MG/ 850MG | METFORMIN-850-MG-TABLET-SITAGLIPTIN-50-MG-TABLET | 0,623042 | STUK
EU/1/08/455/003 | JANUMET TABLET FILMOMHULD 50MG/ 850MG | METFORMIN-850-MG-TABLET-SITAGLIPTIN-50-MG-TABLET | 0,623042 | STUK
EU/1/07/425/020 | EUCREAS TABLET OMHULD 50/ 850MG | METFORMIN-850-MG-TABLET-VILDAGLIPTIN-50-MG-TABLET | 0,655758 | STUK
EU/1/07/425/002 | EUCREAS TABLET OMHULD 50/ 850MG | METFORMIN-850-MG-TABLET-VILDAGLIPTIN-50-MG-TABLET | 0,718600 | STUK
EU/1/07/425/003 | EUCREAS TABLET OMHULD 50/ 850MG | METFORMIN-850-MG-TABLET-VILDAGLIPTIN-50-MG-TABLET | 0,718600 | STUK
8785 | METHOTREXAAT PCH TABLET 10MG | METHOTREXATE-10-MG-TABLET | 0,740567 | STUK
28638 | METHOTREXAAT SANDOZ TABLET 10MG | METHOTREXATE-10-MG-TABLET | 0,740567 | STUK
EU/1/07/400/008 | MIRCERA 50 INJVLST 167MCG/ML WWSP 0,3ML | METHOXYPOLYETHYLEENGLYCOL-EPOETIN BETA-0.167-MG/ML-INJ.VLOEISTOF, WWSP | 290,009493 | ML
EU/1/07/400/017 | MIRCERA 30 INJVLST 100MCG/ML WWSP 0,3ML | METHOXYPOLYETHYLEENGLYCOL-EPOETIN BETA-0.1-MG/ML-INJ.VLOEISTOF, WWSP | 181,289389 | ML
EU/1/07/400/009 | MIRCERA 75 INJVLST 250MCG/ML WWSP 0,3ML | METHOXYPOLYETHYLEENGLYCOL-EPOETIN BETA-0.25-MG/ML-INJ.VLOEISTOF, WWSP | 434,994577 | ML
EU/1/07/400/010 | MIRCERA 100 INJVLST 333MCG/ML WWSP 0,3ML | METHOXYPOLYETHYLEENGLYCOL-EPOETIN BETA-0.333-MG/ML-INJ.VLOEISTOF, WWSP | 579,986335 | ML
EU/1/07/400/020 | MIRCERA 120 INJVLST 400MCG/ML WWSP 0,3ML | METHOXYPOLYETHYLEENGLYCOL-EPOETIN BETA-0.4-MG/ML-INJ.VLOEISTOF, WWSP | 714,301809 | ML
EU/1/07/400/011 | MIRCERA 150 INJVLST 500MCG/ML WWSP 0,3ML | METHOXYPOLYETHYLEENGLYCOL-EPOETIN BETA-0.5-MG/ML-INJ.VLOEISTOF, WWSP | 869,987494 | ML
EU/1/07/400/012 | MIRCERA 200 INJVLST 667MCG/ML WWSP 0,3ML | METHOXYPOLYETHYLEENGLYCOL-EPOETIN BETA-0.667-MG/ML-INJ.VLOEISTOF, WWSP | 1153,284337 | ML
EU/1/07/400/021 | MIRCERA 360 INJVLST 600MCG/ML WWSP 0,6ML | METHOXYPOLYETHYLEENGLYCOL-EPOETIN BETA-0.6-MG/ML-INJ.VLOEISTOF, WWSP | 1005,329001 | ML
EU/1/07/400/013 | MIRCERA 250 INJVLST 833MCG/ML WWSP 0,3ML | METHOXYPOLYETHYLEENGLYCOL-EPOETIN BETA-0.833-MG/ML-INJ.VLOEISTOF, WWSP | 1441,632371 | ML
31130 | METVIX CREME 160MG/G | METHYLAMINOLEVULINAAT-160-MG/G-CREME, CUTAAN | 95,185057 | G
18218 | CELLUVISC UNIT DOSE OOGDRUPPELS 10MG/ML TUBE 0,4ML | METHYLCELLULOSE-10-MG/ML-OOGDRUPPELS UNITDOSE | 0,335141 | ML
10648 | METHYLDOPA (L) TEVA TABLET 250MG | METHYLDOPA (LEVOROTATORY)-250-MG-TABLET | 0,207325 | STUK
57522 | METHYLDOPA CF TABLET 250MG | METHYLDOPA (LEVOROTATORY)-250-MG-TABLET | 0,207325 | STUK
10649 | METHYLDOPA (L) TEVA TABLET 500MG | METHYLDOPA (LEVOROTATORY)-500-MG-TABLET | 0,278989 | STUK
57523 | METHYLDOPA CF TABLET 500MG | METHYLDOPA (LEVOROTATORY)-500-MG-TABLET | 0,278989 | STUK
3686 | METHERGIN INJVLST 0,2MG/ML AMPUL 1ML | METHYLERGOMETRINE-.2-MG/ML-INJ.VLOEISTOF AMPUL | 0,575556 | ML
122872//33227 | EQUASYM XL CAPSULE MGA 10MG | METHYLPHENIDATE-10-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,643674 | STUK
33227 | EQUASYM XL CAPSULE MGA 10MG | METHYLPHENIDATE-10-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,643674 | STUK
117449//34027 | MEDIKINET CR CAPSULE MGA 10MG | METHYLPHENIDATE-10-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,643674 | STUK
123339//34027 | MEDIKINET CR CAPSULE MGA 10MG | METHYLPHENIDATE-10-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,643674 | STUK
34027 | MEDIKINET CR CAPSULE MGA 10MG | METHYLPHENIDATE-10-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,643674 | STUK
34025 | MEDIKINET TABLET 10MG | METHYLPHENIDATE-10-MG-TABLET | 0,167433 | STUK
3957 | RITALIN TABLET 10MG | METHYLPHENIDATE-10-MG-TABLET | 0,167433 | STUK
28073 | CONCERTA TABLET MVA 18MG | METHYLPHENIDATE-18-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,863449 | STUK
122873//33228 | EQUASYM XL CAPSULE MGA 20MG | METHYLPHENIDATE-20-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,867975 | STUK
33228 | EQUASYM XL CAPSULE MGA 20MG | METHYLPHENIDATE-20-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,867975 | STUK
123344//34028 | MEDIKINET CR CAPSULE MGA 20MG | METHYLPHENIDATE-20-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,867975 | STUK
34028 | MEDIKINET CR CAPSULE MGA 20MG | METHYLPHENIDATE-20-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,867975 | STUK
34026 | MEDIKINET TABLET 20MG | METHYLPHENIDATE-20-MG-TABLET | 0,316049 | STUK
101739 | CONCERTA TABLET MVA 27MG | METHYLPHENIDATE-27-MG-TABLET, MET GEREGULEERDE AFGIFTE | 1,129006 | STUK
117653 | KINECTEEN TABLET MVA 27MG | METHYLPHENIDATE-27-MG-TABLET, MET GEREGULEERDE AFGIFTE | 1,129006 | STUK
116633 | METHYLFENIDAAT HCL MYLAN RETARD TABLET MVA 27MG | METHYLPHENIDATE-27-MG-TABLET, MET GEREGULEERDE AFGIFTE | 1,129006 | STUK
118337//33229 | EQUASYM XL CAPSULE MGA 30MG | METHYLPHENIDATE-30-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 1,068999 | STUK
122870//33229 | EQUASYM XL CAPSULE MGA 30MG | METHYLPHENIDATE-30-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 1,068999 | STUK
33229 | EQUASYM XL CAPSULE MGA 30MG | METHYLPHENIDATE-30-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 1,068999 | STUK
123345//34029 | MEDIKINET CR CAPSULE MGA 30MG | METHYLPHENIDATE-30-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 1,068999 | STUK
34029 | MEDIKINET CR CAPSULE MGA 30MG | METHYLPHENIDATE-30-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 1,068999 | STUK
28074 | CONCERTA TABLET MVA 36MG | METHYLPHENIDATE-36-MG-TABLET, MET GEREGULEERDE AFGIFTE | 1,167908 | STUK
111228 | EQUASYM XL CAPSULE MGA 40MG | METHYLPHENIDATE-40-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 1,687521 | STUK
122869//111228 | EQUASYM XL CAPSULE MGA 40MG | METHYLPHENIDATE-40-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 1,687521 | STUK
123346//34030 | MEDIKINET CR CAPSULE MGA 40MG | METHYLPHENIDATE-40-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 1,687521 | STUK
34030 | MEDIKINET CR CAPSULE MGA 40MG | METHYLPHENIDATE-40-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 1,687521 | STUK
28075 | CONCERTA TABLET MVA 54MG | METHYLPHENIDATE-54-MG-TABLET, MET GEREGULEERDE AFGIFTE | 1,621199 | STUK
108026 | MEDIKINET CR CAPSULE MGA 5MG | METHYLPHENIDATE-5-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,541402 | STUK
120717//108026 | MEDIKINET CR CAPSULE MGA 5MG | METHYLPHENIDATE-5-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,541402 | STUK
123680//108026 | MEDIKINET CR CAPSULE MGA 5MG | METHYLPHENIDATE-5-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,541402 | STUK
34024 | MEDIKINET TABLET 5MG | METHYLPHENIDATE-5-MG-TABLET | 0,115171 | STUK
117686//6664 | SOLU MEDROL INFUSIEPOEDER FLACON 1000MG | METHYLPREDNISOLONE-1000-MG-POED. V. INJECTIE, FLACON | 24,287975 | STUK
124559//6664 | SOLU MEDROL INFUSIEPOEDER FLACON 1000MG | METHYLPREDNISOLONE-1000-MG-POED. V. INJECTIE, FLACON | 24,287975 | STUK
124448//7041 | SOLU MEDROL INFUSIEPOEDER FLACON 125MG +SOLV 2ML | METHYLPREDNISOLONE-125-MG-POED. V. INJECTIE, FLACON | 5,801603 | STUK
124565//7041 | SOLU MEDROL INFUSIEPOEDER FLACON 125MG +SOLV 2ML | METHYLPREDNISOLONE-125-MG-POED. V. INJECTIE, FLACON | 5,801603 | STUK
124438//5302 | SOLU MEDROL INJPDR FLAC 40MG+1ML SOLV IN MIXOVIAL | METHYLPREDNISOLONE-40-MG-POED. V. INJECTIE, FLACON | 2,326672 | STUK
5302 | SOLU MEDROL INJPDR FLAC 40MG+1ML SOLV IN MIXOVIAL | METHYLPREDNISOLONE-40-MG-POED. V. INJECTIE, FLACON | 2,417313 | STUK
11811 | METOCLOPRAMIDE HCL ACCORD TABLET 10MG | METOCLOPRAMIDE-10-MG-TABLET | 0,082368 | STUK
27570=55926 | METOCLOPRAMIDE HCL AUROBINDO TABLET 10MG | METOCLOPRAMIDE-10-MG-TABLET | 0,082368 | STUK
55926 | METOCLOPRAMIDE HCL CF TABLET 10MG | METOCLOPRAMIDE-10-MG-TABLET | 0,082368 | STUK
9715 | METOCLOPRAMIDE HCL TEVA TABLET 10MG | METOCLOPRAMIDE-10-MG-TABLET | 0,082368 | STUK
5252 | PRIMPERAN DRANK 1MG/ML | METOCLOPRAMIDE-1-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,120179 | ML
57171 | METOPROLOLTARTRAAT ACCORD TABLET 100MG | METOPROLOL-100-MG-TABLET | 0,104153 | STUK
16552 | METOPROLOLTARTRAAT CF TABLET 100MG | METOPROLOL-100-MG-TABLET | 0,106858 | STUK
57721 | METOPROLOLTARTRAAT SANDOZ TABLET 100MG | METOPROLOL-100-MG-TABLET | 0,106858 | STUK
56500 | METOPROLOLTARTRAAT TEVA TABLET 100MG | METOPROLOL-100-MG-TABLET | 0,106858 | STUK
32378 | METOPROLOLSUCCINAAT SANDOZ RET 100 TABL MGA 95MG | METOPROLOL-100-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,264899 | STUK
112532//12149 | SELOKEEN ZOC 100 TABLET MGA 95MG | METOPROLOL-100-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,264899 | STUK
12149 | SELOKEEN ZOC 100 TABLET MGA 95MG | METOPROLOL-100-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,264899 | STUK
8700 | SELOKEEN INJVLST 1MG/ML AMPUL 5ML | METOPROLOL-1-MG/ML-INJ.VLOEISTOF AMPUL | 0,322675 | ML
32380 | METOPROLOLSUCCINAAT SANDOZ RET 200 TABL MGA 190MG | METOPROLOL-200-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,265392 | STUK
16553 | METOPROLOLTARTRAAT CF RETARD TABLET MGA 200MG | METOPROLOL-200-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,253409 | STUK
12150 | SELOKEEN ZOC 200 TABLET MGA 190MG | METOPROLOL-200-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,265392 | STUK
57170 | METOPROLOLTARTRAAT ACCORD TABLET 50MG | METOPROLOL-50-MG-TABLET | 0,082514 | STUK
16551 | METOPROLOLTARTRAAT CF TABLET 50MG | METOPROLOL-50-MG-TABLET | 0,099483 | STUK
57720 | METOPROLOLTARTRAAT SANDOZ TABLET 50MG | METOPROLOL-50-MG-TABLET | 0,103547 | STUK
56499 | METOPROLOLTARTRAAT TEVA TABLET 50MG | METOPROLOL-50-MG-TABLET | 0,103547 | STUK
10322 | FLAGYL SUSPENSIE 40MG/ML | METRONIDAZOLE-40-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,192297 | ML
121321//238 | FLAGYL OVULE 500MG | METRONIDAZOLE-500-MG-CAPSULE, VAGINAAL | 0,380267 | STUK
122673//238 | FLAGYL OVULE 500MG | METRONIDAZOLE-500-MG-CAPSULE, VAGINAAL | 0,380267 | STUK
8652 | METRONIDAZOL AUROBINDO TABLET 500MG | METRONIDAZOLE-500-MG-TABLET | 0,782398 | STUK
21420=8652 | METRONIDAZOL PCH TABLET 500MG | METRONIDAZOLE-500-MG-TABLET | 0,782398 | STUK
17393 | INFVLST METRONIDAZOLUM 5MG/ML VIAFLO ZAK 100ML | METRONIDAZOLE-5-MG/ML-INFUUSVLOEISTOF, FLACON | 0,033434 | ML
12087 | METRONIDAZOL B.BRAUN INFVLST 5MG/ML FL KUNST 100ML | METRONIDAZOLE-5-MG/ML-INFUUSVLOEISTOF, FLACON | 0,033434 | ML
56005 | METRONIDAZOL FRES INFVLST 5MG/ML KABIPAC FL 100ML | METRONIDAZOLE-5-MG/ML-INFUUSVLOEISTOF, FLACON | 0,033434 | ML
120196 | METRONIDAZOL NORIDEM INFVLST 5MG/ML FLES 100ML | METRONIDAZOLE-5-MG/ML-INFUUSVLOEISTOF, FLACON | 0,033434 | ML
30115 | ROSICED CREME 7,5MG/G | METRONIDAZOLE-7.5-MG/G-CREME, CUTAAN | 0,191229 | G
14416 | ROZEX GEL 7,5MG/G | METRONIDAZOLE-7.5-MG/G-HUIDGEL | 0,250135 | G
57407 | MIANSERINE HCL TEVA TABLET 10MG | MIANSERIN-10-MG-TABLET | 0,212026 | STUK
57408 | MIANSERINE HCL TEVA TABLET 30MG | MIANSERIN-30-MG-TABLET | 0,640533 | STUK
9042 | TOLVON TABLET 30MG | MIANSERIN-30-MG-TABLET | 0,640533 | STUK
125201 | MICAFUNGINE MYLAN INFUSIEPOEDER FLACON 100MG | MICAFUNGIN-100-MG-POED. V. INFUSIE,FLACON | 357,523077 | STUK
EU/1/08/448/002 | MYCAMINE INFUSIEPOEDER FLACON 100MG | MICAFUNGIN-100-MG-POED. V. INFUSIE,FLACON | 357,523077 | STUK
EU/1/08/448/001 | MYCAMINE INFUSIEPOEDER FLACON 50MG | MICAFUNGIN-50-MG-POED. V. INFUSIE,FLACON | 216,061850 | STUK
100470 | MIDAZOLAM ACCORD INJVLST 1MG/ML AMPUL 5ML | MIDAZOLAM-1-MG/ML-INJ.VLOEISTOF AMPUL | 0,161243 | ML
EU/1/17/1218/001 | RYDAPT CAPSULE 25MG | MIDOSTAURINE-25-MG-CAPSULE | 114,907114 | STUK
EU/1/17/1218/002 | RYDAPT CAPSULE 25MG | MIDOSTAURINE-25-MG-CAPSULE | 114,907114 | STUK
EU/1/02/238/001 | ZAVESCA CAPSULE 100MG | MIGLUSTAT-100-MG-CAPSULE | 59,312573 | STUK
22099 | MINOCYCLINE AUROBINDO TABLET 100MG | MINOCYCLINE-100-MG-TABLET | 0,394049 | STUK
25320 | MINOCYCLINE TEVA TABLET 100MG | MINOCYCLINE-100-MG-TABLET | 0,394049 | STUK
22098 | MINOCYCLINE AUROBINDO TABLET 50MG | MINOCYCLINE-50-MG-TABLET | 0,234837 | STUK
25319 | MINOCYCLINE TEVA TABLET 50MG | MINOCYCLINE-50-MG-TABLET | 0,234837 | STUK
123367//8426 | LONNOTEN TABLET 10MG | MINOXIDIL-10-MG-TABLET | 0,472108 | STUK
8426 | LONNOTEN TABLET 10MG | MINOXIDIL-10-MG-TABLET | 0,808884 | STUK
EU/1/12/809/010 | BETMIGA TABLET MVA 50MG | MIRABEGRON-50-MG-TABLET, MET GEREGULEERDE AFGIFTE | 1,150886 | STUK
34052 | MIRTAZAPINE SMELTTAB MYLAN ORODISP TABLET 15MG | MIRTAZAPINE-15-MG-SMELTTABLET | 0,197468 | STUK
25780 | REMERON SOLTAB ORODISP TABLET 15MG | MIRTAZAPINE-15-MG-SMELTTABLET | 0,197468 | STUK
30645 | MIRTAZAPINE CF TABLET 15MG | MIRTAZAPINE-15-MG-TABLET | 0,171455 | STUK
30732 | MIRTAZAPINE MYLAN TABLET 15MG | MIRTAZAPINE-15-MG-TABLET | 0,171455 | STUK
30697 | MIRTAZAPINE SANDOZ TABLET 15MG | MIRTAZAPINE-15-MG-TABLET | 0,171455 | STUK
25781 | REMERON SOLTAB ORODISP TABLET 30MG | MIRTAZAPINE-30-MG-SMELTTABLET | 0,343144 | STUK
30733 | MIRTAZAPINE MYLAN TABLET 30MG | MIRTAZAPINE-30-MG-TABLET | 0,278223 | STUK
30698 | MIRTAZAPINE SANDOZ TABLET 30MG | MIRTAZAPINE-30-MG-TABLET | 0,278223 | STUK
34054 | MIRTAZAPINE SMELTTAB MYLAN ORODISP TABLET 45MG | MIRTAZAPINE-45-MG-SMELTTABLET | 0,384235 | STUK
25782 | REMERON SOLTAB ORODISP TABLET 45MG | MIRTAZAPINE-45-MG-SMELTTABLET | 0,384235 | STUK
30734 | MIRTAZAPINE MYLAN TABLET 45MG | MIRTAZAPINE-45-MG-TABLET | 0,343311 | STUK
30699 | MIRTAZAPINE SANDOZ TABLET 45MG | MIRTAZAPINE-45-MG-TABLET | 0,343311 | STUK
110554//13724 | CYTOTEC TABLET 200MCG | MISOPROSTOL-.2-MG-TABLET | 1,593858 | STUK
126103//13724 | CYTOTEC TABLET 200MCG | MISOPROSTOL-.2-MG-TABLET | 1,593858 | STUK
13724 | CYTOTEC TABLET 200MCG | MISOPROSTOL-.2-MG-TABLET | 1,593858 | STUK
109336 | MITOMYCINE SUBSTIPHARM INJECTIEPOEDER FLACON 20MG | MITOMYCIN-20-MG-POED. V. INJECTIE, FLACON | 55,214874 | STUK
EU/1/04/273/001 | LYSODREN TABLET 500MG | MITOTANE-500-MG-TABLET | 5,943130 | STUK
26663 | MITOXANTRON ACCORD INFVLST CONC 2MG/ML FLAC 5ML | MITOXANTRONE-2-MG/ML-INFUUSVLOEISTOF, FLACON | 14,765781 | ML
26663 | MITOXANTRON ACCORD INFVLST CONC 2MG/ML FLAC 10ML | MITOXANTRONE-2-MG/ML-INFUUSVLOEISTOF, FLACON | 14,765781 | ML
26663 | MITOXANTRON ACCORD INFVLST CONC 2MG/ML FLAC 12,5ML | MITOXANTRONE-2-MG/ML-INFUUSVLOEISTOF, FLACON | 14,765781 | ML
26663 | MITOXANTRON ACCORD INFVLST CONC 2MG/ML FLAC 15ML | MITOXANTRONE-2-MG/ML-INFUUSVLOEISTOF, FLACON | 14,765781 | ML
29568 | MITOXANTRON SANDOZ INFVLST CONC 2MG/ML FLACON 10ML | MITOXANTRONE-2-MG/ML-INFUUSVLOEISTOF, FLACON | 14,765781 | ML
19982 | MIZOLLEN TABLET MGA 10MG | MIZOLASTIN-10-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,283307 | STUK
14904 | AURORIX TABLET OMHULD 150MG | MOCLOBEMIDE-150-MG-TABLET | 0,380160 | STUK
26120 | MOCLOBEMIDE MYLAN TABLET OMHULD 150MG | MOCLOBEMIDE-150-MG-TABLET | 0,380160 | STUK
27287 | MOCLOBEMIDE SANDOZ TABLET OMHULD 150MG | MOCLOBEMIDE-150-MG-TABLET | 0,380160 | STUK
27823 | MOCLOBEMIDE TEVA TABLET OMHULD 150MG | MOCLOBEMIDE-150-MG-TABLET | 0,380160 | STUK
17493 | AURORIX TABLET OMHULD 300MG | MOCLOBEMIDE-300-MG-TABLET | 0,551101 | STUK
26123 | MOCLOBEMIDE AUROBINDO TABLET OMHULD 300MG | MOCLOBEMIDE-300-MG-TABLET | 0,551101 | STUK
27288 | MOCLOBEMIDE SANDOZ TABLET OMHULD 300MG | MOCLOBEMIDE-300-MG-TABLET | 0,551101 | STUK
27824 | MOCLOBEMIDE TEVA TABLET OMHULD 300MG | MOCLOBEMIDE-300-MG-TABLET | 0,551101 | STUK
105888 | ASPENDOS TABLET 100MG | MODAFINIL-100-MG-TABLET | 1,136955 | STUK
104118 | MODAFINIL MYLAN TABLET 100MG | MODAFINIL-100-MG-TABLET | 1,186958 | STUK
123277//18535 | MODIODAL TABLET 100MG | MODAFINIL-100-MG-TABLET | 1,136955 | STUK
18535 | MODIODAL TABLET 100MG | MODAFINIL-100-MG-TABLET | 1,186958 | STUK
107917 | MOMETASONFUROAAT 1A PHAR NEUSSPR 50MCG/DO FL 140DO | MOMETASONE-.05-MG-NEUSSPRAY | 0,034810 | DOSIS
114180 | MOMETASONFUROAAT CIPLA NEUSSPRAY 50MCG/DO FL 140DO | MOMETASONE-.05-MG-NEUSSPRAY | 0,034810 | DOSIS
107922 | MOMETASONFUROAAT SANDOZ NEUSSPR 50MCG/DO FL 140DO | MOMETASONE-.05-MG-NEUSSPRAY | 0,034810 | DOSIS
112354 | MOMETASONFUROAAT TEVA NEUSSPRAY 50MCG/DO FL 140DO | MOMETASONE-.05-MG-NEUSSPRAY | 0,037415 | DOSIS
21613 | NASONEX NEUSSPRAY 50MCG/DO 140DO | MOMETASONE-.05-MG-NEUSSPRAY | 0,037415 | DOSIS
14332 | ELOCON LOTION 1MG/G | MOMETASONE-1-MG/G-APPLICATIEVLOEISTOF, VOOR CUTAAN GEBRUIK | 0,145403 | ML
126968//14332 | MOMETASONFUROAAT BMODESTO LOTION 1MG/G | MOMETASONE-1-MG/G-APPLICATIEVLOEISTOF, VOOR CUTAAN GEBRUIK | 0,118314 | ML
112537//14332 | MOMETASONFUROAAT FISHER LOTION 1MG/ML | MOMETASONE-1-MG/G-APPLICATIEVLOEISTOF, VOOR CUTAAN GEBRUIK | 0,145403 | ML
14174 | ELOCON WATEREMULGERENDE ZALF 1MG/G | MOMETASONE-1-MG/G-CREME, CUTAAN | 0,127696 | G
127036//14174 | MOMETASONFUROAAT EUR-P WATEREMULGERENDE ZALF 1MG/G | MOMETASONE-1-MG/G-CREME, CUTAAN | 0,108890 | G
115250 | MOMETASONFUROAAT SANDOZ CREME 1MG/G | MOMETASONE-1-MG/G-CREME, CUTAAN | 0,140625 | G
115296 | MOMETASONFUROAAT TEVA CREME 1MG/G | MOMETASONE-1-MG/G-CREME, CUTAAN | 0,140625 | G
14173 | ELOCON VET WATEREMULGERENDE ZALF 1MG/G | MOMETASONE-1-MG/G-ZALF, CUTAAN | 0,144530 | G
100911 | MONTELUKAST TEVA TABLET FILMOMHULD 10MG | MONTELUKAST-10-MG-TABLET | 0,466829 | STUK
118585//23164 | SINGULAIR TABLET OMHULD 10MG | MONTELUKAST-10-MG-TABLET | 0,456550 | STUK
23164 | SINGULAIR TABLET OMHULD 10MG | MONTELUKAST-10-MG-TABLET | 0,466829 | STUK
25800 | SINGULAIR KAUWTABLET 4MG | MONTELUKAST-4-MG-KAUWDRAGEE/KAUWTABLET | 0,449652 | STUK
104604 | SINGULAIR GRANULAAT 4MG IN SACHET | MONTELUKAST-4-MG-POEDER/GRANULAAT, ORAAL | 0,506763 | STUK
23165 | SINGULAIR KAUWTABLET 5MG | MONTELUKAST-5-MG-KAUWDRAGEE/KAUWTABLET | 0,445884 | STUK
22944 | MORFINE HCL CF RETARD TABLET MVA 100MG | MORPHINE-100-MG-TABLET, MET GEREGULEERDE AFGIFTE | 1,100943 | STUK
26236=24997 | MORFINESULFAAT AUROBINDO RETARD TABLET MGA 100MG | MORPHINE-100-MG-TABLET, MET GEREGULEERDE AFGIFTE | 1,100943 | STUK
24997 | MORFINESULFAAT TEVA RETARD TABLET MGA 100MG | MORPHINE-100-MG-TABLET, MET GEREGULEERDE AFGIFTE | 1,100943 | STUK
11208 | MS CONTIN TABLET MGA 100MG | MORPHINE-100-MG-TABLET, MET GEREGULEERDE AFGIFTE | 1,100943 | STUK
50836 | MORFINE HCL CF INJVLST 10MG/ML AMPUL 1ML | MORPHINE-10-MG/ML-INJ.VLOEISTOF AMPUL | 1,009785 | ML
50836 | MORFINE HCL CF INJVLST 10MG/ML AMPUL 10ML | MORPHINE-10-MG/ML-INJ.VLOEISTOF AMPUL | 1,009785 | ML
119554 | MORFINE HCL KALCEKS INJVLST 10MG/ML AMPUL 1ML | MORPHINE-10-MG/ML-INJ.VLOEISTOF AMPUL | 1,009785 | ML
22941 | MORFINE HCL CF RETARD TABLET MVA 10MG | MORPHINE-10-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,176880 | STUK
26233=17881 | MORFINESULFAAT AUROBINDO RETARD TABLET MGA 10MG | MORPHINE-10-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,176880 | STUK
17881 | MORFINESULFAAT TEVA RETARD TABLET MGA 10MG | MORPHINE-10-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,176880 | STUK
11205 | MS CONTIN TABLET MGA 10MG | MORPHINE-10-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,176880 | STUK
22945 | MORFINE HCL CF RETARD TABLET MVA 200MG | MORPHINE-200-MG-TABLET, MET GEREGULEERDE AFGIFTE | 2,095103 | STUK
21390 | MORFINE HCL CF INJVLST 20MG/ML AMPUL 1ML | MORPHINE-20-MG/ML-INJ.VLOEISTOF AMPUL | 3,637574 | ML
51952 | MORFINE HCL PCH INJVLST 20MG/ML AMPUL 1ML | MORPHINE-20-MG/ML-INJ.VLOEISTOF AMPUL | 3,637574 | ML
51952 | MORFINE HCL PCH INJVLST 20MG/ML AMPUL 5ML | MORPHINE-20-MG/ML-INJ.VLOEISTOF AMPUL | 3,637574 | ML
121806//18759 | ORAMORPH DRANK 20MG/ML | MORPHINE-20-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,268309 | ML
18759 | ORAMORPH DRANK 20MG/ML | MORPHINE-20-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,385386 | ML
22942 | MORFINE HCL CF RETARD TABLET MVA 30MG | MORPHINE-30-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,351498 | STUK
27350 | MORFINE HCL MYLAN RETARD TABLET MGA 30MG | MORPHINE-30-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,389294 | STUK
26234=17882 | MORFINESULFAAT AUROBINDO RETARD TABLET MGA 30MG | MORPHINE-30-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,389294 | STUK
17882 | MORFINESULFAAT PCH RETARD TABLET MGA 30MG | MORPHINE-30-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,389294 | STUK
17882 | MORFINESULFAAT TEVA RETARD TABLET MGA 30MG | MORPHINE-30-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,389294 | STUK
11206 | MS CONTIN TABLET MGA 30MG | MORPHINE-30-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,389294 | STUK
22943 | MORFINE HCL CF RETARD TABLET MVA 60MG | MORPHINE-60-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,711988 | STUK
26235=17883 | MORFINESULFAAT AUROBINDO RETARD TABLET MGA 60MG | MORPHINE-60-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,711988 | STUK
17883 | MORFINESULFAAT TEVA RETARD TABLET MGA 60MG | MORPHINE-60-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,711988 | STUK
11207 | MS CONTIN TABLET MGA 60MG | MORPHINE-60-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,711988 | STUK
113080 | MOXIFLOXACINE FRES KABI INFVLST 1,6MG/ML FL 250ML | MOXIFLOXACINE-1.6-MG/ML-INFUUSVLOEISTOF, FLACON | 0,141752 | ML
116180 | MOXIFLOXACINE SANDOZ TABLET FILMOMHULD 400MG | MOXIFLOXACINE-400-MG-TABLET | 1,975790 | STUK
113376 | MOXIFLOXACINE TEVA TABLET FILMOMHULD 400MG | MOXIFLOXACINE-400-MG-TABLET | 1,975790 | STUK
102202 | VIGAMOX OOGDRUPPELS 5MG/ML FLACON 5ML | MOXIFLOXACINE-5-MG/ML-OOGDRUPPELS | 2,354103 | ML
29270 | MOXONIDINE PCH TABLET 0,2MG | MOXONIDINE-.2-MG-TABLET | 0,215701 | STUK
29264 | MOXONIDINE SANDOZ TABLET 0,2MG | MOXONIDINE-.2-MG-TABLET | 0,215701 | STUK
29271 | MOXONIDINE PCH TABLET 0,3MG | MOXONIDINE-.3-MG-TABLET | 0,295218 | STUK
29265 | MOXONIDINE SANDOZ TABLET 0,3MG | MOXONIDINE-.3-MG-TABLET | 0,295218 | STUK
29272 | MOXONIDINE PCH TABLET 0,4MG | MOXONIDINE-.4-MG-TABLET | 0,287659 | STUK
29266 | MOXONIDINE SANDOZ TABLET 0,4MG | MOXONIDINE-.4-MG-TABLET | 0,287659 | STUK
119991//13761 | BACTROBAN NEUSZALF 20MG/G | MUPIROCIN-20-MG/G-NEUSZALF | 2,050982 | G
125309//13761 | BACTROBAN NEUSZALF 20MG/G | MUPIROCIN-20-MG/G-NEUSZALF | 2,050982 | G
125894//13761 | BACTROBAN NEUSZALF 20MG/G | MUPIROCIN-20-MG/G-NEUSZALF | 2,050982 | G
11651 | BACTROBAN HYDROFIELE ZALF 20MG/G | MUPIROCIN-20-MG/G-ZALF, CUTAAN | 0,473526 | G
32026 | MUPIROCINE NEVIK ZALF 20MG/G | MUPIROCIN-20-MG/G-ZALF, CUTAAN | 0,435060 | G
EU/1/96/005/006 | CELLCEPT POEDER VOOR SUSPENSIE 200MG/ML | MYCOPHENOLATE MOFETIL-200-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,732579 | ML
EU/1/96/005/001 | CELLCEPT CAPSULE 250MG | MYCOPHENOLATE MOFETIL-250-MG-CAPSULE | 0,429116 | STUK
EU/1/96/005/003 | CELLCEPT CAPSULE 250MG | MYCOPHENOLATE MOFETIL-250-MG-CAPSULE | 0,429116 | STUK
EU/1/96/005/005 | CELLCEPT INFUSIEPOEDER FLACON 500MG | MYCOPHENOLATE MOFETIL-500-MG-POED. V. INFUSIE,FLACON | 10,008978 | STUK
115229 | MYCOFENOLAAT MOFETIL ACCORD INFPDR FLACON 500MG | MYCOPHENOLATE MOFETIL-500-MG-POED. V. INFUSIE,FLACON | 12,532859 | STUK
EU/1/96/005/002 | CELLCEPT TABLET 500MG | MYCOPHENOLATE MOFETIL-500-MG-TABLET | 0,777059 | STUK
EU/1/96/005/004 | CELLCEPT TABLET 500MG | MYCOPHENOLATE MOFETIL-500-MG-TABLET | 0,777059 | STUK
35019 | MYCOFENOLAAT MOFETIL ACCORD TABLET FILMOMH 500MG | MYCOPHENOLATE MOFETIL-500-MG-TABLET | 0,777059 | STUK
106588 | MYCOFENOLAAT MOFETIL SANDOZ TABLET FILMOMH 500MG | MYCOPHENOLATE MOFETIL-500-MG-TABLET | 0,777059 | STUK
EU/1/07/438/005 | MYFENAX TABLET FILMOMHULD 500MG | MYCOPHENOLATE MOFETIL-500-MG-TABLET | 1,054456 | STUK
124398//30202 | MYFORTIC TABLET MSR 180MG | MYCOPHENOLIC ACID-180-MG-TABLET, MAAGSAPRESISTENT | 0,871754 | STUK
126685//30202 | MYFORTIC TABLET MSR 180MG | MYCOPHENOLIC ACID-180-MG-TABLET, MAAGSAPRESISTENT | 0,871754 | STUK
30202 | MYFORTIC TABLET MSR 180MG | MYCOPHENOLIC ACID-180-MG-TABLET, MAAGSAPRESISTENT | 0,995225 | STUK
126970//30203 | MYFORTIC TABLET MSR 360MG | MYCOPHENOLIC ACID-360-MG-TABLET, MAAGSAPRESISTENT | 1,723131 | STUK
30203 | MYFORTIC TABLET MSR 360MG | MYCOPHENOLIC ACID-360-MG-TABLET, MAAGSAPRESISTENT | 1,723131 | STUK
12602 | MEBUTAN TABLET 500MG | NABUMETONE-500-MG-TABLET | 0,128490 | STUK
26497 | NABUMETON MYLAN TABLET 500MG | NABUMETONE-500-MG-TABLET | 0,158680 | STUK
27157 | NABUMETON PCH TABLET 500MG | NABUMETONE-500-MG-TABLET | 0,158680 | STUK
110050//23794 | FRAXIPARINE FORTE INJV 11400IE/0,6ML(19000IE/ML)WW | NADROPARIN-19000-IE/ML-INJ.VLOEISTOF, WWSP | 11,269555 | ML
114999//23794 | FRAXIPARINE FORTE INJV 11400IE/0,6ML(19000IE/ML)WW | NADROPARIN-19000-IE/ML-INJ.VLOEISTOF, WWSP | 11,269555 | ML
23794 | FRAXIPARINE FORTE INJV 11400IE/0,6ML(19000IE/ML)WW | NADROPARIN-19000-IE/ML-INJ.VLOEISTOF, WWSP | 11,429175 | ML
110049//23795 | FRAXIPARINE FORTE INJV 15200IE/0,8ML(19000IE/ML)WW | NADROPARIN-19000-IE/ML-INJ.VLOEISTOF, WWSP | 11,269555 | ML
112643//23795 | FRAXIPARINE FORTE INJV 15200IE/0,8ML(19000IE/ML)WW | NADROPARIN-19000-IE/ML-INJ.VLOEISTOF, WWSP | 11,269555 | ML
23795 | FRAXIPARINE FORTE INJV 15200IE/0,8ML(19000IE/ML)WW | NADROPARIN-19000-IE/ML-INJ.VLOEISTOF, WWSP | 11,269555 | ML
110047//23796 | FRAXIPARINE FORTE INJV 19000IE/1,0ML(19000IE/ML)WW | NADROPARIN-19000-IE/ML-INJ.VLOEISTOF, WWSP | 11,269555 | ML
112645//23796 | FRAXIPARINE FORTE INJV 19000IE/1,0ML(19000IE/ML)WW | NADROPARIN-19000-IE/ML-INJ.VLOEISTOF, WWSP | 11,269555 | ML
11876 | FRAXIPARINE INJVLST 2850IE/0,3ML (9500IE/ML) WWSP | NADROPARIN-9500-IE/ML-INJ.VLOEISTOF, WWSP | 5,293599 | ML
124958//11876 | FRAXIPARINE INJVLST 2850IE/0,3ML (9500IE/ML) WWSP | NADROPARIN-9500-IE/ML-INJ.VLOEISTOF, WWSP | 5,293599 | ML
125566//11876 | FRAXIPARINE INJVLST 2850IE/0,3ML (9500IE/ML) WWSP | NADROPARIN-9500-IE/ML-INJ.VLOEISTOF, WWSP | 5,293599 | ML
124341//15963 | FRAXIPARINE INJVLST 3800IE/0,4ML (9500IE/ML) WWSP | NADROPARIN-9500-IE/ML-INJ.VLOEISTOF, WWSP | 5,293599 | ML
121219//15963 | FRAXIPARINE INJVLST 3800IE/0,4ML (9500IE/ML) WWSP | NADROPARIN-9500-IE/ML-INJ.VLOEISTOF, WWSP | 5,364576 | ML
15963 | FRAXIPARINE INJVLST 3800IE/0,4ML (9500IE/ML) WWSP | NADROPARIN-9500-IE/ML-INJ.VLOEISTOF, WWSP | 5,519075 | ML
11877 | FRAXIPARINE INJVLST 5700IE/0,6ML (9500IE/ML) WWSP | NADROPARIN-9500-IE/ML-INJ.VLOEISTOF, WWSP | 5,293599 | ML
124872//11877 | FRAXIPARINE INJVLST 5700IE/0,6ML (9500IE/ML) WWSP | NADROPARIN-9500-IE/ML-INJ.VLOEISTOF, WWSP | 5,293599 | ML
125370//11877 | FRAXIPARINE INJVLST 5700IE/0,6ML (9500IE/ML) WWSP | NADROPARIN-9500-IE/ML-INJ.VLOEISTOF, WWSP | 5,293599 | ML
125728//15965 | FRAXIPARINE INJVLST 7600IE/0,8ML (9500IE/ML) WWSP | NADROPARIN-9500-IE/ML-INJ.VLOEISTOF, WWSP | 5,293599 | ML
15965 | FRAXIPARINE INJVLST 7600IE/0,8ML (9500IE/ML) WWSP | NADROPARIN-9500-IE/ML-INJ.VLOEISTOF, WWSP | 5,293599 | ML
123605//11878 | FRAXIPARINE INJVLST 9500IE/1,0ML (9500IE/ML) WWSP | NADROPARIN-9500-IE/ML-INJ.VLOEISTOF, WWSP | 5,293599 | ML
109701//11876 | FRAXIPARINE INJVLST 9500IE/ML WWSP 0,3ML | NADROPARIN-9500-IE/ML-INJ.VLOEISTOF, WWSP | 5,293599 | ML
112316//11876 | FRAXIPARINE INJVLST 9500IE/ML WWSP 0,3ML | NADROPARIN-9500-IE/ML-INJ.VLOEISTOF, WWSP | 5,293599 | ML
120330//11876 | FRAXIPARINE INJVLST 9500IE/ML WWSP 0,3ML | NADROPARIN-9500-IE/ML-INJ.VLOEISTOF, WWSP | 5,293599 | ML
111537//15963 | FRAXIPARINE INJVLST 9500IE/ML WWSP 0,4ML | NADROPARIN-9500-IE/ML-INJ.VLOEISTOF, WWSP | 5,293599 | ML
113049//15963 | FRAXIPARINE INJVLST 9500IE/ML WWSP 0,4ML | NADROPARIN-9500-IE/ML-INJ.VLOEISTOF, WWSP | 5,293599 | ML
116801//15963 | FRAXIPARINE INJVLST 9500IE/ML WWSP 0,4ML | NADROPARIN-9500-IE/ML-INJ.VLOEISTOF, WWSP | 5,293599 | ML
113040//11877 | FRAXIPARINE INJVLST 9500IE/ML WWSP 0,6ML | NADROPARIN-9500-IE/ML-INJ.VLOEISTOF, WWSP | 5,293599 | ML
116800//11877 | FRAXIPARINE INJVLST 9500IE/ML WWSP 0,6ML | NADROPARIN-9500-IE/ML-INJ.VLOEISTOF, WWSP | 5,293599 | ML
119031//11877 | FRAXIPARINE INJVLST 9500IE/ML WWSP 0,6ML | NADROPARIN-9500-IE/ML-INJ.VLOEISTOF, WWSP | 5,364576 | ML
111538//15965 | FRAXIPARINE INJVLST 9500IE/ML WWSP 0,8ML | NADROPARIN-9500-IE/ML-INJ.VLOEISTOF, WWSP | 5,293599 | ML
113361//15965 | FRAXIPARINE INJVLST 9500IE/ML WWSP 0,8ML | NADROPARIN-9500-IE/ML-INJ.VLOEISTOF, WWSP | 5,293599 | ML
116803//15965 | FRAXIPARINE INJVLST 9500IE/ML WWSP 0,8ML | NADROPARIN-9500-IE/ML-INJ.VLOEISTOF, WWSP | 5,293599 | ML
15086 | SYNAREL NEUSSPRAY 200MCG/DOSIS FLACON 80DO | NAFARELIN-.2-MG-NEUSSPRAY | 1,308790 | DOSIS
EU/1/12/815/001 | SELINCRO TABLET FILMOMHULD 18MG | NALMEFEEN-18-MG-TABLET | 3,291233 | STUK
EU/1/12/815/002 | SELINCRO TABLET FILMOMHULD 18MG | NALMEFEEN-18-MG-TABLET | 3,525872 | STUK
EU/1/12/815/003 | SELINCRO TABLET FILMOMHULD 18MG | NALMEFEEN-18-MG-TABLET | 3,525872 | STUK
30958 | NALTREXON HCL PCH TABLET OMHULD 50MG | NALTREXONE-50-MG-TABLET | 1,928932 | STUK
24058 | NAPROXEN ACCORD TABLET 250MG | NAPROXEN-250-MG-TABLET | 0,089563 | STUK
57558 | NAPROXEN APOTEX TABLET 250MG | NAPROXEN-250-MG-TABLET | 0,158067 | STUK
56913 | NAPROXEN CF TABLET 250MG | NAPROXEN-250-MG-TABLET | 0,158067 | STUK
11195 | NAPROXEN MYLAN TABLET 250MG | NAPROXEN-250-MG-TABLET | 0,142940 | STUK
12570 | NAPROXEN TEVA TABLET 250MG | NAPROXEN-250-MG-TABLET | 0,158067 | STUK
21931 | NAPROXEN AUROBINDO EC TABLET MSR 250MG | NAPROXEN-250-MG-TABLET, MAAGSAPRESISTENT | 0,195251 | STUK
24967 | NAPROXEN MYLAN EC TABLET MSR 250MG | NAPROXEN-250-MG-TABLET, MAAGSAPRESISTENT | 0,195251 | STUK
30325 | NAPROXEN TEVA TABLET MSR 250MG | NAPROXEN-250-MG-TABLET, MAAGSAPRESISTENT | 0,195251 | STUK
24059 | NAPROXEN ACCORD TABLET 500MG | NAPROXEN-500-MG-TABLET | 0,159853 | STUK
57559 | NAPROXEN APOTEX TABLET 500MG | NAPROXEN-500-MG-TABLET | 0,247083 | STUK
56914 | NAPROXEN CF TABLET 500MG | NAPROXEN-500-MG-TABLET | 0,247083 | STUK
11196 | NAPROXEN MYLAN TABLET 500MG | NAPROXEN-500-MG-TABLET | 0,159853 | STUK
12571 | NAPROXEN TEVA TABLET 500MG | NAPROXEN-500-MG-TABLET | 0,247083 | STUK
21932 | NAPROXEN AUROBINDO EC TABLET MSR 500MG | NAPROXEN-500-MG-TABLET, MAAGSAPRESISTENT | 0,299778 | STUK
24968 | NAPROXEN MYLAN EC TABLET MSR 500MG | NAPROXEN-500-MG-TABLET, MAAGSAPRESISTENT | 0,299778 | STUK
30326 | NAPROXEN TEVA TABLET MSR 500MG | NAPROXEN-500-MG-TABLET, MAAGSAPRESISTENT | 0,299778 | STUK
113033//106235 | VIMOVO TABLET MGA 500/20MG | NAPROXEN-500-MG-TABLET, MET GEREGULEERDE AFGIFTE-ESOMEPRAZOL-20-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,343897 | STUK
106235 | VIMOVO TABLET MGA 500/20MG | NAPROXEN-500-MG-TABLET, MET GEREGULEERDE AFGIFTE-ESOMEPRAZOL-20-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,344597 | STUK
21444 | NARAMIG TABLET OMHULD 2,5MG | NARATRIPTAN-2.5-MG-TABLET | 2,958282 | STUK
EU/1/06/346/001 | TYSABRI INFVLST CONC 20MG/ML FLACON 15ML | NATALIZUMAB-20-MG/ML-INFUUSVLOEISTOF, FLACON | 88,260093 | ML
123885 | NATRIUMOXYBAAT KALCEKS DRANK 500MG/ML | NATRIUM OXYBATE-500-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 1,398818 | ML
EU/1/05/312/001 | XYREM DRANK 500MG/ML | NATRIUM OXYBATE-500-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 1,398818 | ML
18849 | NEBILET TABLET 5MG | NEBIVOLOL-5-MG-TABLET | 0,165121 | STUK
EU/1/07/403/001 | ATRIANCE INFVLST 5MG/ML FLACON 50ML | NELARABIN-5-MG/ML-INFUUSVLOEISTOF, FLACON | 6,524549 | ML
EU/1/97/055/006 | VIRAMUNE TABLET MVA 100MG | NEVIRAPINE-100-MG-TABLET, MET GEREGULEERDE AFGIFTE | 2,122419 | STUK
EU/1/97/055/002 | VIRAMUNE SUSPENSIE 10MG/ML | NEVIRAPINE-10-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,240089 | ML
107898 | NEVIRAPINE MYLAN TABLET 200MG | NEVIRAPINE-200-MG-TABLET | 2,118517 | STUK
109115 | NEVIRAPINE SANDOZ TABLET 200MG | NEVIRAPINE-200-MG-TABLET | 2,118517 | STUK
EU/1/97/055/001 | VIRAMUNE TABLET 200MG | NEVIRAPINE-200-MG-TABLET | 2,118517 | STUK
114879 | NEVIRAPINE MYLAN TABLET MVA 400MG | NEVIRAPINE-400-MG-TABLET, MET GEREGULEERDE AFGIFTE | 3,896331 | STUK
EU/1/97/055/008 | VIRAMUNE TABLET MVA 400MG | NEVIRAPINE-400-MG-TABLET, MET GEREGULEERDE AFGIFTE | 4,600340 | STUK
15221 | IKOREL TABLET 10MG | NICORANDIL-10-MG-TABLET | 0,129640 | STUK
15870 | NIFEDIPINE CF CAPSULE 10MG | NIFEDIPINE-10-MG-CAPSULE | 0,513470 | STUK
20139=15976 | NIFEDIPINE AUROBINDO RETARD TABLET 20MG | NIFEDIPINE-20-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,170886 | STUK
15976 | NIFEDIPINE CF RETARD TABLET 20MG | NIFEDIPINE-20-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,164956 | STUK
22964=15976 | NIFEDIPINE SANDOZ RETARD TABLET 20MG | NIFEDIPINE-20-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,170886 | STUK
26557=15976 | NIFEDIPINE TEVA RETARD TABLET 20MG | NIFEDIPINE-20-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,170886 | STUK
119044//14794 | ADALAT OROS TABLET MGA 30MG | NIFEDIPINE-30-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,224535 | STUK
28944 | NIFEDIPINE SANDOZ RETARD TABLET MGA 30MG | NIFEDIPINE-30-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,224535 | STUK
100102 | NIFEDIPINE TEVA RETARD TABLET MGA 30MG | NIFEDIPINE-30-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,224535 | STUK
119046//14794 | ADALAT OROS TABLET MGA 60MG | NIFEDIPINE-60-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,399949 | STUK
28945 | NIFEDIPINE SANDOZ RETARD TABLET MGA 60MG | NIFEDIPINE-60-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,399949 | STUK
100104 | NIFEDIPINE TEVA RETARD TABLET MGA 60MG | NIFEDIPINE-60-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,399949 | STUK
EU/1/07/422/005 | TASIGNA CAPSULE 150MG | NILOTINIB-150-MG-CAPSULE | 23,479696 | STUK
EU/1/07/422/006 | TASIGNA CAPSULE 150MG | NILOTINIB-150-MG-CAPSULE | 23,479696 | STUK
EU/1/07/422/009 | TASIGNA CAPSULE 150MG | NILOTINIB-150-MG-CAPSULE | 23,479696 | STUK
EU/1/07/422/007 | TASIGNA CAPSULE 200MG | NILOTINIB-200-MG-CAPSULE | 29,149479 | STUK
EU/1/07/422/011 | TASIGNA CAPSULE 200MG | NILOTINIB-200-MG-CAPSULE | 29,149479 | STUK
12060 | NIMOTOP TABLET 30MG | NIMODIPINE-30-MG-TABLET | 0,387823 | STUK
EU/1/14/979/004 | OFEV CAPSULE 150MG | NINTEDANIB-150-MG-CAPSULE | 39,539238 | STUK
EU/1/14/954/004 | VARGATEF CAPSULE 150MG | NINTEDANIB-150-MG-CAPSULE | 39,539238 | STUK
EU/1/17/1235/001 | ZEJULA CAPSULE 100MG | NIRAPARIB-100-MG-CAPSULE | 95,784651 | STUK
EU/1/17/1235/002 | ZEJULA CAPSULE 100MG | NIRAPARIB-100-MG-CAPSULE | 95,784651 | STUK
EU/1/17/1217/003 | NITISINONE MDK CAPSULE 10MG | NITISINON-10-MG-CAPSULE | 32,972496 | STUK
EU/1/04/303/003 | ORFADIN CAPSULE 10MG | NITISINON-10-MG-CAPSULE | 35,870196 | STUK
EU/1/04/303/004 | ORFADIN CAPSULE 20MG | NITISINON-20-MG-CAPSULE | 65,638747 | STUK
EU/1/17/1217/001 | NITISINONE MDK CAPSULE 2MG | NITISINON-2-MG-CAPSULE | 9,052521 | STUK
EU/1/04/303/001 | ORFADIN CAPSULE 2MG | NITISINON-2-MG-CAPSULE | 9,052521 | STUK
EU/1/04/303/005 | ORFADIN SUSPENSIE 4MG/ML | NITISINON-4-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 20,411594 | ML
EU/1/17/1217/002 | NITISINONE MDK CAPSULE 5MG | NITISINON-5-MG-CAPSULE | 18,102600 | STUK
EU/1/04/303/002 | ORFADIN CAPSULE 5MG | NITISINON-5-MG-CAPSULE | 18,102600 | STUK
50283 | NITRAZEPAM APOTEX TABLET 5MG | NITRAZEPAM-5-MG-TABLET | 0,109372 | STUK
23514 | NITRAZEPAM AUROBINDO TABLET 5MG | NITRAZEPAM-5-MG-TABLET | 0,109372 | STUK
56236 | NITRAZEPAM TEVA TABLET 5MG | NITRAZEPAM-5-MG-TABLET | 0,109372 | STUK
5748 | FURADANTINE MC CAPSULE 50MG | NITROFURANTOIN-50-MG-CAPSULE | 0,246047 | STUK
24265 | NORFLOXACINE CF TABLET 400MG | NORFLOXACIN-400-MG-TABLET | 0,270627 | STUK
26800 | NORFLOXACINE SANDOZ TABLET 400MG | NORFLOXACIN-400-MG-TABLET | 0,270627 | STUK
3285 | NORTRILEN TABLET 10MG | NORTRIPTYLINE-10-MG-TABLET | 0,151849 | STUK
125238//3286 | NORTRILEN TABLET 25MG | NORTRIPTYLINE-25-MG-TABLET | 0,112482 | STUK
30294//3286 | NORTRILEN TABLET 25MG | NORTRIPTYLINE-25-MG-TABLET | 0,112482 | STUK
30336//3286 | NORTRILEN TABLET 25MG | NORTRIPTYLINE-25-MG-TABLET | 0,112482 | STUK
29213//3286 | NORTRILEN TABLET 25MG | NORTRIPTYLINE-25-MG-TABLET | 0,114719 | STUK
3286 | NORTRILEN TABLET 25MG | NORTRIPTYLINE-25-MG-TABLET | 0,127466 | STUK
121858 | NORTRIPTYLINE MYLAN TABLET FILMOMHULD 25MG | NORTRIPTYLINE-25-MG-TABLET | 0,112482 | STUK
EU/1/17/1188/001 | SPINRAZA INJVLST 2,4MG/ML FLACON 5ML | NUSINERSEN-12-MG-INJECTIEVLOEISTOF, FLAC | 86008,695833 | STUK
124711//6771 | NYSTATINE ERC SUSPENSIE 100.000E/ML | NYSTATIN-100000-IE/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,110551 | ML
119514//6771 | NYSTATINE EURECO-PHARMA SUSPENSIE 100.000E/ML | NYSTATIN-100000-IE/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,110551 | ML
6771 | NYSTATINE LABAZ SUSPENSIE 100.000E/ML | NYSTATIN-100000-IE/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,110551 | ML
119515//6771 | NYSTATINE SUSPENSIE 100.000E/ML | NYSTATIN-100000-IE/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,110551 | ML
EU/1/14/937/001 | GAZYVARO INFVLST CONC 1000MG/40ML (25MG/ML) FLACON | OBINUTUZUMAB-25-MG/ML-INFUUSVLOEISTOF, FLACON | 90,559174 | ML
EU/1/17/1231/001 | OCREVUS INFVLST CONC 300MG/10ML (30MG/ML) FLACON | OCRELIZUMAB-300-MG-INJECTIEVLOEISTOF, FLAC | 5609,314800 | STUK
12612 | SANDOSTATINE INJVLST 0,05MG/ML AMPUL 1ML | OCTREOTIDE-.05-MG/ML-INJ.VLOEISTOF AMPUL | 5,301312 | ML
122781//12613 | SANDOSTATINE INJVLST 0,1MG/ML AMPUL 1ML | OCTREOTIDE-.1-MG/ML-INJ.VLOEISTOF AMPUL | 7,503278 | ML
12613 | SANDOSTATINE INJVLST 0,1MG/ML AMPUL 1ML | OCTREOTIDE-.1-MG/ML-INJ.VLOEISTOF AMPUL | 7,503278 | ML
35049 | OCTREOTIDE HOSPIRA INJVLST 0,2MG/ML FLACON 5ML | OCTREOTIDE-.2-MG/ML-INJECTIEVLOEISTOF, FLAC | 18,505932 | ML
14997 | SANDOSTATINE INJVLST 0,5MG/ML AMPUL 1ML | OCTREOTIDE-.5-MG/ML-INJ.VLOEISTOF AMPUL | 41,181033 | ML
126336//112909 | SIROCTID INJVLST 0,05MG/ML WWSP 1ML | OCTREOTIDE-0.05-MG/ML-INJ.VLOEISTOF, WWSP | 4,647818 | ML
112909 | SIROCTID INJVLST 0,05MG/ML WWSP 1ML | OCTREOTIDE-0.05-MG/ML-INJ.VLOEISTOF, WWSP | 5,472010 | ML
126333//112910 | SIROCTID INJVLST 0,1MG/ML WWSP 1ML | OCTREOTIDE-0.1-MG/ML-INJ.VLOEISTOF, WWSP | 6,685887 | ML
112910 | SIROCTID INJVLST 0,1MG/ML WWSP 1ML | OCTREOTIDE-0.1-MG/ML-INJ.VLOEISTOF, WWSP | 8,369166 | ML
126339//112911 | SIROCTID INJVLST 0,5MG/ML WWSP 1ML | OCTREOTIDE-0.5-MG/ML-INJ.VLOEISTOF, WWSP | 32,414464 | ML
112911 | SIROCTID INJVLST 0,5MG/ML WWSP 1ML | OCTREOTIDE-0.5-MG/ML-INJ.VLOEISTOF, WWSP | 43,052832 | ML
117929//18235 | SANDOSTATINE LAR INJPDR FL 10MG + SOLV 2ML | OCTREOTIDE-10-MG-POED. V. INJECTIE, FLACON | 650,638621 | STUK
120574//18235 | SANDOSTATINE LAR INJPDR FL 10MG + SOLV 2ML | OCTREOTIDE-10-MG-POED. V. INJECTIE, FLACON | 650,638621 | STUK
120938//18235 | SANDOSTATINE LAR INJPDR FL 10MG + SOLV 2ML | OCTREOTIDE-10-MG-POED. V. INJECTIE, FLACON | 650,638621 | STUK
31749//18235 | SANDOSTATINE LAR INJPDR FL 10MG + SOLV 2ML | OCTREOTIDE-10-MG-POED. V. INJECTIE, FLACON | 650,638621 | STUK
122164 | OCTREOTIDE DEPOT TEVA INJPDR FL 20MG + SOLV 2ML | OCTREOTIDE-20-MG-POED. V. INJECTIE, FLACON | 781,955129 | STUK
114114//18236 | SANDOSTATINE LAR INJPDR FL 20MG + SOLV 2ML | OCTREOTIDE-20-MG-POED. V. INJECTIE, FLACON | 781,955129 | STUK
117926//18236 | SANDOSTATINE LAR INJPDR FL 20MG + SOLV 2ML | OCTREOTIDE-20-MG-POED. V. INJECTIE, FLACON | 781,955129 | STUK
120241//18236 | SANDOSTATINE LAR INJPDR FL 20MG + SOLV 2ML | OCTREOTIDE-20-MG-POED. V. INJECTIE, FLACON | 781,955129 | STUK
120939//18236 | SANDOSTATINE LAR INJPDR FL 20MG + SOLV 2ML | OCTREOTIDE-20-MG-POED. V. INJECTIE, FLACON | 781,955129 | STUK
122899//18236 | SANDOSTATINE LAR INJPDR FL 20MG + SOLV 2ML | OCTREOTIDE-20-MG-POED. V. INJECTIE, FLACON | 781,955129 | STUK
123487//18236 | SANDOSTATINE LAR INJPDR FL 20MG + SOLV 2ML | OCTREOTIDE-20-MG-POED. V. INJECTIE, FLACON | 781,955129 | STUK
123648//18236 | SANDOSTATINE LAR INJPDR FL 20MG + SOLV 2ML | OCTREOTIDE-20-MG-POED. V. INJECTIE, FLACON | 781,955129 | STUK
124098//18236 | SANDOSTATINE LAR INJPDR FL 20MG + SOLV 2ML | OCTREOTIDE-20-MG-POED. V. INJECTIE, FLACON | 781,955129 | STUK
124746//18236 | SANDOSTATINE LAR INJPDR FL 20MG + SOLV 2ML | OCTREOTIDE-20-MG-POED. V. INJECTIE, FLACON | 781,955129 | STUK
125125//18236 | SANDOSTATINE LAR INJPDR FL 20MG + SOLV 2ML | OCTREOTIDE-20-MG-POED. V. INJECTIE, FLACON | 781,955129 | STUK
18236 | SANDOSTATINE LAR INJPDR FL 20MG + SOLV 2ML | OCTREOTIDE-20-MG-POED. V. INJECTIE, FLACON | 781,955129 | STUK
31750//18236 | SANDOSTATINE LAR INJPDR FL 20MG + SOLV 2ML | OCTREOTIDE-20-MG-POED. V. INJECTIE, FLACON | 781,955129 | STUK
122165 | OCTREOTIDE DEPOT TEVA INJPDR FL 30MG + SOLV 2ML | OCTREOTIDE-30-MG-POED. V. INJECTIE, FLACON | 978,969854 | STUK
114113//18237 | SANDOSTATINE LAR INJPDR FL 30MG + SOLV 2ML | OCTREOTIDE-30-MG-POED. V. INJECTIE, FLACON | 978,969854 | STUK
117930//18237 | SANDOSTATINE LAR INJPDR FL 30MG + SOLV 2ML | OCTREOTIDE-30-MG-POED. V. INJECTIE, FLACON | 978,969854 | STUK
120940//18237 | SANDOSTATINE LAR INJPDR FL 30MG + SOLV 2ML | OCTREOTIDE-30-MG-POED. V. INJECTIE, FLACON | 978,969854 | STUK
120963//18237 | SANDOSTATINE LAR INJPDR FL 30MG + SOLV 2ML | OCTREOTIDE-30-MG-POED. V. INJECTIE, FLACON | 978,969854 | STUK
122646//18237 | SANDOSTATINE LAR INJPDR FL 30MG + SOLV 2ML | OCTREOTIDE-30-MG-POED. V. INJECTIE, FLACON | 978,969854 | STUK
122791//18237 | SANDOSTATINE LAR INJPDR FL 30MG + SOLV 2ML | OCTREOTIDE-30-MG-POED. V. INJECTIE, FLACON | 978,969854 | STUK
122898//18237 | SANDOSTATINE LAR INJPDR FL 30MG + SOLV 2ML | OCTREOTIDE-30-MG-POED. V. INJECTIE, FLACON | 978,969854 | STUK
123347//18237 | SANDOSTATINE LAR INJPDR FL 30MG + SOLV 2ML | OCTREOTIDE-30-MG-POED. V. INJECTIE, FLACON | 978,969854 | STUK
124097//18237 | SANDOSTATINE LAR INJPDR FL 30MG + SOLV 2ML | OCTREOTIDE-30-MG-POED. V. INJECTIE, FLACON | 978,969854 | STUK
124364//18237 | SANDOSTATINE LAR INJPDR FL 30MG + SOLV 2ML | OCTREOTIDE-30-MG-POED. V. INJECTIE, FLACON | 978,969854 | STUK
125099//18237 | SANDOSTATINE LAR INJPDR FL 30MG + SOLV 2ML | OCTREOTIDE-30-MG-POED. V. INJECTIE, FLACON | 978,969854 | STUK
18237 | SANDOSTATINE LAR INJPDR FL 30MG + SOLV 2ML | OCTREOTIDE-30-MG-POED. V. INJECTIE, FLACON | 978,969854 | STUK
31751//18237 | SANDOSTATINE LAR INJPDR FL 30MG + SOLV 2ML | OCTREOTIDE-30-MG-POED. V. INJECTIE, FLACON | 978,969854 | STUK
27571 | OFLOXACINE PCH TABLET FILMOMHULD 200MG | OFLOXACIN-200-MG-TABLET | 0,760626 | STUK
110894 | OFLOXACINE POS OOGDRUPPELS 3MG/ML FLACON 5ML | OFLOXACIN-3-MG/ML-OOGDRUPPELS | 0,473699 | ML
13510 | TRAFLOXAL OOGDRUPPELS 3MG/ML FLACON 5ML | OFLOXACIN-3-MG/ML-OOGDRUPPELS | 0,473699 | ML
109912 | OFLOXACINE STULLN UNIT DOS OOGDR 3MG/ML TUBE 0,5ML | OFLOXACIN-3-MG/ML-OOGDRUPPELS UNITDOSE | 0,499198 | ML
29805 | TRAFLOXAL EDO OOGDRUPPELS 3MG/ML TUBE 0,5ML | OFLOXACIN-3-MG/ML-OOGDRUPPELS UNITDOSE | 0,499198 | ML
27572 | OFLOXACINE PCH TABLET FILMOMHULD 400MG | OFLOXACIN-400-MG-TABLET | 1,660815 | STUK
EU/1/96/022/016 | ZYPREXA INJECTIEPOEDER FLACON 10MG | OLANZAPINE-10-MG-POED. V. INJECTIE, FLACON | 17,489189 | STUK
107682 | OLANZAPINE SANDOZ ORODISP TABLET 10MG | OLANZAPINE-10-MG-SMELTTABLET | 1,138204 | STUK
EU/1/99/125/002 | ZYPREXA VELOTAB ORODISP TABLET 10MG | OLANZAPINE-10-MG-SMELTTABLET | 1,138204 | STUK
EU/1/96/022/009 | ZYPREXA TABLET 10MG | OLANZAPINE-10-MG-TABLET | 1,036951 | STUK
107683 | OLANZAPINE SANDOZ ORODISP TABLET 15MG | OLANZAPINE-15-MG-SMELTTABLET | 2,469063 | STUK
EU/1/99/125/003 | ZYPREXA VELOTAB ORODISP TABLET 15MG | OLANZAPINE-15-MG-SMELTTABLET | 2,469063 | STUK
EU/1/08/475/006 | OLANZAPINE MYLAN TABLET FILMOMHULD 2,5MG | OLANZAPINE-2.5-MG-TABLET | 0,529434 | STUK
EU/1/07/427/002 | OLANZAPINE TEVA TABLET FILMOMHULD 2,5MG | OLANZAPINE-2.5-MG-TABLET | 0,529434 | STUK
EU/1/96/022/002 | ZYPREXA TABLET 2,5MG | OLANZAPINE-2.5-MG-TABLET | 0,529434 | STUK
107684 | OLANZAPINE SANDOZ ORODISP TABLET 20MG | OLANZAPINE-20-MG-SMELTTABLET | 3,290184 | STUK
EU/1/99/125/004 | ZYPREXA VELOTAB ORODISP TABLET 20MG | OLANZAPINE-20-MG-SMELTTABLET | 3,290184 | STUK
EU/1/08/479/001 | ZYPADHERA INJPDR MVA FLACON 210MG +SOLV 3ML | OLANZAPINE-210-MG-POED. V. INJECTIE, FLACON | 170,632553 | STUK
EU/1/08/479/002 | ZYPADHERA INJPDR MVA FLACON 300MG +SOLV 3ML | OLANZAPINE-300-MG-POED. V. INJECTIE, FLACON | 206,784002 | STUK
EU/1/08/479/003 | ZYPADHERA INJPDR MVA FLACON 405MG +SOLV 3ML | OLANZAPINE-405-MG-POED. V. INJECTIE, FLACON | 273,017772 | STUK
EU/1/09/588/001 | OLANZAPINE GLENMARK SMELTTABLET 5MG | OLANZAPINE-5-MG-SMELTTABLET | 0,743292 | STUK
107681 | OLANZAPINE SANDOZ ORODISP TABLET 5MG | OLANZAPINE-5-MG-SMELTTABLET | 0,743292 | STUK
EU/1/99/125/001 | ZYPREXA VELOTAB ORODISP TABLET 5MG | OLANZAPINE-5-MG-SMELTTABLET | 0,743292 | STUK
EU/1/09/587/004 | OLANZAPINE GLENMARK TABLET 5MG | OLANZAPINE-5-MG-TABLET | 0,671366 | STUK
EU/1/96/022/004 | ZYPREXA TABLET 5MG | OLANZAPINE-5-MG-TABLET | 0,671366 | STUK
EU/1/96/022/020 | ZYPREXA TABLET 5MG | OLANZAPINE-5-MG-TABLET | 0,671366 | STUK
EU/1/14/959/002 | LYNPARZA TABLET FILMOMHULD 100MG | OLAPARIB-100-MG-TABLET | 44,374760 | STUK
EU/1/14/959/004 | LYNPARZA TABLET FILMOMHULD 150MG | OLAPARIB-150-MG-TABLET | 44,374760 | STUK
EU/1/14/959/001 | LYNPARZA CAPSULE 50MG | OLAPARIB-50-MG-CAPSULE | 11,156688 | STUK
116942 | OLMESARTANMEDOXOMIL ACCORD TABLET FILMOMHULD 10MG | OLMESARTAN-10-MG-TABLET | 0,301340 | STUK
118852 | OLMESARTANMEDOXOMIL AUROBINDO TABLET FILMOMH 10MG | OLMESARTAN-10-MG-TABLET | 0,301340 | STUK
115135 | OLMESARTANMEDOXOMIL GLENMARK TABLET FILMOMH 10MG | OLMESARTAN-10-MG-TABLET | 0,301340 | STUK
114727 | OLMESARTANMEDOXOMIL TEVA TABLET FILMOMHULD 10MG | OLMESARTAN-10-MG-TABLET | 0,301340 | STUK
28782 | OLMETEC TABLET FILMOMHULD 10MG | OLMESARTAN-10-MG-TABLET | 0,301340 | STUK
116943 | OLMESARTANMEDOXOMIL ACCORD TABLET FILMOMHULD 20MG | OLMESARTAN-20-MG-TABLET | 0,392766 | STUK
118853 | OLMESARTANMEDOXOMIL AUROBINDO TABLET FILMOMH 20MG | OLMESARTAN-20-MG-TABLET | 0,392766 | STUK
115136 | OLMESARTANMEDOXOMIL GLENMARK TABLET FILMOMH 20MG | OLMESARTAN-20-MG-TABLET | 0,392766 | STUK
114728 | OLMESARTANMEDOXOMIL TEVA TABLET FILMOMHULD 20MG | OLMESARTAN-20-MG-TABLET | 0,392766 | STUK
28783 | OLMETEC TABLET FILMOMHULD 20MG | OLMESARTAN-20-MG-TABLET | 0,392766 | STUK
116944 | OLMESARTANMEDOXOMIL ACCORD TABLET FILMOMHULD 40MG | OLMESARTAN-40-MG-TABLET | 0,457642 | STUK
118854 | OLMESARTANMEDOXOMIL AUROBINDO TABLET FILMOMH 40MG | OLMESARTAN-40-MG-TABLET | 0,457642 | STUK
115137 | OLMESARTANMEDOXOMIL GLENMARK TABLET FILMOMH 40MG | OLMESARTAN-40-MG-TABLET | 0,457642 | STUK
114075 | OLMESARTANMEDOXOMIL MYLAN TABLET FILMOMHULD 40MG | OLMESARTAN-40-MG-TABLET | 0,457642 | STUK
114729 | OLMESARTANMEDOXOMIL TEVA TABLET FILMOMHULD 40MG | OLMESARTAN-40-MG-TABLET | 0,457642 | STUK
28784 | OLMETEC TABLET FILMOMHULD 40MG | OLMESARTAN-40-MG-TABLET | 0,457642 | STUK
118405//112058 | STRIVERDI RESPIMAT INHOPL 2,5MCG/DO PATR 60DO+INH | OLODATEROL-0.0025-MG-AEROSOL | 0,440894 | DOSIS
112058 | STRIVERDI RESPIMAT INHOPL 2,5MCG/DO PATR 60DO+INH | OLODATEROL-0.0025-MG-AEROSOL | 0,494128 | DOSIS
119377//112058 | STRIVERDI RESPIMAT INHOPL 2,5MCG/DO PATR 60DO+INH | OLODATEROL-0.0025-MG-AEROSOL | 0,494128 | DOSIS
EU/1/02/217/001 | OPATANOL OOGDRUPPELS 1MG/ML FLACON 5ML | OLOPATADINE-1-MG/ML-OOGDRUPPELS | 1,396571 | ML
11790 | DIPENTUM CAPSULE 250MG | OLSALAZINE-250-MG-CAPSULE | 0,737373 | STUK
14363 | DIPENTUM TABLET 500MG | OLSALAZINE-500-MG-TABLET | 1,523937 | STUK
EU/1/05/319/005 | XOLAIR 75 INJECTIEVLOEISTOF 150MG/ML WWSP 0,5ML | OMALIZUMAB-150-MG/ML-INJ.VLOEISTOF, WWSP | 298,912697 | ML
EU/1/05/319/008 | XOLAIR 150 INJECTIEVLOEISTOF 150MG/ML WWSP 1ML | OMALIZUMAB-150-MG/ML-INJ.VLOEISTOF, WWSP | 298,912697 | ML
113713 | OMECAT CAPSULE MSR 10MG | OMEPRAZOLE-10-MG-CAPSULE, MAAGSAPRESISTENT | 0,207854 | STUK
21683 | LOSEC MUPS TABLET MSR 10MG | OMEPRAZOLE-10-MG-TABLET, MAAGSAPRESISTENT | 0,340205 | STUK
104959 | OMEPRAZOL SANDOZ MUT TABLET MSR 10MG | OMEPRAZOLE-10-MG-TABLET, MAAGSAPRESISTENT | 0,340205 | STUK
113714 | OMECAT CAPSULE MSR 20MG | OMEPRAZOLE-20-MG-CAPSULE, MAAGSAPRESISTENT | 0,234344 | STUK
26725 | OMEPRAZOL APOTEX CAPSULE MSR 20MG | OMEPRAZOLE-20-MG-CAPSULE, MAAGSAPRESISTENT | 0,234344 | STUK
25482 | OMEPRAZOL MYLAN CAPSULE MSR 20MG | OMEPRAZOLE-20-MG-CAPSULE, MAAGSAPRESISTENT | 0,234344 | STUK
110107 | OMEPRAZOL TEVA CAPSULE MSR 20MG | OMEPRAZOLE-20-MG-CAPSULE, MAAGSAPRESISTENT | 0,234344 | STUK
119909//21684 | LOSEC MUPS TABLET MSR 20MG | OMEPRAZOLE-20-MG-TABLET, MAAGSAPRESISTENT | 0,521741 | STUK
21684 | LOSEC MUPS TABLET MSR 20MG | OMEPRAZOLE-20-MG-TABLET, MAAGSAPRESISTENT | 0,521741 | STUK
104960 | OMEPRAZOL SANDOZ MUT TABLET MSR 20MG | OMEPRAZOLE-20-MG-TABLET, MAAGSAPRESISTENT | 0,521741 | STUK
26726 | OMEPRAZOL APOTEX CAPSULE MSR 40MG | OMEPRAZOLE-40-MG-CAPSULE, MAAGSAPRESISTENT | 0,434513 | STUK
26016 | OMEPRAZOL MYLAN CAPSULE MSR 40MG | OMEPRAZOLE-40-MG-CAPSULE, MAAGSAPRESISTENT | 0,430613 | STUK
110108 | OMEPRAZOL TEVA CAPSULE MSR 40MG | OMEPRAZOLE-40-MG-CAPSULE, MAAGSAPRESISTENT | 0,430613 | STUK
119910//21685 | LOSEC MUPS TABLET MSR 40MG | OMEPRAZOLE-40-MG-TABLET, MAAGSAPRESISTENT | 1,394850 | STUK
21685 | LOSEC MUPS TABLET MSR 40MG | OMEPRAZOLE-40-MG-TABLET, MAAGSAPRESISTENT | 1,394850 | STUK
104961 | OMEPRAZOL SANDOZ MUT TABLET MSR 40MG | OMEPRAZOLE-40-MG-TABLET, MAAGSAPRESISTENT | 1,394850 | STUK
114115//19922 | ZOFRAN STROOP 0,8MG/ML | ONDANSETRON-.8-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,879823 | ML
117425//19922 | ZOFRAN STROOP 0,8MG/ML | ONDANSETRON-.8-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,977581 | ML
19922 | ZOFRAN STROOP 0,8MG/ML | ONDANSETRON-.8-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,977581 | ML
110622//19252 | ZOFRAN ZETPIL 16MG | ONDANSETRON-16-MG-ZETPIL | 11,284381 | STUK
117076//19252 | ZOFRAN ZETPIL 16MG | ONDANSETRON-16-MG-ZETPIL | 11,284381 | STUK
122825//19252 | ZOFRAN ZETPIL 16MG | ONDANSETRON-16-MG-ZETPIL | 11,284381 | STUK
113115 | ONDANSETRON ACCORD INJVLST 2MG/ML AMPUL 2ML | ONDANSETRON-2-MG/ML-INJ.VLOEISTOF AMPUL | 1,930978 | ML
113115 | ONDANSETRON ACCORD INJVLST 2MG/ML AMPUL 4ML | ONDANSETRON-2-MG/ML-INJ.VLOEISTOF AMPUL | 1,930978 | ML
101235 | ONDANSETRON CLARIS INJVLST 2MG/ML AMPUL 2ML | ONDANSETRON-2-MG/ML-INJ.VLOEISTOF AMPUL | 1,930978 | ML
101235 | ONDANSETRON CLARIS INJVLST 2MG/ML AMPUL 4ML | ONDANSETRON-2-MG/ML-INJ.VLOEISTOF AMPUL | 1,930978 | ML
33570 | ONDANSETRON HIKMA INJVLST 2MG/ML AMPUL 2ML | ONDANSETRON-2-MG/ML-INJ.VLOEISTOF AMPUL | 1,930978 | ML
33571 | ONDANSETRON HIKMA INJVLST 2MG/ML AMPUL 4ML | ONDANSETRON-2-MG/ML-INJ.VLOEISTOF AMPUL | 1,930978 | ML
33506 | ONDANSETRON KABI INJVLST 2MG/ML AMPUL 2ML | ONDANSETRON-2-MG/ML-INJ.VLOEISTOF AMPUL | 1,930978 | ML
33506 | ONDANSETRON KABI INJVLST 2MG/ML AMPUL 4ML | ONDANSETRON-2-MG/ML-INJ.VLOEISTOF AMPUL | 1,930978 | ML
110634//21471 | ZOFRAN ZYDIS SMELTTABLET 4MG | ONDANSETRON-4-MG-SMELTTABLET | 2,929360 | STUK
117080//21471 | ZOFRAN ZYDIS SMELTTABLET 4MG | ONDANSETRON-4-MG-SMELTTABLET | 2,929360 | STUK
124270//21471 | ZOFRAN ZYDIS SMELTTABLET 4MG | ONDANSETRON-4-MG-SMELTTABLET | 2,929360 | STUK
124728//21471 | ZOFRAN ZYDIS SMELTTABLET 4MG | ONDANSETRON-4-MG-SMELTTABLET | 2,929360 | STUK
125973//21471 | ZOFRAN ZYDIS SMELTTABLET 4MG | ONDANSETRON-4-MG-SMELTTABLET | 2,929360 | STUK
126817//21471 | ZOFRAN ZYDIS SMELTTABLET 4MG | ONDANSETRON-4-MG-SMELTTABLET | 2,929360 | STUK
127661//21471 | ZOFRAN ZYDIS SMELTTABLET 4MG | ONDANSETRON-4-MG-SMELTTABLET | 2,929360 | STUK
21471 | ZOFRAN ZYDIS SMELTTABLET 4MG | ONDANSETRON-4-MG-SMELTTABLET | 2,929360 | STUK
120923//21471 | ZOFRAN ZYDIS SMELTTABLET 4MG | ONDANSETRON-4-MG-SMELTTABLET | 2,943427 | STUK
121693//21472 | ZOFRAN ZYDIS SMELTTABLET 8MG | ONDANSETRON-8-MG-SMELTTABLET | 4,496456 | STUK
124284//21472 | ZOFRAN ZYDIS SMELTTABLET 8MG | ONDANSETRON-8-MG-SMELTTABLET | 4,496456 | STUK
124740//21472 | ZOFRAN ZYDIS SMELTTABLET 8MG | ONDANSETRON-8-MG-SMELTTABLET | 4,496456 | STUK
126104//21472 | ZOFRAN ZYDIS SMELTTABLET 8MG | ONDANSETRON-8-MG-SMELTTABLET | 4,496456 | STUK
127516//21472 | ZOFRAN ZYDIS SMELTTABLET 8MG | ONDANSETRON-8-MG-SMELTTABLET | 4,496456 | STUK
110633//21472 | ZOFRAN ZYDIS SMELTTABLET 8MG | ONDANSETRON-8-MG-SMELTTABLET | 4,701344 | STUK
119943//21472 | ZOFRAN ZYDIS SMELTTABLET 8MG | ONDANSETRON-8-MG-SMELTTABLET | 4,701344 | STUK
123469//21472 | ZOFRAN ZYDIS SMELTTABLET 8MG | ONDANSETRON-8-MG-SMELTTABLET | 4,701344 | STUK
117081//21472 | ZOFRAN ZYDIS SMELTTABLET 8MG | ONDANSETRON-8-MG-SMELTTABLET | 5,223715 | STUK
21472 | ZOFRAN ZYDIS SMELTTABLET 8MG | ONDANSETRON-8-MG-SMELTTABLET | 5,223715 | STUK
EU/1/16/1086/002 | TAGRISSO TABLET FILMOMHULD 80MG | OSIMERTINIB-80-MG-TABLET | 201,882688 | STUK
103779 | OXALIPLATIN ACCORD INFVLST CONC 5MG/ML FL 10ML | OXALIPLATINE-5-MG/ML-INFUUSVLOEISTOF, FLACON | 10,505353 | ML
103779 | OXALIPLATIN ACCORD INFVLST CONC 5MG/ML FL 20ML | OXALIPLATINE-5-MG/ML-INFUUSVLOEISTOF, FLACON | 10,505353 | ML
103779 | OXALIPLATIN ACCORD INFVLST CONC 5MG/ML FL 40ML | OXALIPLATINE-5-MG/ML-INFUUSVLOEISTOF, FLACON | 10,505353 | ML
100834 | OXALIPLATINE FRES KABI INFVLST CONC 5MG/ML FL 10ML | OXALIPLATINE-5-MG/ML-INFUUSVLOEISTOF, FLACON | 10,505353 | ML
100834 | OXALIPLATINE FRES KABI INFVLST CONC 5MG/ML FL 20ML | OXALIPLATINE-5-MG/ML-INFUUSVLOEISTOF, FLACON | 10,505353 | ML
100834 | OXALIPLATINE FRES KABI INFVLST CONC 5MG/ML FL 40ML | OXALIPLATINE-5-MG/ML-INFUUSVLOEISTOF, FLACON | 10,505353 | ML
34033 | OXALISIN INFVLST CONC 5MG/ML FL 10ML | OXALIPLATINE-5-MG/ML-INFUUSVLOEISTOF, FLACON | 10,931674 | ML
34033 | OXALISIN INFVLST CONC 5MG/ML FL 20ML | OXALIPLATINE-5-MG/ML-INFUUSVLOEISTOF, FLACON | 10,931674 | ML
34033 | OXALISIN INFVLST CONC 5MG/ML FL 40ML | OXALIPLATINE-5-MG/ML-INFUUSVLOEISTOF, FLACON | 10,931674 | ML
55581 | OXAZEPAM ACCORD TABLET 10MG | OXAZEPAM-10-MG-TABLET | 0,155591 | STUK
53369 | OXAZEPAM APOTEX TABLET 10MG | OXAZEPAM-10-MG-TABLET | 0,181743 | STUK
12923 | OXAZEPAM AUROBINDO TABLET 10MG | OXAZEPAM-10-MG-TABLET | 0,181743 | STUK
55928 | OXAZEPAM CF TABLET 10MG | OXAZEPAM-10-MG-TABLET | 0,172532 | STUK
55829 | OXAZEPAM TEVA TABLET 10MG | OXAZEPAM-10-MG-TABLET | 0,155591 | STUK
5181 | SERESTA TABLET 10MG | OXAZEPAM-10-MG-TABLET | 0,181743 | STUK
101681 | OXCARBAZEPINE PCH TABLET FILMOMHULD 300MG | OXCARBAZEPINE-300-MG-TABLET | 0,288485 | STUK
118970//24751 | TRILEPTAL TABLET FILMOMHULD 300MG | OXCARBAZEPINE-300-MG-TABLET | 0,246960 | STUK
121987//24751 | TRILEPTAL TABLET FILMOMHULD 300MG | OXCARBAZEPINE-300-MG-TABLET | 0,246960 | STUK
125693//24751 | TRILEPTAL TABLET FILMOMHULD 300MG | OXCARBAZEPINE-300-MG-TABLET | 0,246960 | STUK
122521//24751 | TRILEPTAL TABLET FILMOMHULD 300MG | OXCARBAZEPINE-300-MG-TABLET | 0,259637 | STUK
24751 | TRILEPTAL TABLET FILMOMHULD 300MG | OXCARBAZEPINE-300-MG-TABLET | 0,288485 | STUK
101683 | OXCARBAZEPINE PCH TABLET FILMOMHULD 600MG | OXCARBAZEPINE-600-MG-TABLET | 0,609112 | STUK
123164//24752 | TRILEPTAL TABLET FILMOMHULD 600MG | OXCARBAZEPINE-600-MG-TABLET | 0,539558 | STUK
24752 | TRILEPTAL TABLET FILMOMHULD 600MG | OXCARBAZEPINE-600-MG-TABLET | 0,609112 | STUK
110666//26830 | TRILEPTAL SUSPENSIE 60MG/ML | OXCARBAZEPINE-60-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,162748 | ML
125037//26830 | TRILEPTAL SUSPENSIE 60MG/ML | OXCARBAZEPINE-60-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,162748 | ML
125581//26830 | TRILEPTAL SUSPENSIE 60MG/ML | OXCARBAZEPINE-60-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,162748 | ML
112691//26830 | TRILEPTAL SUSPENSIE 60MG/ML | OXCARBAZEPINE-60-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,165556 | ML
26830 | TRILEPTAL SUSPENSIE 60MG/ML | OXCARBAZEPINE-60-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,165556 | ML
EU/1/03/270/001 | KENTERA PLEISTER TRANSDERMAAL 3,9MG/24UUR | OXYBUTYNIN-3.9-MG/24H-PLEISTER, DERMAAL | 4,302349 | STUK
23879 | OXYBUTYNINE HCL ACCORD TABLET 5MG | OXYBUTYNIN-5-MG-TABLET | 0,094480 | STUK
21285 | OXYBUTYNINE HCL AUROBINDO TABLET 5MG | OXYBUTYNIN-5-MG-TABLET | 0,094480 | STUK
22823 | OXYBUTYNINE HCL MYLAN TABLET 5MG | OXYBUTYNIN-5-MG-TABLET | 0,094480 | STUK
23950 | OXYBUTYNINE HCL TEVA TABLET 5MG | OXYBUTYNIN-5-MG-TABLET | 0,094480 | STUK
20797 | OXYBUTYNINE HCL UNICHEM TABLET 5MG | OXYBUTYNIN-5-MG-TABLET | 0,086165 | STUK
121132//27510 | OXYNORM CAPSULE 10MG | OXYCODONE-10-MG-CAPSULE | 0,243856 | STUK
27510 | OXYNORM CAPSULE 10MG | OXYCODONE-10-MG-CAPSULE | 0,776389 | STUK
104139 | OXYCODON HCL LANNACHER RETARD TABLET MVA 10MG | OXYCODONE-10-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,186489 | STUK
104139 | OXYCODON HCL LANNACHER TABLET MVA 10MG | OXYCODONE-10-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,186489 | STUK
100649 | OXYCODON HCL SANDOZ RETARD TABLET MVA 10MG | OXYCODONE-10-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,316793 | STUK
124593//22107 | OXYCONTIN TABLET MVA 10MG | OXYCODONE-10-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,186489 | STUK
22107 | OXYCONTIN TABLET MVA 10MG | OXYCODONE-10-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,316793 | STUK
100824 | OXYCONTIN TABLET MVA 120MG | OXYCODONE-120-MG-TABLET, MET GEREGULEERDE AFGIFTE | 4,164301 | STUK
112718 | OXYCODON HCL AUROBINDO RETARD TABLET MGA 15MG | OXYCODONE-15-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,428456 | STUK
112600 | OXYCODON HCL CF RETARD TABLET MVA 15MG | OXYCODONE-15-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,428456 | STUK
117835 | OXYCODON HCL TEVA RETARD TABLET MVA 15MG | OXYCODONE-15-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,428456 | STUK
100819 | OXYCONTIN TABLET MVA 15MG | OXYCODONE-15-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,428456 | STUK
121133//27511 | OXYNORM CAPSULE 20MG | OXYCODONE-20-MG-CAPSULE | 0,480175 | STUK
27511 | OXYNORM CAPSULE 20MG | OXYCODONE-20-MG-CAPSULE | 1,203575 | STUK
119229//34777 | OXYNORM INSTANT ORODISP TABLET 20MG | OXYCODONE-20-MG-SMELTTABLET | 1,256459 | STUK
34777 | OXYNORM INSTANT ORODISP TABLET 20MG | OXYCODONE-20-MG-SMELTTABLET | 1,256459 | STUK
104140 | OXYCODON HCL LANNACHER TABLET MVA 20MG | OXYCODONE-20-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,563403 | STUK
100654 | OXYCODON HCL SANDOZ RETARD TABLET MVA 20MG | OXYCODONE-20-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,563403 | STUK
124592//22108 | OXYCONTIN TABLET MVA 20MG | OXYCODONE-20-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,346069 | STUK
22108 | OXYCONTIN TABLET MVA 20MG | OXYCODONE-20-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,563403 | STUK
112602 | OXYCODON HCL CF RETARD TABLET MVA 30MG | OXYCODONE-30-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,976678 | STUK
117837 | OXYCODON HCL TEVA RETARD TABLET MVA 30MG | OXYCODONE-30-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,976678 | STUK
100820 | OXYCONTIN TABLET MVA 30MG | OXYCODONE-30-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,976678 | STUK
124599//22109 | OXYCONTIN TABLET MVA 40MG | OXYCODONE-40-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,674163 | STUK
22109 | OXYCONTIN TABLET MVA 40MG | OXYCODONE-40-MG-TABLET, MET GEREGULEERDE AFGIFTE | 1,080933 | STUK
121131//27509 | OXYNORM CAPSULE 5MG | OXYCODONE-5-MG-CAPSULE | 0,127683 | STUK
27509 | OXYNORM CAPSULE 5MG | OXYCODONE-5-MG-CAPSULE | 0,480655 | STUK
106668 | OXYCODON HCL GL TABLET FILMOMHULD 5MG | OXYCODONE-5-MG-TABLET | 0,182807 | STUK
104137 | OXYCODON HCL LANNACHER RETARD TABLET MVA 5MG | OXYCODONE-5-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,142385 | STUK
104137 | OXYCODON HCL LANNACHER TABLET MVA 5MG | OXYCODONE-5-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,142385 | STUK
100644 | OXYCODON HCL SANDOZ RETARD TABLET MVA 5MG | OXYCODONE-5-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,215728 | STUK
117833 | OXYCODON HCL TEVA RETARD TABLET MVA 5MG | OXYCODONE-5-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,215728 | STUK
27536 | OXYCONTIN TABLET MVA 5MG | OXYCODONE-5-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,215728 | STUK
109613 | OXYCODON HCL SANDOZ RETARD TABLET MVA 60MG | OXYCODONE-60-MG-TABLET, MET GEREGULEERDE AFGIFTE | 1,831484 | STUK
100821 | OXYCONTIN TABLET MVA 60MG | OXYCODONE-60-MG-TABLET, MET GEREGULEERDE AFGIFTE | 1,831484 | STUK
22110 | OXYCONTIN TABLET MVA 80MG | OXYCODONE-80-MG-TABLET, MET GEREGULEERDE AFGIFTE | 2,010990 | STUK
117498 | OXYTOCINE DEVRIMED INJVLST 5IE/ML AMPUL 1ML | OXYTOCIN-5-IE/ML-INJ.VLOEISTOF AMPUL | 1,901106 | ML
119497//3714 | OXYTOCINE EURECO-PHARMA INJVLST 5IE/ML AMP 1ML | OXYTOCIN-5-IE/ML-INJ.VLOEISTOF AMPUL | 1,901106 | ML
3714 | SYNTOCINON INJVLST 5IE/ML AMPUL 1ML | OXYTOCIN-5-IE/ML-INJ.VLOEISTOF AMPUL | 1,901106 | ML
EU/1/07/428/001 | ABRAXANE INFUSIEPOEDER FLACON 100MG | PACLITAXEL-100-MG-POED. V. INFUSIE,FLACON | 273,387055 | STUK
102965 | PACLITAXEL ACCORD INFVLST CONC 6MG/ML FL 5ML | PACLITAXEL-6-MG/ML-INFUUSVLOEISTOF, FLACON | 12,675096 | ML
102965 | PACLITAXEL ACCORD INFVLST CONC 6MG/ML FL 16,7ML | PACLITAXEL-6-MG/ML-INFUUSVLOEISTOF, FLACON | 12,675096 | ML
102965 | PACLITAXEL ACCORD INFVLST CONC 6MG/ML FL 25ML | PACLITAXEL-6-MG/ML-INFUUSVLOEISTOF, FLACON | 12,675096 | ML
102965 | PACLITAXEL ACCORD INFVLST CONC 6MG/ML FL 50ML | PACLITAXEL-6-MG/ML-INFUUSVLOEISTOF, FLACON | 12,675096 | ML
102965 | PACLITAXEL ACCORD INFVLST CONC 6MG/ML FL 100ML | PACLITAXEL-6-MG/ML-INFUUSVLOEISTOF, FLACON | 12,675096 | ML
34659 | PACLITAXEL AUROBINDO INFVLST CONC 6MG/ML FL 5ML | PACLITAXEL-6-MG/ML-INFUUSVLOEISTOF, FLACON | 12,675096 | ML
34659 | PACLITAXEL AUROBINDO INFVLST CONC 6MG/ML FL 16,7ML | PACLITAXEL-6-MG/ML-INFUUSVLOEISTOF, FLACON | 12,675096 | ML
34659 | PACLITAXEL AUROBINDO INFVLST CONC 6MG/ML FL 25ML | PACLITAXEL-6-MG/ML-INFUUSVLOEISTOF, FLACON | 12,675096 | ML
34659 | PACLITAXEL AUROBINDO INFVLST CONC 6MG/ML FL 50ML | PACLITAXEL-6-MG/ML-INFUUSVLOEISTOF, FLACON | 12,675096 | ML
101863 | PACLITAXEL FRES KABI INFVLST CONC 6MG/ML FL 5ML | PACLITAXEL-6-MG/ML-INFUUSVLOEISTOF, FLACON | 12,675096 | ML
101863 | PACLITAXEL FRES KABI INFVLST CONC 6MG/ML FL 25ML | PACLITAXEL-6-MG/ML-INFUUSVLOEISTOF, FLACON | 12,675096 | ML
101863 | PACLITAXEL FRES KABI INFVLST CONC 6MG/ML FL 50ML | PACLITAXEL-6-MG/ML-INFUUSVLOEISTOF, FLACON | 12,675096 | ML
101863 | PACLITAXEL FRES KABI INFVLST CONC 6MG/ML FL 100ML | PACLITAXEL-6-MG/ML-INFUUSVLOEISTOF, FLACON | 12,675096 | ML
101863 | PACLITAXEL FRES KABI INFVLST CONC 6MG/ML FL 16,7ML | PACLITAXEL-6-MG/ML-INFUUSVLOEISTOF, FLACON | 12,675096 | ML
EU/1/11/672/004 | XEPLION 100 INJVLST 100MG/ML WWSP 1ML | PALIPERIDON-100-MG-INJ.VLOEISTOF, WWSP | 296,805680 | STUK
EU/1/11/672/005 | XEPLION 150 INJVLST 100MG/ML WWSP 1,5ML | PALIPERIDON-150-MG-INJ.VLOEISTOF, WWSP | 409,242531 | STUK
EU/1/14/971/007 | TREVICTA 175 INJSUSP 200MG/ML WWSP 0,875ML | PALIPERIDON-175-MG-INJ.VLOEISTOF, WWSP | 619,951906 | STUK
EU/1/11/672/001 | XEPLION 25 INJVLST 100MG/ML WWSP 0,25ML | PALIPERIDON-25-MG-INJ.VLOEISTOF, WWSP | 99,018183 | STUK
EU/1/14/971/008 | TREVICTA 263 INJSUSP 200MG/ML WWSP 1,315ML | PALIPERIDON-263-MG-INJ.VLOEISTOF, WWSP | 847,110316 | STUK
EU/1/14/971/009 | TREVICTA 350 INJSUSP 200MG/ML WWSP 1,75ML | PALIPERIDON-350-MG-INJ.VLOEISTOF, WWSP | 1075,570276 | STUK
EU/1/07/395/001 | INVEGA TABLET MVA 3MG | PALIPERIDON-3-MG-TABLET, MET GEREGULEERDE AFGIFTE | 2,907649 | STUK
EU/1/07/395/002 | INVEGA TABLET MVA 3MG | PALIPERIDON-3-MG-TABLET, MET GEREGULEERDE AFGIFTE | 2,907649 | STUK
EU/1/11/672/002 | XEPLION 50 INJVLST 100MG/ML WWSP 0,5ML | PALIPERIDON-50-MG-INJ.VLOEISTOF, WWSP | 185,769107 | STUK
EU/1/14/971/010 | TREVICTA 525 INJSUSP 200MG/ML WWSP 2,625ML | PALIPERIDON-525-MG-INJ.VLOEISTOF, WWSP | 1520,436983 | STUK
EU/1/07/395/007 | INVEGA TABLET MVA 6MG | PALIPERIDON-6-MG-TABLET, MET GEREGULEERDE AFGIFTE | 3,224429 | STUK
EU/1/07/395/006 | INVEGA TABLET MVA 6MG | PALIPERIDON-6-MG-TABLET, MET GEREGULEERDE AFGIFTE | 3,582699 | STUK
EU/1/07/395/026 | INVEGA TABLET MVA 6MG | PALIPERIDON-6-MG-TABLET, MET GEREGULEERDE AFGIFTE | 3,582699 | STUK
121622 | PALIPERIDON SANDOZ RETARD TABLET MVA 6MG | PALIPERIDON-6-MG-TABLET, MET GEREGULEERDE AFGIFTE | 3,582699 | STUK
EU/1/11/672/003 | XEPLION 75 INJVLST 100MG/ML WWSP 0,75ML | PALIPERIDON-75-MG-INJ.VLOEISTOF, WWSP | 237,488501 | STUK
EU/1/07/395/011 | INVEGA TABLET MVA 9MG | PALIPERIDON-9-MG-TABLET, MET GEREGULEERDE AFGIFTE | 4,617780 | STUK
EU/1/07/395/012 | INVEGA TABLET MVA 9MG | PALIPERIDON-9-MG-TABLET, MET GEREGULEERDE AFGIFTE | 4,617780 | STUK
121623 | PALIPERIDON SANDOZ RETARD TABLET MVA 9MG | PALIPERIDON-9-MG-TABLET, MET GEREGULEERDE AFGIFTE | 4,617780 | STUK
EU/1/99/117/003 | SYNAGIS 50 INJVLST 100MG/ML FLACON 0,5ML | PALIVIZUMAB-100-MG/ML-INJECTIEVLOEISTOF, FLAC | 728,826821 | ML
EU/1/15/1001/001 | AKYNZEO CAPSULE | PALONOSETRON-0.5-MG-CAPSULE-NETUPITANT-300-MG-CAPSULE | 66,753500 | STUK
32237 | PAMIDRONAAT PCH INFVLST CONC 3MG/ML FL 20ML | PAMIDRONIC ACID-3-MG/ML-INFUUSVLOEISTOF, FLACON | 5,509275 | ML
32237 | PAMIDRONAAT PCH INFVLST CONC 3MG/ML FL 30ML | PAMIDRONIC ACID-3-MG/ML-INFUUSVLOEISTOF, FLACON | 5,509275 | ML
30331 | PAMIPRO INFVLST CONC 3MG/ML FLACON 20ML | PAMIDRONIC ACID-3-MG/ML-INFUUSVLOEISTOF, FLACON | 5,509275 | ML
30331 | PAMIPRO INFVLST CONC 3MG/ML FLACON 30ML | PAMIDRONIC ACID-3-MG/ML-INFUUSVLOEISTOF, FLACON | 5,509275 | ML
30873 | PAMIDRONAAT HOSPIRA INFVLST CONC 6MG/ML FLAC 10ML | PAMIDRONIC ACID-6-MG/ML-INFUUSVLOEISTOF, FLACON | 10,523231 | ML
30874 | PAMIDRONAAT HOSPIRA INFVLST CONC 9MG/ML FLAC 10ML | PAMIDRONIC ACID-9-MG/ML-INFUUSVLOEISTOF, FLACON | 16,918229 | ML
EU/1/07/423/001 | VECTIBIX INFVLST CONC 20MG/ML FLACON 5ML | PANITUMUMAB-20-MG/ML-INFUUSVLOEISTOF, FLACON | 81,217361 | ML
EU/1/07/423/003 | VECTIBIX INFVLST CONC 20MG/ML FLACON 20ML | PANITUMUMAB-20-MG/ML-INFUUSVLOEISTOF, FLACON | 81,217361 | ML
EU/1/15/1023/001 | FARYDAK CAPSULE 10MG | PANOBINOSTAT-10-MG-CAPSULE | 700,490763 | STUK
EU/1/15/1023/004 | FARYDAK CAPSULE 15MG | PANOBINOSTAT-15-MG-CAPSULE | 700,490763 | STUK
104919 | PANTOPRAZOL TEVA TABLET MSR 20MG | PANTOPRAZOLE-20-MG-TABLET, MAAGSAPRESISTENT | 0,190746 | STUK
23513 | PANTOZOL TABLET MSR 20MG | PANTOPRAZOLE-20-MG-TABLET, MAAGSAPRESISTENT | 0,217105 | STUK
114229 | PANTOPRAZOL ACCORD INJPDR FLACON 40MG | PANTOPRAZOLE-40-MG-POED. V. INJECTIE, FLACON | 4,429092 | STUK
33902 | PANTOPRAZOL SANDOZ INJPDR FLACON 40MG | PANTOPRAZOLE-40-MG-POED. V. INJECTIE, FLACON | 4,883436 | STUK
117970 | PANTOPRAZOL SUN PHARMA INJPDR FLACON 40MG | PANTOPRAZOLE-40-MG-POED. V. INJECTIE, FLACON | 4,181459 | STUK
22084 | PANTOZOL INJECTIEPOEDER FLACON 40MG | PANTOPRAZOLE-40-MG-POED. V. INJECTIE, FLACON | 4,883436 | STUK
103226 | PANTOPRAZOL PENSA TABLET MSR 40MG | PANTOPRAZOLE-40-MG-TABLET, MAAGSAPRESISTENT | 0,218327 | STUK
104920 | PANTOPRAZOL TEVA TABLET MSR 40MG | PANTOPRAZOLE-40-MG-TABLET, MAAGSAPRESISTENT | 0,218327 | STUK
18300 | PANTOZOL TABLET MSR 40MG | PANTOPRAZOLE-40-MG-TABLET, MAAGSAPRESISTENT | 0,237438 | STUK
109193 | PARACETAMOL B.BRAUN INFVLST 10MG/ML AMPUL 10ML | PARACETAMOL-10-MG/ML-INFUUSVLOEISTOF, FLACON | 0,017729 | ML
109193 | PARACETAMOL B.BRAUN INFVLST 10MG/ML FLACON 100ML | PARACETAMOL-10-MG/ML-INFUUSVLOEISTOF, FLACON | 0,017729 | ML
105747 | PARACETAMOL FRES KABI INFVLST 10MG/ML FLACON 50ML | PARACETAMOL-10-MG/ML-INFUUSVLOEISTOF, FLACON | 0,017729 | ML
105747 | PARACETAMOL FRES KABI INFVLST 10MG/ML FLACON 100ML | PARACETAMOL-10-MG/ML-INFUUSVLOEISTOF, FLACON | 0,017729 | ML
111839 | TRAMADOL HCL/PARACETAM TEV TAB FILMOMH 37,5/325MG | PARACETAMOL-325-MG-TABLET-TRAMADOL-37.5-MG-TABLET | 0,157607 | STUK
117331 | TRAMADOL HCL/PARACETAMOL SANDOZ TABLET 37,5/325MG | PARACETAMOL-325-MG-TABLET-TRAMADOL-37.5-MG-TABLET | 0,157607 | STUK
113288//28113 | ZALDIAR TABLET FILMOMHULD | PARACETAMOL-325-MG-TABLET-TRAMADOL-37.5-MG-TABLET | 0,127329 | STUK
118638//28113 | ZALDIAR TABLET FILMOMHULD | PARACETAMOL-325-MG-TABLET-TRAMADOL-37.5-MG-TABLET | 0,127329 | STUK
123207//28113 | ZALDIAR TABLET FILMOMHULD | PARACETAMOL-325-MG-TABLET-TRAMADOL-37.5-MG-TABLET | 0,142413 | STUK
28113 | ZALDIAR TABLET FILMOMHULD | PARACETAMOL-325-MG-TABLET-TRAMADOL-37.5-MG-TABLET | 0,157607 | STUK
EU/1/02/209/008 | DYNASTAT INJPDR FLACON 40MG + SOLVENS 2ML | PARECOXIB-40-MG-POED. V. INJECTIE, FLACON | 6,451219 | STUK
100085 | PAROXETINE PROLEPHA TABLET 10MG(ALS HCL ANHY) | PAROXETINE-10-MG-TABLET | 0,364053 | STUK
34110 | PAROXETINE TEVA TABLET 10MG(ALS HCL ANHY) | PAROXETINE-10-MG-TABLET | 0,384030 | STUK
27840 | PAROXETINE CF TABLET FILMOMHULD 20MG(ALS HCL ANHY) | PAROXETINE-20-MG-TABLET | 0,194285 | STUK
34377 | PAROXETINE MYLAN TABLET FILMOMH 20MG(ALS HCL ANHY) | PAROXETINE-20-MG-TABLET | 0,194285 | STUK
26613 | PAROXETINE SANDOZ TABLET FILMOMH 20MG(ALS HCL ANH) | PAROXETINE-20-MG-TABLET | 0,201713 | STUK
14668 | SEROXAT TABLET FILMOMHULD 20MG | PAROXETINE-20-MG-TABLET | 0,201713 | STUK
124814//20557 | SEROXAT SUSPENSIE 2MG/ML | PAROXETINE-2-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,073610 | ML
115961//20557 | SEROXAT SUSPENSIE 2MG/ML | PAROXETINE-2-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,093549 | ML
120558//20557 | SEROXAT SUSPENSIE 2MG/ML | PAROXETINE-2-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,103943 | ML
20557 | SEROXAT SUSPENSIE 2MG/ML | PAROXETINE-2-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,103943 | ML
28924 | PAROXETINE MYLAN TABLET FILMOMHULD 30MG | PAROXETINE-30-MG-TABLET | 0,308783 | STUK
33723 | PAROXETINE SANDOZ TABLET FILMOMHULD 30MG | PAROXETINE-30-MG-TABLET | 0,308783 | STUK
34112 | PAROXETINE TEVA TABLET 30MG(ALS HCL ANHY) | PAROXETINE-30-MG-TABLET | 0,308783 | STUK
27135 | SEROXAT TABLET FILMOMHULD 30MG | PAROXETINE-30-MG-TABLET | 0,308783 | STUK
EU/1/12/753/011 | SIGNIFOR INJVLST 0,9MG/ML AMPUL 1ML | PASIREOTIDE-0.9-MG/ML-INJ.VLOEISTOF AMPUL | 67,356902 | ML
EU/1/12/753/016 | SIGNIFOR INJECTIEPOEDER 60MG + SOLVENS 2ML | PASIREOTIDE-60-MG-POED. V. INJECTIE, FLACON | 2760,150180 | STUK
EU/1/10/628/001 | VOTRIENT TABLET FILMOMHULD 200MG | PAZOPANIB-200-MG-TABLET | 23,648283 | STUK
EU/1/10/628/003 | VOTRIENT TABLET FILMOMHULD 400MG | PAZOPANIB-400-MG-TABLET | 46,890233 | STUK
EU/1/10/628/004 | VOTRIENT TABLET FILMOMHULD 400MG | PAZOPANIB-400-MG-TABLET | 46,890233 | STUK
EU/1/15/1070/002 | ONCASPAR INJ/INFUSIEPOEDER FLACON 3750E | PEGASPARGASE-3750-IE-POED. V. INJECTIE, FLACON | 1572,760431 | STUK
EU/1/02/227/005 | NEULASTA INJV 10MG/ML WWSP 0,64ML+ON-BODY INJECTOR | PEGFILGRASTIM-10-MG/ML-INJ.VLOEISTOF, WWSP | 1230,247905 | ML
EU/1/02/227/002 | NEULASTA INJVLST 10MG/ML WWSP 0,6ML | PEGFILGRASTIM-10-MG/ML-INJ.VLOEISTOF, WWSP | 1121,433470 | ML
EU/1/02/227/004 | NEULASTA INJVLST 10MG/ML WWSP 0,6ML | PEGFILGRASTIM-10-MG/ML-INJ.VLOEISTOF, WWSP | 1121,433470 | ML
EU/1/02/227/001 | NEULASTA INJVLST 10MG/ML WWSP 0,6ML | PEGFILGRASTIM-10-MG/ML-INJ.VLOEISTOF, WWSP | 1230,247905 | ML
EU/1/18/1313/001 | PELGRAZ INJVLST 10MG/ML WWSP 0,6ML | PEGFILGRASTIM-10-MG/ML-INJ.VLOEISTOF, WWSP | 1121,433470 | ML
EU/1/18/1328/001 | PELMEG INJVLST 10MG/ML WWSP 0,6ML | PEGFILGRASTIM-10-MG/ML-INJ.VLOEISTOF, WWSP | 1121,433470 | ML
EU/1/18/1327/001 | ZIEXTENZO INJVLST 10MG/ML WWSP 0,6ML | PEGFILGRASTIM-10-MG/ML-INJ.VLOEISTOF, WWSP | 1121,433470 | ML
EU/1/02/221/017 | PEGASYS 90 INJVLST 180MCG/ML WWSP 0,5ML | PEGINTERFERON ALFA 2A-0.18-MG/ML-INJ.VLOEISTOF, WWSP | 180,481646 | ML
EU/1/02/221/005 | PEGASYS 135 INJVLST 270MCG/ML WWSP 0,5ML | PEGINTERFERON ALFA 2A-0.27-MG/ML-INJ.VLOEISTOF, WWSP | 271,081347 | ML
EU/1/02/221/007 | PEGASYS 180 INJVLST 360MCG/ML WWSP 0,5ML | PEGINTERFERON ALFA 2A-0.36-MG/ML-INJ.VLOEISTOF, WWSP | 311,307774 | ML
EU/1/02/221/008 | PEGASYS 180 INJVLST 360MCG/ML WWSP 0,5ML | PEGINTERFERON ALFA 2A-0.36-MG/ML-INJ.VLOEISTOF, WWSP | 311,307774 | ML
EU/1/14/934/005 | PLEGRIDY 125 INJVLST 250MCG/ML PEN 0,5ML | PEGINTERFERON BETA 1A-0.125-MG-INJ.VLOEISTOF, WWSP | 455,687101 | STUK
EU/1/14/934/003 | PLEGRIDY 125 INJVLST 250MCG/ML WWSP 0,5ML | PEGINTERFERON BETA 1A-0.125-MG-INJ.VLOEISTOF, WWSP | 455,687101 | STUK
EU/1/02/240/001 | SOMAVERT INJPDR FLACON 10MG + SOLVENS 1ML IN WWSP | PEGVISOMANT-10-MG-POED. V. INJECTIE, FLACON | 61,240886 | STUK
EU/1/02/240/002 | SOMAVERT INJPDR FLACON 15MG + SOLVENS 1ML IN WWSP | PEGVISOMANT-15-MG-POED. V. INJECTIE, FLACON | 91,641465 | STUK
EU/1/02/240/003 | SOMAVERT INJPDR FLACON 20MG + SOLVENS 1ML IN WWSP | PEGVISOMANT-20-MG-POED. V. INJECTIE, FLACON | 122,065879 | STUK
EU/1/02/240/010 | SOMAVERT INJPDR FLACON 25MG + SOLVENS 1ML IN WWSP | PEGVISOMANT-25-MG-POED. V. INJECTIE, FLACON | 158,603341 | STUK
EU/1/02/240/012 | SOMAVERT INJPDR FLACON 30MG + SOLVENS 1ML IN WWSP | PEGVISOMANT-30-MG-POED. V. INJECTIE, FLACON | 186,795674 | STUK
EU/1/04/290/002 | ALIMTA INFUSIEPOEDER FLACON 100MG | PEMETREXED-100-MG-POED. V. INFUSIE,FLACON | 219,136710 | STUK
EU/1/16/1115/004 | PEMETREXED FRES KABI INFVLST CONC 25MG/ML FL 20ML | PEMETREXED-25-MG/ML-INFUUSVLOEISTOF, FLACON | 24,472354 | ML
EU/1/16/1115/005 | PEMETREXED FRES KABI INFVLST CONC 25MG/ML FL 40ML | PEMETREXED-25-MG/ML-INFUUSVLOEISTOF, FLACON | 24,472354 | ML
EU/1/16/1115/003 | PEMETREXED FRES KABI INFVLST CONC 25MG/ML FL 4ML | PEMETREXED-25-MG/ML-INFUUSVLOEISTOF, FLACON | 24,472354 | ML
120314 | PEMETREXED MYLAN INFVLST CONC 25MG/ML FLACON 20ML | PEMETREXED-25-MG/ML-INFUUSVLOEISTOF, FLACON | 24,472354 | ML
120314 | PEMETREXED MYLAN INFVLST CONC 25MG/ML FLACON 40ML | PEMETREXED-25-MG/ML-INFUUSVLOEISTOF, FLACON | 24,472354 | ML
120314 | PEMETREXED MYLAN INFVLST CONC 25MG/ML FLACON 4ML | PEMETREXED-25-MG/ML-INFUUSVLOEISTOF, FLACON | 24,472354 | ML
EU/1/04/290/001 | ALIMTA INFUSIEPOEDER FLACON 500MG | PEMETREXED-500-MG-POED. V. INFUSIE,FLACON | 1085,256507 | STUK
116774 | PEMETREXED B-MEDICAL INFUSIEPOEDER FLACON 500MG | PEMETREXED-500-MG-POED. V. INFUSIE,FLACON | 1085,256507 | STUK
15008 | PENTACARINAT POEDER VOOR VERNEVELOPL FLACON 300MG | PENTAMIDINE ISETHIONATE-300-MG-POEDER VOOR INHALATIEVLOEISTOF | 28,384147 | STUK
11175 | TRENTAL TABLET MGA 400MG | PENTOXIFYLLINE-400-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,189889 | STUK
112459//11175 | TRENTAL TABLET MGA 400MG | PENTOXIFYLLINE-400-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,189889 | STUK
113167//11175 | TRENTAL TABLET MGA 400MG | PENTOXIFYLLINE-400-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,189889 | STUK
EU/1/12/776/012 | FYCOMPA TABLET FILMOMHULD 10MG | PERAMPANEL-10-MG-TABLET | 5,592850 | STUK
EU/1/12/776/015 | FYCOMPA TABLET FILMOMHULD 12MG | PERAMPANEL-12-MG-TABLET | 5,592850 | STUK
EU/1/12/776/009 | FYCOMPA TABLET FILMOMHULD 8MG | PERAMPANEL-8-MG-TABLET | 5,428118 | STUK
123212//31959 | COVERSYL ARG TABLET FILMOMHULD 10MG | PERINDOPRIL-10-MG-TABLET | 0,328518 | STUK
110388//31959 | COVERSYL ARG TABLET FILMOMHULD 10MG | PERINDOPRIL-10-MG-TABLET | 0,363761 | STUK
31959 | COVERSYL ARG TABLET FILMOMHULD 10MG | PERINDOPRIL-10-MG-TABLET | 0,363761 | STUK
110719 | PERINDOPRIL TOSILAAT TEVA TABLET 10MG | PERINDOPRIL-10-MG-TABLET | 0,363761 | STUK
125675//31957 | COVERSYL ARG TABLET FILMOMHULD 2,5MG | PERINDOPRIL-2.5-MG-TABLET | 0,135767 | STUK
31957 | COVERSYL ARG TABLET FILMOMHULD 2,5MG | PERINDOPRIL-2.5-MG-TABLET | 0,219464 | STUK
110703 | PERINDOPRIL TOSILAAT TEVA TABLET 2,5MG | PERINDOPRIL-2.5-MG-TABLET | 0,219464 | STUK
33332 | PERINDOPRIL TERT-BUTYLAMINE TEVA TABLET 4MG | PERINDOPRIL-4-MG-TABLET | 0,148756 | STUK
123210//31958 | COVERSYL ARG TABLET FILMOMHULD 5MG | PERINDOPRIL-5-MG-TABLET | 0,240604 | STUK
110387//31958 | COVERSYL ARG TABLET FILMOMHULD 5MG | PERINDOPRIL-5-MG-TABLET | 0,266079 | STUK
31958 | COVERSYL ARG TABLET FILMOMHULD 5MG | PERINDOPRIL-5-MG-TABLET | 0,266079 | STUK
110718 | PERINDOPRIL TOSILAAT TEVA TABLET 5MG | PERINDOPRIL-5-MG-TABLET | 0,266079 | STUK
105836 | PERINDOPRIL TERT-BUTYLAMINE AUROBINDO TABLET 8MG | PERINDOPRIL-8-MG-TABLET | 0,193371 | STUK
EU/1/13/813/001 | PERJETA INFVLST CONC 30MG/ML FLACON 14ML | PERTUZUMAB-30-MG/ML-INFUUSVLOEISTOF, FLACON | 195,423880 | ML
2976 | DIPHANTOINE-Z 100 TABLET 92MG | PHENYTOIN-100-MG-TABLET | 0,244288 | STUK
28742 | ELIDEL CREME 10MG/G | PIMECROLIMUS-10-MG/G-CREME, CUTAAN | 0,722547 | G
121834//6149 | ORAP TABLET 1MG | PIMOZIDE-1-MG-TABLET | 0,061443 | STUK
123493//6149 | ORAP TABLET 1MG | PIMOZIDE-1-MG-TABLET | 0,061443 | STUK
14085//6149 | ORAP TABLET 1MG | PIMOZIDE-1-MG-TABLET | 0,061443 | STUK
26480//6149 | ORAP TABLET 1MG | PIMOZIDE-1-MG-TABLET | 0,061443 | STUK
6149 | ORAP TABLET 1MG | PIMOZIDE-1-MG-TABLET | 0,061443 | STUK
26481//6150 | ORAP TABLET 4MG | PIMOZIDE-4-MG-TABLET | 0,317179 | STUK
6150 | ORAP TABLET 4MG | PIMOZIDE-4-MG-TABLET | 0,317179 | STUK
9479//6150 | ORAP TABLET 4MG | PIMOZIDE-4-MG-TABLET | 0,317179 | STUK
55975 | PINDOLOL CF TABLET 5MG | PINDOLOL-5-MG-TABLET | 0,115065 | STUK
EU/1/00/150/004 | ACTOS TABLET 30MG | PIOGLITAZON-30-MG-TABLET | 0,926995 | STUK
EU/1/00/150/020 | ACTOS TABLET 30MG | PIOGLITAZON-30-MG-TABLET | 0,926995 | STUK
9964 | DIPIPERON DRUPPELS 40MG/ML | PIPAMPERONE-40-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,058417 | ML
183 | DIPIPERON TABLET 40MG | PIPAMPERONE-40-MG-TABLET | 0,062954 | STUK
29879 | PIPAMPERON SANDOZ TABLET 40MG | PIPAMPERONE-40-MG-TABLET | 0,106096 | STUK
100288 | PIPERACILLINE/TAZOBACT KABI INJPDR FL 2000MG/250MG | PIPERACILLIN-2000-MG-POED. V. INJECTIE, FLACON-TAZOBACTAM-250-MG-POED. V. INJECTIE, FLACON | 6,094149 | STUK
100289 | PIPERACILLINE/TAZOBACT KABI INJPDR FL 4000MG/500MG | PIPERACILLIN-4000-MG-POED. V. INJECTIE, FLACON-TAZOBACTAM-500-MG-POED. V. INJECTIE, FLACON | 10,886043 | STUK
35004 | PIPERACILLINE/TAZOBACT MYLAN INJPDR F 4000MG/500MG | PIPERACILLIN-4000-MG-POED. V. INJECTIE, FLACON-TAZOBACTAM-500-MG-POED. V. INJECTIE, FLACON | 10,886043 | STUK
34045 | PIPERACILLINE/TAZOBACT PCH INJPDR F 4000MG/500MG | PIPERACILLIN-4000-MG-POED. V. INJECTIE, FLACON-TAZOBACTAM-500-MG-POED. V. INJECTIE, FLACON | 13,487224 | STUK
11783 | NOOTROPIL TABLET 1200MG | PIRACETAM-1200-MG-TABLET | 0,241831 | STUK
7353 | NOOTROPIL TABLET 800MG | PIRACETAM-800-MG-TABLET | 0,165597 | STUK
18655 | PIRACETAM TEVA TABLET 800MG | PIRACETAM-800-MG-TABLET | 0,165597 | STUK
EU/1/11/667/002 | ESBRIET CAPSULE 267MG | PIRFENIDONE-267-MG-CAPSULE | 9,029804 | STUK
EU/1/11/667/016 | ESBRIET TABLET FILMOMHULD 267MG | PIRFENIDONE-267-MG-TABLET | 8,962784 | STUK
EU/1/11/667/017 | ESBRIET TABLET FILMOMHULD 267MG | PIRFENIDONE-267-MG-TABLET | 8,962784 | STUK
EU/1/11/667/018 | ESBRIET TABLET FILMOMHULD 801MG | PIRFENIDONE-801-MG-TABLET | 27,113777 | STUK
EU/1/11/667/019 | ESBRIET TABLET FILMOMHULD 801MG | PIRFENIDONE-801-MG-TABLET | 27,113777 | STUK
17039 | PIROXICAM SANDOZ DISPER TABLET 20MG | PIROXICAM-20-MG-BRUISTABLET | 0,199203 | STUK
57449 | PIROXICAM CF CAPSULE 20MG | PIROXICAM-20-MG-CAPSULE | 0,193795 | STUK
14674 | PIROXICAM TEVA CAPSULE 20MG | PIROXICAM-20-MG-CAPSULE | 0,193795 | STUK
6258 | SANDOMIGRAN TABLET OMHULD 0,5MG | PIZOTIFEN-.5-MG-TABLET | 0,155384 | STUK
EU/1/09/537/001 | MOZOBIL INJVLST 20MG/ML FLACON 1,2ML | PLERIXAFOR-20-MG/ML-INJECTIEVLOEISTOF, FLAC | 4777,886795 | ML
109832//12093 | CONDYLINE APPLICATIEVLOEISTOF 5MG/ML | PODOPHYLLOTOXIN-5-MG/ML-APPLICATIEVLOEISTOF, VOOR CUTAAN GEBRUIK | 5,528813 | ML
117583//12093 | CONDYLINE APPLICATIEVLOEISTOF 5MG/ML | PODOPHYLLOTOXIN-5-MG/ML-APPLICATIEVLOEISTOF, VOOR CUTAAN GEBRUIK | 5,528813 | ML
120715//12093 | CONDYLINE APPLICATIEVLOEISTOF 5MG/ML | PODOPHYLLOTOXIN-5-MG/ML-APPLICATIEVLOEISTOF, VOOR CUTAAN GEBRUIK | 5,528813 | ML
12093 | CONDYLINE APPLICATIEVLOEISTOF 5MG/ML | PODOPHYLLOTOXIN-5-MG/ML-APPLICATIEVLOEISTOF, VOOR CUTAAN GEBRUIK | 5,528813 | ML
123385//12093 | CONDYLINE APPLICATIEVLOEISTOF 5MG/ML | PODOPHYLLOTOXIN-5-MG/ML-APPLICATIEVLOEISTOF, VOOR CUTAAN GEBRUIK | 5,528813 | ML
124682//12093 | CONDYLINE APPLICATIEVLOEISTOF 5MG/ML | PODOPHYLLOTOXIN-5-MG/ML-APPLICATIEVLOEISTOF, VOOR CUTAAN GEBRUIK | 5,528813 | ML
19304 | OCULOTECT OOGDRUPPELS 50MG/ML FLACON 10ML | POLYVIDON-50-MG/ML-OOGDRUPPELS | 0,303736 | ML
9018 | VIDISIC PVP OPHTIOLE OOGDRUPPELS 50MG/ML FLAC 10ML | POLYVIDON-50-MG/ML-OOGDRUPPELS | 0,303736 | ML
119116//19305 | OCULOTECT UNIDOSE OOGDRUPPELS 50MG/ML AMP 0,4ML | POLYVIDON-50-MG/ML-OOGDRUPPELS UNITDOSE | 0,410654 | ML
19305 | OCULOTECT UNIDOSE OOGDRUPPELS 50MG/ML AMP 0,4ML | POLYVIDON-50-MG/ML-OOGDRUPPELS UNITDOSE | 0,410654 | ML
EU/1/13/850/001 | IMNOVID CAPSULE 1MG | POMALIDOMIDE-1-MG-CAPSULE | 421,181823 | STUK
EU/1/13/850/002 | IMNOVID CAPSULE 2MG | POMALIDOMIDE-2-MG-CAPSULE | 426,886658 | STUK
EU/1/13/850/003 | IMNOVID CAPSULE 3MG | POMALIDOMIDE-3-MG-CAPSULE | 429,511495 | STUK
EU/1/13/850/004 | IMNOVID CAPSULE 4MG | POMALIDOMIDE-4-MG-CAPSULE | 431,289342 | STUK
EU/1/13/850/008 | IMNOVID CAPSULE 4MG | POMALIDOMIDE-4-MG-CAPSULE | 431,289342 | STUK
EU/1/13/839/005 | ICLUSIG TABLET FILMOMHULD 15MG | PONATINIB-15-MG-TABLET | 109,837785 | STUK
EU/1/13/839/006 | ICLUSIG TABLET FILMOMHULD 30MG | PONATINIB-30-MG-TABLET | 180,238165 | STUK
EU/1/13/839/003 | ICLUSIG TABLET FILMOMHULD 45MG | PONATINIB-45-MG-TABLET | 180,698415 | STUK
EU/1/05/320/002 | NOXAFIL TABLET MSR 100MG | POSACONAZOLE-100-MG-TABLET, MAAGSAPRESISTENT | 21,842463 | STUK
122968 | POSACONAZOL CF TABLET MSR 100MG | POSACONAZOLE-100-MG-TABLET, MAAGSAPRESISTENT | 21,842463 | STUK
124009 | POSACONAZOL FRESENIUS KABI TABLET MSR 100MG | POSACONAZOLE-100-MG-TABLET, MAAGSAPRESISTENT | 21,842463 | STUK
122973 | POSACONAZOL MYLAN TABLET MSR 100MG | POSACONAZOLE-100-MG-TABLET, MAAGSAPRESISTENT | 21,842463 | STUK
124369 | POSACONAZOL TEVA TABLET MSR 100MG | POSACONAZOLE-100-MG-TABLET, MAAGSAPRESISTENT | 21,842463 | STUK
EU/1/19/1379/002 | POSACONAZOLE ACCORD TABLET MSR 100MG | POSACONAZOLE-100-MG-TABLET, MAAGSAPRESISTENT | 21,842463 | STUK
EU/1/05/320/004 | NOXAFIL INFVLST CONC 18MG/ML FLACON 16,7ML | POSACONAZOLE-18-MG/ML-INFUUSVLOEISTOF, FLACON | 21,466389 | ML
EU/1/05/320/001 | NOXAFIL SUSPENSIE 40MG/ML | POSACONAZOLE-40-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 5,996752 | ML
109310 | MINIMS POVIDON JODIUM OOGDR 50MG/ML TUBE 0,4ML | POVIDONE-IODINE-50-MG/ML-OOGDRUPPELS UNITDOSE | 2,028291 | ML
101915 | GLEPARK TABLET 0,125MG (0,088MG BASE) | PRAMIPEXOL-.125-MG-TABLET | 0,256309 | STUK
EU/1/97/051/001 | MIRAPEXIN TABLET 0,125MG (0,088MG BASE) | PRAMIPEXOL-.125-MG-TABLET | 0,256309 | STUK
104991 | PRAMIPEXOL MYLAN TABLET 0,125MG (0,088MG BASE) | PRAMIPEXOL-.125-MG-TABLET | 0,256309 | STUK
EU/1/97/050/001 | SIFROL TABLET 0,125MG (0,088MG BASE) | PRAMIPEXOL-.125-MG-TABLET | 0,256309 | STUK
EU/1/97/050/002 | SIFROL TABLET 0,125MG (0,088MG BASE) | PRAMIPEXOL-.125-MG-TABLET | 0,256309 | STUK
101918 | GLEPARK TABLET 0,25MG (0,18MG BASE) | PRAMIPEXOL-.25-MG-TABLET | 0,245563 | STUK
EU/1/08/490/007 | PRAMIPEXOL TEVA TABLET 0,25MG (0,18MG BASE) | PRAMIPEXOL-.25-MG-TABLET | 0,245563 | STUK
EU/1/97/051/013 | MIRAPEXIN TABLET MVA 0,375MG (0,26MG BASE) | PRAMIPEXOL-0.375-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,478715 | STUK
EU/1/08/469/027 | OPRYMEA TABLET MVA 0,375MG (0,26MG BASE) | PRAMIPEXOL-0.375-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,478715 | STUK
114116 | PRAMIPEXOL SANDOZ RET TB MVA 0,375MG (0,26MG BASE) | PRAMIPEXOL-0.375-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,478715 | STUK
114669 | PRAMIPEXOL TEVA RET TABL MVA 0,375MG (0,26MG BASE) | PRAMIPEXOL-0.375-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,478715 | STUK
EU/1/97/050/014 | SIFROL TABLET MVA 0,375MG (0,26MG BASE) | PRAMIPEXOL-0.375-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,478715 | STUK
EU/1/97/051/020 | MIRAPEXIN TABLET MVA 1,5MG (1,05MG BASE) | PRAMIPEXOL-1.5-MG-TABLET, MET GEREGULEERDE AFGIFTE | 1,511217 | STUK
EU/1/08/469/035 | OPRYMEA TABLET MVA 1,5MG (1,05MG BASE) | PRAMIPEXOL-1.5-MG-TABLET, MET GEREGULEERDE AFGIFTE | 1,511217 | STUK
114120 | PRAMIPEXOL SANDOZ RET TB MVA 1,5MG (1,05MG BASE) | PRAMIPEXOL-1.5-MG-TABLET, MET GEREGULEERDE AFGIFTE | 1,541523 | STUK
114670 | PRAMIPEXOL TEVA RET TABL MVA 1,5MG (1,05MG BASE) | PRAMIPEXOL-1.5-MG-TABLET, MET GEREGULEERDE AFGIFTE | 1,541523 | STUK
EU/1/97/050/020 | SIFROL TABLET MVA 1,5MG (1,05MG BASE) | PRAMIPEXOL-1.5-MG-TABLET, MET GEREGULEERDE AFGIFTE | 1,511217 | STUK
101920 | GLEPARK TABLET 1MG (0,7MG BASE) | PRAMIPEXOL-1-MG-TABLET | 0,796877 | STUK
EU/1/97/051/005 | MIRAPEXIN TABLET 1MG (0,7MG BASE) | PRAMIPEXOL-1-MG-TABLET | 0,833058 | STUK
104999 | PRAMIPEXOL MYLAN TABLET 1MG (0,7MG BASE) | PRAMIPEXOL-1-MG-TABLET | 0,861823 | STUK
EU/1/97/050/005 | SIFROL TABLET 1MG (0,7MG BASE) | PRAMIPEXOL-1-MG-TABLET | 0,833058 | STUK
EU/1/97/050/006 | SIFROL TABLET 1MG (0,7MG BASE) | PRAMIPEXOL-1-MG-TABLET | 0,833058 | STUK
EU/1/08/469/039 | OPRYMEA TABLET MVA 2,25MG (1,57MG BASE) | PRAMIPEXOL-2.25-MG-TABLET, MET GEREGULEERDE AFGIFTE | 3,211768 | STUK
114121 | PRAMIPEXOL SANDOZ RET TB MVA 2,25MG (1,57MG BASE) | PRAMIPEXOL-2.25-MG-TABLET, MET GEREGULEERDE AFGIFTE | 3,211768 | STUK
114671 | PRAMIPEXOL TEVA RET TABL MVA 2,25MG (1,57MG BASE) | PRAMIPEXOL-2.25-MG-TABLET, MET GEREGULEERDE AFGIFTE | 3,211768 | STUK
EU/1/97/050/029 | SIFROL TABLET MVA 2,25MG (1,57MG BASE) | PRAMIPEXOL-2.25-MG-TABLET, MET GEREGULEERDE AFGIFTE | 3,211768 | STUK
EU/1/97/051/023 | MIRAPEXIN TABLET MVA 3MG (2,1MG BASE) | PRAMIPEXOL-3-MG-TABLET, MET GEREGULEERDE AFGIFTE | 3,321146 | STUK
EU/1/08/469/043 | OPRYMEA TABLET MVA 3MG (2,1MG BASE) | PRAMIPEXOL-3-MG-TABLET, MET GEREGULEERDE AFGIFTE | 3,321146 | STUK
114122 | PRAMIPEXOL SANDOZ RET TB MVA 3MG (2,1MG BASE) | PRAMIPEXOL-3-MG-TABLET, MET GEREGULEERDE AFGIFTE | 3,321146 | STUK
114672 | PRAMIPEXOL TEVA RET TABL MVA 3MG (2,1MG BASE) | PRAMIPEXOL-3-MG-TABLET, MET GEREGULEERDE AFGIFTE | 3,321146 | STUK
EU/1/97/050/023 | SIFROL TABLET MVA 3MG (2,1MG BASE) | PRAMIPEXOL-3-MG-TABLET, MET GEREGULEERDE AFGIFTE | 3,321146 | STUK
EU/1/97/051/026 | MIRAPEXIN TABLET MVA 4,5MG (3,15MG BASE) | PRAMIPEXOL-4.5-MG-TABLET, MET GEREGULEERDE AFGIFTE | 6,411920 | STUK
EU/1/08/469/051 | OPRYMEA TABLET MVA 4,5MG (3,15MG BASE) | PRAMIPEXOL-4.5-MG-TABLET, MET GEREGULEERDE AFGIFTE | 6,411920 | STUK
114125 | PRAMIPEXOL SANDOZ RET TB MVA 4,5MG (3,15MG BASE) | PRAMIPEXOL-4.5-MG-TABLET, MET GEREGULEERDE AFGIFTE | 6,411920 | STUK
114674 | PRAMIPEXOL TEVA RET TABL MVA 4,5MG (3,15MG BASE) | PRAMIPEXOL-4.5-MG-TABLET, MET GEREGULEERDE AFGIFTE | 6,411920 | STUK
EU/1/97/050/026 | SIFROL TABLET MVA 4,5MG (3,15MG BASE) | PRAMIPEXOL-4.5-MG-TABLET, MET GEREGULEERDE AFGIFTE | 6,411920 | STUK
EU/1/08/503/010 | EFIENT TABLET FILMOMHULD 10MG | PRASUGREL-10-MG-TABLET | 1,272477 | STUK
EU/1/08/503/008 | EFIENT TABLET FILMOMHULD 10MG | PRASUGREL-10-MG-TABLET | 1,378166 | STUK
EU/1/08/503/009 | EFIENT TABLET FILMOMHULD 10MG | PRASUGREL-10-MG-TABLET | 1,378166 | STUK
EU/1/18/1273/002 | PRASUGREL MYLAN TABLET FILMOMHULD 10MG | PRASUGREL-10-MG-TABLET | 1,272477 | STUK
EU/1/08/503/002 | EFIENT TABLET FILMOMHULD 5MG | PRASUGREL-5-MG-TABLET | 1,633721 | STUK
28928 | PRAVASTATINENATRIUM PCH TABLET 10MG | PRAVASTATIN-10-MG-TABLET | 0,099129 | STUK
30138 | PRAVASTATINENATRIUM SANDOZ TABLET 10MG | PRAVASTATIN-10-MG-TABLET | 0,099129 | STUK
30479 | PRAVASTATINENATRIUM SANDOZ TABLET 10MG | PRAVASTATIN-10-MG-TABLET | 0,099129 | STUK
28928 | PRAVASTATINENATRIUM TEVA TABLET 10MG | PRAVASTATIN-10-MG-TABLET | 0,099129 | STUK
28929 | PRAVASTATINENATRIUM PCH TABLET 20MG | PRAVASTATIN-20-MG-TABLET | 0,169510 | STUK
30503 | PRAVASTATINENATRIUM SANDOZ TABLET 20MG | PRAVASTATIN-20-MG-TABLET | 0,167580 | STUK
30139 | PRAVASTATINENATRIUM SANDOZ TABLET 20MG | PRAVASTATIN-20-MG-TABLET | 0,169510 | STUK
28929 | PRAVASTATINENATRIUM TEVA TABLET 20MG | PRAVASTATIN-20-MG-TABLET | 0,169510 | STUK
30504 | PRAVASTATINENATRIUM SANDOZ TABLET 40MG | PRAVASTATIN-40-MG-TABLET | 0,244624 | STUK
30141 | PRAVASTATINENATRIUM SANDOZ TABLET 40MG | PRAVASTATIN-40-MG-TABLET | 0,249086 | STUK
28930 | PRAVASTATINENATRIUM TEVA TABLET 40MG | PRAVASTATIN-40-MG-TABLET | 0,249086 | STUK
6994 | REAPAM TABLET 10MG | PRAZEPAM-10-MG-TABLET | 0,131716 | STUK
11271 | PRED FORTE OOGDRUPPELS 10MG/ML FLACON 5ML | PREDNISOLONE-10-MG/ML-OOGDRUPPELS | 0,658002 | ML
105828 | PREDNISOLON MYLAN TABLET 20MG | PREDNISOLONE-20-MG-TABLET | 0,540471 | STUK
106140 | PREDNISOLON SANDOZ TABLET 20MG | PREDNISOLONE-20-MG-TABLET | 0,540471 | STUK
17518=50969 | PREDNISOLON APOTEX TABLET 5MG | PREDNISOLONE-5-MG-TABLET | 0,087357 | STUK
18233=50969 | PREDNISOLON AUROBINDO TABLET 5MG | PREDNISOLONE-5-MG-TABLET | 0,087357 | STUK
50766 | PREDNISOLON CF TABLET 5MG | PREDNISOLONE-5-MG-TABLET | 0,078621 | STUK
14257=50969 | PREDNISOLON SANDOZ TABLET 5MG | PREDNISOLONE-5-MG-TABLET | 0,087357 | STUK
50969 | PREDNISOLON TEVA TABLET 5MG | PREDNISOLONE-5-MG-TABLET | 0,071436 | STUK
EU/1/04/279/017 | LYRICA CAPSULE 150MG | PREGABALINE-150-MG-CAPSULE | 0,478972 | STUK
EU/1/04/279/018 | LYRICA CAPSULE 150MG | PREGABALINE-150-MG-CAPSULE | 0,478972 | STUK
EU/1/04/279/019 | LYRICA CAPSULE 150MG | PREGABALINE-150-MG-CAPSULE | 0,478972 | STUK
EU/1/04/279/028 | LYRICA CAPSULE 150MG | PREGABALINE-150-MG-CAPSULE | 0,478972 | STUK
EU/1/15/1027/047 | PREGABALINE ACCORD CAPSULE 150MG | PREGABALINE-150-MG-CAPSULE | 0,365741 | STUK
115804 | PREGABALINE AMAROX CAPSULE 150MG | PREGABALINE-150-MG-CAPSULE | 0,392866 | STUK
115919 | PREGABALINE AUROBINDO CAPSULE 150MG | PREGABALINE-150-MG-CAPSULE | 0,478972 | STUK
EU/1/15/997/034 | PREGABALINE MYLAN CAPSULE 150MG | PREGABALINE-150-MG-CAPSULE | 0,392866 | STUK
EU/1/15/1011/054 | PREGABALINE SANDOZ CAPSULE 150MG | PREGABALINE-150-MG-CAPSULE | 0,392866 | STUK
EU/1/15/1012/054 | PREGABALINE SANDOZ GMBH CAPSULE 150MG | PREGABALINE-150-MG-CAPSULE | 0,365741 | STUK
116153 | PREGABALINE SUN CAPSULE 150MG | PREGABALINE-150-MG-CAPSULE | 0,365741 | STUK
EU/1/04/279/003 | LYRICA CAPSULE 25MG | PREGABALINE-25-MG-CAPSULE | 0,289075 | STUK
EU/1/15/997/003 | PREGABALINE MYLAN CAPSULE 25MG | PREGABALINE-25-MG-CAPSULE | 0,289075 | STUK
EU/1/15/1011/003 | PREGABALINE SANDOZ CAPSULE 25MG | PREGABALINE-25-MG-CAPSULE | 0,289075 | STUK
115847 | PREGABALINE TEVA CAPSULE 25MG | PREGABALINE-25-MG-CAPSULE | 0,257069 | STUK
EU/1/04/279/024 | LYRICA CAPSULE 300MG | PREGABALINE-300-MG-CAPSULE | 0,662135 | STUK
EU/1/04/279/029 | LYRICA CAPSULE 300MG | PREGABALINE-300-MG-CAPSULE | 0,662135 | STUK
EU/1/15/1027/080 | PREGABALINE ACCORD CAPSULE 300MG | PREGABALINE-300-MG-CAPSULE | 0,500177 | STUK
115807 | PREGABALINE AMAROX CAPSULE 300MG | PREGABALINE-300-MG-CAPSULE | 0,500177 | STUK
115920 | PREGABALINE AUROBINDO CAPSULE 300MG | PREGABALINE-300-MG-CAPSULE | 0,662135 | STUK
EU/1/04/279/011 | LYRICA CAPSULE 75MG | PREGABALINE-75-MG-CAPSULE | 0,389863 | STUK
EU/1/04/279/012 | LYRICA CAPSULE 75MG | PREGABALINE-75-MG-CAPSULE | 0,389863 | STUK
EU/1/04/279/013 | LYRICA CAPSULE 75MG | PREGABALINE-75-MG-CAPSULE | 0,389863 | STUK
EU/1/04/279/027 | LYRICA CAPSULE 75MG | PREGABALINE-75-MG-CAPSULE | 0,389863 | STUK
EU/1/15/1027/025 | PREGABALINE ACCORD CAPSULE 75MG | PREGABALINE-75-MG-CAPSULE | 0,309977 | STUK
115802 | PREGABALINE AMAROX CAPSULE 75MG | PREGABALINE-75-MG-CAPSULE | 0,321160 | STUK
115917 | PREGABALINE AUROBINDO CAPSULE 75MG | PREGABALINE-75-MG-CAPSULE | 0,389863 | STUK
EU/1/15/997/017 | PREGABALINE MYLAN CAPSULE 75MG | PREGABALINE-75-MG-CAPSULE | 0,321160 | STUK
EU/1/15/997/020 | PREGABALINE MYLAN CAPSULE 75MG | PREGABALINE-75-MG-CAPSULE | 0,321160 | STUK
EU/1/15/997/022 | PREGABALINE MYLAN CAPSULE 75MG | PREGABALINE-75-MG-CAPSULE | 0,321160 | STUK
EU/1/15/1011/031 | PREGABALINE SANDOZ CAPSULE 75MG | PREGABALINE-75-MG-CAPSULE | 0,309977 | STUK
EU/1/15/1012/031 | PREGABALINE SANDOZ GMBH CAPSULE 75MG | PREGABALINE-75-MG-CAPSULE | 0,309977 | STUK
116152 | PREGABALINE SUN CAPSULE 75MG | PREGABALINE-75-MG-CAPSULE | 0,309977 | STUK
5077 | NATULAN CAPSULE 50MG | PROCARBAZINE-50-MG-CAPSULE | 8,352480 | STUK
109696//11473 | UTROGESTAN CAPSULE 100MG | PROGESTERONE-100-MG-CAPSULE | 0,170871 | STUK
11473 | UTROGESTAN CAPSULE 100MG | PROGESTERONE-100-MG-CAPSULE | 0,170871 | STUK
123999 | UTROGESTAN VAGINAALCAPSULE 200MG | PROGESTERONE-200-MG-CAPSULE, VAGINAAL | 0,387197 | STUK
114730 | CRINONE 80MG/G VAGINALE GEL IN APPLICATOR 1,125G | PROGESTERONE-80-MG/G-GEL, VAGINAAL | 2,428523 | G
122576 | ATOVAQUON/PROGUANIL AMAROX TAB FILMOMH 250/100MG | PROGUANIL-100-MG-TABLET-ATOVAQUONE-250-MG-TABLET | 2,003250 | STUK
118552 | ATOVAQUON/PROGUANIL CF TABLET FILMOMH 250/100MG | PROGUANIL-100-MG-TABLET-ATOVAQUONE-250-MG-TABLET | 2,003250 | STUK
105808 | ATOVAQUON/PROGUANIL GLENMARK TAB FILMOMH 250/100MG | PROGUANIL-100-MG-TABLET-ATOVAQUONE-250-MG-TABLET | 2,003250 | STUK
109086 | ATOVAQUON/PROGUANIL MYLAN TABLET FILMOMH 250/100MG | PROGUANIL-100-MG-TABLET-ATOVAQUONE-250-MG-TABLET | 2,003250 | STUK
111742 | ATOVAQUON/PROGUANIL TEVA TABLET FILMOMH 250/100MG | PROGUANIL-100-MG-TABLET-ATOVAQUONE-250-MG-TABLET | 2,003250 | STUK
25386 | MALARONE TABLET FILMOMHULD | PROGUANIL-100-MG-TABLET-ATOVAQUONE-250-MG-TABLET | 2,003250 | STUK
50250 | PROMETHAZINE CF TABLET OMHULD 25MG | PROMETHAZINE-25-MG-TABLET | 0,091303 | STUK
23441=50250 | PROMETHAZINE TEVA TABLET OMHULD 25MG | PROMETHAZINE-25-MG-TABLET | 0,091303 | STUK
12448 | RYTMONORM TABLET OMHULD 150MG | PROPAFENONE-150-MG-TABLET | 0,104862 | STUK
12449 | RYTMONORM TABLET OMHULD 300MG | PROPAFENONE-300-MG-TABLET | 0,190765 | STUK
55387 | PROPRANOLOL HCL ACCORD TABLET 10MG | PROPRANOLOL-10-MG-TABLET | 0,075352 | STUK
12636 | PROPRANOLOL HCL SANDOZ TABLET 10MG | PROPRANOLOL-10-MG-TABLET | 0,075352 | STUK
10216 | PROPRANOLOL HCL TEVA TABLET 10MG | PROPRANOLOL-10-MG-TABLET | 0,075352 | STUK
15489=12821 | PROPRANOLOL HCL AUROBINDO RETARD CAPSULE MGA 160MG | PROPRANOLOL-160-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,193052 | STUK
12821 | PROPRANOLOL HCL PCH RETARD CAPSULE MGA 160MG | PROPRANOLOL-160-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,193052 | STUK
16071=12821 | PROPRANOLOL HCL SANDOZ RETARD CAPSULE MGA 160MG | PROPRANOLOL-160-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,193052 | STUK
EU/1/14/919/001 | HEMANGIOL DRANK 3,75MG/ML | PROPRANOLOL-3.75-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 1,408629 | ML
55388 | PROPRANOLOL HCL ACCORD TABLET 40MG | PROPRANOLOL-40-MG-TABLET | 0,056841 | STUK
55618 | PROPRANOLOL HCL CF TABLET 40MG | PROPRANOLOL-40-MG-TABLET | 0,070706 | STUK
12637 | PROPRANOLOL HCL SANDOZ TABLET 40MG | PROPRANOLOL-40-MG-TABLET | 0,070706 | STUK
10217 | PROPRANOLOL HCL TEVA TABLET 40MG | PROPRANOLOL-40-MG-TABLET | 0,070706 | STUK
15488=14353 | PROPRANOLOL HCL AUROBINDO RETARD CAPSULE MGA 80MG | PROPRANOLOL-80-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,154911 | STUK
14353 | PROPRANOLOL HCL PCH RETARD CAPSULE MGA 80MG | PROPRANOLOL-80-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,154911 | STUK
16045=14353 | PROPRANOLOL HCL SANDOZ RETARD CAPSULE MGA 80MG | PROPRANOLOL-80-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,154911 | STUK
14353 | PROPRANOLOL HCL TEVA RETARD CAPSULE MGA 80MG | PROPRANOLOL-80-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,154911 | STUK
55880 | PROPRANOLOL HCL ACCORD TABLET 80MG | PROPRANOLOL-80-MG-TABLET | 0,066033 | STUK
55619 | PROPRANOLOL HCL CF TABLET 80MG | PROPRANOLOL-80-MG-TABLET | 0,076267 | STUK
12638 | PROPRANOLOL HCL SANDOZ TABLET 80MG | PROPRANOLOL-80-MG-TABLET | 0,084741 | STUK
10218 | PROPRANOLOL HCL TEVA TABLET 80MG | PROPRANOLOL-80-MG-TABLET | 0,084741 | STUK
50772 | PYRAZINAMIDE CF TABLET 500MG | PYRAZINAMIDE-500-MG-TABLET | 0,684940 | STUK
3820 | MESTINON TABLET 10MG | PYRIDOSTIGMINE-10-MG-TABLET | 0,082185 | STUK
3821 | MESTINON DRAGEE 60MG | PYRIDOSTIGMINE-60-MG-TABLET | 0,250416 | STUK
254 | DARAPRIM TABLET 25MG | PYRIMETHAMINE-25-MG-TABLET | 0,381076 | STUK
103590 | QUETIAPINE CF TABLET FILMOMHULD 100MG | QUETIAPINE-100-MG-TABLET | 0,855079 | STUK
109272 | QUETIAPINE FAIR-MED TABLET FILMOMHULD 100MG | QUETIAPINE-100-MG-TABLET | 0,855079 | STUK
100752 | QUETIAPINE TEVA TABLET FILMOMHULD 100MG | QUETIAPINE-100-MG-TABLET | 0,855079 | STUK
122562//20827 | SEROQUEL TABLET FILMOMHULD 100MG | QUETIAPINE-100-MG-TABLET | 0,855079 | STUK
126971//20827 | SEROQUEL TABLET FILMOMHULD 100MG | QUETIAPINE-100-MG-TABLET | 0,855079 | STUK
20827 | SEROQUEL TABLET FILMOMHULD 100MG | QUETIAPINE-100-MG-TABLET | 0,855079 | STUK
117395 | QUETIAPINE ACCORD RETARD TABLET MVA 150MG | QUETIAPINE-150-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,786660 | STUK
119791 | QUETIAPINE AUROBINDO RETARD TABLET MVA 150MG | QUETIAPINE-150-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,786660 | STUK
117555 | QUETIAPINE SANDOZ SR TABLET MVA 150MG | QUETIAPINE-150-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,786660 | STUK
111319 | QUETIAPINE TEVA RETARD TABLET MVA 150MG | QUETIAPINE-150-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,786660 | STUK
102408 | SEROQUEL XR TABLET MVA 150MG | QUETIAPINE-150-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,786660 | STUK
118244//102408 | SEROQUEL XR TABLET MVA 150MG | QUETIAPINE-150-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,786660 | STUK
103592 | QUETIAPINE CF TABLET FILMOMHULD 200MG | QUETIAPINE-200-MG-TABLET | 0,977882 | STUK
109274 | QUETIAPINE FAIR-MED TABLET FILMOMHULD 200MG | QUETIAPINE-200-MG-TABLET | 0,977882 | STUK
102992 | QUETIAPINE SANDOZ TABLET FILMOMHULD 200MG | QUETIAPINE-200-MG-TABLET | 0,977882 | STUK
100755 | QUETIAPINE TEVA TABLET FILMOMHULD 200MG | QUETIAPINE-200-MG-TABLET | 0,977882 | STUK
20828 | SEROQUEL TABLET FILMOMHULD 200MG | QUETIAPINE-200-MG-TABLET | 0,977882 | STUK
122527//34626 | SEROQUEL XR TABLET MVA 200MG | QUETIAPINE-200-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,840001 | STUK
122570//34626 | SEROQUEL XR TABLET MVA 200MG | QUETIAPINE-200-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,840001 | STUK
34626 | SEROQUEL XR TABLET MVA 200MG | QUETIAPINE-200-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,840001 | STUK
103589 | QUETIAPINE CF TABLET FILMOMHULD 25MG | QUETIAPINE-25-MG-TABLET | 0,336420 | STUK
109270 | QUETIAPINE FAIR-MED TABLET FILMOMHULD 25MG | QUETIAPINE-25-MG-TABLET | 0,336420 | STUK
100746 | QUETIAPINE TEVA TABLET FILMOMHULD 25MG | QUETIAPINE-25-MG-TABLET | 0,336420 | STUK
20826 | SEROQUEL TABLET FILMOMHULD 25MG | QUETIAPINE-25-MG-TABLET | 0,336420 | STUK
103591 | QUETIAPINE CF TABLET FILMOMHULD 300MG | QUETIAPINE-300-MG-TABLET | 1,339025 | STUK
109275 | QUETIAPINE FAIR-MED TABLET FILMOMHULD 300MG | QUETIAPINE-300-MG-TABLET | 1,339025 | STUK
100761 | QUETIAPINE TEVA TABLET FILMOMHULD 300MG | QUETIAPINE-300-MG-TABLET | 1,339025 | STUK
25603 | SEROQUEL TABLET FILMOMHULD 300MG | QUETIAPINE-300-MG-TABLET | 1,339025 | STUK
121139//34627 | SEROQUEL XR TABLET MVA 300MG | QUETIAPINE-300-MG-TABLET, MET GEREGULEERDE AFGIFTE | 1,040477 | STUK
122528//34627 | SEROQUEL XR TABLET MVA 300MG | QUETIAPINE-300-MG-TABLET, MET GEREGULEERDE AFGIFTE | 1,074133 | STUK
34627 | SEROQUEL XR TABLET MVA 300MG | QUETIAPINE-300-MG-TABLET, MET GEREGULEERDE AFGIFTE | 1,074133 | STUK
121140//34628 | SEROQUEL XR TABLET MVA 400MG | QUETIAPINE-400-MG-TABLET, MET GEREGULEERDE AFGIFTE | 1,402913 | STUK
34628 | SEROQUEL XR TABLET MVA 400MG | QUETIAPINE-400-MG-TABLET, MET GEREGULEERDE AFGIFTE | 1,430615 | STUK
122299//34625 | SEROQUEL XR TABLET MVA 50MG | QUETIAPINE-50-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,477652 | STUK
123713//34625 | SEROQUEL XR TABLET MVA 50MG | QUETIAPINE-50-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,477652 | STUK
34625 | SEROQUEL XR TABLET MVA 50MG | QUETIAPINE-50-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,479132 | STUK
16289 | NORPROLAC TABLET 25 + 50MCG (3+3TABL) | QUINAGOLIDE-.025-MG-TABLET-QUINAGOLIDE-FASE2-.05-MG-TABLET | 2,642351 | STUK
23210 | PARIET TABLET MSR 10MG | RABEPRAZOL-10-MG-TABLET, MAAGSAPRESISTENT | 0,193965 | STUK
23211 | PARIET TABLET MSR 20MG | RABEPRAZOL-20-MG-TABLET, MAAGSAPRESISTENT | 0,284288 | STUK
EU/1/98/073/002 | EVISTA TABLET 60MG | RALOXIFEN-60-MG-TABLET | 0,464391 | STUK
EU/1/10/627/002 | RALOXIFEEN TEVA TABLET FILMOMHULD 60MG | RALOXIFEN-60-MG-TABLET | 0,515990 | STUK
EU/1/07/436/001 | ISENTRESS TABLET FILMOMHULD 400MG | RALTEGRAVIR-400-MG-TABLET | 9,414042 | STUK
EU/1/07/436/006 | ISENTRESS TABLET FILMOMHULD 600MG | RALTEGRAVIR-600-MG-TABLET | 9,414042 | STUK
28001 | RAMIPRIL SANDOZ TABLET 1,25MG | RAMIPRIL-1.25-MG-TABLET | 0,107861 | STUK
30971 | RAMIPRIL MYLAN TABLET 10MG | RAMIPRIL-10-MG-TABLET | 0,198525 | STUK
28004 | RAMIPRIL SANDOZ TABLET 10MG | RAMIPRIL-10-MG-TABLET | 0,198525 | STUK
30969 | RAMIPRIL MYLAN TABLET 2,5MG | RAMIPRIL-2.5-MG-TABLET | 0,124559 | STUK
28002 | RAMIPRIL SANDOZ TABLET 2,5MG | RAMIPRIL-2.5-MG-TABLET | 0,124559 | STUK
30970 | RAMIPRIL MYLAN TABLET 5MG | RAMIPRIL-5-MG-TABLET | 0,146854 | STUK
28003 | RAMIPRIL SANDOZ TABLET 5MG | RAMIPRIL-5-MG-TABLET | 0,146854 | STUK
EU/1/14/957/001 | CYRAMZA INFVLST CONC 10MG/ML FLACON 10ML | RAMUCIRUMAB-10-MG/ML-INFUUSVLOEISTOF, FLACON | 52,589978 | ML
EU/1/14/957/003 | CYRAMZA INFVLST CONC 10MG/ML FLACON 50ML | RAMUCIRUMAB-10-MG/ML-INFUUSVLOEISTOF, FLACON | 52,589978 | ML
EU/1/06/374/003 | LUCENTIS INJVLST 10MG/ML WWSP 0,165ML | RANIBIZUMAB-10-MG/ML-INJ.VLOEISTOF, WWSP | 3858,020676 | ML
EU/1/06/374/001 | LUCENTIS INJVLST 10MG/ML FLACON 0,23ML | RANIBIZUMAB-10-MG/ML-INJECTIEVLOEISTOF, FLAC | 2869,860357 | ML
EU/1/06/374/004 | LUCENTIS INJVLST 10MG/ML FLACON 0,23ML | RANIBIZUMAB-10-MG/ML-INJECTIEVLOEISTOF, FLAC | 2869,860357 | ML
21969 | RANITIDINE SANDOZ TABLET 150MG | RANITIDINE-150-MG-TABLET | 0,104108 | STUK
21970 | RANITIDINE SANDOZ TABLET 300MG | RANITIDINE-300-MG-TABLET | 0,195440 | STUK
EU/1/04/304/003 | AZILECT TABLET 1MG | RASAGILINE-1-MG-TABLET | 1,651153 | STUK
EU/1/04/304/004 | AZILECT TABLET 1MG | RASAGILINE-1-MG-TABLET | 1,651153 | STUK
117125 | RASAGILINE SANDOZ TABLET 1MG | RASAGILINE-1-MG-TABLET | 1,651153 | STUK
EU/1/00/170/001 | FASTURTEC INFUSIEPOEDER FLACON 1,5MG + SOLV 1ML | RASBURICASE-1.5-MG-POED. V. INFUSIE,FLACON | 69,581736 | STUK
EU/1/00/170/002 | FASTURTEC INFUSIEPOEDER FLACON 7,5MG + SOLV 5ML | RASBURICASE-7.5-MG-POED. V. INFUSIE,FLACON | 379,318464 | STUK
EU/1/13/858/002 | STIVARGA TABLET FILMOMHULD 40MG | REGORAFENIB-40-MG-TABLET | 37,412759 | STUK
103405 | REMIFENTANIL FRES KABI INJECTIEPOEDER FLACON 1MG | REMIFENTANIL-1-MG-POED. V. INJECTIE, FLACON | 4,024424 | STUK
104745 | REMIFENTANIL HCL MYLAN INJECTIEPOEDER FLACON 1MG | REMIFENTANIL-1-MG-POED. V. INJECTIE, FLACON | 4,252323 | STUK
125626//20601 | ULTIVA INJECTIEPOEDER FLACON 1MG | REMIFENTANIL-1-MG-POED. V. INJECTIE, FLACON | 4,024424 | STUK
20601 | ULTIVA INJECTIEPOEDER FLACON 1MG | REMIFENTANIL-1-MG-POED. V. INJECTIE, FLACON | 4,252323 | STUK
103407 | REMIFENTANIL FRES KABI INJECTIEPOEDER FLACON 2MG | REMIFENTANIL-2-MG-POED. V. INJECTIE, FLACON | 7,720899 | STUK
104756 | REMIFENTANIL HCL MYLAN INJECTIEPOEDER FLACON 2MG | REMIFENTANIL-2-MG-POED. V. INJECTIE, FLACON | 7,720899 | STUK
125619//20602 | ULTIVA INJECTIEPOEDER FLACON 2MG | REMIFENTANIL-2-MG-POED. V. INJECTIE, FLACON | 7,720899 | STUK
20602 | ULTIVA INJECTIEPOEDER FLACON 2MG | REMIFENTANIL-2-MG-POED. V. INJECTIE, FLACON | 8,129558 | STUK
103409 | REMIFENTANIL FRES KABI INJECTIEPOEDER FLACON 5MG | REMIFENTANIL-5-MG-POED. V. INJECTIE, FLACON | 18,938128 | STUK
104757 | REMIFENTANIL HCL MYLAN INJECTIEPOEDER FLACON 5MG | REMIFENTANIL-5-MG-POED. V. INJECTIE, FLACON | 18,938128 | STUK
125628//20603 | ULTIVA INJECTIEPOEDER FLACON 5MG | REMIFENTANIL-5-MG-POED. V. INJECTIE, FLACON | 18,938128 | STUK
20603 | ULTIVA INJECTIEPOEDER FLACON 5MG | REMIFENTANIL-5-MG-POED. V. INJECTIE, FLACON | 19,713014 | STUK
EU/1/98/076/004 | NOVONORM TABLET 0,5MG | REPAGLINIDE-.5-MG-TABLET | 0,113069 | STUK
EU/1/98/076/005 | NOVONORM TABLET 0,5MG | REPAGLINIDE-.5-MG-TABLET | 0,113069 | STUK
EU/1/11/743/001 | REPAGLINIDE ACCORD TABLET 0,5MG | REPAGLINIDE-.5-MG-TABLET | 0,102895 | STUK
EU/1/98/076/011 | NOVONORM TABLET 1MG | REPAGLINIDE-1-MG-TABLET | 0,120505 | STUK
EU/1/98/076/012 | NOVONORM TABLET 1MG | REPAGLINIDE-1-MG-TABLET | 0,120505 | STUK
EU/1/11/743/006 | REPAGLINIDE ACCORD TABLET 1MG | REPAGLINIDE-1-MG-TABLET | 0,109588 | STUK
EU/1/98/076/018 | NOVONORM TABLET 2MG | REPAGLINIDE-2-MG-TABLET | 0,115899 | STUK
EU/1/98/076/019 | NOVONORM TABLET 2MG | REPAGLINIDE-2-MG-TABLET | 0,115899 | STUK
EU/1/11/743/011 | REPAGLINIDE ACCORD TABLET 2MG | REPAGLINIDE-2-MG-TABLET | 0,105442 | STUK
EU/1/99/107/002 | REBETOL CAPSULE 200MG | RIBAVIRIN-200-MG-CAPSULE | 2,130244 | STUK
EU/1/99/107/001 | REBETOL CAPSULE 200MG | RIBAVIRIN-200-MG-CAPSULE | 2,223374 | STUK
EU/1/99/107/003 | REBETOL CAPSULE 200MG | RIBAVIRIN-200-MG-CAPSULE | 2,223374 | STUK
110588 | RIBAVIRINE MYLAN TABLET FILMOMHULD 200MG | RIBAVIRIN-200-MG-TABLET | 2,420203 | STUK
EU/1/09/527/003 | RIBAVIRINE TEVA TABLET FILMOMHULD 200MG | RIBAVIRIN-200-MG-TABLET | 2,178183 | STUK
EU/1/09/527/005 | RIBAVIRINE TEVA TABLET FILMOMHULD 200MG | RIBAVIRIN-200-MG-TABLET | 2,178183 | STUK
16740 | MYCOBUTIN CAPSULE 150MG | RIFABUTIN-150-MG-CAPSULE | 3,261149 | STUK
5764 | RIFADIN CAPSULE 150MG | RIFAMPICIN-150-MG-CAPSULE | 0,365725 | STUK
5761 | RIFAMPICINE SANDOZ CAPSULE 150MG | RIFAMPICIN-150-MG-CAPSULE | 0,365725 | STUK
5766 | RIFADIN SUSPENSIE 20MG/ML (2%) | RIFAMPICIN-20-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,126383 | ML
5765 | RIFADIN CAPSULE 300MG | RIFAMPICIN-300-MG-CAPSULE | 0,620123 | STUK
6090 | RIFAMPICINE SANDOZ CAPSULE 300MG | RIFAMPICIN-300-MG-CAPSULE | 0,620123 | STUK
8755 | RIFADIN INFUSIEPOEDER FLACON 600MG + SOLVENS 10ML | RIFAMPICIN-600-MG-POED. V. INFUSIE,FLACON | 7,585725 | STUK
125715//110659 | RIFAXIMINE BMODESTO TABLET FILMOMHULD 550MG | RIFAXIMIN-550-MG-TABLET | 5,395805 | STUK
124153//110660 | RIFAXIMINE ERC TABLET FILMOMHULD 550MG | RIFAXIMIN-550-MG-TABLET | 5,395805 | STUK
110659 | XIFAXAN TABLET FILMOMHULD 550MG | RIFAXIMIN-550-MG-TABLET | 5,395805 | STUK
117454//110659 | XIFAXAN TABLET FILMOMHULD 550MG | RIFAXIMIN-550-MG-TABLET | 5,395805 | STUK
122526//110659 | XIFAXAN TABLET FILMOMHULD 550MG | RIFAXIMIN-550-MG-TABLET | 5,395805 | STUK
122672//110659 | XIFAXAN TABLET FILMOMHULD 550MG | RIFAXIMIN-550-MG-TABLET | 5,395805 | STUK
EU/1/11/736/001 | EDURANT TABLET FILMOMHULD 25MG | RILPIVIRINE-25-MG-TABLET | 8,335763 | STUK
EU/1/96/010/001 | RILUTEK TABLET OMHULD 50MG | RILUZOLE-50-MG-TABLET | 2,978969 | STUK
EU/1/13/907/013 | ADEMPAS TABLET FILMOMHULD 2,5MG | RIOCIGUAT-2.5-MG-TABLET | 28,043056 | STUK
EU/1/19/1361/001 | SKYRIZI INJVLST 75MG/0,83ML (90,36MG/ML) WWSP | RISANKIZUMAB-75-MG-INJ.VLOEISTOF, WWSP | 1605,830473 | STUK
28338 | ACTONEL WEKELIJKS TABLET FILMOMHULD 35MG | RISEDRONINEZUUR-35-MG-TABLET | 3,345826 | STUK
25801 | ACTONEL TABLET FILMOMHULD 5MG | RISEDRONINEZUUR-5-MG-TABLET | 0,533866 | STUK
22714 | RISPERDAL TABLET OMHULD 0,5MG | RISPERIDONE-.5-MG-TABLET | 0,181071 | STUK
33495 | RISPERIDON AUROBINDO TABLET OMHULD 0,5MG | RISPERIDONE-.5-MG-TABLET | 0,199301 | STUK
30913 | RISPERIDON CF TABLET OMHULD 0,5MG | RISPERIDONE-.5-MG-TABLET | 0,199301 | STUK
33271 | RISPERIDON TEVA TABLET OMHULD 0,5MG | RISPERIDONE-.5-MG-TABLET | 0,199301 | STUK
19127 | RISPERDAL DRANK 1MG/ML | RISPERIDONE-1-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,190603 | ML
34630 | RISPERIDON MYLAN DRANK 1MG/ML | RISPERIDONE-1-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,190603 | ML
33796 | RISPERIDON SANDOZ DRANK 1MG/ML | RISPERIDONE-1-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,190603 | ML
16096 | RISPERDAL TABLET OMHULD 1MG | RISPERIDONE-1-MG-TABLET | 0,191470 | STUK
33496 | RISPERIDON AUROBINDO TABLET OMHULD 1MG | RISPERIDONE-1-MG-TABLET | 0,191470 | STUK
30914 | RISPERIDON CF TABLET OMHULD 1MG | RISPERIDONE-1-MG-TABLET | 0,191470 | STUK
35242 | RISPERIDON PCH TABLET OMHULD 1MG | RISPERIDONE-1-MG-TABLET | 0,191470 | STUK
34202 | RISPERIDON SANDOZ TABLET OMHULD 1MG | RISPERIDONE-1-MG-TABLET | 0,191470 | STUK
113171//27178 | RISPERDAL CONSTA INJPDR FLACON 25MG + SOLV 2ML | RISPERIDONE-25-MG-POED. V. INJECTIE, FLACON | 82,019378 | STUK
27178 | RISPERDAL CONSTA INJPDR FLACON 25MG + SOLV 2ML | RISPERIDONE-25-MG-POED. V. INJECTIE, FLACON | 82,019378 | STUK
16097 | RISPERDAL TABLET OMHULD 2MG | RISPERIDONE-2-MG-TABLET | 0,374863 | STUK
33497 | RISPERIDON AUROBINDO TABLET OMHULD 2MG | RISPERIDONE-2-MG-TABLET | 0,374863 | STUK
30915 | RISPERIDON CF TABLET OMHULD 2MG | RISPERIDONE-2-MG-TABLET | 0,374863 | STUK
35243 | RISPERIDON PCH TABLET OMHULD 2MG | RISPERIDONE-2-MG-TABLET | 0,374863 | STUK
34203 | RISPERIDON SANDOZ TABLET OMHULD 2MG | RISPERIDONE-2-MG-TABLET | 0,374863 | STUK
113170//27179 | RISPERDAL CONSTA INJPDR FLACON 37,5MG + SOLV 2ML | RISPERIDONE-37.5-MG-POED. V. INJECTIE, FLACON | 111,646116 | STUK
27179 | RISPERDAL CONSTA INJPDR FLACON 37,5MG + SOLV 2ML | RISPERIDONE-37.5-MG-POED. V. INJECTIE, FLACON | 111,646116 | STUK
16098 | RISPERDAL TABLET OMHULD 3MG | RISPERIDONE-3-MG-TABLET | 0,626170 | STUK
35244 | RISPERIDON PCH TABLET OMHULD 3MG | RISPERIDONE-3-MG-TABLET | 0,626170 | STUK
34204 | RISPERIDON SANDOZ TABLET OMHULD 3MG | RISPERIDONE-3-MG-TABLET | 0,626170 | STUK
16099 | RISPERDAL TABLET OMHULD 4MG | RISPERIDONE-4-MG-TABLET | 0,703476 | STUK
35245 | RISPERIDON PCH TABLET OMHULD 4MG | RISPERIDONE-4-MG-TABLET | 0,703476 | STUK
34205 | RISPERIDON SANDOZ TABLET OMHULD 4MG | RISPERIDONE-4-MG-TABLET | 0,703476 | STUK
113169//27180 | RISPERDAL CONSTA INJPDR FLACON 50MG + SOLV 2ML | RISPERIDONE-50-MG-POED. V. INJECTIE, FLACON | 135,349771 | STUK
27180 | RISPERDAL CONSTA INJPDR FLACON 50MG + SOLV 2ML | RISPERIDONE-50-MG-POED. V. INJECTIE, FLACON | 135,349771 | STUK
100176 | RISPERIDON ACCORD TABLET OMHULD 6MG | RISPERIDONE-6-MG-TABLET | 1,756224 | STUK
EU/1/96/016/009 | NORVIR POEDER VOOR SUSPENSIE 100MG IN SACHET | RITONAVIR-100-MG-POEDER/GRANULAAT, ORAAL | 1,051671 | STUK
EU/1/96/016/005 | NORVIR TABLET FILMOMHULD 100MG | RITONAVIR-100-MG-TABLET | 0,744912 | STUK
115126 | RITONAVIR ACCORD TABLET FILMOMHULD 100MG | RITONAVIR-100-MG-TABLET | 0,744912 | STUK
115127 | RITONAVIR SANDOZ TABLET FILMOMHULD 100MG | RITONAVIR-100-MG-TABLET | 0,744912 | STUK
EU/1/01/172/003 | KALETRA DRANK | RITONAVIR-20-MG/ML-OPLOSSING/SUSPENSIE, ORAAL-LOPINAVIR-80-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 1,434747 | ML
EU/1/01/172/006 | KALETRA TABLET FILMOMHULD 100/25MG | RITONAVIR-25-MG-TABLET-LOPINAVIR-100-MG-TABLET | 1,997065 | STUK
EU/1/01/172/005 | KALETRA TABLET FILMOMHULD 200/50MG | RITONAVIR-50-MG-TABLET-LOPINAVIR-200-MG-TABLET | 3,166822 | STUK
EU/1/01/172/004 | KALETRA TABLET FILMOMHULD 200/50MG | RITONAVIR-50-MG-TABLET-LOPINAVIR-200-MG-TABLET | 3,518691 | STUK
EU/1/01/172/008 | KALETRA TABLET FILMOMHULD 200/50MG | RITONAVIR-50-MG-TABLET-LOPINAVIR-200-MG-TABLET | 3,518691 | STUK
EU/1/14/982/001 | VIEKIRAX TABLET FILMOMHULD 12,5/75/50MG | RITONAVIR-50-MG-TABLET-OMBITASVIR-12.5-MG-TABLET-PARITAPREVIR-75-MG-TABLET | 176,453485 | STUK
EU/1/98/067/001 | MABTHERA INFVLST CONCENTRAAT 10MG/ML FLACON 10ML | RITUXIMAB-10-MG/ML-INFUUSVLOEISTOF, FLACON | 19,569088 | ML
EU/1/98/067/002 | MABTHERA INFVLST CONCENTRAAT 10MG/ML FLACON 50ML | RITUXIMAB-10-MG/ML-INFUUSVLOEISTOF, FLACON | 19,569088 | ML
EU/1/17/1185/001 | RIXATHON INFVLST CONC 10MG/ML FLACON 10ML | RITUXIMAB-10-MG/ML-INFUUSVLOEISTOF, FLACON | 19,569088 | ML
EU/1/17/1185/002 | RIXATHON INFVLST CONC 10MG/ML FLACON 10ML | RITUXIMAB-10-MG/ML-INFUUSVLOEISTOF, FLACON | 19,569088 | ML
EU/1/17/1185/003 | RIXATHON INFVLST CONC 10MG/ML FLACON 50ML | RITUXIMAB-10-MG/ML-INFUUSVLOEISTOF, FLACON | 19,569088 | ML
EU/1/16/1167/002 | TRUXIMA INFVLST CONCENTRAAT 10MG/ML FLACON 10ML | RITUXIMAB-10-MG/ML-INFUUSVLOEISTOF, FLACON | 19,569088 | ML
EU/1/16/1167/001 | TRUXIMA INFVLST CONCENTRAAT 10MG/ML FLACON 50ML | RITUXIMAB-10-MG/ML-INFUUSVLOEISTOF, FLACON | 19,569088 | ML
EU/1/98/067/003 | MABTHERA INJVLST 1400MG/11,7ML (120MG/ML) FLACON | RITUXIMAB-120-MG/ML-INJECTIEVLOEISTOF, FLAC | 130,971827 | ML
EU/1/08/472/007 | XARELTO TABLET FILMOMHULD 10MG | RIVAROXABAN-10-MG-TABLET | 2,046129 | STUK
EU/1/08/472/008 | XARELTO TABLET FILMOMHULD 10MG | RIVAROXABAN-10-MG-TABLET | 2,046129 | STUK
EU/1/08/472/006 | XARELTO TABLET FILMOMHULD 10MG | RIVAROXABAN-10-MG-TABLET | 2,065233 | STUK
EU/1/08/472/012 | XARELTO TABLET FILMOMHULD 15MG | RIVAROXABAN-15-MG-TABLET | 2,051785 | STUK
EU/1/08/472/013 | XARELTO TABLET FILMOMHULD 15MG | RIVAROXABAN-15-MG-TABLET | 2,051785 | STUK
EU/1/08/472/014 | XARELTO TABLET FILMOMHULD 15MG | RIVAROXABAN-15-MG-TABLET | 2,051785 | STUK
EU/1/08/472/016 | XARELTO TABLET FILMOMHULD 15MG | RIVAROXABAN-15-MG-TABLET | 2,051785 | STUK
EU/1/08/472/036 | XARELTO TABLET FILMOMHULD 15MG | RIVAROXABAN-15-MG-TABLET | 2,051785 | STUK
EU/1/08/472/027 | XARELTO TABLET FILMOMHULD 2,5MG | RIVAROXABAN-2.5-MG-TABLET | 1,058145 | STUK
EU/1/08/472/033 | XARELTO TABLET FILMOMHULD 2,5MG | RIVAROXABAN-2.5-MG-TABLET | 1,058145 | STUK
EU/1/08/472/018 | XARELTO TABLET FILMOMHULD 20MG | RIVAROXABAN-20-MG-TABLET | 2,046199 | STUK
EU/1/08/472/021 | XARELTO TABLET FILMOMHULD 20MG | RIVAROXABAN-20-MG-TABLET | 2,046199 | STUK
EU/1/08/472/037 | XARELTO TABLET FILMOMHULD 20MG | RIVAROXABAN-20-MG-TABLET | 2,046199 | STUK
EU/1/98/066/001 | EXELON CAPSULE 1,5MG | RIVASTIGMINE-1.5-MG-CAPSULE | 0,530531 | STUK
EU/1/98/066/028 | EXELON PLEISTER TRANSDERMAAL 13,3MG/24UUR | RIVASTIGMINE-13.3-MG/24H-PLEISTER, DERMAAL | 2,574492 | STUK
115384 | RIVASTIGMINE SANDOZ PLEISTER TRANSDERM 13,3MG/24U | RIVASTIGMINE-13.3-MG/24H-PLEISTER, DERMAAL | 2,574492 | STUK
115219 | RIVASTIGMINE TEVA PLEISTER TRANSDERM 13,3MG/24UUR | RIVASTIGMINE-13.3-MG/24H-PLEISTER, DERMAAL | 2,574492 | STUK
EU/1/98/066/004 | EXELON CAPSULE 3MG | RIVASTIGMINE-3-MG-CAPSULE | 0,561331 | STUK
EU/1/98/066/005 | EXELON CAPSULE 3MG | RIVASTIGMINE-3-MG-CAPSULE | 0,561331 | STUK
EU/1/09/599/005 | RIVASTIGMINE SANDOZ CAPSULE 3MG | RIVASTIGMINE-3-MG-CAPSULE | 0,561331 | STUK
EU/1/98/066/007 | EXELON CAPSULE 4,5MG | RIVASTIGMINE-4.5-MG-CAPSULE | 0,712146 | STUK
EU/1/98/066/008 | EXELON CAPSULE 4,5MG | RIVASTIGMINE-4.5-MG-CAPSULE | 0,712146 | STUK
EU/1/09/599/009 | RIVASTIGMINE SANDOZ CAPSULE 4,5MG | RIVASTIGMINE-4.5-MG-CAPSULE | 0,712146 | STUK
EU/1/98/066/020 | EXELON PLEISTER TRANSDERMAAL 4,6MG/24UUR | RIVASTIGMINE-4.6-MG/24H-PLEISTER, DERMAAL | 1,786657 | STUK
110688 | RIVASTIGMINE TEVA PLEISTER TRANSDERM 4,6MG/24UUR | RIVASTIGMINE-4.6-MG/24H-PLEISTER, DERMAAL | 1,786657 | STUK
EU/1/98/066/010 | EXELON CAPSULE 6MG | RIVASTIGMINE-6-MG-CAPSULE | 0,722307 | STUK
EU/1/98/066/011 | EXELON CAPSULE 6MG | RIVASTIGMINE-6-MG-CAPSULE | 0,722307 | STUK
EU/1/98/092/011 | PROMETAX CAPSULE 6MG | RIVASTIGMINE-6-MG-CAPSULE | 0,722307 | STUK
EU/1/09/599/013 | RIVASTIGMINE SANDOZ CAPSULE 6MG | RIVASTIGMINE-6-MG-CAPSULE | 0,722307 | STUK
EU/1/98/066/024 | EXELON PLEISTER TRANSDERMAAL 9,5MG/24UUR | RIVASTIGMINE-9.5-MG/24H-PLEISTER, DERMAAL | 1,776452 | STUK
113176 | RIVASTIGMINE SANDOZ PLEISTER TRANSDERM 9,5MG/24U | RIVASTIGMINE-9.5-MG/24H-PLEISTER, DERMAAL | 1,776452 | STUK
110689 | RIVASTIGMINE TEVA PLEISTER TRANSDERM 9,5MG/24UUR | RIVASTIGMINE-9.5-MG/24H-PLEISTER, DERMAAL | 1,776452 | STUK
123471//21818 | MAXALT SMELTTABLET 10MG | RIZATRIPTAN-10-MG-SMELTTABLET | 3,245427 | STUK
123490//21818 | MAXALT SMELTTABLET 10MG | RIZATRIPTAN-10-MG-SMELTTABLET | 3,245427 | STUK
119592//21818 | MAXALT SMELTTABLET 10MG | RIZATRIPTAN-10-MG-SMELTTABLET | 3,430052 | STUK
21818 | MAXALT SMELTTABLET 10MG | RIZATRIPTAN-10-MG-SMELTTABLET | 3,798576 | STUK
29836//21818 | MAXALT SMELTTABLET 10MG | RIZATRIPTAN-10-MG-SMELTTABLET | 3,798576 | STUK
21816 | MAXALT TABLET 10MG | RIZATRIPTAN-10-MG-TABLET | 2,261322 | STUK
EU/1/08/497/005 | NPLATE INJPDR FLACON 250MCG + SOLV + TOEBEH | ROMIPLOSTIM-0.25-MG-POED. V. INJECTIE, FLACON | 583,567429 | STUK
EU/1/08/497/007 | NPLATE INJPDR FLACON 500MCG + SOLV + TOEBEH | ROMIPLOSTIM-0.5-MG-POED. V. INJECTIE, FLACON | 1125,333906 | STUK
31670 | ADARTREL STARTVERPAKKING TABLET FILMOMHULD 0,25MG | ROPINIROL-.25-MG-TABLET | 0,272735 | STUK
20761 | REQUIP TABLET OMHULD 0,25MG | ROPINIROL-.25-MG-TABLET | 0,280469 | STUK
103720 | ROPINIROL GLENMARK TABLET FILMOMHULD 0,25MG | ROPINIROL-.25-MG-TABLET | 0,252693 | STUK
34856 | ROPINIROL MYLAN TABLET FILMOMHULD 0,25MG | ROPINIROL-.25-MG-TABLET | 0,280469 | STUK
101690 | ROPINIROL PCH TABLET FILMOMHULD 0,25MG | ROPINIROL-.25-MG-TABLET | 0,280469 | STUK
20763 | REQUIP TABLET OMHULD 1MG | ROPINIROL-1-MG-TABLET | 0,432886 | STUK
103722 | ROPINIROL GLENMARK TABLET FILMOMHULD 1MG | ROPINIROL-1-MG-TABLET | 0,384875 | STUK
34858 | ROPINIROL MYLAN TABLET FILMOMHULD 1MG | ROPINIROL-1-MG-TABLET | 0,432886 | STUK
101692 | ROPINIROL PCH TABLET FILMOMHULD 1MG | ROPINIROL-1-MG-TABLET | 0,432886 | STUK
31673 | ADARTREL TABLET FILMOMHULD 2MG | ROPINIROL-2-MG-TABLET | 0,701155 | STUK
20764 | REQUIP TABLET OMHULD 2MG | ROPINIROL-2-MG-TABLET | 0,701155 | STUK
103723 | ROPINIROL GLENMARK TABLET FILMOMHULD 2MG | ROPINIROL-2-MG-TABLET | 0,594794 | STUK
101693 | ROPINIROL PCH TABLET FILMOMHULD 2MG | ROPINIROL-2-MG-TABLET | 0,701155 | STUK
125352//100571 | REQUIP MODUTAB TABLET MVA 2MG | ROPINIROL-2-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,339553 | STUK
100571 | REQUIP MODUTAB TABLET MVA 2MG | ROPINIROL-2-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,451355 | STUK
109023 | ROPINIROL AUROBINDO RETARD TABLET MVA 2MG | ROPINIROL-2-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,451355 | STUK
108338 | ROPINIROL CF RETARD TABLET MVA 2MG | ROPINIROL-2-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,406220 | STUK
106214 | ROPINIROL SANDOZ RETARD TABLET MGA 2MG | ROPINIROL-2-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,451355 | STUK
106222 | ROPINIROL TEVA RETARD TABLET MGA 2MG | ROPINIROL-2-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,451355 | STUK
118820//100574 | REQUIP MODUTAB TABLET MVA 4MG | ROPINIROL-4-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,787082 | STUK
100574 | REQUIP MODUTAB TABLET MVA 4MG | ROPINIROL-4-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,874535 | STUK
109027 | ROPINIROL AUROBINDO RETARD TABLET MVA 4MG | ROPINIROL-4-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,874535 | STUK
108340 | ROPINIROL CF RETARD TABLET MVA 4MG | ROPINIROL-4-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,787082 | STUK
106215 | ROPINIROL SANDOZ RETARD TABLET MGA 4MG | ROPINIROL-4-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,874535 | STUK
106223 | ROPINIROL TEVA RETARD TABLET MGA 4MG | ROPINIROL-4-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,874535 | STUK
20765 | REQUIP TABLET OMHULD 5MG | ROPINIROL-5-MG-TABLET | 1,623904 | STUK
106929 | ROPINIROL AUROBINDO TABLET FILMOMHULD 5MG | ROPINIROL-5-MG-TABLET | 1,623904 | STUK
34860 | ROPINIROL MYLAN TABLET FILMOMHULD 5MG | ROPINIROL-5-MG-TABLET | 1,623904 | STUK
121612//100576 | REQUIP MODUTAB TABLET MVA 8MG | ROPINIROL-8-MG-TABLET, MET GEREGULEERDE AFGIFTE | 1,085100 | STUK
118821//100576 | REQUIP MODUTAB TABLET MVA 8MG | ROPINIROL-8-MG-TABLET, MET GEREGULEERDE AFGIFTE | 1,459112 | STUK
100576 | REQUIP MODUTAB TABLET MVA 8MG | ROPINIROL-8-MG-TABLET, MET GEREGULEERDE AFGIFTE | 1,621235 | STUK
109030 | ROPINIROL AUROBINDO RETARD TABLET MVA 8MG | ROPINIROL-8-MG-TABLET, MET GEREGULEERDE AFGIFTE | 1,621235 | STUK
108341 | ROPINIROL CF RETARD TABLET MVA 8MG | ROPINIROL-8-MG-TABLET, MET GEREGULEERDE AFGIFTE | 1,459112 | STUK
106216 | ROPINIROL SANDOZ RETARD TABLET MGA 8MG | ROPINIROL-8-MG-TABLET, MET GEREGULEERDE AFGIFTE | 1,621235 | STUK
106224 | ROPINIROL TEVA RETARD TABLET MGA 8MG | ROPINIROL-8-MG-TABLET, MET GEREGULEERDE AFGIFTE | 1,621235 | STUK
109412//26872 | CRESTOR TABLET FILMOMHULD 10MG | ROSUVASTATINE-10-MG-TABLET | 0,298488 | STUK
109991//26872 | CRESTOR TABLET FILMOMHULD 10MG | ROSUVASTATINE-10-MG-TABLET | 0,313990 | STUK
26872 | CRESTOR TABLET FILMOMHULD 10MG | ROSUVASTATINE-10-MG-TABLET | 0,313990 | STUK
31034//26872 | CRESTOR TABLET FILMOMHULD 10MG | ROSUVASTATINE-10-MG-TABLET | 0,313990 | STUK
119173 | ROSUVASTATINE ARISTO TABLET FILMOMHULD 10MG | ROSUVASTATINE-10-MG-TABLET | 0,298488 | STUK
111413//26873 | CRESTOR TABLET FILMOMHULD 20MG | ROSUVASTATINE-20-MG-TABLET | 0,385984 | STUK
26873 | CRESTOR TABLET FILMOMHULD 20MG | ROSUVASTATINE-20-MG-TABLET | 0,419618 | STUK
31035//26873 | CRESTOR TABLET FILMOMHULD 20MG | ROSUVASTATINE-20-MG-TABLET | 0,419618 | STUK
33507//26873 | CRESTOR TABLET FILMOMHULD 20MG | ROSUVASTATINE-20-MG-TABLET | 0,419618 | STUK
119174 | ROSUVASTATINE ARISTO TABLET FILMOMHULD 20MG | ROSUVASTATINE-20-MG-TABLET | 0,385984 | STUK
111388//26874 | CRESTOR TABLET FILMOMHULD 40MG | ROSUVASTATINE-40-MG-TABLET | 0,531837 | STUK
26874 | CRESTOR TABLET FILMOMHULD 40MG | ROSUVASTATINE-40-MG-TABLET | 0,531837 | STUK
31036//26874 | CRESTOR TABLET FILMOMHULD 40MG | ROSUVASTATINE-40-MG-TABLET | 0,531837 | STUK
32457//26874 | CRESTOR TABLET FILMOMHULD 40MG | ROSUVASTATINE-40-MG-TABLET | 0,531837 | STUK
113182 | ROSUVASTATINE MYLAN TABLET FILMOMHULD 40MG | ROSUVASTATINE-40-MG-TABLET | 0,531837 | STUK
123789//30823 | CRESTOR TABLET FILMOMHULD 5MG | ROSUVASTATINE-5-MG-TABLET | 0,254443 | STUK
30823 | CRESTOR TABLET FILMOMHULD 5MG | ROSUVASTATINE-5-MG-TABLET | 0,268435 | STUK
EU/1/05/331/033 | NEUPRO PLEISTER 8MG/24UUR | ROTIGOTINE-8-MG/24H-PLEISTER, DERMAAL | 4,933999 | STUK
EU/1/06/378/009 | INOVELON TABLET FILMOMHULD 200MG | RUFINAMIDE-200-MG-TABLET | 1,080976 | STUK
EU/1/06/378/016 | INOVELON TABLET FILMOMHULD 400MG | RUFINAMIDE-400-MG-TABLET | 2,075985 | STUK
34425 | RUPAFIN TABLET 10MG | RUPATADINE-10-MG-TABLET | 0,509411 | STUK
108903 | RUPAFIN DRANK 1MG/ML | RUPATADINE-1-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,078905 | ML
EU/1/12/773/015 | JAKAVI TABLET 10MG | RUXOLITINIB-10-MG-TABLET | 59,855835 | STUK
EU/1/12/773/008 | JAKAVI TABLET 15MG | RUXOLITINIB-15-MG-TABLET | 59,950632 | STUK
EU/1/12/773/011 | JAKAVI TABLET 20MG | RUXOLITINIB-20-MG-TABLET | 59,950632 | STUK
EU/1/12/773/005 | JAKAVI TABLET 5MG | RUXOLITINIB-5-MG-TABLET | 30,125292 | STUK
EU/1/14/984/008 | XADAGO TABLET FILMOMHULD 100MG | SAFINAMIDE-100-MG-TABLET | 2,912486 | STUK
EU/1/14/984/003 | XADAGO TABLET FILMOMHULD 50MG | SAFINAMIDE-50-MG-TABLET | 2,869994 | STUK
22393 | AIROMIR AUTOHALER AEROSOL 100MCG/DO SPBS 200DO | SALBUTAMOL-.1-MG-AEROSOL BAI | 0,043023 | DOSIS
26971 | SALBUTAMOL 100 REDIHALER 100MCG/DO SPB 200D+INH | SALBUTAMOL-.1-MG-AEROSOL BAI | 0,043023 | DOSIS
29458 | SALBUTAMOL NOVOLIZER INHALPD NAVUL 100MCG/DO 200DO | SALBUTAMOL-.1-MG-INHALATIEPOEDER | 0,021979 | DOSIS
29458 | SALBUTAMOL NOVOLIZER PDR START 100MCG/DO 200DO+INH | SALBUTAMOL-.1-MG-INHALATIEPOEDER INCL INHALER | 0,039556 | DOSIS
19496 | VENTOLIN DISKUS INHPDR 200MCG 60DO | SALBUTAMOL-.2-MG-INHALATIEPOEDER INCL INHALER | 0,063076 | DOSIS
100332 | SALAMOL STERI-NEB VERNOPL 1MG/ML AMPUL 2,5ML | SALBUTAMOL-1-MG/ML-INHALATIEVLOEISTOF UNITDOSE | 0,074745 | ML
12587 | VENTOLIN 2,5 INHVLST 1MG/ML NEBULE 2,5ML | SALBUTAMOL-1-MG/ML-INHALATIEVLOEISTOF UNITDOSE | 0,072710 | ML
100333 | SALAMOL STERI-NEB VERNOPL 2MG/ML AMPUL 2,5ML | SALBUTAMOL-2-MG/ML-INHALATIEVLOEISTOF UNITDOSE | 0,105033 | ML
14590 | VENTOLIN 5,0 INHVLST 2MG/ML NEBULE 2,5ML | SALBUTAMOL-2-MG/ML-INHALATIEVLOEISTOF UNITDOSE | 0,105033 | ML
56751 | SALBUTAMOL PCH INHALATIEVLOEISTOF 5MG/ML | SALBUTAMOL-5-MG/ML-INHALATIEVLOEISTOF | 0,175379 | ML
6676 | VENTOLIN OPLOSSING INHALATIEVLOEISTOF 5MG/ML | SALBUTAMOL-5-MG/ML-INHALATIEVLOEISTOF | 0,175379 | ML
122896//9375 | DIPROSALIC ZALF | SALICYLIC ACID-30-MG/G-ZALF, CUTAAN-BETAMETHASONE-.5-MG/G-ZALF, CUTAAN | 0,120021 | G
29629//9375 | DIPROSALIC ZALF | SALICYLIC ACID-30-MG/G-ZALF, CUTAAN-BETAMETHASONE-.5-MG/G-ZALF, CUTAAN | 0,120021 | G
23110//9375 | DIPROSALIC ZALF | SALICYLIC ACID-30-MG/G-ZALF, CUTAAN-BETAMETHASONE-.5-MG/G-ZALF, CUTAAN | 0,136476 | G
9375 | DIPROSALIC ZALF | SALICYLIC ACID-30-MG/G-ZALF, CUTAAN-BETAMETHASONE-.5-MG/G-ZALF, CUTAAN | 0,136476 | G
102315//33735 | SEREVENT AEROSOL 25MCG/DO CFKVR SPBS 120DO + INH | SALMETEROL-.025-MG-AEROSOL | 0,182042 | DOSIS
112535//33735 | SEREVENT AEROSOL 25MCG/DO CFKVR SPBS 120DO + INH | SALMETEROL-.025-MG-AEROSOL | 0,182042 | DOSIS
120578//33735 | SEREVENT AEROSOL 25MCG/DO CFKVR SPBS 120DO + INH | SALMETEROL-.025-MG-AEROSOL | 0,182042 | DOSIS
121199//33735 | SEREVENT AEROSOL 25MCG/DO CFKVR SPBS 120DO + INH | SALMETEROL-.025-MG-AEROSOL | 0,182042 | DOSIS
122121//33735 | SEREVENT AEROSOL 25MCG/DO CFKVR SPBS 120DO + INH | SALMETEROL-.025-MG-AEROSOL | 0,182042 | DOSIS
33735 | SEREVENT AEROSOL 25MCG/DO CFKVR SPBS 120DO + INH | SALMETEROL-.025-MG-AEROSOL | 0,182042 | DOSIS
110490//33735 | SEREVENT AEROSOL 25MCG/DO CFKVR SPBS 120DO + INH | SALMETEROL-.025-MG-AEROSOL | 0,186505 | DOSIS
116397//33735 | SEREVENT AEROSOL 25MCG/DO CFKVR SPBS 120DO + INH | SALMETEROL-.025-MG-AEROSOL | 0,186505 | DOSIS
122757//33735 | SEREVENT AEROSOL 25MCG/DO CFKVR SPBS 120DO + INH | SALMETEROL-.025-MG-AEROSOL | 0,186505 | DOSIS
113645//25865 | SERETIDE AEROSOL 25/ 50MCG/DO CFKVR SPBS 120DO+INH | SALMETEROL-.025-MG-AEROSOL-FLUTICASONE-.05-MG-AEROSOL | 0,165258 | DOSIS
25865 | SERETIDE AEROSOL 25/ 50MCG/DO CFKVR SPBS 120DO+INH | SALMETEROL-.025-MG-AEROSOL-FLUTICASONE-.05-MG-AEROSOL | 0,177358 | DOSIS
25866 | SERETIDE AEROSOL 25/125MCG/DO CFKVR SPBS 120DO+INH | SALMETEROL-.025-MG-AEROSOL-FLUTICASONE-.125-MG-AEROSOL | 0,211031 | DOSIS
25867 | SERETIDE AEROSOL 25/250MCG/DO CFKVR SPBS 120DO+INH | SALMETEROL-.025-MG-AEROSOL-FLUTICASONE-.25-MG-AEROSOL | 0,227263 | DOSIS
105277//18150 | SEREVENT DISKUS INHPDR 50MCG 60DO | SALMETEROL-.05-MG-INHALATIEPOEDER INCL INHALER | 0,409615 | DOSIS
125829//18150 | SEREVENT DISKUS INHPDR 50MCG 60DO | SALMETEROL-.05-MG-INHALATIEPOEDER INCL INHALER | 0,409615 | DOSIS
126973//18150 | SEREVENT DISKUS INHPDR 50MCG 60DO | SALMETEROL-.05-MG-INHALATIEPOEDER INCL INHALER | 0,409615 | DOSIS
127518//18150 | SEREVENT DISKUS INHPDR 50MCG 60DO | SALMETEROL-.05-MG-INHALATIEPOEDER INCL INHALER | 0,409615 | DOSIS
18150 | SEREVENT DISKUS INHPDR 50MCG 60DO | SALMETEROL-.05-MG-INHALATIEPOEDER INCL INHALER | 0,409615 | DOSIS
119948//18150 | SEREVENT DISKUS INHPDR 50MCG 60DO | SALMETEROL-.05-MG-INHALATIEPOEDER INCL INHALER | 0,422977 | DOSIS
122998 | SALMETEROL/FLUTICASON NEUTEC INHPDR 50/100MCG 60DO | SALMETEROL-.05-MG-INHALATIEPOEDER INCL INHALER-FLUTICASONE-.1-MG-INHALATIEPOEDER INCL INHALER | 0,321890 | DOSIS
124322//23529 | SERETIDE DISKUS INHPDR 50/100MCG 60DO | SALMETEROL-.05-MG-INHALATIEPOEDER INCL INHALER-FLUTICASONE-.1-MG-INHALATIEPOEDER INCL INHALER | 0,322607 | DOSIS
126967//23529 | SERETIDE DISKUS INHPDR 50/100MCG 60DO | SALMETEROL-.05-MG-INHALATIEPOEDER INCL INHALER-FLUTICASONE-.1-MG-INHALATIEPOEDER INCL INHALER | 0,322607 | DOSIS
122879//23529 | SERETIDE DISKUS INHPDR 50/100MCG 60DO | SALMETEROL-.05-MG-INHALATIEPOEDER INCL INHALER-FLUTICASONE-.1-MG-INHALATIEPOEDER INCL INHALER | 0,338906 | DOSIS
111727//23529 | SERETIDE DISKUS INHPDR 50/100MCG 60DO | SALMETEROL-.05-MG-INHALATIEPOEDER INCL INHALER-FLUTICASONE-.1-MG-INHALATIEPOEDER INCL INHALER | 0,365003 | DOSIS
23529 | SERETIDE DISKUS INHPDR 50/100MCG 60DO | SALMETEROL-.05-MG-INHALATIEPOEDER INCL INHALER-FLUTICASONE-.1-MG-INHALATIEPOEDER INCL INHALER | 0,365003 | DOSIS
110377 | SALMETEROL/FLUTICASON ELPEN INHPDR 50/250MCG 60DO | SALMETEROL-.05-MG-INHALATIEPOEDER INCL INHALER-FLUTICASONE-.25-MG-INHALATIEPOEDER INCL INHALER | 0,417411 | DOSIS
123002 | SALMETEROL/FLUTICASON NEUTEC INHPDR 50/250MCG 60DO | SALMETEROL-.05-MG-INHALATIEPOEDER INCL INHALER-FLUTICASONE-.25-MG-INHALATIEPOEDER INCL INHALER | 0,417411 | DOSIS
122635//23530 | SERETIDE DISKUS INHPDR 50/250MCG 60DO | SALMETEROL-.05-MG-INHALATIEPOEDER INCL INHALER-FLUTICASONE-.25-MG-INHALATIEPOEDER INCL INHALER | 0,417411 | DOSIS
123229//23530 | SERETIDE DISKUS INHPDR 50/250MCG 60DO | SALMETEROL-.05-MG-INHALATIEPOEDER INCL INHALER-FLUTICASONE-.25-MG-INHALATIEPOEDER INCL INHALER | 0,417411 | DOSIS
125539//23530 | SERETIDE DISKUS INHPDR 50/250MCG 60DO | SALMETEROL-.05-MG-INHALATIEPOEDER INCL INHALER-FLUTICASONE-.25-MG-INHALATIEPOEDER INCL INHALER | 0,417411 | DOSIS
126092//23530 | SERETIDE DISKUS INHPDR 50/250MCG 60DO | SALMETEROL-.05-MG-INHALATIEPOEDER INCL INHALER-FLUTICASONE-.25-MG-INHALATIEPOEDER INCL INHALER | 0,417411 | DOSIS
23530 | SERETIDE DISKUS INHPDR 50/250MCG 60DO | SALMETEROL-.05-MG-INHALATIEPOEDER INCL INHALER-FLUTICASONE-.25-MG-INHALATIEPOEDER INCL INHALER | 0,417411 | DOSIS
27283//23530 | SERETIDE DISKUS INHPDR 50/250MCG 60DO | SALMETEROL-.05-MG-INHALATIEPOEDER INCL INHALER-FLUTICASONE-.25-MG-INHALATIEPOEDER INCL INHALER | 0,417411 | DOSIS
108737//23530 | SERETIDE DISKUS INHPDR 50/250MCG 60DO | SALMETEROL-.05-MG-INHALATIEPOEDER INCL INHALER-FLUTICASONE-.25-MG-INHALATIEPOEDER INCL INHALER | 0,418356 | DOSIS
116077//23530 | SERETIDE DISKUS INHPDR 50/250MCG 60DO | SALMETEROL-.05-MG-INHALATIEPOEDER INCL INHALER-FLUTICASONE-.25-MG-INHALATIEPOEDER INCL INHALER | 0,418356 | DOSIS
117009//23530 | SERETIDE DISKUS INHPDR 50/250MCG 60DO | SALMETEROL-.05-MG-INHALATIEPOEDER INCL INHALER-FLUTICASONE-.25-MG-INHALATIEPOEDER INCL INHALER | 0,418356 | DOSIS
122667//23530 | SERETIDE DISKUS INHPDR 50/250MCG 60DO | SALMETEROL-.05-MG-INHALATIEPOEDER INCL INHALER-FLUTICASONE-.25-MG-INHALATIEPOEDER INCL INHALER | 0,418356 | DOSIS
124145//23530 | SERETIDE DISKUS INHPDR 50/250MCG 60DO | SALMETEROL-.05-MG-INHALATIEPOEDER INCL INHALER-FLUTICASONE-.25-MG-INHALATIEPOEDER INCL INHALER | 0,418356 | DOSIS
126953//23530 | SERETIDE DISKUS INHPDR 50/250MCG 60DO | SALMETEROL-.05-MG-INHALATIEPOEDER INCL INHALER-FLUTICASONE-.25-MG-INHALATIEPOEDER INCL INHALER | 0,418356 | DOSIS
25673//23530 | SERETIDE DISKUS INHPDR 50/250MCG 60DO | SALMETEROL-.05-MG-INHALATIEPOEDER INCL INHALER-FLUTICASONE-.25-MG-INHALATIEPOEDER INCL INHALER | 0,418356 | DOSIS
123679//116003 | AIRFLUSAL FORSPIRO INHALPDR 50/500MCG/DO 60DO | SALMETEROL-.05-MG-INHALATIEPOEDER INCL INHALER-FLUTICASONE-.5-MG-INHALATIEPOEDER INCL INHALER | 0,477168 | DOSIS
124050//116003 | AIRFLUSAL FORSPIRO INHALPDR 50/500MCG/DO 60DO | SALMETEROL-.05-MG-INHALATIEPOEDER INCL INHALER-FLUTICASONE-.5-MG-INHALATIEPOEDER INCL INHALER | 0,477168 | DOSIS
125756//116003 | AIRFLUSAL FORSPIRO INHALPDR 50/500MCG/DO 60DO | SALMETEROL-.05-MG-INHALATIEPOEDER INCL INHALER-FLUTICASONE-.5-MG-INHALATIEPOEDER INCL INHALER | 0,477168 | DOSIS
120133 | SALFLUTIN INHALPDR 50/500MCG 60DO | SALMETEROL-.05-MG-INHALATIEPOEDER INCL INHALER-FLUTICASONE-.5-MG-INHALATIEPOEDER INCL INHALER | 0,576425 | DOSIS
121013 | SALFULER EASYHALER INHPDR 50/500MCG 60DO | SALMETEROL-.05-MG-INHALATIEPOEDER INCL INHALER-FLUTICASONE-.5-MG-INHALATIEPOEDER INCL INHALER | 0,576425 | DOSIS
110378 | SALMETEROL/FLUTICASON ELPEN INHPDR 50/500MCG 60DO | SALMETEROL-.05-MG-INHALATIEPOEDER INCL INHALER-FLUTICASONE-.5-MG-INHALATIEPOEDER INCL INHALER | 0,477168 | DOSIS
123691 | SALMETEROL/FLUTICASON NEUTEC INHPDR 50/500MCG 60DO | SALMETEROL-.05-MG-INHALATIEPOEDER INCL INHALER-FLUTICASONE-.5-MG-INHALATIEPOEDER INCL INHALER | 0,477168 | DOSIS
116078//23531 | SERETIDE DISKUS INHPDR 50/500MCG 60DO | SALMETEROL-.05-MG-INHALATIEPOEDER INCL INHALER-FLUTICASONE-.5-MG-INHALATIEPOEDER INCL INHALER | 0,477168 | DOSIS
126180//23531 | SERETIDE DISKUS INHPDR 50/500MCG 60DO | SALMETEROL-.05-MG-INHALATIEPOEDER INCL INHALER-FLUTICASONE-.5-MG-INHALATIEPOEDER INCL INHALER | 0,477168 | DOSIS
126949//23531 | SERETIDE DISKUS INHPDR 50/500MCG 60DO | SALMETEROL-.05-MG-INHALATIEPOEDER INCL INHALER-FLUTICASONE-.5-MG-INHALATIEPOEDER INCL INHALER | 0,477168 | DOSIS
23531 | SERETIDE DISKUS INHPDR 50/500MCG 60DO | SALMETEROL-.05-MG-INHALATIEPOEDER INCL INHALER-FLUTICASONE-.5-MG-INHALATIEPOEDER INCL INHALER | 0,477168 | DOSIS
EU/1/08/481/001 | KUVAN OPLOSBARE TABLET 100MG | SAPROPTERIN-100-MG-BRUISTABLET | 22,843841 | STUK
EU/1/08/481/002 | KUVAN OPLOSBARE TABLET 100MG | SAPROPTERIN-100-MG-BRUISTABLET | 22,843841 | STUK
EU/1/17/1196/005 | KEVZARA INJVLST 150MG/1,14ML (131.6MG/ML) PEN | SARILUMAB-150-MG-INJ.VLOEISTOF, WWSP | 451,434943 | STUK
EU/1/17/1196/001 | KEVZARA INJVLST 150MG/1,14ML (131.6MG/ML) WWSP | SARILUMAB-150-MG-INJ.VLOEISTOF, WWSP | 451,434943 | STUK
EU/1/17/1196/007 | KEVZARA INJVLST 200MG/1,14ML (175MG/ML) PEN | SARILUMAB-200-MG-INJ.VLOEISTOF, WWSP | 451,434943 | STUK
EU/1/17/1196/003 | KEVZARA INJVLST 200MG/1,14ML (175MG/ML) WWSP | SARILUMAB-200-MG-INJ.VLOEISTOF, WWSP | 451,434943 | STUK
EU/1/09/545/014 | ONGLYZA TABLET 2,5MG | SAXAGLIPTIN-2.5-MG-TABLET | 1,454019 | STUK
EU/1/09/545/006 | ONGLYZA TABLET 5MG | SAXAGLIPTIN-5-MG-TABLET | 1,147909 | STUK
EU/1/09/545/009 | ONGLYZA TABLET 5MG | SAXAGLIPTIN-5-MG-TABLET | 1,147909 | STUK
9709 | SCOPODERM TTS PLEISTER 1,5MG | SCOPOLAMINE-0.33-MG/24H-PLEISTER, DERMAAL | 5,710703 | STUK
EU/1/15/1033/001 | KANUMA INFVLST CONC 2MG/ML FLACON 10ML | SEBELIPASE ALFA-2-MG/ML-INFUUSVLOEISTOF, FLACON | 821,386033 | ML
EU/1/14/980/005 | COSENTYX INJVLST 150MG/ML PEN 1ML | SECUKINUMAB-150-MG-INJ.VLOEISTOF, WWSP | 583,459215 | STUK
EU/1/14/980/003 | COSENTYX INJVLST 150MG/ML WWSP 1ML | SECUKINUMAB-150-MG-INJ.VLOEISTOF, WWSP | 583,459215 | STUK
19007 | SELEGILINE HCL SANDOZ TABLET 5MG | SELEGILINE-5-MG-TABLET | 0,375494 | STUK
EU/1/15/1083/003 | UPTRAVI TABLET FILMOMHULD 200MCG | SELEXIPAG-0.2-MG-TABLET | 54,446720 | STUK
EU/1/15/1083/002 | UPTRAVI TABLET FILMOMHULD 200MCG | SELEXIPAG-0.2-MG-TABLET | 58,789431 | STUK
EU/1/15/1083/004 | UPTRAVI TABLET FILMOMHULD 400MCG | SELEXIPAG-0.4-MG-TABLET | 58,789443 | STUK
EU/1/15/1083/005 | UPTRAVI TABLET FILMOMHULD 600MCG | SELEXIPAG-0.6-MG-TABLET | 54,447650 | STUK
EU/1/15/1083/010 | UPTRAVI TABLET FILMOMHULD 1600MCG | SELEXIPAG-1.6-MG-TABLET | 54,923424 | STUK
EU/1/15/1083/007 | UPTRAVI TABLET FILMOMHULD 1000MCG | SELEXIPAG-1-MG-TABLET | 58,789443 | STUK
EU/1/17/1251/002 | OZEMPIC 0,25 INJVST 1,34MG/ML PEN 1,5ML+TOEB START | SEMAGLUTIDE-0.25-MG-INJ.VLOEISTOF, WWSP | 86,185417 | STUK
EU/1/17/1251/003 | OZEMPIC 0,5 INJVLST 1,34MG/ML PEN 1,5ML + TOEBEH | SEMAGLUTIDE-0.5-MG-INJ.VLOEISTOF, WWSP | 86,185417 | STUK
EU/1/17/1251/004 | OZEMPIC 0,5 INJVLST 1,34MG/ML PEN 1,5ML + TOEBEH | SEMAGLUTIDE-0.5-MG-INJ.VLOEISTOF, WWSP | 86,185417 | STUK
EU/1/17/1251/005 | OZEMPIC 1 INJVLST 1,34MG/ML PEN 3ML + TOEBEH | SEMAGLUTIDE-1-MG-INJ.VLOEISTOF, WWSP | 86,185417 | STUK
EU/1/17/1251/006 | OZEMPIC 1 INJVLST 1,34MG/ML PEN 3ML + TOEBEH | SEMAGLUTIDE-1-MG-INJ.VLOEISTOF, WWSP | 86,185417 | STUK
20613 | SERDOLECT TABLET FILMOMHULD 16MG | SERTINDOLE-16-MG-TABLET | 3,739658 | STUK
20610 | SERDOLECT TABLET FILMOMHULD 4MG | SERTINDOLE-4-MG-TABLET | 0,967741 | STUK
33644 | SERTRALINE AUROBINDO TABLET FILMOMHULD 100MG | SERTRALINE-100-MG-TABLET | 0,425543 | STUK
32679 | SERTRALINE MYLAN TABLET FILMOMHULD 100MG | SERTRALINE-100-MG-TABLET | 0,425543 | STUK
28402 | SERTRALINE TEVA TABLET FILMOMHULD 100MG | SERTRALINE-100-MG-TABLET | 0,425543 | STUK
32678 | SERTRALINE MYLAN TABLET FILMOMHULD 50MG | SERTRALINE-50-MG-TABLET | 0,261588 | STUK
31054 | SERTRALINE SANDOZ TABLET FILMOMHULD 50MG | SERTRALINE-50-MG-TABLET | 0,262748 | STUK
30288 | SERTRALINE SUN TABLET FILMOMHULD 50MG | SERTRALINE-50-MG-TABLET | 0,261588 | STUK
28401 | SERTRALINE TEVA TABLET FILMOMHULD 50MG | SERTRALINE-50-MG-TABLET | 0,262748 | STUK
16292 | ZOLOFT TABLET FILMOMHULD 50MG | SERTRALINE-50-MG-TABLET | 0,261588 | STUK
120699//16292 | ZOLOFT TABLET FILMOMHULD 50MG | SERTRALINE-50-MG-TABLET | 0,262748 | STUK
EU/1/09/521/006 | RENVELA POEDER VOOR SUSPENSIE 2,4G IN SACHET | SEVELAMER-2400-MG-POEDER/GRANULAAT, ORAAL | 2,748986 | STUK
EU/1/09/521/007 | RENVELA POEDER VOOR SUSPENSIE 2,4G IN SACHET | SEVELAMER-2400-MG-POEDER/GRANULAAT, ORAAL | 2,748986 | STUK
119580 | SEVELAMEERCARBONAAT AUROBINDO PDR V SUSP 2,4G SACH | SEVELAMER-2400-MG-POEDER/GRANULAAT, ORAAL | 2,748986 | STUK
117860 | SEVELAMEERCARBONAAT SANDOZ PDR V SUSP 2,4G SACHET | SEVELAMER-2400-MG-POEDER/GRANULAAT, ORAAL | 2,748986 | STUK
EU/1/99/123/008 | RENAGEL TABLET FILMOMHULD 800MG | SEVELAMER-800-MG-TABLET | 0,731127 | STUK
EU/1/99/123/012 | RENAGEL TABLET FILMOMHULD 800MG | SEVELAMER-800-MG-TABLET | 0,731127 | STUK
EU/1/09/521/003 | RENVELA TABLET FILMOMHULD 800MG | SEVELAMER-800-MG-TABLET | 0,812363 | STUK
112714 | SEVELAMER-CARBONAAT GENTHON TABLET FILMOMH 800MG | SEVELAMER-800-MG-TABLET | 0,645482 | STUK
EU/1/05/318/003 | REVATIO POEDER VOOR SUSPENSIE 10MG/ML | SILDENAFIL-10-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 2,498680 | ML
EU/1/05/318/001 | REVATIO TABLET FILMOMHULD 20MG | SILDENAFIL-20-MG-TABLET | 3,921463 | STUK
EU/1/09/607/004 | SILODYX CAPSULE 4MG | SILODOSINE-4-MG-CAPSULE | 0,397239 | STUK
EU/1/09/607/011 | SILODYX CAPSULE 8MG | SILODOSINE-8-MG-CAPSULE | 0,325388 | STUK
27556 | SIMVASTATINE APOTEX TABLET FILMOMHULD 10MG | SIMVASTATIN-10-MG-TABLET | 0,168302 | STUK
33009 | SIMVASTATINE SANDOZ TABLET FILMOMHULD 10MG | SIMVASTATIN-10-MG-TABLET | 0,168302 | STUK
107356 | SIMVASTATINE TEVA TABLET FILMOMHULD 10MG | SIMVASTATIN-10-MG-TABLET | 0,168302 | STUK
13193 | ZOCOR TABLET 10MG | SIMVASTATIN-10-MG-TABLET | 0,168302 | STUK
27557 | SIMVASTATINE APOTEX TABLET FILMOMHULD 20MG | SIMVASTATIN-20-MG-TABLET | 0,188368 | STUK
28508 | SIMVASTATINE CF TABLET FILMOMHULD 20MG | SIMVASTATIN-20-MG-TABLET | 0,188368 | STUK
107357 | SIMVASTATINE TEVA TABLET FILMOMHULD 20MG | SIMVASTATIN-20-MG-TABLET | 0,188368 | STUK
13194 | ZOCOR TABLET 20MG | SIMVASTATIN-20-MG-TABLET | 0,188368 | STUK
118166 | EZETIMIBE/SIMVASTATINE CF TABLET 10/20MG | SIMVASTATIN-20-MG-TABLET-EZETIMIB-10-MG-TABLET | 1,158658 | STUK
115284 | EZETIMIBE/SIMVASTATINE MYLAN TABLET 10/20MG | SIMVASTATIN-20-MG-TABLET-EZETIMIB-10-MG-TABLET | 0,833992 | STUK
116797 | EZETIMIBE/SIMVASTATINE SUN TABLET 10/20MG | SIMVASTATIN-20-MG-TABLET-EZETIMIB-10-MG-TABLET | 0,833992 | STUK
118368 | EZETIMIBE/SIMVASTATINE TEVA TABLET 10/20MG | SIMVASTATIN-20-MG-TABLET-EZETIMIB-10-MG-TABLET | 0,833992 | STUK
120533 | EZETIMIBE/SIMVASTATINE TEVA TABLET 10/20MG | SIMVASTATIN-20-MG-TABLET-EZETIMIB-10-MG-TABLET | 0,833992 | STUK
124150//30928 | INEGY TABLET 10/20MG | SIMVASTATIN-20-MG-TABLET-EZETIMIB-10-MG-TABLET | 0,833992 | STUK
126254//30928 | INEGY TABLET 10/20MG | SIMVASTATIN-20-MG-TABLET-EZETIMIB-10-MG-TABLET | 0,833992 | STUK
111948//30928 | INEGY TABLET 10/20MG | SIMVASTATIN-20-MG-TABLET-EZETIMIB-10-MG-TABLET | 1,287398 | STUK
30928 | INEGY TABLET 10/20MG | SIMVASTATIN-20-MG-TABLET-EZETIMIB-10-MG-TABLET | 1,287398 | STUK
27558 | SIMVASTATINE APOTEX TABLET FILMOMHULD 40MG | SIMVASTATIN-40-MG-TABLET | 0,244807 | STUK
28509 | SIMVASTATINE CF TABLET FILMOMHULD 40MG | SIMVASTATIN-40-MG-TABLET | 0,244807 | STUK
33011 | SIMVASTATINE SANDOZ TABLET FILMOMHULD 40MG | SIMVASTATIN-40-MG-TABLET | 0,244807 | STUK
107358 | SIMVASTATINE TEVA TABLET FILMOMHULD 40MG | SIMVASTATIN-40-MG-TABLET | 0,244807 | STUK
13195 | ZOCOR TABLET 40MG | SIMVASTATIN-40-MG-TABLET | 0,244807 | STUK
118167 | EZETIMIBE/SIMVASTATINE CF TABLET 10/40MG | SIMVASTATIN-40-MG-TABLET-EZETIMIB-10-MG-TABLET | 0,946738 | STUK
121349 | EZETIMIBE/SIMVASTATINE GLENMARK TABLET 10/40MG | SIMVASTATIN-40-MG-TABLET-EZETIMIB-10-MG-TABLET | 0,946738 | STUK
115286 | EZETIMIBE/SIMVASTATINE MYLAN TABLET 10/40MG | SIMVASTATIN-40-MG-TABLET-EZETIMIB-10-MG-TABLET | 0,946738 | STUK
116798 | EZETIMIBE/SIMVASTATINE SUN TABLET 10/40MG | SIMVASTATIN-40-MG-TABLET-EZETIMIB-10-MG-TABLET | 0,946738 | STUK
118370 | EZETIMIBE/SIMVASTATINE TEVA TABLET 10/40MG | SIMVASTATIN-40-MG-TABLET-EZETIMIB-10-MG-TABLET | 0,946738 | STUK
120534 | EZETIMIBE/SIMVASTATINE TEVA TABLET 10/40MG | SIMVASTATIN-40-MG-TABLET-EZETIMIB-10-MG-TABLET | 0,946738 | STUK
126253//30929 | INEGY TABLET 10/40MG | SIMVASTATIN-40-MG-TABLET-EZETIMIB-10-MG-TABLET | 0,946738 | STUK
103536//30929 | INEGY TABLET 10/40MG | SIMVASTATIN-40-MG-TABLET-EZETIMIB-10-MG-TABLET | 1,218767 | STUK
30929 | INEGY TABLET 10/40MG | SIMVASTATIN-40-MG-TABLET-EZETIMIB-10-MG-TABLET | 1,218767 | STUK
115287 | EZETIMIBE/SIMVASTATINE MYLAN TABLET 10/80MG | SIMVASTATIN-80-MG-TABLET-EZETIMIB-10-MG-TABLET | 1,794925 | STUK
120535 | EZETIMIBE/SIMVASTATINE TEVA TABLET 10/80MG | SIMVASTATIN-80-MG-TABLET-EZETIMIB-10-MG-TABLET | 1,794925 | STUK
118876//30930 | INEGY TABLET 10/80MG | SIMVASTATIN-80-MG-TABLET-EZETIMIB-10-MG-TABLET | 1,615433 | STUK
30930 | INEGY TABLET 10/80MG | SIMVASTATIN-80-MG-TABLET-EZETIMIB-10-MG-TABLET | 1,794925 | STUK
110904 | VEREGEN ZALF 100MG/G | SINECATECHINS-100-MG/G-ZALF, CUTAAN | 3,023754 | G
EU/1/01/171/001 | RAPAMUNE DRANK 1MG/ML | SIROLIMUS-1-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 4,459466 | ML
EU/1/01/171/008 | RAPAMUNE TABLET FILMOMHULD 1MG | SIROLIMUS-1-MG-TABLET | 4,141466 | STUK
EU/1/01/171/009 | RAPAMUNE TABLET FILMOMHULD 2MG | SIROLIMUS-2-MG-TABLET | 8,145142 | STUK
EU/1/01/171/010 | RAPAMUNE TABLET FILMOMHULD 2MG | SIROLIMUS-2-MG-TABLET | 8,145142 | STUK
EU/1/07/383/014 | JANUVIA TABLET FILMOMHULD 100MG | SITAGLIPTIN-100-MG-TABLET | 1,187863 | STUK
EU/1/07/383/017 | JANUVIA TABLET FILMOMHULD 100MG | SITAGLIPTIN-100-MG-TABLET | 1,187863 | STUK
EU/1/10/621/014 | RISTABEN TABLET FILMOMHULD 100MG | SITAGLIPTIN-100-MG-TABLET | 1,187863 | STUK
EU/1/07/382/014 | XELEVIA TABLET FILMOMHULD 100MG | SITAGLIPTIN-100-MG-TABLET | 1,187863 | STUK
EU/1/07/383/002 | JANUVIA TABLET FILMOMHULD 25MG | SITAGLIPTIN-25-MG-TABLET | 1,132564 | STUK
EU/1/10/621/002 | RISTABEN TABLET FILMOMHULD 25MG | SITAGLIPTIN-25-MG-TABLET | 1,132564 | STUK
EU/1/07/435/002 | TESAVEL TABLET FILMOMHULD 25MG | SITAGLIPTIN-25-MG-TABLET | 0,906737 | STUK
EU/1/07/382/002 | XELEVIA TABLET FILMOMHULD 25MG | SITAGLIPTIN-25-MG-TABLET | 1,132564 | STUK
EU/1/07/383/008 | JANUVIA TABLET FILMOMHULD 50MG | SITAGLIPTIN-50-MG-TABLET | 1,094289 | STUK
EU/1/10/621/008 | RISTABEN TABLET FILMOMHULD 50MG | SITAGLIPTIN-50-MG-TABLET | 1,094289 | STUK
EU/1/07/435/008 | TESAVEL TABLET FILMOMHULD 50MG | SITAGLIPTIN-50-MG-TABLET | 0,851124 | STUK
EU/1/07/382/008 | XELEVIA TABLET FILMOMHULD 50MG | SITAGLIPTIN-50-MG-TABLET | 1,094289 | STUK
EU/1/13/894/001 | SOVALDI TABLET FILMOMHULD 400MG | SOFOSBUVIR-400-MG-TABLET | 388,589940 | STUK
118119 | SOLIFENACINESUCCINAAT ACCORD TABLET FILMOMH 10MG | SOLIFENACINE-10-MG-TABLET | 0,613971 | STUK
115976 | SOLIFENACINESUCCINAAT MYLAN TABLET FILMOMHULD 10MG | SOLIFENACINE-10-MG-TABLET | 0,617970 | STUK
120514 | SOLIFENACINESUCCINAAT SANDOZ TABLET FILMOMH 10MG | SOLIFENACINE-10-MG-TABLET | 0,617970 | STUK
119103 | SOLIFENACINESUCCINAAT SUN TABLET FILMOMHULD 10MG | SOLIFENACINE-10-MG-TABLET | 0,613971 | STUK
117406 | SOLIFENACINESUCCINAAT TEVA TABLET FILMOMHULD 10MG | SOLIFENACINE-10-MG-TABLET | 0,617970 | STUK
124116//29152 | VESICARE TABLET FILMOMHULD 10MG | SOLIFENACINE-10-MG-TABLET | 0,613971 | STUK
125240//29152 | VESICARE TABLET FILMOMHULD 10MG | SOLIFENACINE-10-MG-TABLET | 0,613971 | STUK
125785//29152 | VESICARE TABLET FILMOMHULD 10MG | SOLIFENACINE-10-MG-TABLET | 0,613971 | STUK
29152 | VESICARE TABLET FILMOMHULD 10MG | SOLIFENACINE-10-MG-TABLET | 0,960461 | STUK
118118 | SOLIFENACINESUCCINAAT ACCORD TABLET FILMOMHULD 5MG | SOLIFENACINE-5-MG-TABLET | 0,507778 | STUK
115975 | SOLIFENACINESUCCINAAT MYLAN TABLET FILMOMHULD 5MG | SOLIFENACINE-5-MG-TABLET | 0,507778 | STUK
120513 | SOLIFENACINESUCCINAAT SANDOZ TABLET FILMOMHULD 5MG | SOLIFENACINE-5-MG-TABLET | 0,507778 | STUK
122396 | SOLIFENACINESUCCINAAT SUN TABLET FILMOMHULD 5MG | SOLIFENACINE-5-MG-TABLET | 0,507778 | STUK
117404 | SOLIFENACINESUCCINAAT TEVA TABLET FILMOMHULD 5MG | SOLIFENACINE-5-MG-TABLET | 0,507778 | STUK
125242//29151 | VESICARE TABLET FILMOMHULD 5MG | SOLIFENACINE-5-MG-TABLET | 0,507778 | STUK
125784//29151 | VESICARE TABLET FILMOMHULD 5MG | SOLIFENACINE-5-MG-TABLET | 0,507778 | STUK
29151 | VESICARE TABLET FILMOMHULD 5MG | SOLIFENACINE-5-MG-TABLET | 0,707746 | STUK
24225 | NORDITROPIN SIMPLEXX INJVLST 15MG/PATROON 1,5ML | SOMATROPIN-10-MG/ML-INJ.VLOEISTOF AMPUL | 298,162545 | ML
EU/1/06/332/011 | OMNITROPE SUREPAL INJVLST 15MG/PATROON 1,5ML | SOMATROPIN-10-MG/ML-INJ.VLOEISTOF AMPUL | 218,512546 | ML
102990 | ZOMACTON INJPDR FLACON 10MG + SOLV 1ML + TOEBEH | SOMATROPIN-10-MG-POED. V. INJECTIE, FLACON | 211,719359 | STUK
15790 | GENOTROPIN INJPDR PATROON 12MG + CONS+SOLV 1ML | SOMATROPIN-12-MG-POED. V. INJECTIE, PATROON | 256,380728 | STUK
17071 | HUMATROPE PENPATROON INJPDR PATR 12MG+SOLV 3,15ML | SOMATROPIN-12-MG-POED. V. INJECTIE, PATROON | 256,380728 | STUK
15790 | GENOTROPIN GOQUICK INJPDR 12MG+CONS+SV 1ML IN WWSP | SOMATROPIN-12-MG-POED. V. INJECTIE, WWSP | 248,519130 | STUK
17072 | HUMATROPE PENPATROON INJPDR PATR 24MG+SOLV 3,15ML | SOMATROPIN-24-MG-POED. V. INJECTIE, PATROON | 586,338540 | STUK
24223 | NORDITROPIN SIMPLEXX INJVLST 5MG/PATROON 1,5ML | SOMATROPIN-3.3-MG/ML-INJ.VLOEISTOF AMPUL | 89,277433 | ML
EU/1/06/332/014 | OMNITROPE SUREPAL INJVLST 5MG/PATROON 1,5ML | SOMATROPIN-3.3-MG/ML-INJ.VLOEISTOF AMPUL | 69,048335 | ML
105180 | NORDITROPIN FLEXPRO INJVLST 5MG/WWSP 1,5ML | SOMATROPIN-3.3-MG/ML-INJ.VLOEISTOF, WWSP | 79,325825 | ML
14593 | ZOMACTON INJPDR FLACON 4MG + SOLV 3,5ML + TOEBEH | SOMATROPIN-4-MG-POED. V. INJECTIE, FLACON | 116,292756 | STUK
EU/1/00/164/004 | NUTROPINAQ INJVLST 5MG/ML PATROON 2ML | SOMATROPIN-5-MG/ML-INJ.VLOEISTOF AMPUL | 103,269630 | ML
EU/1/00/164/003 | NUTROPINAQ INJVLST 5MG/ML PATROON 2ML | SOMATROPIN-5-MG/ML-INJ.VLOEISTOF AMPUL | 140,648441 | ML
24224 | NORDITROPIN SIMPLEXX INJVLST 10MG/PATROON 1,5ML | SOMATROPIN-6.7-MG/ML-INJ.VLOEISTOF AMPUL | 138,959185 | ML
EU/1/06/332/017 | OMNITROPE SUREPAL INJVLST 10MG/PATROON 1,5ML | SOMATROPIN-6.7-MG/ML-INJ.VLOEISTOF AMPUL | 138,959185 | ML
105181 | NORDITROPIN FLEXPRO INJVLST 10MG/WWSP 1,5ML | SOMATROPIN-6.7-MG/ML-INJ.VLOEISTOF, WWSP | 160,980400 | ML
17070 | HUMATROPE PENPATROON INJPDR PATR 6MG+SOLV 3,15ML | SOMATROPIN-6-MG-POED. V. INJECTIE, PATROON | 149,340716 | STUK
EU/1/06/342/001 | NEXAVAR TABLET FILMOMHULD 200MG | SORAFENIB-200-MG-TABLET | 30,784793 | STUK
19580 | SOTALOL HCL MYLAN TABLET 160MG | SOTALOL-160-MG-TABLET | 0,124165 | STUK
17706 | SOTALOL HCL SANDOZ TABLET 160MG | SOTALOL-160-MG-TABLET | 0,124165 | STUK
33884 | SOTALOL HCL TEVA TABLET 40MG | SOTALOL-40-MG-TABLET | 0,056291 | STUK
57480 | SOTALOL HCL CF TABLET 80MG | SOTALOL-80-MG-TABLET | 0,070841 | STUK
20329 | SOTALOL HCL FOCUS TABLET 80MG | SOTALOL-80-MG-TABLET | 0,063911 | STUK
19579 | SOTALOL HCL MYLAN TABLET 80MG | SOTALOL-80-MG-TABLET | 0,066411 | STUK
28268 | SOTALOL HCL PCH TABLET 80MG | SOTALOL-80-MG-TABLET | 0,070841 | STUK
17705 | SOTALOL HCL SANDOZ TABLET 80MG | SOTALOL-80-MG-TABLET | 0,070841 | STUK
24027 | SPIRONOLACTON ACCORD TABLET OMHULD 100MG | SPIRONOLACTONE-100-MG-TABLET | 0,191403 | STUK
23151 | SPIRONOLACTON SANDOZ TABLET 100MG | SPIRONOLACTONE-100-MG-TABLET | 0,191403 | STUK
55838 | SPIRONOLACTON TEVA TABLET 100MG | SPIRONOLACTONE-100-MG-TABLET | 0,191403 | STUK
18639 | SPIRONOLACTONUM TABLET 100MG | SPIRONOLACTONE-100-MG-TABLET | 0,191403 | STUK
24025 | SPIRONOLACTON ACCORD TABLET OMHULD 25MG | SPIRONOLACTONE-25-MG-TABLET | 0,068828 | STUK
25923 | SPIRONOLACTON MYLAN TABLET 25MG | SPIRONOLACTONE-25-MG-TABLET | 0,068828 | STUK
55837 | SPIRONOLACTON TEVA TABLET 25MG | SPIRONOLACTONE-25-MG-TABLET | 0,068828 | STUK
18637 | SPIRONOLACTONUM TABLET 25MG | SPIRONOLACTONE-25-MG-TABLET | 0,068828 | STUK
24026 | SPIRONOLACTON ACCORD TABLET OMHULD 50MG | SPIRONOLACTONE-50-MG-TABLET | 0,151588 | STUK
25924 | SPIRONOLACTON MYLAN TABLET 50MG | SPIRONOLACTONE-50-MG-TABLET | 0,156922 | STUK
23150 | SPIRONOLACTON SANDOZ TABLET 50MG | SPIRONOLACTONE-50-MG-TABLET | 0,156922 | STUK
55973 | SPIRONOLACTON TEVA TABLET 50MG | SPIRONOLACTONE-50-MG-TABLET | 0,156922 | STUK
18638 | SPIRONOLACTONUM TABLET 50MG | SPIRONOLACTONE-50-MG-TABLET | 0,151528 | STUK
EU/1/06/367/002 | DIACOMIT CAPSULE 250MG | STIRIPENTOL-250-MG-CAPSULE | 3,753108 | STUK
EU/1/06/367/008 | DIACOMIT POEDER VOOR SUSPENSIE 250MG IN SACHET | STIRIPENTOL-250-MG-POEDER/GRANULAAT, ORAAL | 3,753108 | STUK
EU/1/06/367/005 | DIACOMIT CAPSULE 500MG | STIRIPENTOL-500-MG-CAPSULE | 7,001286 | STUK
EU/1/06/367/011 | DIACOMIT POEDER VOOR SUSPENSIE 500MG IN SACHET | STIRIPENTOL-500-MG-POEDER/GRANULAAT, ORAAL | 7,001286 | STUK
16859 | SUCRALFAAT SANDOZ SUSPENSIE 200MG/ML IN ZAKJE 5ML | SUCRALFATE-200-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,192484 | ML
9233 | SUFENTA INJVLST 0,005MG/ML AMPUL 2ML | SUFENTANIL-.005-MG/ML-INJ.VLOEISTOF AMPUL | 0,185504 | ML
9233 | SUFENTA INJVLST 0,005MG/ML AMPUL 10ML | SUFENTANIL-.005-MG/ML-INJ.VLOEISTOF AMPUL | 0,185504 | ML
114609 | SUFENTANIL EUROCEPT INJVLST 5MCG/ML AMPUL 10ML | SUFENTANIL-.005-MG/ML-INJ.VLOEISTOF AMPUL | 0,186815 | ML
26151 | SUFENTANIL HAMELN INJVLST 5MCG/ML AMPUL 2ML | SUFENTANIL-.005-MG/ML-INJ.VLOEISTOF AMPUL | 0,185504 | ML
26151 | SUFENTANIL HAMELN INJVLST 5MCG/ML AMPUL 10ML | SUFENTANIL-.005-MG/ML-INJ.VLOEISTOF AMPUL | 0,185504 | ML
9232 | SUFENTA FORTE INJVLST 0,05MG/ML AMPUL 1ML | SUFENTANIL-.05-MG/ML-INJ.VLOEISTOF AMPUL | 1,256990 | ML
9232 | SUFENTA FORTE INJVLST 0,05MG/ML AMPUL 5ML | SUFENTANIL-.05-MG/ML-INJ.VLOEISTOF AMPUL | 1,256990 | ML
9232 | SUFENTA FORTE INJVLST 0,05MG/ML AMPUL 20ML | SUFENTANIL-.05-MG/ML-INJ.VLOEISTOF AMPUL | 1,256990 | ML
26152 | SUFENTANIL HAMELN INJVLST 50MCG/ML AMPUL 1ML | SUFENTANIL-.05-MG/ML-INJ.VLOEISTOF AMPUL | 1,256990 | ML
26152 | SUFENTANIL HAMELN INJVLST 50MCG/ML AMPUL 5ML | SUFENTANIL-.05-MG/ML-INJ.VLOEISTOF AMPUL | 1,256990 | ML
25565 | SUFENTANIL NARCOMED INJVLST 50MCG/ML AMPUL 1ML | SUFENTANIL-.05-MG/ML-INJ.VLOEISTOF AMPUL | 1,266073 | ML
6705 | FLAMMAZINE CREME 10MG/G | SULFADIAZINE-10-MG/G-CREME, CUTAAN | 0,058695 | G
55054 | ZILVERSULFADIAZINE CF CREME 10MG/G | SULFADIAZINE-10-MG/G-CREME, CUTAAN | 0,063242 | G
7231 | BACTRIMEL INFUSIEVLOEISTOF CONC AMPUL 5ML | SULFAMETHOXAZOLE-80-MG/ML-INJ.VLOEISTOF AMPUL-TRIMETHOPRIM-16-MG/ML-INJ.VLOEISTOF AMPUL | 0,898117 | ML
123796//5705 | SALAZOPYRINE EC TABLET MSR 500MG | SULFASALAZINE-500-MG-TABLET, MAAGSAPRESISTENT | 0,101636 | STUK
124363//5705 | SALAZOPYRINE EC TABLET MSR 500MG | SULFASALAZINE-500-MG-TABLET, MAAGSAPRESISTENT | 0,101636 | STUK
5705 | SALAZOPYRINE EC TABLET MSR 500MG | SULFASALAZINE-500-MG-TABLET, MAAGSAPRESISTENT | 0,117065 | STUK
15007 | SULFASALAZINE MYLAN TABLET MSR 500MG | SULFASALAZINE-500-MG-TABLET, MAAGSAPRESISTENT | 0,101636 | STUK
15836=9645 | SULFASALAZINE SANDOZ TABLET MSR 500MG | SULFASALAZINE-500-MG-TABLET, MAAGSAPRESISTENT | 0,117065 | STUK
9645 | SULFASALAZINE TEVA TABLET MSR 500MG | SULFASALAZINE-500-MG-TABLET, MAAGSAPRESISTENT | 0,117065 | STUK
103957//6279 | DOGMATIL CAPSULE 50MG | SULPIRIDE-50-MG-CAPSULE | 0,140011 | STUK
6279 | DOGMATIL CAPSULE 50MG | SULPIRIDE-50-MG-CAPSULE | 0,140011 | STUK
112033//29414 | IMIGRAN FTAB DISPERGEERBARE TABLET 100MG | SUMATRIPTAN-100-MG-BRUISTABLET | 9,361017 | STUK
119233//29414 | IMIGRAN FTAB DISPERGEERBARE TABLET 100MG | SUMATRIPTAN-100-MG-BRUISTABLET | 9,361017 | STUK
120235//29414 | IMIGRAN FTAB DISPERGEERBARE TABLET 100MG | SUMATRIPTAN-100-MG-BRUISTABLET | 9,361017 | STUK
124319//29414 | IMIGRAN FTAB DISPERGEERBARE TABLET 100MG | SUMATRIPTAN-100-MG-BRUISTABLET | 9,361017 | STUK
29414 | IMIGRAN FTAB DISPERGEERBARE TABLET 100MG | SUMATRIPTAN-100-MG-BRUISTABLET | 9,361017 | STUK
30623 | SUMATRIPTAN MYLAN TABLET OMHULD 100MG | SUMATRIPTAN-100-MG-TABLET | 2,948880 | STUK
31077 | SUMATRIPTAN SANDOZ TABLET OMHULD 100MG | SUMATRIPTAN-100-MG-TABLET | 2,948880 | STUK
31900 | SUMATRIPTAN TEVA TABLET OMHULD 100MG | SUMATRIPTAN-100-MG-TABLET | 2,948880 | STUK
124896//19469 | IMIGRAN NEUSSPRAY 10MG | SUMATRIPTAN-10-MG-NEUSSPRAY | 5,776690 | STUK
19469 | IMIGRAN NEUSSPRAY 10MG | SUMATRIPTAN-10-MG-NEUSSPRAY | 6,466901 | STUK
15009 | IMIGRAN INJVLST 12MG/ML PENFILLPATR 0,5ML | SUMATRIPTAN-12-MG/ML-INJ.VLOEISTOF, WWSP | 43,649967 | ML
15009 | IMIGRAN INJVLST 12MG/ML PENFILLPATR 0,5ML+GLAXOPEN | SUMATRIPTAN-12-MG/ML-INJ.VLOEISTOF, WWSP | 43,649967 | ML
102601 | SUMATRIPTAN SUN INJVLST 12MG/ML WWSP 0,5ML | SUMATRIPTAN-12-MG/ML-INJ.VLOEISTOF, WWSP | 43,649967 | ML
122542//19470 | IMIGRAN NEUSSPRAY 20MG | SUMATRIPTAN-20-MG-NEUSSPRAY | 7,156103 | STUK
123738//19470 | IMIGRAN NEUSSPRAY 20MG | SUMATRIPTAN-20-MG-NEUSSPRAY | 7,156103 | STUK
19470 | IMIGRAN NEUSSPRAY 20MG | SUMATRIPTAN-20-MG-NEUSSPRAY | 7,156103 | STUK
119232//29413 | IMIGRAN FTAB DISPERGEERBARE TABLET 50MG | SUMATRIPTAN-50-MG-BRUISTABLET | 4,950111 | STUK
120234//29413 | IMIGRAN FTAB DISPERGEERBARE TABLET 50MG | SUMATRIPTAN-50-MG-BRUISTABLET | 4,950111 | STUK
124300//29413 | IMIGRAN FTAB DISPERGEERBARE TABLET 50MG | SUMATRIPTAN-50-MG-BRUISTABLET | 4,950111 | STUK
112032//29413 | IMIGRAN FTAB DISPERGEERBARE TABLET 50MG | SUMATRIPTAN-50-MG-BRUISTABLET | 5,000033 | STUK
29413 | IMIGRAN FTAB DISPERGEERBARE TABLET 50MG | SUMATRIPTAN-50-MG-BRUISTABLET | 5,000033 | STUK
30622 | SUMATRIPTAN MYLAN TABLET OMHULD 50MG | SUMATRIPTAN-50-MG-TABLET | 1,904620 | STUK
31899 | SUMATRIPTAN PCH TABLET OMHULD 50MG | SUMATRIPTAN-50-MG-TABLET | 1,904620 | STUK
31076 | SUMATRIPTAN SANDOZ TABLET OMHULD 50MG | SUMATRIPTAN-50-MG-TABLET | 1,904620 | STUK
31899 | SUMATRIPTAN TEVA TABLET OMHULD 50MG | SUMATRIPTAN-50-MG-TABLET | 1,904620 | STUK
EU/1/06/347/001 | SUTENT CAPSULE 12,5MG | SUNITINIB-12.5-MG-CAPSULE | 38,984746 | STUK
EU/1/06/347/004 | SUTENT CAPSULE 12,5MG | SUNITINIB-12.5-MG-CAPSULE | 38,984746 | STUK
EU/1/06/347/002 | SUTENT CAPSULE 25MG | SUNITINIB-25-MG-CAPSULE | 77,618249 | STUK
EU/1/06/347/005 | SUTENT CAPSULE 25MG | SUNITINIB-25-MG-CAPSULE | 77,618249 | STUK
EU/1/06/347/003 | SUTENT CAPSULE 50MG | SUNITINIB-50-MG-CAPSULE | 154,811641 | STUK
EU/1/06/347/006 | SUTENT CAPSULE 50MG | SUNITINIB-50-MG-CAPSULE | 154,811641 | STUK
EU/1/02/201/001 | PROTOPIC ZALF 0,3MG/G | TACROLIMUS-.3-MG/G-ZALF, CUTAAN | 0,810917 | G
102092 | ADPORT CAPSULE 0,5MG | TACROLIMUS-.5-MG-CAPSULE | 1,172736 | STUK
120068//22236 | PROGRAF CAPSULE 0,5MG | TACROLIMUS-.5-MG-CAPSULE | 0,874849 | STUK
120727//22236 | PROGRAF CAPSULE 0,5MG | TACROLIMUS-.5-MG-CAPSULE | 0,874849 | STUK
121015//22236 | PROGRAF CAPSULE 0,5MG | TACROLIMUS-.5-MG-CAPSULE | 0,874849 | STUK
126573//22236 | PROGRAF CAPSULE 0,5MG | TACROLIMUS-.5-MG-CAPSULE | 0,874849 | STUK
35214//22236 | PROGRAF CAPSULE 0,5MG | TACROLIMUS-.5-MG-CAPSULE | 0,874849 | STUK
110288//22236 | PROGRAFT CAPSULE 0,5MG | TACROLIMUS-.5-MG-CAPSULE | 0,874849 | STUK
119036//22236 | PROGRAFT CAPSULE 0,5MG | TACROLIMUS-.5-MG-CAPSULE | 0,874849 | STUK
125025//22236 | PROGRAFT CAPSULE 0,5MG | TACROLIMUS-.5-MG-CAPSULE | 0,874849 | STUK
22236 | PROGRAFT CAPSULE 0,5MG | TACROLIMUS-.5-MG-CAPSULE | 0,874849 | STUK
113951//22236 | PROGRAFT CAPSULE 0,5MG | TACROLIMUS-.5-MG-CAPSULE | 1,055462 | STUK
EU/1/07/387/015 | ADVAGRAF CAPSULE MVA 0,5MG | TACROLIMUS-0.5-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,757603 | STUK
EU/1/07/387/016 | ADVAGRAF CAPSULE MVA 0,5MG | TACROLIMUS-0.5-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,757603 | STUK
EU/1/07/387/001 | ADVAGRAF CAPSULE MVA 0,5MG | TACROLIMUS-0.5-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 1,063154 | STUK
EU/1/07/387/002 | ADVAGRAF CAPSULE MVA 0,5MG | TACROLIMUS-0.5-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 1,063154 | STUK
EU/1/07/387/014 | ADVAGRAF CAPSULE MVA 0,5MG | TACROLIMUS-0.5-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 1,063154 | STUK
EU/1/14/935/001 | ENVARSUS TABLET MVA 0,75MG | TACROLIMUS-0.75-MG-TABLET, MET GEREGULEERDE AFGIFTE | 2,408735 | STUK
EU/1/02/201/003 | PROTOPIC ZALF 1MG/G | TACROLIMUS-1-MG/G-ZALF, CUTAAN | 0,650000 | G
EU/1/02/201/004 | PROTOPIC ZALF 1MG/G | TACROLIMUS-1-MG/G-ZALF, CUTAAN | 0,650000 | G
116338 | TAKROZEM ZALF 1MG/G | TACROLIMUS-1-MG/G-ZALF, CUTAAN | 0,650000 | G
127662//102094 | ADPORT CAPSULE 1MG | TACROLIMUS-1-MG-CAPSULE | 1,382555 | STUK
102094 | ADPORT CAPSULE 1MG | TACROLIMUS-1-MG-CAPSULE | 1,775635 | STUK
114831//18107 | PROGRAF CAPSULE 1MG | TACROLIMUS-1-MG-CAPSULE | 1,382555 | STUK
120728//18107 | PROGRAF CAPSULE 1MG | TACROLIMUS-1-MG-CAPSULE | 1,382555 | STUK
121026//18107 | PROGRAF CAPSULE 1MG | TACROLIMUS-1-MG-CAPSULE | 1,382555 | STUK
121092//18107 | PROGRAF CAPSULE 1MG | TACROLIMUS-1-MG-CAPSULE | 1,382555 | STUK
126575//18107 | PROGRAF CAPSULE 1MG | TACROLIMUS-1-MG-CAPSULE | 1,382555 | STUK
110289//18107 | PROGRAFT CAPSULE 1MG | TACROLIMUS-1-MG-CAPSULE | 1,382555 | STUK
118636//18107 | PROGRAFT CAPSULE 1MG | TACROLIMUS-1-MG-CAPSULE | 1,382555 | STUK
125314//18107 | PROGRAFT CAPSULE 1MG | TACROLIMUS-1-MG-CAPSULE | 1,382555 | STUK
125640//18107 | PROGRAFT CAPSULE 1MG | TACROLIMUS-1-MG-CAPSULE | 1,382555 | STUK
18107 | PROGRAFT CAPSULE 1MG | TACROLIMUS-1-MG-CAPSULE | 1,382555 | STUK
107939 | TACROLIMUS CF CAPSULE 1MG | TACROLIMUS-1-MG-CAPSULE | 1,598072 | STUK
EU/1/07/387/003 | ADVAGRAF CAPSULE MVA 1MG | TACROLIMUS-1-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 1,427471 | STUK
EU/1/07/387/004 | ADVAGRAF CAPSULE MVA 1MG | TACROLIMUS-1-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 1,427471 | STUK
EU/1/07/387/005 | ADVAGRAF CAPSULE MVA 1MG | TACROLIMUS-1-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 1,427471 | STUK
EU/1/07/387/017 | ADVAGRAF CAPSULE MVA 1MG | TACROLIMUS-1-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 1,427471 | STUK
EU/1/07/387/018 | ADVAGRAF CAPSULE MVA 1MG | TACROLIMUS-1-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 1,427471 | STUK
EU/1/07/387/019 | ADVAGRAF CAPSULE MVA 1MG | TACROLIMUS-1-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 1,427471 | STUK
EU/1/07/387/020 | ADVAGRAF CAPSULE MVA 1MG | TACROLIMUS-1-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 1,427471 | STUK
EU/1/14/935/005 | ENVARSUS TABLET MVA 1MG | TACROLIMUS-1-MG-TABLET, MET GEREGULEERDE AFGIFTE | 2,127481 | STUK
EU/1/14/935/004 | ENVARSUS TABLET MVA 1MG | TACROLIMUS-1-MG-TABLET, MET GEREGULEERDE AFGIFTE | 2,856096 | STUK
EU/1/07/387/011 | ADVAGRAF CAPSULE MVA 3MG | TACROLIMUS-3-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 4,208836 | STUK
EU/1/07/387/012 | ADVAGRAF CAPSULE MVA 3MG | TACROLIMUS-3-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 4,208836 | STUK
EU/1/07/387/021 | ADVAGRAF CAPSULE MVA 3MG | TACROLIMUS-3-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 4,208836 | STUK
EU/1/07/387/022 | ADVAGRAF CAPSULE MVA 3MG | TACROLIMUS-3-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 4,208836 | STUK
EU/1/07/387/023 | ADVAGRAF CAPSULE MVA 3MG | TACROLIMUS-3-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 4,208836 | STUK
EU/1/14/935/007 | ENVARSUS TABLET MVA 4MG | TACROLIMUS-4-MG-TABLET, MET GEREGULEERDE AFGIFTE | 10,769361 | STUK
18109 | PROGRAFT INFVLST CONC 5MG/ML AMPUL 1ML | TACROLIMUS-5-MG/ML-INFUUSVLOEISTOF, FLACON | 60,958539 | ML
102095 | ADPORT CAPSULE 5MG | TACROLIMUS-5-MG-CAPSULE | 7,848765 | STUK
125331//18108 | PROGRAF CAPSULE 5MG | TACROLIMUS-5-MG-CAPSULE | 5,812528 | STUK
127198//18108 | PROGRAF CAPSULE 5MG | TACROLIMUS-5-MG-CAPSULE | 5,812528 | STUK
120437//18108 | PROGRAF CAPSULE 5MG | TACROLIMUS-5-MG-CAPSULE | 7,063889 | STUK
116345//18108 | PROGRAFT CAPSULE 5MG | TACROLIMUS-5-MG-CAPSULE | 5,812528 | STUK
120013//18108 | PROGRAFT CAPSULE 5MG | TACROLIMUS-5-MG-CAPSULE | 5,812528 | STUK
125080//18108 | PROGRAFT CAPSULE 5MG | TACROLIMUS-5-MG-CAPSULE | 5,812528 | STUK
125750//18108 | PROGRAFT CAPSULE 5MG | TACROLIMUS-5-MG-CAPSULE | 5,812528 | STUK
18108 | PROGRAFT CAPSULE 5MG | TACROLIMUS-5-MG-CAPSULE | 5,812528 | STUK
EU/1/07/387/007 | ADVAGRAF CAPSULE MVA 5MG | TACROLIMUS-5-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 6,232623 | STUK
EU/1/07/387/008 | ADVAGRAF CAPSULE MVA 5MG | TACROLIMUS-5-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 6,232623 | STUK
EU/1/07/387/024 | ADVAGRAF CAPSULE MVA 5MG | TACROLIMUS-5-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 6,232623 | STUK
EU/1/07/387/025 | ADVAGRAF CAPSULE MVA 5MG | TACROLIMUS-5-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 6,232623 | STUK
EU/1/07/387/026 | ADVAGRAF CAPSULE MVA 5MG | TACROLIMUS-5-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 6,232623 | STUK
EU/1/11/717/001 | VYNDAQEL CAPSULE 20MG | TAFAMIDIS-20-MG-CAPSULE | 343,894354 | STUK
103823 | SAFLUTAN OOGDRUPPELS 15MCG/ML FLACON 0,3ML | TAFLUPROST-0.015-MG/ML-OOGDRUPPELS UNITDOSE | 1,965046 | ML
117799//103823 | SAFLUTAN OOGDRUPPELS 15MCG/ML FLACON 0,3ML | TAFLUPROST-0.015-MG/ML-OOGDRUPPELS UNITDOSE | 1,965046 | ML
123264//103823 | SAFLUTAN OOGDRUPPELS 15MCG/ML FLACON 0,3ML | TAFLUPROST-0.015-MG/ML-OOGDRUPPELS UNITDOSE | 1,965046 | ML
124286//103823 | SAFLUTAN OOGDRUPPELS 15MCG/ML FLACON 0,3ML | TAFLUPROST-0.015-MG/ML-OOGDRUPPELS UNITDOSE | 1,965046 | ML
127099//103823 | SAFLUTAN OOGDRUPPELS 15MCG/ML FLACON 0,3ML | TAFLUPROST-0.015-MG/ML-OOGDRUPPELS UNITDOSE | 1,965046 | ML
121155//103823 | TAFLUPROST FISHER OOGDRUPPELS 15MCG/ML FLAC 0,3ML | TAFLUPROST-0.015-MG/ML-OOGDRUPPELS UNITDOSE | 1,965046 | ML
122663//103823 | TAFLUPROST FISHER OOGDRUPPELS 15MCG/ML FLAC 0,3ML | TAFLUPROST-0.015-MG/ML-OOGDRUPPELS UNITDOSE | 1,965046 | ML
EU/1/15/1064/002 | IMLYGIC INJVLST 100MILJ PFU/ML FLACON 1ML | TALIMOGENE LAHERPAREPVEC-100-MIE/ML-INJECTIEVLOEISTOF, FLAC | 2243,538064 | ML
EU/1/15/1064/001 | IMLYGIC INJVLST 1MILJ PFU/ML FLACON 1ML | TALIMOGENE LAHERPAREPVEC-1-MIE/ML-INJECTIEVLOEISTOF, FLAC | 2243,538064 | ML
11197 | TAMOXIFEN MYLAN TABLET 10MG | TAMOXIFEN-10-MG-TABLET | 0,937214 | STUK
9322 | TAMOXIFEN PCH TABLET 10MG | TAMOXIFEN-10-MG-TABLET | 0,937214 | STUK
16766 | TAMOXIFEN SANDOZ TABLET 10MG | TAMOXIFEN-10-MG-TABLET | 0,937214 | STUK
24006=11198 | TAMOXIFEN APOTEX TABLET 20MG | TAMOXIFEN-20-MG-TABLET | 0,328841 | STUK
17116=10635 | TAMOXIFEN AUROBINDO TABLET 20MG | TAMOXIFEN-20-MG-TABLET | 0,328841 | STUK
11198 | TAMOXIFEN MYLAN TABLET 20MG | TAMOXIFEN-20-MG-TABLET | 0,328841 | STUK
10635 | TAMOXIFEN PCH TABLET 20MG | TAMOXIFEN-20-MG-TABLET | 0,328841 | STUK
16767 | TAMOXIFEN SANDOZ TABLET 20MG | TAMOXIFEN-20-MG-TABLET | 0,328841 | STUK
32582 | TAMSULOSINE HCL CF CAPSULE MGA 0,4MG | TAMSULOSIN-.4-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,245242 | STUK
32576 | TAMSULOSINE HCL GENTHON CAPSULE MGA 0,4MG | TAMSULOSIN-.4-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,245242 | STUK
32577 | TAMSULOSINE HCL MYLAN RETARD CAPSULE MGA 0,4MG | TAMSULOSIN-.4-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,245242 | STUK
32584 | TAMSULOSINE HCL TEVA RETARD CAPSULE MGA 0,4MG | TAMSULOSIN-.4-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,245242 | STUK
115733//30565 | OMNIC OCAS TABLET MVA 0,4MG | TAMSULOSIN-.4-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,295570 | STUK
119227//30565 | OMNIC OCAS TABLET MVA 0,4MG | TAMSULOSIN-.4-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,338752 | STUK
30565 | OMNIC OCAS TABLET MVA 0,4MG | TAMSULOSIN-.4-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,338752 | STUK
104130 | COMBODART CAPSULE 0,5/0,4MG | TAMSULOSIN-0.4-MG-CAPSULE, MET GEREGULEERDE AFGIFTE-DUTASTERIDE-0.5-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,716621 | STUK
123255//104130 | COMBODART CAPSULE 0,5/0,4MG | TAMSULOSIN-0.4-MG-CAPSULE, MET GEREGULEERDE AFGIFTE-DUTASTERIDE-0.5-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,716621 | STUK
123366//104130 | COMBODART CAPSULE 0,5/0,4MG | TAMSULOSIN-0.4-MG-CAPSULE, MET GEREGULEERDE AFGIFTE-DUTASTERIDE-0.5-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,716621 | STUK
126701//104130 | COMBODART CAPSULE 0,5/0,4MG | TAMSULOSIN-0.4-MG-CAPSULE, MET GEREGULEERDE AFGIFTE-DUTASTERIDE-0.5-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,716621 | STUK
120494 | DUTASTERIDE/TAMSULOSINE HCL FOCUS CAPS 0,5/0,4MG | TAMSULOSIN-0.4-MG-CAPSULE-DUTASTERIDE-0.5-MG-CAPSULE | 0,457688 | STUK
123106 | DUTASTERIDE/TAMSULOSINE HCL MYLAN CAPS 0,5/0,4MG | TAMSULOSIN-0.4-MG-CAPSULE-DUTASTERIDE-0.5-MG-CAPSULE | 0,471611 | STUK
123100 | DUTASTERIDE/TAMSULOSINE HCL XIROMED CAPS 0,5/0,4MG | TAMSULOSIN-0.4-MG-CAPSULE-DUTASTERIDE-0.5-MG-CAPSULE | 0,457688 | STUK
125939//111622 | SOLIFENACINESUC/TAMSUL HCL BMODESTO TB MGA 6/0,4MG | TAMSULOSIN-0.4-MG-TABLET, MET GEREGULEERDE AFGIFTE-SOLIFENACINE-6-MG-TABLET, MET GEREGULEERDE AFGIFTE | 1,116433 | STUK
111622 | VESOMNI TABLET MGA 6/0,4MG | TAMSULOSIN-0.4-MG-TABLET, MET GEREGULEERDE AFGIFTE-SOLIFENACINE-6-MG-TABLET, MET GEREGULEERDE AFGIFTE | 1,116433 | STUK
119725//111622 | VESOMNI TABLET MGA 6/0,4MG | TAMSULOSIN-0.4-MG-TABLET, MET GEREGULEERDE AFGIFTE-SOLIFENACINE-6-MG-TABLET, MET GEREGULEERDE AFGIFTE | 1,116433 | STUK
122079//111622 | VESOMNI TABLET MGA 6/0,4MG | TAMSULOSIN-0.4-MG-TABLET, MET GEREGULEERDE AFGIFTE-SOLIFENACINE-6-MG-TABLET, MET GEREGULEERDE AFGIFTE | 1,116433 | STUK
125627//110728 | PALEXIA RETARD TABLET MVA 100MG | TAPENTADOL-100-MG-TABLET, MET GEREGULEERDE AFGIFTE | 1,102676 | STUK
125618//110729 | PALEXIA RETARD TABLET MVA 150MG | TAPENTADOL-150-MG-TABLET, MET GEREGULEERDE AFGIFTE | 1,646883 | STUK
125624//110730 | PALEXIA RETARD TABLET MVA 200MG | TAPENTADOL-200-MG-TABLET, MET GEREGULEERDE AFGIFTE | 2,191146 | STUK
110724 | PALEXIA RETARD TABLET MVA 50MG | TAPENTADOL-50-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,558393 | STUK
EU/1/11/669/001 | TEYSUNO CAPSULE 15MG/4,35MG/11,8MG | TEGAFUR-15-MG-CAPSULE-OTERACIL-11.8-MG-CAPSULE-GIMERACIL-4.35-MG-CAPSULE | 3,117911 | STUK
125803//13473 | TARGOCID INJPDR FLACON 200MG + SOLVENS 3ML | TEICOPLANIN-200-MG-POED. V. INJECTIE, FLACON | 13,236635 | STUK
13473 | TARGOCID INJPDR FLACON 200MG + SOLVENS 3ML | TEICOPLANIN-200-MG-POED. V. INJECTIE, FLACON | 22,280618 | STUK
120893 | TEICOPLANINE ALTAN PH INJ/INFPDR FL 200MG + SV 3ML | TEICOPLANIN-200-MG-POED. V. INJECTIE, FLACON | 13,236635 | STUK
124055 | TEICOPLANINE BRADEX INJ/INFPDR FL 200MG + SOLV 3ML | TEICOPLANIN-200-MG-POED. V. INJECTIE, FLACON | 13,236635 | STUK
110477 | TEICOPLANINE HIKMA INJ/INFUSIEPOEDER FLACON 200MG | TEICOPLANIN-200-MG-POED. V. INJECTIE, FLACON | 13,236635 | STUK
115351//15374 | TARGOCID INJPDR FLACON 400MG + SOLVENS 3ML | TEICOPLANIN-400-MG-POED. V. INJECTIE, FLACON | 23,885504 | STUK
117186//15374 | TARGOCID INJPDR FLACON 400MG + SOLVENS 3ML | TEICOPLANIN-400-MG-POED. V. INJECTIE, FLACON | 39,607229 | STUK
15374 | TARGOCID INJPDR FLACON 400MG + SOLVENS 3ML | TEICOPLANIN-400-MG-POED. V. INJECTIE, FLACON | 39,607229 | STUK
120894 | TEICOPLANINE ALTAN PH INJ/INFPDR FL 400MG + SV 3ML | TEICOPLANIN-400-MG-POED. V. INJECTIE, FLACON | 23,885504 | STUK
124056 | TEICOPLANINE BRADEX INJ/INFPDR FL 400MG + SOLV 3ML | TEICOPLANIN-400-MG-POED. V. INJECTIE, FLACON | 23,885504 | STUK
110478 | TEICOPLANINE HIKMA INJ/INFUSIEPOEDER FLACON 400MG | TEICOPLANIN-400-MG-POED. V. INJECTIE, FLACON | 23,885504 | STUK
EU/1/98/090/010 | MICARDIS TABLET 20MG | TELMISARTAN-20-MG-TABLET | 0,381100 | STUK
115655 | TELMISARTAN FAIR-MED TABLET 20MG | TELMISARTAN-20-MG-TABLET | 0,338254 | STUK
EU/1/98/090/001 | MICARDIS TABLET 40MG | TELMISARTAN-40-MG-TABLET | 0,306733 | STUK
EU/1/98/090/002 | MICARDIS TABLET 40MG | TELMISARTAN-40-MG-TABLET | 0,347707 | STUK
115657 | TELMISARTAN FAIR-MED TABLET 40MG | TELMISARTAN-40-MG-TABLET | 0,306733 | STUK
EU/1/98/090/005 | MICARDIS TABLET 80MG | TELMISARTAN-80-MG-TABLET | 0,362129 | STUK
EU/1/98/090/006 | MICARDIS TABLET 80MG | TELMISARTAN-80-MG-TABLET | 0,383809 | STUK
115659 | TELMISARTAN FAIR-MED TABLET 80MG | TELMISARTAN-80-MG-TABLET | 0,349966 | STUK
EU/1/17/1224/001 | XERMELO TABLET FILMOMHULD 250MG | TELOTRISTAT-250-MG-TABLET | 13,453313 | STUK
EU/1/98/096/005 | TEMODAL CAPSULE 100MG | TEMOZOLOMIDE-100-MG-CAPSULE | 34,175109 | STUK
EU/1/10/615/029 | TEMOZOLOMIDE ACCORD CAPSULE 100MG | TEMOZOLOMIDE-100-MG-CAPSULE | 34,175109 | STUK
109655 | TEMOZOLOMIDE FAIR-MED CAPSULE 100MG | TEMOZOLOMIDE-100-MG-CAPSULE | 34,175109 | STUK
EU/1/11/697/017 | TEMOZOLOMIDE SUN CAPSULE 100MG | TEMOZOLOMIDE-100-MG-CAPSULE | 34,175109 | STUK
EU/1/10/615/031 | TEMOZOLOMIDE ACCORD CAPSULE 140MG | TEMOZOLOMIDE-140-MG-CAPSULE | 47,682715 | STUK
109656 | TEMOZOLOMIDE FAIR-MED CAPSULE 140MG | TEMOZOLOMIDE-140-MG-CAPSULE | 47,682715 | STUK
EU/1/11/697/019 | TEMOZOLOMIDE SUN CAPSULE 140MG | TEMOZOLOMIDE-140-MG-CAPSULE | 47,682715 | STUK
EU/1/10/615/033 | TEMOZOLOMIDE ACCORD CAPSULE 180MG | TEMOZOLOMIDE-180-MG-CAPSULE | 81,789714 | STUK
109657 | TEMOZOLOMIDE FAIR-MED CAPSULE 180MG | TEMOZOLOMIDE-180-MG-CAPSULE | 62,154822 | STUK
EU/1/11/697/021 | TEMOZOLOMIDE SUN CAPSULE 180MG | TEMOZOLOMIDE-180-MG-CAPSULE | 62,154822 | STUK
EU/1/98/096/003 | TEMODAL CAPSULE 20MG | TEMOZOLOMIDE-20-MG-CAPSULE | 7,261591 | STUK
EU/1/10/615/027 | TEMOZOLOMIDE ACCORD CAPSULE 20MG | TEMOZOLOMIDE-20-MG-CAPSULE | 8,300137 | STUK
109654 | TEMOZOLOMIDE FAIR-MED CAPSULE 20MG | TEMOZOLOMIDE-20-MG-CAPSULE | 7,261591 | STUK
EU/1/11/697/015 | TEMOZOLOMIDE SUN CAPSULE 20MG | TEMOZOLOMIDE-20-MG-CAPSULE | 7,261591 | STUK
EU/1/98/096/007 | TEMODAL CAPSULE 250MG | TEMOZOLOMIDE-250-MG-CAPSULE | 83,149418 | STUK
EU/1/10/615/035 | TEMOZOLOMIDE ACCORD CAPSULE 250MG | TEMOZOLOMIDE-250-MG-CAPSULE | 113,364050 | STUK
109658 | TEMOZOLOMIDE FAIR-MED CAPSULE 250MG | TEMOZOLOMIDE-250-MG-CAPSULE | 83,149418 | STUK
EU/1/11/697/023 | TEMOZOLOMIDE SUN CAPSULE 250MG | TEMOZOLOMIDE-250-MG-CAPSULE | 83,149418 | STUK
EU/1/10/615/025 | TEMOZOLOMIDE ACCORD CAPSULE 5MG | TEMOZOLOMIDE-5-MG-CAPSULE | 2,003557 | STUK
109653 | TEMOZOLOMIDE FAIR-MED CAPSULE 5MG | TEMOZOLOMIDE-5-MG-CAPSULE | 1,814666 | STUK
EU/1/11/697/013 | TEMOZOLOMIDE SUN CAPSULE 5MG | TEMOZOLOMIDE-5-MG-CAPSULE | 2,226174 | STUK
EU/1/07/424/001 | TORISEL 30 INFVLST CONC 25MG/ML FLAC 1,2ML + SOLV | TEMSIROLIMUS-25-MG/ML-INFUUSVLOEISTOF, FLACON | 624,750606 | ML
EU/1/00/169/006 | METALYSE INJPDR FL 10000E (50MG) +SOL 10ML IN WWSP | TENECTEPLASE-10000-IE-POED. V. INJECTIE, FLACON | 905,350440 | STUK
EU/1/01/200/004 | VIREAD TABLET FILMOMHULD 123MG | TENOFOVIR-123-MG-TABLET | 3,725059 | STUK
EU/1/01/200/006 | VIREAD TABLET FILMOMHULD 163MG | TENOFOVIR-163-MG-TABLET | 4,936866 | STUK
EU/1/01/200/008 | VIREAD TABLET FILMOMHULD 204MG | TENOFOVIR-204-MG-TABLET | 6,083689 | STUK
118116 | TENOFOVIRDISOPROXIL ACCORD TABLET FILMOMH 245MG | TENOFOVIR-245-MG-TABLET | 5,957825 | STUK
117065 | TENOFOVIRDISOPROXIL CF TABLET FILMOMHULD 245MG | TENOFOVIR-245-MG-TABLET | 5,957825 | STUK
EU/1/16/1129/001 | TENOFOVIRDISOPROXIL MYLAN TABLET FILMOMH 245MG | TENOFOVIR-245-MG-TABLET | 5,957825 | STUK
118117 | TENOFOVIRDISOPROXIL SANDOZ TABLET FILMOMHULD 245MG | TENOFOVIR-245-MG-TABLET | 6,243343 | STUK
115948 | TENOFOVIRDISOPROXIL TEVA TABLET FILMOMHULD 245MG | TENOFOVIR-245-MG-TABLET | 6,243343 | STUK
EU/1/01/200/001 | VIREAD TABLET FILMOMHULD 245MG | TENOFOVIR-245-MG-TABLET | 5,957825 | STUK
118252 | EMTRICITABINE/TENOFOVIRDIS CF TAB OMH 200/245MG | TENOFOVIR-245-MG-TABLET-EMTRICITABINE-200-MG-TABLET | 9,008885 | STUK
EU/1/16/1133/004 | EMTRICITABINE/TENOFOVIRDIS MYLAN TAB OMH 200/245MG | TENOFOVIR-245-MG-TABLET-EMTRICITABINE-200-MG-TABLET | 8,569528 | STUK
118839 | EMTRICITABINE/TENOFOVIRDIS SDZ TAB OMH 200/245MG | TENOFOVIR-245-MG-TABLET-EMTRICITABINE-200-MG-TABLET | 9,529296 | STUK
117050 | EMTRICITABINE/TENOFOVIRDIS TEVA TAB OMH 200/245MG | TENOFOVIR-245-MG-TABLET-EMTRICITABINE-200-MG-TABLET | 8,569528 | STUK
EU/1/04/305/001 | TRUVADA TABLET FILMOMHULD | TENOFOVIR-245-MG-TABLET-EMTRICITABINE-200-MG-TABLET | 8,569528 | STUK
EU/1/13/830/001 | STRIBILD TABLET FILMOMHULD | TENOFOVIR-245-MG-TABLET-EMTRICITABINE-200-MG-TABLET-COBICISTAT-150-MG-TABLET-ELVITEGRAVIR-150-MG-TABLET | 28,308870 | STUK
EU/1/13/830/002 | STRIBILD TABLET FILMOMHULD | TENOFOVIR-245-MG-TABLET-EMTRICITABINE-200-MG-TABLET-COBICISTAT-150-MG-TABLET-ELVITEGRAVIR-150-MG-TABLET | 28,308870 | STUK
EU/1/11/737/001 | EVIPLERA TABLET FILMOMHULD | TENOFOVIR-245-MG-TABLET-EMTRICITABINE-200-MG-TABLET-RILPIVIRINE-25-MG-TABLET | 19,007367 | STUK
EU/1/01/200/003 | VIREAD GRANULES 33MG/G | TENOFOVIR-33-MG/G-POEDER/GRANULAAT (ONV), ORAAL | 1,180603 | G
14561 | HYTRIN TABLET 10MG | TERAZOSIN-10-MG-TABLET | 0,397866 | STUK
14559 | HYTRIN TABLET 2MG | TERAZOSIN-2-MG-TABLET | 0,136564 | STUK
26357 | TERAZOSINE PCH TABLET 2MG | TERAZOSIN-2-MG-TABLET | 0,144894 | STUK
31396 | TERAZOSINE SANDOZ TABLET 2MG | TERAZOSIN-2-MG-TABLET | 0,144894 | STUK
14560 | HYTRIN TABLET 5MG | TERAZOSIN-5-MG-TABLET | 0,283687 | STUK
26358 | TERAZOSINE PCH TABLET 5MG | TERAZOSIN-5-MG-TABLET | 0,283687 | STUK
31397 | TERAZOSINE SANDOZ TABLET 5MG | TERAZOSIN-5-MG-TABLET | 0,283687 | STUK
28796 | TERBINAFINE MYLAN TABLET 250MG | TERBINAFINE-250-MG-TABLET | 0,744711 | STUK
29654 | TERBINAFINE PCH TABLET 250MG | TERBINAFINE-250-MG-TABLET | 0,744711 | STUK
31711 | TERBINAFINE SANDOZ TABLET 250MG | TERBINAFINE-250-MG-TABLET | 0,744711 | STUK
101219//12480 | BRICANYL TURBUHALER INHALPDR 0,5MG/DO 100DO | TERBUTALINE-.5-MG-INHALATIEPOEDER INCL INHALER | 0,060406 | DOSIS
101219//12480 | BRICANYL TURBUHALER INHALPDR 0,5MG/DO 120DO | TERBUTALINE-.5-MG-INHALATIEPOEDER INCL INHALER | 0,060406 | DOSIS
125310//12480 | BRICANYL TURBUHALER INHALPDR 0,5MG/DO 120DO | TERBUTALINE-.5-MG-INHALATIEPOEDER INCL INHALER | 0,060406 | DOSIS
126054//12480 | BRICANYL TURBUHALER INHALPDR 0,5MG/DO 120DO | TERBUTALINE-.5-MG-INHALATIEPOEDER INCL INHALER | 0,060406 | DOSIS
12480 | BRICANYL TURBUHALER INHALPDR 0,5MG/DO 120DO | TERBUTALINE-.5-MG-INHALATIEPOEDER INCL INHALER | 0,071914 | DOSIS
EU/1/13/838/002 | AUBAGIO TABLET FILMOMHULD 14MG | TERIFLUNOMIDE-14-MG-TABLET | 31,329939 | STUK
EU/1/03/247/001 | FORSTEO INJVLST 250MCG/ML PEN 2,4ML | TERIPARATIDE-.25-MG/ML-INJ.VLOEISTOF, WWSP | 111,980212 | ML
35309 | GLYPRESSIN INJVLST 0,1 MG/ML AMPUL 8,5ML | TERLIPRESSIN-0.1-MG/ML-INJ.VLOEISTOF AMPUL | 4,508825 | ML
110384 | TERLIPRESSINE SUN INJVLST 0,1MG/ML AMPUL 8,5ML | TERLIPRESSIN-0.1-MG/ML-INJ.VLOEISTOF AMPUL | 4,508825 | ML
124580//27741 | ANDROGEL GEL 50MG IN SACHET | TESTOSTERONE-10-MG/G-HUIDGEL | 0,251808 | G
126340//27741 | ANDROGEL GEL 50MG IN SACHET | TESTOSTERONE-10-MG/G-HUIDGEL | 0,251808 | G
27741 | ANDROGEL GEL 50MG IN SACHET | TESTOSTERONE-10-MG/G-HUIDGEL | 0,251808 | G
122809//30794 | NEBIDO INJVLST 250MG/ML FLACON 4ML | TESTOSTERONE-158-MG/ML-INJECTIEVLOEISTOF, FLAC | 26,633250 | ML
123275//30794 | NEBIDO INJVLST 250MG/ML FLACON 4ML | TESTOSTERONE-158-MG/ML-INJECTIEVLOEISTOF, FLAC | 26,633250 | ML
30794 | NEBIDO INJVLST 250MG/ML FLACON 4ML | TESTOSTERONE-158-MG/ML-INJECTIEVLOEISTOF, FLAC | 26,906833 | ML
115746 | ANDROGEL GEL 16,2MG/G IN DOSEERPOMP | TESTOSTERONE-16.2-MG/G-HUIDGEL | 0,518884 | G
126801//115746 | ANDROGEL GEL 16,2MG/G IN DOSEERPOMP | TESTOSTERONE-16.2-MG/G-HUIDGEL | 0,518884 | G
105350//27 | SUSTANON 250 INJVLST 250MG/ML AMPUL 1ML | TESTOSTERONE-180-MG/ML-INJ.VLOEISTOF AMPUL | 13,389554 | ML
109334//27 | SUSTANON 250 INJVLST 250MG/ML AMPUL 1ML | TESTOSTERONE-180-MG/ML-INJ.VLOEISTOF AMPUL | 13,389554 | ML
110344//27 | SUSTANON 250 INJVLST 250MG/ML AMPUL 1ML | TESTOSTERONE-180-MG/ML-INJ.VLOEISTOF AMPUL | 13,389554 | ML
27 | SUSTANON 250 INJVLST 250MG/ML AMPUL 1ML | TESTOSTERONE-180-MG/ML-INJ.VLOEISTOF AMPUL | 13,389554 | ML
29437//27 | SUSTANON 250 INJVLST 250MG/ML AMPUL 1ML | TESTOSTERONE-180-MG/ML-INJ.VLOEISTOF AMPUL | 13,389554 | ML
120624 | TESTAVAN GEL TRANSDERMAAL 20MG/G + APPLICATOR | TESTOSTERONE-20-MG/G-HUIDGEL | 0,573150 | G
115461//33424 | TOSTRAN GEL 20MG/G | TESTOSTERONE-20-MG/G-HUIDGEL | 0,553735 | G
121637//33424 | TOSTRAN GEL 20MG/G | TESTOSTERONE-20-MG/G-HUIDGEL | 0,553735 | G
121994//33424 | TOSTRAN GEL 20MG/G | TESTOSTERONE-20-MG/G-HUIDGEL | 0,553735 | G
122244//33424 | TOSTRAN GEL 20MG/G | TESTOSTERONE-20-MG/G-HUIDGEL | 0,553735 | G
33424 | TOSTRAN GEL 20MG/G | TESTOSTERONE-20-MG/G-HUIDGEL | 0,573150 | G
102458 | TETMODIS TABLET 25MG | TETRABENAZINE-25-MG-TABLET | 1,324117 | STUK
29852 | XENAZINE TABLET 25MG | TETRABENAZINE-25-MG-TABLET | 1,243330 | STUK
2224 | STRUMAZOL TABLET 10MG | THIAMAZOLE-10-MG-TABLET | 0,068488 | STUK
EU/1/10/622/002 | TEPADINA INFPDR FLACON 100MG | THIOTEPA-100-MG-POED. V. INFUSIE,FLACON | 854,460843 | STUK
EU/1/10/622/001 | TEPADINA INFPDR FLACON 15MG | THIOTEPA-15-MG-POED. V. INFUSIE,FLACON | 142,556863 | STUK
11146 | LIVIAL TABLET 2,5MG | TIBOLONE-2.5-MG-TABLET | 0,588664 | STUK
112639 | TIBOLINIA TABLET 2,5MG | TIBOLONE-2.5-MG-TABLET | 0,588664 | STUK
112638 | TIBOLON MYLAN TABLET 2,5MG | TIBOLONE-2.5-MG-TABLET | 0,458534 | STUK
EU/1/10/655/009 | BRILIQUE TABLET FILMOMHULD 60MG | TICAGRELOR-60-MG-TABLET | 0,999684 | STUK
EU/1/10/655/008 | BRILIQUE TABLET FILMOMHULD 60MG | TICAGRELOR-60-MG-TABLET | 1,142171 | STUK
EU/1/10/655/010 | BRILIQUE TABLET FILMOMHULD 60MG | TICAGRELOR-60-MG-TABLET | 1,142171 | STUK
EU/1/10/655/001 | BRILIQUE TABLET FILMOMHULD 90MG | TICAGRELOR-90-MG-TABLET | 1,104371 | STUK
EU/1/10/655/003 | BRILIQUE TABLET FILMOMHULD 90MG | TICAGRELOR-90-MG-TABLET | 1,104371 | STUK
EU/1/10/655/004 | BRILIQUE TABLET FILMOMHULD 90MG | TICAGRELOR-90-MG-TABLET | 1,104371 | STUK
EU/1/10/655/005 | BRILIQUE TABLET FILMOMHULD 90MG | TICAGRELOR-90-MG-TABLET | 1,104371 | STUK
EU/1/10/655/006 | BRILIQUE TABLET FILMOMHULD 90MG | TICAGRELOR-90-MG-TABLET | 1,104371 | STUK
125523//33801 | TIMOGEL OOGGEL 1MG/G TUBE 0,4G | TIMOLOL-1-MG/G-OOGGEL UNITDOSE | 0,582567 | G
33801 | TIMOGEL OOGGEL 1MG/G TUBE 0,4G | TIMOLOL-1-MG/G-OOGGEL UNITDOSE | 0,582567 | G
21644 | TIMO-COMOD OOGDRUPPELS 2,5MG/ML FLACON 10ML | TIMOLOL-2.5-MG/ML-OOGDRUPPELS | 0,898368 | ML
15699 | TIMOLOL PCH OOGDRUPPELS 2,5MG/ML FLACON 5ML | TIMOLOL-2.5-MG/ML-OOGDRUPPELS | 0,903658 | ML
57608 | TIMOLOL SANDOZ OOGDRUPPELS 2,5MG/ML FLACON 5ML | TIMOLOL-2.5-MG/ML-OOGDRUPPELS | 0,903658 | ML
17017 | TIMOPTOL XE OOGDRUPPELS 2,5MG/ML FLACON 2,5ML | TIMOLOL-2.5-MG/ML-OOGDRUPPELS MET GEREGULEERDE AFGIFTE | 1,923994 | ML
21645 | TIMO-COMOD OOGDRUPPELS 5MG/ML FLACON 10ML | TIMOLOL-5-MG/ML-OOGDRUPPELS | 0,698052 | ML
15700 | TIMOLOL PCH OOGDRUPPELS 5MG/ML FLACON 5ML | TIMOLOL-5-MG/ML-OOGDRUPPELS | 0,768881 | ML
57609 | TIMOLOL SANDOZ OOGDRUPPELS 5MG/ML FLACON 5ML | TIMOLOL-5-MG/ML-OOGDRUPPELS | 0,768881 | ML
17018 | TIMOPTOL XE OOGDRUPPELS 5MG/ML FLACON 2,5ML | TIMOLOL-5-MG/ML-OOGDRUPPELS MET GEREGULEERDE AFGIFTE | 1,747983 | ML
EU/1/06/340/004 | GANFORT OOGDRUPPELS MINIM 0,4ML | TIMOLOL-5-MG/ML-OOGDRUPPELS UNITDOSE-BIMATOPROST-0.3-MG/ML-OOGDRUPPELS UNITDOSE | 1,487681 | ML
116218//33660 | COSOPT CONSERVEERMIDDELVRIJ OOGDRUPPELS FLAC 0,2ML | TIMOLOL-5-MG/ML-OOGDRUPPELS UNITDOSE-DORZOLAMIDE-20-MG/ML-OOGDRUPPELS UNITDOSE | 1,906506 | ML
117915//33660 | COSOPT CONSERVEERMIDDELVRIJ OOGDRUPPELS FLAC 0,2ML | TIMOLOL-5-MG/ML-OOGDRUPPELS UNITDOSE-DORZOLAMIDE-20-MG/ML-OOGDRUPPELS UNITDOSE | 1,906506 | ML
119854//33660 | COSOPT CONSERVEERMIDDELVRIJ OOGDRUPPELS FLAC 0,2ML | TIMOLOL-5-MG/ML-OOGDRUPPELS UNITDOSE-DORZOLAMIDE-20-MG/ML-OOGDRUPPELS UNITDOSE | 1,906506 | ML
122533//33660 | COSOPT CONSERVEERMIDDELVRIJ OOGDRUPPELS FLAC 0,2ML | TIMOLOL-5-MG/ML-OOGDRUPPELS UNITDOSE-DORZOLAMIDE-20-MG/ML-OOGDRUPPELS UNITDOSE | 1,906506 | ML
122758//33660 | COSOPT CONSERVEERMIDDELVRIJ OOGDRUPPELS FLAC 0,2ML | TIMOLOL-5-MG/ML-OOGDRUPPELS UNITDOSE-DORZOLAMIDE-20-MG/ML-OOGDRUPPELS UNITDOSE | 1,906506 | ML
122792//33660 | COSOPT CONSERVEERMIDDELVRIJ OOGDRUPPELS FLAC 0,2ML | TIMOLOL-5-MG/ML-OOGDRUPPELS UNITDOSE-DORZOLAMIDE-20-MG/ML-OOGDRUPPELS UNITDOSE | 1,906506 | ML
33660 | COSOPT CONSERVEERMIDDELVRIJ OOGDRUPPELS FLAC 0,2ML | TIMOLOL-5-MG/ML-OOGDRUPPELS UNITDOSE-DORZOLAMIDE-20-MG/ML-OOGDRUPPELS UNITDOSE | 1,906506 | ML
113881 | TAPTIQOM OOGDRUPPELS 15MCG/5MG/ML MINIM 0,3ML | TIMOLOL-5-MG/ML-OOGDRUPPELS UNITDOSE-TAFLUPROST-0.015-MG/ML-OOGDRUPPELS UNITDOSE | 2,044091 | ML
119654//113881 | TAPTIQOM OOGDRUPPELS 15MCG/5MG/ML MINIM 0,3ML | TIMOLOL-5-MG/ML-OOGDRUPPELS UNITDOSE-TAFLUPROST-0.015-MG/ML-OOGDRUPPELS UNITDOSE | 2,044091 | ML
121047//113881 | TAPTIQOM OOGDRUPPELS 15MCG/5MG/ML MINIM 0,3ML | TIMOLOL-5-MG/ML-OOGDRUPPELS UNITDOSE-TAFLUPROST-0.015-MG/ML-OOGDRUPPELS UNITDOSE | 2,044091 | ML
121330//113881 | TAPTIQOM OOGDRUPPELS 15MCG/5MG/ML MINIM 0,3ML | TIMOLOL-5-MG/ML-OOGDRUPPELS UNITDOSE-TAFLUPROST-0.015-MG/ML-OOGDRUPPELS UNITDOSE | 2,044091 | ML
122391//113881 | TAPTIQOM OOGDRUPPELS 15MCG/5MG/ML MINIM 0,3ML | TIMOLOL-5-MG/ML-OOGDRUPPELS UNITDOSE-TAFLUPROST-0.015-MG/ML-OOGDRUPPELS UNITDOSE | 2,044091 | ML
EU/1/06/340/001 | GANFORT OOGDRUPPELS FLACON 3ML | TIMOLOL-5-MG/ML-OOGDRUPPELS-BIMATOPROST-0.3-MG/ML-OOGDRUPPELS | 5,027741 | ML
EU/1/06/340/002 | GANFORT OOGDRUPPELS FLACON 3ML | TIMOLOL-5-MG/ML-OOGDRUPPELS-BIMATOPROST-0.3-MG/ML-OOGDRUPPELS | 5,027741 | ML
32744 | COMBIGAN OOGDRUPPELS FLACON 5ML | TIMOLOL-5-MG/ML-OOGDRUPPELS-BRIMONIDINE-2-MG/ML-OOGDRUPPELS | 2,424064 | ML
EU/1/08/482/001 | AZARGA OOGDRUPPELS FLACON 5ML | TIMOLOL-5-MG/ML-OOGDRUPPELS-BRINZOLAMIDE-10-MG/ML-OOGDRUPPELS | 2,017669 | ML
EU/1/08/482/002 | AZARGA OOGDRUPPELS FLACON 5ML | TIMOLOL-5-MG/ML-OOGDRUPPELS-BRINZOLAMIDE-10-MG/ML-OOGDRUPPELS | 2,017669 | ML
122414 | BRINZOLAMIDE/TIMOLOL CF OOGDR 10/5MG/ML FLACON 5ML | TIMOLOL-5-MG/ML-OOGDRUPPELS-BRINZOLAMIDE-10-MG/ML-OOGDRUPPELS | 2,017669 | ML
125392 | BRINZOLAMIDE/TIMOLOL MYLAN OOGDR 10/5MG/ML FL 5ML | TIMOLOL-5-MG/ML-OOGDRUPPELS-BRINZOLAMIDE-10-MG/ML-OOGDRUPPELS | 2,017669 | ML
109567//22871 | COSOPT OOGDRUPPELS FLACON 5ML | TIMOLOL-5-MG/ML-OOGDRUPPELS-DORZOLAMIDE-20-MG/ML-OOGDRUPPELS | 1,571217 | ML
123688//22871 | COSOPT OOGDRUPPELS FLACON 5ML | TIMOLOL-5-MG/ML-OOGDRUPPELS-DORZOLAMIDE-20-MG/ML-OOGDRUPPELS | 1,571217 | ML
126258//22871 | COSOPT OOGDRUPPELS FLACON 5ML | TIMOLOL-5-MG/ML-OOGDRUPPELS-DORZOLAMIDE-20-MG/ML-OOGDRUPPELS | 1,571217 | ML
22871 | COSOPT OOGDRUPPELS FLACON 5ML | TIMOLOL-5-MG/ML-OOGDRUPPELS-DORZOLAMIDE-20-MG/ML-OOGDRUPPELS | 1,571217 | ML
105541 | DORZOLAMIDE/TIMOLOL AUROBINDO OOGDR 20/5MG/ML F5ML | TIMOLOL-5-MG/ML-OOGDRUPPELS-DORZOLAMIDE-20-MG/ML-OOGDRUPPELS | 1,676648 | ML
112681 | DUALKOPT OOGDRUPPELS FLACON 10ML | TIMOLOL-5-MG/ML-OOGDRUPPELS-DORZOLAMIDE-20-MG/ML-OOGDRUPPELS | 1,571217 | ML
110118 | LATANOPROST/TIMOLOL MYL OOGDR 0,05/5MG/ML FL 2,5ML | TIMOLOL-5-MG/ML-OOGDRUPPELS-LATANOPROST-.05-MG/ML-OOGDRUPPELS | 3,472932 | ML
110119 | LATANOPROST/TIMOLOL TEV OOGDR 0,05/5MG/ML FL 2,5ML | TIMOLOL-5-MG/ML-OOGDRUPPELS-LATANOPROST-.05-MG/ML-OOGDRUPPELS | 3,472932 | ML
26592 | XALACOM OOGDRUPPELS FLACON 2,5ML | TIMOLOL-5-MG/ML-OOGDRUPPELS-LATANOPROST-.05-MG/ML-OOGDRUPPELS | 3,472932 | ML
EU/1/06/338/001 | DUOTRAV OOGDRUPPELS FLACON 2,5ML | TIMOLOL-5-MG/ML-OOGDRUPPELS-TRAVOPROST-0.04-MG/ML-OOGDRUPPELS | 4,107720 | ML
EU/1/06/338/002 | DUOTRAV OOGDRUPPELS FLACON 2,5ML | TIMOLOL-5-MG/ML-OOGDRUPPELS-TRAVOPROST-0.04-MG/ML-OOGDRUPPELS | 4,319102 | ML
119307 | TRAVOPROST/TIMOLOL CF OOGDR 40MCG/5MG/ML FL 2,5ML | TIMOLOL-5-MG/ML-OOGDRUPPELS-TRAVOPROST-0.04-MG/ML-OOGDRUPPELS | 4,799002 | ML
119304 | TRAVOPROST/TIMOLOL MYL OOGDR 40MCG/5MG/ML FL 2,5ML | TIMOLOL-5-MG/ML-OOGDRUPPELS-TRAVOPROST-0.04-MG/ML-OOGDRUPPELS | 4,076550 | ML
119283 | TRAVOPROST/TIMOLOL TEV OOGDR 40MCG/5MG/ML FL 2,5ML | TIMOLOL-5-MG/ML-OOGDRUPPELS-TRAVOPROST-0.04-MG/ML-OOGDRUPPELS | 4,319102 | ML
20817 | INNOHEP INJVLST 20000 IE/ML WWSP 0,5ML | TINZAPARIN-20000-IE/ML-INJ.VLOEISTOF, WWSP | 13,777830 | ML
20818 | INNOHEP INJVLST 20000 IE/ML WWSP 0,7ML | TINZAPARIN-20000-IE/ML-INJ.VLOEISTOF, WWSP | 13,777830 | ML
20819 | INNOHEP INJVLST 20000 IE/ML WWSP 0,9ML | TINZAPARIN-20000-IE/ML-INJ.VLOEISTOF, WWSP | 13,777830 | ML
7070 | LANVIS TABLET 40MG | TIOGUANINE-40-MG-TABLET | 4,499842 | STUK
121383//26191 | SPIRIVA INHALPDR 18MCG | TIOTROPIUM-.018-MG-INHALATIEPOEDER | 1,211794 | STUK
26191 | SPIRIVA INHALPDR 18MCG | TIOTROPIUM-.018-MG-INHALATIEPOEDER | 1,211794 | STUK
26191 | SPIRIVA INHALPDR 18MCG MET HANDIHALER | TIOTROPIUM-.018-MG-INHALATIEPOEDER INCL INHALER | 1,049798 | STUK
109483//34382 | SPIRIVA RESPIMAT INHOPL 2,5MCG/DO PATR 60DO+INH | TIOTROPIUM-0.0025-MG-AEROSOL | 0,428792 | DOSIS
34382 | SPIRIVA RESPIMAT INHOPL 2,5MCG/DO PATR 60DO+INH | TIOTROPIUM-0.0025-MG-AEROSOL | 0,428792 | DOSIS
34382 | SPIRIVA RESPIMAT INHOPL NAVUL 2,5MCG/DO PATR 60DO | TIOTROPIUM-0.0025-MG-AEROSOL | 0,428792 | DOSIS
115528 | SPIOLTO RESPIMAT INH NAVUL 2,5/2,5MCG/DO PATR 60DO | TIOTROPIUM-0.0025-MG-AEROSOL-OLODATEROL-0.0025-MG-AEROSOL | 0,659133 | DOSIS
115528 | SPIOLTO RESPIMAT INHOP 2,5/2,5MCG/DO PATR 60DO+INH | TIOTROPIUM-0.0025-MG-AEROSOL-OLODATEROL-0.0025-MG-AEROSOL | 0,659133 | DOSIS
118406//115528 | SPIOLTO RESPIMAT INHOP 2,5/2,5MCG/DO PATR 60DO+INH | TIOTROPIUM-0.0025-MG-AEROSOL-OLODATEROL-0.0025-MG-AEROSOL | 0,659133 | DOSIS
120292//115528 | SPIOLTO RESPIMAT INHOP 2,5/2,5MCG/DO PATR 60DO+INH | TIOTROPIUM-0.0025-MG-AEROSOL-OLODATEROL-0.0025-MG-AEROSOL | 0,659133 | DOSIS
23381 | AGGRASTAT INFVLST 0,05MG/ML ZAK 250ML | TIROFIBAN-0.05-MG/ML-INFUUSVLOEISTOF, FLACON | 0,716468 | ML
EU/1/17/1215/001 | FOTIVDA CAPSULE 890MCG | TIVOZANIB-0.89-MG-CAPSULE | 141,297908 | STUK
EU/1/17/1215/002 | FOTIVDA CAPSULE 1340MCG | TIVOZANIB-1.34-MG-CAPSULE | 141,297908 | STUK
10037 | SIRDALUD TABLET 4MG | TIZANIDINE-4-MG-TABLET | 0,294701 | STUK
31643 | TIZANIDINE HCL TEVA TABLET 4MG | TIZANIDINE-4-MG-TABLET | 0,294701 | STUK
EU/1/10/652/002 | TOBI PODHALER INHALPDR 28MG MET PODHALER | TOBRAMYCIN-28-MG-INHALATIEPOEDER INCL INHALER | 9,822972 | STUK
10225 | TOBREX OOGZALF TUBE 3,5G | TOBRAMYCIN-3-MG/G-OOGZALF | 1,244857 | G
109689//10225 | TOBREX OOGZALF TUBE 3,5G | TOBRAMYCIN-3-MG/G-OOGZALF | 1,244857 | G
28141 | TOBREX BID OOGDRUPPELS 3MG/ML FLACON 5ML | TOBRAMYCIN-3-MG/ML-OOGDRUPPELS | 0,993000 | ML
6890 | OBRACIN INJVLST 40MG/ML FLACON 2ML | TOBRAMYCIN-40-MG/ML-INJECTIEVLOEISTOF, FLAC | 2,099198 | ML
25484 | TOBI INHVLST 60MG/ML AMPUL 5ML | TOBRAMYCIN-60-MG/ML-INHALATIEVLOEISTOF UNITDOSE | 5,461450 | ML
106999 | TOBRAMYCINE STERI-NEB VERNEVELOPL 60MG/ML AMP 5ML | TOBRAMYCIN-60-MG/ML-INHALATIEVLOEISTOF UNITDOSE | 5,461450 | ML
117965 | TOBRAMYCINE SUN VERNEVELOPLOSSING 60MG/ML AMP 5ML | TOBRAMYCIN-60-MG/ML-INHALATIEVLOEISTOF UNITDOSE | 6,507949 | ML
EU/1/08/492/009 | ROACTEMRA INJVLST 162MG/0,9ML (180MG/ML) PEN | TOCILIZUMAB-180-MG/ML-INJ.VLOEISTOF, WWSP | 262,227639 | ML
EU/1/08/492/007 | ROACTEMRA INJVLST 162MG/0,9ML (180MG/ML) WWSP | TOCILIZUMAB-180-MG/ML-INJ.VLOEISTOF, WWSP | 262,227639 | ML
EU/1/08/492/001 | ROACTEMRA INFVLST CONC 20MG/ML FLACON 4ML | TOCILIZUMAB-20-MG/ML-INFUUSVLOEISTOF, FLACON | 32,875551 | ML
EU/1/08/492/003 | ROACTEMRA INFVLST CONC 20MG/ML FLACON 10ML | TOCILIZUMAB-20-MG/ML-INFUUSVLOEISTOF, FLACON | 32,875551 | ML
EU/1/08/492/005 | ROACTEMRA INFVLST CONC 20MG/ML FLACON 20ML | TOCILIZUMAB-20-MG/ML-INFUUSVLOEISTOF, FLACON | 32,875551 | ML
EU/1/17/1178/007 | XELJANZ TABLET FILMOMHULD 10MG | TOFACITINIB-10-MG-TABLET | 25,283663 | STUK
EU/1/17/1178/003 | XELJANZ TABLET FILMOMHULD 5MG | TOFACITINIB-5-MG-TABLET | 12,845129 | STUK
EU/1/97/044/003 | TASMAR TABLET FILMOMHULD 100MG | TOLCAPONE-100-MG-TABLET | 1,221036 | STUK
26669 | DETRUSITOL SR CAPSULE MVA 2MG | TOLTERODINE-2-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,635657 | STUK
22149 | DETRUSITOL TABLET OMHULD 2MG | TOLTERODINE-2-MG-TABLET | 0,600739 | STUK
111751 | TOLTERODINETARTRAAT ACCORD TABLET FILMOMHULD 2MG | TOLTERODINE-2-MG-TABLET | 0,600739 | STUK
26670 | DETRUSITOL SR CAPSULE MVA 4MG | TOLTERODINE-4-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,650389 | STUK
108954 | TOLTERODINE PFIZER CAPSULE MVA 4MG | TOLTERODINE-4-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,650389 | STUK
119971//24167 | TOPAMAX TABLET OMHULD 100MG | TOPIRAMATE-100-MG-TABLET | 0,431389 | STUK
24167 | TOPAMAX TABLET OMHULD 100MG | TOPIRAMATE-100-MG-TABLET | 0,448430 | STUK
101530 | TOPIRAMAAT PCH TABLET FILMOMHULD 100MG | TOPIRAMATE-100-MG-TABLET | 0,448430 | STUK
113045//25836 | TOPAMAX SPRINKLE CAPSULE 15MG | TOPIRAMATE-15-MG-CAPSULE | 0,229097 | STUK
114398//25836 | TOPAMAX SPRINKLE CAPSULE 15MG | TOPIRAMATE-15-MG-CAPSULE | 0,254552 | STUK
25836 | TOPAMAX SPRINKLE CAPSULE 15MG | TOPIRAMATE-15-MG-CAPSULE | 0,254552 | STUK
24168 | TOPAMAX TABLET OMHULD 200MG | TOPIRAMATE-200-MG-TABLET | 0,900578 | STUK
113358//25837 | TOPAMAX SPRINKLE CAPSULE 25MG | TOPIRAMATE-25-MG-CAPSULE | 0,237929 | STUK
25837 | TOPAMAX SPRINKLE CAPSULE 25MG | TOPIRAMATE-25-MG-CAPSULE | 0,237929 | STUK
119269//24165 | TOPAMAX TABLET OMHULD 25MG | TOPIRAMATE-25-MG-TABLET | 0,165141 | STUK
124477//24165 | TOPAMAX TABLET OMHULD 25MG | TOPIRAMATE-25-MG-TABLET | 0,165141 | STUK
24165 | TOPAMAX TABLET OMHULD 25MG | TOPIRAMATE-25-MG-TABLET | 0,165141 | STUK
101527 | TOPIRAMAAT PCH TABLET FILMOMHULD 25MG | TOPIRAMATE-25-MG-TABLET | 0,165141 | STUK
33976 | TOPIRAMAAT SANDOZ TABLET FILMOMHULD 25MG | TOPIRAMATE-25-MG-TABLET | 0,165141 | STUK
113046//25838 | TOPAMAX SPRINKLE CAPSULE 50MG | TOPIRAMATE-50-MG-CAPSULE | 0,409278 | STUK
113067//25838 | TOPAMAX SPRINKLE CAPSULE 50MG | TOPIRAMATE-50-MG-CAPSULE | 0,414850 | STUK
114066//25838 | TOPAMAX SPRINKLE CAPSULE 50MG | TOPIRAMATE-50-MG-CAPSULE | 0,460944 | STUK
25838 | TOPAMAX SPRINKLE CAPSULE 50MG | TOPIRAMATE-50-MG-CAPSULE | 0,460944 | STUK
103743 | TOPIRAMAAT GLENMARK TABLET FILMOMHULD 50MG | TOPIRAMATE-50-MG-TABLET | 0,278156 | STUK
EU/1/96/027/006 | HYCAMTIN CAPSULE 0,25MG | TOPOTECAN-0.25-MG-CAPSULE | 12,470548 | STUK
109171 | TOPOTECAN ACCORD INFVLST CONC 1MG/ML FLACON 1ML | TOPOTECAN-1-MG/ML-INFUUSVLOEISTOF, FLACON | 59,967146 | ML
109171 | TOPOTECAN ACCORD INFVLST CONC 1MG/ML FLACON 4ML | TOPOTECAN-1-MG/ML-INFUUSVLOEISTOF, FLACON | 59,967146 | ML
105701 | TOPOTECAN SANDOZ INFVLST CONC 1MG/ML FLACON 4ML | TOPOTECAN-1-MG/ML-INFUUSVLOEISTOF, FLACON | 61,133553 | ML
EU/1/96/027/007 | HYCAMTIN CAPSULE 1MG | TOPOTECAN-1-MG-CAPSULE | 51,360979 | STUK
EU/1/96/027/003 | HYCAMTIN INFUSIEPOEDER FLACON 4MG | TOPOTECAN-4-MG-POED. V. INFUSIE,FLACON | 326,044874 | STUK
EU/1/07/417/001 | YONDELIS INFPDR FLACON 0,25MG | TRABECTEDIN-0.25-MG-POED. V. INFUSIE,FLACON | 483,783075 | STUK
EU/1/07/417/002 | YONDELIS INFPDR FLACON 1MG | TRABECTEDIN-1-MG-POED. V. INFUSIE,FLACON | 1853,645184 | STUK
27165 | TRAMADOL HCL CF DRUPPELS 100MG/ML | TRAMADOL-100-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 1,287560 | ML
27177 | TRAMADOL HCL PCH DRUPPELS 100MG/ML | TRAMADOL-100-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 1,287560 | ML
15513 | TRAMAL DRUPPELVLOEISTOF 100MG/ML | TRAMADOL-100-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 1,287560 | ML
33751 | TRAMADOL HCL TEVA RETARD TABLET MGA 100MG | TRAMADOL-100-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,207478 | STUK
22361 | TRAMAL RETARD TABLET MVA 100MG | TRAMADOL-100-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,207478 | STUK
25694 | TRAMADOL HCL SANDOZ RETARD TABLET MGA 150MG | TRAMADOL-150-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,292811 | STUK
22362 | TRAMAL RETARD TABLET MVA 150MG | TRAMADOL-150-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,292811 | STUK
25695 | TRAMADOL HCL SANDOZ RETARD TABLET MGA 200MG | TRAMADOL-200-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,374196 | STUK
33753 | TRAMADOL HCL TEVA RETARD TABLET MGA 200MG | TRAMADOL-200-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,355203 | STUK
22233 | TRAMAGETIC ONCE DAILY TABLET MGA 200MG | TRAMADOL-200-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,374196 | STUK
22363 | TRAMAL RETARD TABLET MVA 200MG | TRAMADOL-200-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,374196 | STUK
22234 | TRAMAGETIC ONCE DAILY TABLET MGA 300MG | TRAMADOL-300-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,767614 | STUK
15510 | TRAMAL INJVLST 50MG/ML AMPUL 2ML | TRAMADOL-50-MG/ML-INJ.VLOEISTOF AMPUL | 0,520844 | ML
23527 | TRAMADOL HCL SANDOZ BRUISTABLET 50MG | TRAMADOL-50-MG-BRUISTABLET | 0,149013 | STUK
27163 | TRAMADOL HCL CF CAPSULE 50MG | TRAMADOL-50-MG-CAPSULE | 0,092701 | STUK
26280 | TRAMADOL HCL MYLAN CAPSULE 50MG | TRAMADOL-50-MG-CAPSULE | 0,074060 | STUK
22031 | TRAMADOL HCL PCH CAPSULE 50MG | TRAMADOL-50-MG-CAPSULE | 0,100937 | STUK
21690 | TRAMADOL HCL SANDOZ CAPSULE 50MG | TRAMADOL-50-MG-CAPSULE | 0,100937 | STUK
15511 | TRAMAL CAPSULE 50MG | TRAMADOL-50-MG-CAPSULE | 0,100937 | STUK
EU/1/14/931/002 | MEKINIST TABLET FILMOMHULD 0,5MG | TRAMETINIB-0.5-MG-TABLET | 59,783597 | STUK
EU/1/14/931/006 | MEKINIST TABLET FILMOMHULD 2MG | TRAMETINIB-2-MG-TABLET | 216,909567 | STUK
5574 | CYKLOKAPRON TABLET FILMOMHULD 500MG | TRANEXAMIC ACID-500-MG-TABLET | 0,323248 | STUK
32372//5574 | TRANEXAMINEZUUR TABLET FILMOMHULD 500MG | TRANEXAMIC ACID-500-MG-TABLET | 0,258075 | STUK
EU/1/13/885/001 | KADCYLA INFUSIEPOEDER FLACON 100MG | TRASTUZUMAB-100-MG-POED. V. INFUSIE,FLACON | 1671,229782 | STUK
EU/1/00/145/002 | HERCEPTIN INJVLST 120MG/ML FLACON 5ML | TRASTUZUMAB-120-MG/ML-INJECTIEVLOEISTOF, FLAC | 265,210360 | ML
EU/1/00/145/001 | HERCEPTIN INFUSIEPOEDER FLACON 150MG | TRASTUZUMAB-150-MG-POED. V. INFUSIE,FLACON | 410,431458 | STUK
EU/1/17/1257/001 | HERZUMA INFUSIEPOEDER FLACON 150MG | TRASTUZUMAB-150-MG-POED. V. INFUSIE,FLACON | 410,431458 | STUK
EU/1/18/1281/001 | KANJINTI INFUSIEPOEDER FLACON 150MG | TRASTUZUMAB-150-MG-POED. V. INFUSIE,FLACON | 410,431458 | STUK
EU/1/18/1341/001 | OGIVRI INFUSIEPOEDER FLACON 150MG | TRASTUZUMAB-150-MG-POED. V. INFUSIE,FLACON | 410,431458 | STUK
EU/1/18/1295/001 | TRAZIMERA INFUSIEPOEDER FLACON 150MG | TRASTUZUMAB-150-MG-POED. V. INFUSIE,FLACON | 410,431458 | STUK
EU/1/13/885/002 | KADCYLA INFUSIEPOEDER FLACON 160MG | TRASTUZUMAB-160-MG-POED. V. INFUSIE,FLACON | 2736,334094 | STUK
EU/1/17/1257/002 | HERZUMA INFUSIEPOEDER FLACON 420MG | TRASTUZUMAB-420-MG-POED. V. INFUSIE,FLACON | 1135,447636 | STUK
EU/1/18/1281/002 | KANJINTI INFUSIEPOEDER FLACON 420MG | TRASTUZUMAB-420-MG-POED. V. INFUSIE,FLACON | 1135,447636 | STUK
EU/1/18/1295/002 | TRAZIMERA INFUSIEPOEDER FLACON 420MG | TRASTUZUMAB-420-MG-POED. V. INFUSIE,FLACON | 1135,447636 | STUK
EU/1/01/199/001 | TRAVATAN OOGDRUPPELS 40MCG/ML FLACON 2,5ML | TRAVOPROST-.04-MG/ML-OOGDRUPPELS | 3,382501 | ML
EU/1/01/199/002 | TRAVATAN OOGDRUPPELS 40MCG/ML FLACON 2,5ML | TRAVOPROST-.04-MG/ML-OOGDRUPPELS | 3,382501 | ML
111943 | TRAVOPROST CF OOGDRUPPELS 40MCG/ML FLAC 2,5ML | TRAVOPROST-.04-MG/ML-OOGDRUPPELS | 3,161658 | ML
112011 | TRAVOPROST SANDOZ OOGDRUPPELS 40MCG/ML FLAC 2,5ML | TRAVOPROST-.04-MG/ML-OOGDRUPPELS | 3,382501 | ML
112273 | TRAVOPROST TEVA OOGDRUPPELS 40MCG/ML FLAC 2,5ML | TRAVOPROST-.04-MG/ML-OOGDRUPPELS | 3,382501 | ML
113007//9145 | TRAZOLAN TABLET 100MG | TRAZODONE-100-MG-TABLET | 0,346906 | STUK
9145 | TRAZOLAN TABLET 100MG | TRAZODONE-100-MG-TABLET | 0,346906 | STUK
14974 | TREOSULFAN MEDAC INFUSIEPOEDER 1000MG | TREOSULFAN-1000-MG-POED. V. INFUSIE,FLACON | 123,993949 | STUK
14975 | TREOSULFAN MEDAC INFUSIEPOEDER 5000MG | TREOSULFAN-5000-MG-POED. V. INFUSIE,FLACON | 614,984846 | STUK
123904 | TREOSULFAN TILLOMED INFUSIEPOEDER 5000MG | TREOSULFAN-5000-MG-POED. V. INFUSIE,FLACON | 614,984846 | STUK
32553 | REMODULIN INFVLST 10MG/ML FLACON 20ML | TREPROSTINIL-10-MG/ML-INFUUSVLOEISTOF, FLACON | 648,635974 | ML
32550 | REMODULIN INFVLST 1MG/ML FLACON 20ML | TREPROSTINIL-1-MG/ML-INFUUSVLOEISTOF, FLACON | 93,628632 | ML
32551 | REMODULIN INFVLST 2,5MG/ML FLACON 20ML | TREPROSTINIL-2.5-MG/ML-INFUUSVLOEISTOF, FLACON | 226,556872 | ML
32552 | REMODULIN INFVLST 5MG/ML FLACON 20ML | TREPROSTINIL-5-MG/ML-INFUUSVLOEISTOF, FLACON | 393,218066 | ML
122813//109745 | TRECLINAC GEL 0,25/10MG/G | TRETINOIN-0.25-MG/G-HUIDGEL-CLINDAMYCIN-10-MG/G-HUIDGEL | 0,533082 | G
109745 | TRECLINAC GEL 0,25/10MG/G | TRETINOIN-0.25-MG/G-HUIDGEL-CLINDAMYCIN-10-MG/G-HUIDGEL | 0,545724 | G
20455 | VESANOID CAPSULE 10MG | TRETINOIN-10-MG-CAPSULE | 3,676039 | STUK
21837 | NASACORT NEUSSPRAY 55MCG/DO 120DO | TRIAMCINOLONE-.055-MG-NEUSSPRAY | 0,076752 | DOSIS
1591 | KENACORT A 10 INJECTIESUSPENSIE 10MG/ML FLACON 5ML | TRIAMCINOLONE-10-MG/ML-INJECTIEVLOEISTOF, FLAC | 0,901392 | ML
110359 | TRISPAN INJSUSP 20MG/ML AMPUL 1ML | TRIAMCINOLONE-20-MG/ML-INJ.VLOEISTOF AMPUL | 9,680070 | ML
34023//5341 | KENACORT A 40 INJECTIESUSPENSIE 40MG/ML AMPUL 1ML | TRIAMCINOLONE-40-MG/ML-INJECTIEVLOEISTOF, FLAC | 12,797472 | ML
112133//5341 | KENACORT A 40 INJECTIESUSPENSIE 40MG/ML FLACON 1ML | TRIAMCINOLONE-40-MG/ML-INJECTIEVLOEISTOF, FLAC | 12,797472 | ML
116929//5341 | KENACORT A 40 INJECTIESUSPENSIE 40MG/ML FLACON 1ML | TRIAMCINOLONE-40-MG/ML-INJECTIEVLOEISTOF, FLAC | 12,797472 | ML
116938//5341 | KENACORT A 40 INJECTIESUSPENSIE 40MG/ML FLACON 1ML | TRIAMCINOLONE-40-MG/ML-INJECTIEVLOEISTOF, FLAC | 12,797472 | ML
23115//5341 | KENACORT A 40 INJECTIESUSPENSIE 40MG/ML FLACON 1ML | TRIAMCINOLONE-40-MG/ML-INJECTIEVLOEISTOF, FLAC | 12,797472 | ML
5341 | KENACORT A 40 INJECTIESUSPENSIE 40MG/ML FLACON 1ML | TRIAMCINOLONE-40-MG/ML-INJECTIEVLOEISTOF, FLAC | 12,797472 | ML
5341 | KENACORT A 40 INJECTIESUSPENSIE 40MG/ML FLACON 5ML | TRIAMCINOLONE-40-MG/ML-INJECTIEVLOEISTOF, FLAC | 12,797472 | ML
EU/1/17/1199/001 | CUPRIOR TABLET FILMOMHULD 150MG | TRIENTINE-150-MG-TABLET | 44,374472 | STUK
EU/1/16/1096/001 | LONSURF TABLET FILMOMHULD 15/6,14MG | TRIFLURIDINE-15-MG-TABLET-TIPIRACIL-6.14-MG-TABLET | 28,373408 | STUK
EU/1/16/1096/003 | LONSURF TABLET FILMOMHULD 15/6,14MG | TRIFLURIDINE-15-MG-TABLET-TIPIRACIL-6.14-MG-TABLET | 28,373408 | STUK
EU/1/16/1096/004 | LONSURF TABLET FILMOMHULD 20/8,19MG | TRIFLURIDINE-20-MG-TABLET-TIPIRACIL-8.19-MG-TABLET | 37,786134 | STUK
EU/1/16/1096/006 | LONSURF TABLET FILMOMHULD 20/8,19MG | TRIFLURIDINE-20-MG-TABLET-TIPIRACIL-8.19-MG-TABLET | 37,786134 | STUK
640 | ARTANE TABLET 2MG | TRIHEXYPHENIDYL-2-MG-TABLET | 0,058446 | STUK
641 | ARTANE TABLET 5MG | TRIHEXYPHENIDYL-5-MG-TABLET | 0,148643 | STUK
55722 | TRIMETHOPRIM CF TABLET 100MG | TRIMETHOPRIM-100-MG-TABLET | 0,228464 | STUK
9596 | TRIMETHOPRIM TEVA TABLET 100MG | TRIMETHOPRIM-100-MG-TABLET | 0,228464 | STUK
13359 | COTRIMOXAZOL FORTE AUROBINDO TABLET 960MG | TRIMETHOPRIM-160-MG-TABLET-SULFAMETHOXAZOLE-800-MG-TABLET | 0,267200 | STUK
55506 | COTRIMOXAZOL FORTE CF TABLET 960MG | TRIMETHOPRIM-160-MG-TABLET-SULFAMETHOXAZOLE-800-MG-TABLET | 0,267200 | STUK
10243 | COTRIMOXAZOL TEVA TABLET 960MG | TRIMETHOPRIM-160-MG-TABLET-SULFAMETHOXAZOLE-800-MG-TABLET | 0,267200 | STUK
9597 | TRIMETHOPRIM TEVA TABLET 300MG | TRIMETHOPRIM-300-MG-TABLET | 1,147262 | STUK
13358 | COTRIMOXAZOL AUROBINDO TABLET 480MG | TRIMETHOPRIM-80-MG-TABLET-SULFAMETHOXAZOLE-400-MG-TABLET | 0,155277 | STUK
55505 | COTRIMOXAZOL CF TABLET 480MG | TRIMETHOPRIM-80-MG-TABLET-SULFAMETHOXAZOLE-400-MG-TABLET | 0,155277 | STUK
9647 | COTRIMOXAZOL TEVA TABLET 480MG | TRIMETHOPRIM-80-MG-TABLET-SULFAMETHOXAZOLE-400-MG-TABLET | 0,155277 | STUK
10550 | COTRIMOXAZOL TEVA SUSPENSIE 240MG/5ML | TRIMETHOPRIM-8-MG/ML-OPLOSSING/SUSPENSIE, ORAAL-SULFAMETHOXAZOLE-40-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,047488 | ML
110636 | TRIPTOFEM INJVLST 0,1MG/ML WWSP 1ML | TRIPTORELIN-.1-MG/ML-INJ.VLOEISTOF, WWSP | 6,434831 | ML
125479//31138 | PAMORELIN INJPDR FLACON 11,25MG + SOLVENS 2ML | TRIPTORELIN-11.25-MG-POED. V. INJECTIE, FLACON | 268,004391 | STUK
31138 | PAMORELIN INJPDR FLACON 11,25MG + SOLVENS 2ML | TRIPTORELIN-11.25-MG-POED. V. INJECTIE, FLACON | 268,004391 | STUK
34737 | SALVACYL INJECTIEPOEDER 11,25MG + SOLVENS 2ML | TRIPTORELIN-11.25-MG-POED. V. INJECTIE, FLACON | 268,004391 | STUK
123515//31138 | TRIPTORELINE BMODESTO INJPDR FL 11,25MG + SOLV 2ML | TRIPTORELIN-11.25-MG-POED. V. INJECTIE, FLACON | 268,004391 | STUK
125956//31138 | TRIPTORELINE ERC INJPDR FL 11,25MG + SOLV 2ML | TRIPTORELIN-11.25-MG-POED. V. INJECTIE, FLACON | 268,004391 | STUK
103585 | PAMORELIN INJPDR FLACON 22,5MG + SOLVENS 2ML | TRIPTORELIN-22.5-MG-POED. V. INJECTIE, FLACON | 501,015834 | STUK
125741//103585 | TRIPTORELINE BMODESTO INJPDR FL 22,5MG + SOLV 2ML | TRIPTORELIN-22.5-MG-POED. V. INJECTIE, FLACON | 501,015834 | STUK
33849 | PAMORELIN INJPDR FLACON 3,75MG + SOLVENS 2ML | TRIPTORELIN-3.75-MG-POED. V. INJECTIE, FLACON | 92,221735 | STUK
118913//12450 | DECAPEPTYL CR INJPDR 3,75MG IN WWSP +SOLV 1ML | TRIPTORELIN-3.75-MG-POED. V. INJECTIE, WWSP | 101,090925 | STUK
122901//12450 | DECAPEPTYL CR INJPDR 3,75MG IN WWSP +SOLV 1ML | TRIPTORELIN-3.75-MG-POED. V. INJECTIE, WWSP | 101,090925 | STUK
123807//12450 | DECAPEPTYL CR INJPDR 3,75MG IN WWSP +SOLV 1ML | TRIPTORELIN-3.75-MG-POED. V. INJECTIE, WWSP | 101,090925 | STUK
12450 | DECAPEPTYL CR INJPDR 3,75MG IN WWSP +SOLV 1ML | TRIPTORELIN-3.75-MG-POED. V. INJECTIE, WWSP | 113,957417 | STUK
121160//25383 | GONAPEPTYL DEPOT INJPDR 3,75MG IN WWSP + SOLV 1ML | TRIPTORELIN-3.75-MG-POED. V. INJECTIE, WWSP | 101,090925 | STUK
33701 | MYDRIASERT OOGINSERT 20STUKS IN SACHET + PINCET | TROPICAMIDE-0.28-MG-OOGSTIFT-PHENYLEPHRINE-5.4-MG-OOGSTIFT | 6,818257 | STUK
33701 | MYDRIASERT OOGINSERT IN SACHET + PINCET | TROPICAMIDE-0.28-MG-OOGSTIFT-PHENYLEPHRINE-5.4-MG-OOGSTIFT | 6,818257 | STUK
EU/1/12/750/001 | ESMYA TABLET 5MG | ULIPRISTAL-5-MG-TABLET | 4,255958 | STUK
EU/1/12/750/002 | ESMYA TABLET 5MG | ULIPRISTAL-5-MG-TABLET | 4,255958 | STUK
EU/1/14/922/002 | INCRUSE ELLIPTA INHALPDR 55MCG/DO 30DO + INH | UMECLIDINIUM-0.055-MG-INHALATIEPOEDER INCL INHALER | 0,957415 | DOSIS
EU/1/14/898/002 | ANORO ELLIPTA INHPDR 55/22MCG 30DO | UMECLIDINIUM-0.055-MG-INHALATIEPOEDER INCL INHALER-VILANTEROL-0.022-MG-INHALATIEPOEDER INCL INHALER | 1,318112 | DOSIS
110121 | FOSTIMON INJPDR FL 150IE + SOLV 1ML WWSP | UROFOLLITROPHIN-150-IE-POED. V. INJECTIE, FLACON | 50,895916 | STUK
110120 | FOSTIMON INJPDR FL 75IE + SOLV 1ML WWSP | UROFOLLITROPHIN-75-IE-POED. V. INJECTIE, FLACON | 25,588355 | STUK
118788 | GRINTEROL CAPSULE 250MG | URSODEOXYCHOLIC ACID-250-MG-CAPSULE | 0,312984 | STUK
117964 | URSODEOXYCHOLZUUR GLENMARK CAPSULE 250MG | URSODEOXYCHOLIC ACID-250-MG-CAPSULE | 0,324541 | STUK
111238 | URSODEOXYCHOLZUUR STRIDES CAPSULE 250MG | URSODEOXYCHOLIC ACID-250-MG-CAPSULE | 0,312984 | STUK
112534//8384 | URSOFALK CAPSULE 250MG | URSODEOXYCHOLIC ACID-250-MG-CAPSULE | 0,324541 | STUK
8384 | URSOFALK CAPSULE 250MG | URSODEOXYCHOLIC ACID-250-MG-CAPSULE | 0,324541 | STUK
114508//9307 | URSOCHOL TABLET 300MG | URSODEOXYCHOLIC ACID-300-MG-TABLET | 0,715200 | STUK
118146//9307 | URSOCHOL TABLET 300MG | URSODEOXYCHOLIC ACID-300-MG-TABLET | 0,715200 | STUK
118518//9307 | URSOCHOL TABLET 300MG | URSODEOXYCHOLIC ACID-300-MG-TABLET | 0,715200 | STUK
9307 | URSOCHOL TABLET 300MG | URSODEOXYCHOLIC ACID-300-MG-TABLET | 0,715200 | STUK
22117=9307 | URSODEOXYCHOLZUUR IMPHOS TABLET 300MG | URSODEOXYCHOLIC ACID-300-MG-TABLET | 0,715200 | STUK
120752 | URSOTEVA TABLET 300MG | URSODEOXYCHOLIC ACID-300-MG-TABLET | 0,715200 | STUK
112405 | URSOFALK TABLET FILMOMHULD 500MG | URSODEOXYCHOLIC ACID-500-MG-TABLET | 0,640761 | STUK
101647 | URSOFALK SUSPENSIE 50MG/ML | URSODEOXYCHOLIC ACID-50-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,123689 | ML
EU/1/08/494/003 | STELARA INJVLST 90MG/ML WWSP 0,5ML | USTEKINUMAB-45-MG-INJ.VLOEISTOF, WWSP | 2547,114028 | STUK
EU/1/08/494/001 | STELARA INJVLST 90MG/ML FLACON 0,5ML | USTEKINUMAB-45-MG-INJECTIEVLOEISTOF, FLAC | 2693,643223 | STUK
EU/1/08/494/005 | STELARA INFVLST CONC 5MG/ML FLACON 26ML | USTEKINUMAB-5-MG/ML-INFUUSVLOEISTOF, FLACON | 100,837503 | ML
EU/1/08/494/004 | STELARA INJVLST 90MG/ML WWSP 1ML | USTEKINUMAB-90-MG-INJ.VLOEISTOF, WWSP | 2547,114028 | STUK
18065 | ZELITREX TABLET 500MG | VALACICLOVIR-500-MG-TABLET | 1,142594 | STUK
25992 | VALCYTE TABLET FILMOMHULD 450MG | VALGANCICLOVIR-450-MG-TABLET | 13,322315 | STUK
34730 | VALCYTE POEDER V DRANK 50MG/ML | VALGANCICLOVIR-50-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 2,586735 | ML
24465 | ORFIRIL INJVLST 100MG/ML AMPUL 3ML | VALPROIC ACID-100-MG/ML-INJ.VLOEISTOF AMPUL | 3,362812 | ML
7405 | DEPAKINE ENTERIC TABLET 150MG | VALPROIC ACID-150-MG-TABLET, MAAGSAPRESISTENT | 0,059071 | STUK
7405 | DEPAKINE ENTERIC TABLET MSR 150MG | VALPROIC ACID-150-MG-TABLET, MAAGSAPRESISTENT | 0,059071 | STUK
55564 | NATRIUMVALPROAAT APOTEX TABLET MSR 150MG | VALPROIC ACID-150-MG-TABLET, MAAGSAPRESISTENT | 0,059071 | STUK
7055 | DEPAKINE ENTERIC TABLET 300MG | VALPROIC ACID-300-MG-TABLET, MAAGSAPRESISTENT | 0,092090 | STUK
7055 | DEPAKINE ENTERIC TABLET MSR 300MG | VALPROIC ACID-300-MG-TABLET, MAAGSAPRESISTENT | 0,092090 | STUK
55565 | NATRIUMVALPROAAT APOTEX TABLET MSR 300MG | VALPROIC ACID-300-MG-TABLET, MAAGSAPRESISTENT | 0,092090 | STUK
110594//13157 | DEPAKINE CHRONO TABLET MGA 300MG | VALPROIC ACID-300-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,276799 | STUK
110764//13157 | DEPAKINE CHRONO TABLET MGA 300MG | VALPROIC ACID-300-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,276799 | STUK
110791//13157 | DEPAKINE CHRONO TABLET MGA 300MG | VALPROIC ACID-300-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,276799 | STUK
112498//13157 | DEPAKINE CHRONO TABLET MGA 300MG | VALPROIC ACID-300-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,276799 | STUK
13157 | DEPAKINE CHRONO TABLET MGA 300MG | VALPROIC ACID-300-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,276799 | STUK
35065 | NATRIUMVALPROAAT CF CHRONO TABLET MVA 300MG | VALPROIC ACID-300-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,276799 | STUK
33299 | NATRIUMVALPROAAT SANDOZ CHRONO TABLET MVA 300MG | VALPROIC ACID-300-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,276799 | STUK
33979 | NATRIUMVALPROAAT TEVA CHRONO TABLET MGA 300MG | VALPROIC ACID-300-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,276799 | STUK
14996 | DEPAKINE INJECTIEPOEDER FLAC 400MG + SOLV 4ML | VALPROIC ACID-400-MG-POED. V. INJECTIE, FLACON | 11,057896 | STUK
7476 | DEPAKINE ENTERIC TABLET 500MG | VALPROIC ACID-500-MG-TABLET, MAAGSAPRESISTENT | 0,215169 | STUK
117598//7476 | DEPAKINE ENTERIC TABLET MSR 500MG | VALPROIC ACID-500-MG-TABLET, MAAGSAPRESISTENT | 0,215169 | STUK
118583//7476 | DEPAKINE ENTERIC TABLET MSR 500MG | VALPROIC ACID-500-MG-TABLET, MAAGSAPRESISTENT | 0,215169 | STUK
7476 | DEPAKINE ENTERIC TABLET MSR 500MG | VALPROIC ACID-500-MG-TABLET, MAAGSAPRESISTENT | 0,215169 | STUK
110797//11775 | DEPAKINE CHRONO TABLET MGA 500MG | VALPROIC ACID-500-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,224224 | STUK
11775 | DEPAKINE CHRONO TABLET MGA 500MG | VALPROIC ACID-500-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,224224 | STUK
123383//11775 | DEPAKINE CHRONO TABLET MGA 500MG | VALPROIC ACID-500-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,224224 | STUK
123524//11775 | DEPAKINE CHRONO TABLET MGA 500MG | VALPROIC ACID-500-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,224224 | STUK
126818//11775 | DEPAKINE CHRONO TABLET MGA 500MG | VALPROIC ACID-500-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,224224 | STUK
17172//11775 | DEPAKINE CHRONO TABLET MGA 500MG | VALPROIC ACID-500-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,224224 | STUK
118028//11775 | DEPAKINE CHRONO TABLET MGA 500MG | VALPROIC ACID-500-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,241981 | STUK
121183//11775 | DEPAKINE CHRONO TABLET MGA 500MG | VALPROIC ACID-500-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,241981 | STUK
33302 | NATRIUMVALPROAAT 1A PHARMA CHRONO TABLET MVA 500MG | VALPROIC ACID-500-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,224224 | STUK
35066 | NATRIUMVALPROAAT CF CHRONO TABLET MVA 500MG | VALPROIC ACID-500-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,241981 | STUK
33300 | NATRIUMVALPROAAT SANDOZ CHRONO TABLET MVA 500MG | VALPROIC ACID-500-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,224224 | STUK
33980 | NATRIUMVALPROAAT TEVA CHRONO TABLET MGA 500MG | VALPROIC ACID-500-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,224224 | STUK
55567 | NATRIUMVALPROAAT APOTEX DRANK 60MG/ML | VALPROIC ACID-60-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,053397 | ML
EU/1/15/1058/006 | ENTRESTO TABLET FILMOMHULD 97/103MG | VALSARTAN-103-MG-TABLET-SACUBITRIL-97-MG-TABLET | 2,082814 | STUK
EU/1/15/1058/007 | ENTRESTO TABLET FILMOMHULD 97/103MG | VALSARTAN-103-MG-TABLET-SACUBITRIL-97-MG-TABLET | 2,082814 | STUK
126125//26940 | DIOVAN TABLET OMHULD 160MG | VALSARTAN-160-MG-TABLET | 0,284744 | STUK
26940 | DIOVAN TABLET OMHULD 160MG | VALSARTAN-160-MG-TABLET | 0,343408 | STUK
103737 | VALSARTAN CF TABLET FILMOMHULD 160MG | VALSARTAN-160-MG-TABLET | 0,343408 | STUK
105536 | VALSARTAN KRKA TABLET FILMOMHULD 160MG | VALSARTAN-160-MG-TABLET | 0,284744 | STUK
102764 | VALSARTAN PCH TABLET FILMOMHULD 160MG | VALSARTAN-160-MG-TABLET | 0,343408 | STUK
EU/1/15/1058/001 | ENTRESTO TABLET FILMOMHULD 24/ 26MG | VALSARTAN-26-MG-TABLET-SACUBITRIL-24-MG-TABLET | 2,096802 | STUK
34472 | DIOVAN TABLET OMHULD 320MG | VALSARTAN-320-MG-TABLET | 0,596366 | STUK
107481 | DIOVAN DRANK 3MG/ML | VALSARTAN-3-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,051528 | ML
108248 | VALSARTAN AUROBINDO TABLET FILMOMHULD 40MG | VALSARTAN-40-MG-TABLET | 0,524097 | STUK
103732 | VALSARTAN CF TABLET FILMOMHULD 40MG | VALSARTAN-40-MG-TABLET | 0,524097 | STUK
107560 | VALSARTAN MYLAN TABLET FILMOMHULD 40MG | VALSARTAN-40-MG-TABLET | 0,524097 | STUK
102756 | VALSARTAN PCH TABLET FILMOMHULD 40MG | VALSARTAN-40-MG-TABLET | 0,524097 | STUK
EU/1/15/1058/002 | ENTRESTO TABLET FILMOMHULD 49/ 51MG | VALSARTAN-51-MG-TABLET-SACUBITRIL-49-MG-TABLET | 2,082814 | STUK
EU/1/15/1058/004 | ENTRESTO TABLET FILMOMHULD 49/ 51MG | VALSARTAN-51-MG-TABLET-SACUBITRIL-49-MG-TABLET | 2,082814 | STUK
EU/1/15/1058/003 | ENTRESTO TABLET FILMOMHULD 49/ 51MG | VALSARTAN-51-MG-TABLET-SACUBITRIL-49-MG-TABLET | 2,140969 | STUK
26939 | DIOVAN TABLET OMHULD 80MG | VALSARTAN-80-MG-TABLET | 0,252301 | STUK
103736 | VALSARTAN CF TABLET FILMOMHULD 80MG | VALSARTAN-80-MG-TABLET | 0,252301 | STUK
105535 | VALSARTAN KRKA TABLET FILMOMHULD 80MG | VALSARTAN-80-MG-TABLET | 0,252301 | STUK
102762 | VALSARTAN PCH TABLET FILMOMHULD 80MG | VALSARTAN-80-MG-TABLET | 0,252301 | STUK
104965 | VALSARTAN SANDOZ TABLET FILMOMHULD 80MG | VALSARTAN-80-MG-TABLET | 0,252301 | STUK
113555 | VANCOMYCINE AUROBINDO INFUSIEPOEDER FLACON 1000MG | VANCOMYCIN-1000-MG-POED. V. INFUSIE,FLACON | 13,336899 | STUK
110476 | VANCOMYCINE HIKMA INFUSIEPOEDER FLACON 1000MG | VANCOMYCIN-1000-MG-POED. V. INFUSIE,FLACON | 13,336899 | STUK
113830 | VANCOMYCINE AUROBINDO INFUSIEPOEDER FLACON 500MG | VANCOMYCIN-500-MG-POED. V. INFUSIE,FLACON | 7,893636 | STUK
110475 | VANCOMYCINE HIKMA INFUSIEPOEDER FLACON 500MG | VANCOMYCIN-500-MG-POED. V. INFUSIE,FLACON | 7,032176 | STUK
EU/1/11/749/001 | CAPRELSA TABLET 100MG | VANDETANIB-100-MG-TABLET | 77,099641 | STUK
EU/1/11/749/002 | CAPRELSA TABLET 300MG | VANDETANIB-300-MG-TABLET | 171,961281 | STUK
EU/1/14/923/006 | ENTYVIO INJVLST 108MG/0,68ML (158,8MG/ML) PEN | VEDOLIZUMAB-108-MG-INJ.VLOEISTOF, WWSP | 604,412039 | STUK
EU/1/14/923/003 | ENTYVIO INJVLST 108MG/0,68ML (158,8MG/ML) WWSP | VEDOLIZUMAB-108-MG-INJ.VLOEISTOF, WWSP | 604,412039 | STUK
EU/1/14/923/001 | ENTYVIO INFPDR FLACON 300MG | VEDOLIZUMAB-300-MG-POED. V. INFUSIE,FLACON | 2373,511429 | STUK
EU/1/10/646/002 | VPRIV INFUSIEPOEDER FLACON 400E | VELAGLUCERASE ALFA-400-IE-POED. V. INFUSIE,FLACON | 1530,992051 | STUK
EU/1/12/751/001 | ZELBORAF TABLET FILMOMHULD 240MG | VEMURAFENIB-240-MG-TABLET | 31,024637 | STUK
EU/1/16/1138/005 | VENCLYXTO TABLET FILMOMHULD 100MG | VENETOCLAX-100-MG-TABLET | 52,016637 | STUK
EU/1/16/1138/006 | VENCLYXTO TABLET FILMOMHULD 100MG | VENETOCLAX-100-MG-TABLET | 52,016637 | STUK
EU/1/16/1138/007 | VENCLYXTO TABLET FILMOMHULD 100MG | VENETOCLAX-100-MG-TABLET | 52,016637 | STUK
118456//20863 | EFEXOR XR CAPSULE MVA 150MG | VENLAFAXINE-150-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,531680 | STUK
118943//20863 | EFEXOR XR CAPSULE MVA 150MG | VENLAFAXINE-150-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,531680 | STUK
20863 | EFEXOR XR CAPSULE MVA 150MG | VENLAFAXINE-150-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,531680 | STUK
102455 | VENLAFAXINE TEVA RETARD CAPSULE MVA 150MG | VENLAFAXINE-150-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,531680 | STUK
108592 | VENLAFAXINE FOCUS TABLET MVA 225MG | VENLAFAXINE-225-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,818862 | STUK
26661 | EFEXOR XR CAPSULE MVA 37,5MG | VENLAFAXINE-37.5-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,216605 | STUK
102453 | VENLAFAXINE TEVA RETARD CAPSULE MVA 37,5MG | VENLAFAXINE-37.5-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,216605 | STUK
118457//20862 | EFEXOR XR CAPSULE MVA 75MG | VENLAFAXINE-75-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,289229 | STUK
118940//20862 | EFEXOR XR CAPSULE MVA 75MG | VENLAFAXINE-75-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,296285 | STUK
20862 | EFEXOR XR CAPSULE MVA 75MG | VENLAFAXINE-75-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,296285 | STUK
102454 | VENLAFAXINE TEVA RETARD CAPSULE MVA 75MG | VENLAFAXINE-75-MG-CAPSULE, MET GEREGULEERDE AFGIFTE | 0,296285 | STUK
18015 | VERAPAMIL HCL SANDOZ TABLET 120MG | VERAPAMIL-120-MG-TABLET | 0,104582 | STUK
15481 | ISOPTIN SR TABLET MGA 120MG | VERAPAMIL-120-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,170388 | STUK
12102 | ISOPTIN SR TABLET MGA 240MG | VERAPAMIL-240-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,213703 | STUK
26239=24174 | VERAPAMIL HCL AUROBINDO RETARD TABLET MGA 240MG | VERAPAMIL-240-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,213703 | STUK
19936 | VERAPAMIL HCL SANDOZ RETARD TABLET MGA 240MG | VERAPAMIL-240-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,213703 | STUK
21977=19936 | VERAPAMIL HCL TEVA RETARD TABLET MGA 240MG | VERAPAMIL-240-MG-TABLET, MET GEREGULEERDE AFGIFTE | 0,213703 | STUK
18013 | VERAPAMIL HCL SANDOZ TABLET 40MG | VERAPAMIL-40-MG-TABLET | 0,041587 | STUK
18014 | VERAPAMIL HCL SANDOZ TABLET 80MG | VERAPAMIL-80-MG-TABLET | 0,056168 | STUK
EU/1/10/645/002 | BRINAVESS INFVLST CONCENTRAAT 20MG/ML FLACON 25ML | VERNAKALANT-20-MG/ML-INFUUSVLOEISTOF, FLACON | 14,759953 | ML
EU/1/00/140/001 | VISUDYNE INFUSIEPOEDER FLACON 15MG | VERTEPORFIN-15-MG-POED. V. INFUSIE,FLACON | 1105,963634 | STUK
15722 | SABRIL GRANULAAT IN SACHETS 500MG | VIGABATRIN-500-MG-POEDER/GRANULAAT, ORAAL | 0,705613 | STUK
13707 | SABRIL TABLET 500MG | VIGABATRIN-500-MG-TABLET | 0,598667 | STUK
18857//13707 | SABRIL TABLET 500MG | VIGABATRIN-500-MG-TABLET | 0,598667 | STUK
EU/1/07/414/003 | GALVUS TABLET 50MG | VILDAGLIPTIN-50-MG-TABLET | 0,569766 | STUK
EU/1/07/414/005 | GALVUS TABLET 50MG | VILDAGLIPTIN-50-MG-TABLET | 0,579680 | STUK
EU/1/07/414/008 | GALVUS TABLET 50MG | VILDAGLIPTIN-50-MG-TABLET | 0,579680 | STUK
100081 | VINCRISTINESULFAAT PCH INJVLST 1MG/ML FLACON 1ML | VINCRISTINE-1-MG/ML-INJECTIEVLOEISTOF, FLAC | 11,963005 | ML
100081 | VINCRISTINESULFAAT PCH INJVLST 1MG/ML FLACON 2ML | VINCRISTINE-1-MG/ML-INJECTIEVLOEISTOF, FLAC | 11,963005 | ML
18020 | NAVELBINE INFVLST CONC 10MG/ML FLACON 1ML | VINORELBINE-10-MG/ML-INFUUSVLOEISTOF, FLACON | 20,074745 | ML
18020 | NAVELBINE INFVLST CONC 10MG/ML FLACON 5ML | VINORELBINE-10-MG/ML-INFUUSVLOEISTOF, FLACON | 20,074745 | ML
119281 | VINORELBINE ACCORD INFVLST CONC 10MG/ML FLAC 1ML | VINORELBINE-10-MG/ML-INFUUSVLOEISTOF, FLACON | 22,759784 | ML
119281 | VINORELBINE ACCORD INFVLST CONC 10MG/ML FLAC 5ML | VINORELBINE-10-MG/ML-INFUUSVLOEISTOF, FLACON | 22,759784 | ML
111393 | NAVELBINE CAPSULE 20MG | VINORELBINE-20-MG-CAPSULE | 42,016195 | STUK
111394 | NAVELBINE CAPSULE 30MG | VINORELBINE-30-MG-CAPSULE | 62,707400 | STUK
EU/1/02/212/025 | VFEND INFUSIEPOEDER FLACON 200MG | VORICONAZOLE-200-MG-POED. V. INFUSIE,FLACON | 107,978233 | STUK
119280 | VORICONAZOL B-MEDICAL INFUSIEPOEDER FLACON 200MG | VORICONAZOLE-200-MG-POED. V. INFUSIE,FLACON | 107,978233 | STUK
112276 | VORICONAZOL CF INFUSIEPOEDER FLACON 200MG | VORICONAZOLE-200-MG-POED. V. INFUSIE,FLACON | 107,978233 | STUK
113768 | VORICONAZOL MYLAN INFUSIEPOEDER FLACON 200MG | VORICONAZOLE-200-MG-POED. V. INFUSIE,FLACON | 107,978233 | STUK
114808 | VORICONAZOL TEVA INFUSIEPOEDER FLACON 200MG | VORICONAZOLE-200-MG-POED. V. INFUSIE,FLACON | 107,978233 | STUK
EU/1/02/212/018 | VFEND TABLET FILMOMHULD 200MG | VORICONAZOLE-200-MG-TABLET | 22,165824 | STUK
EU/1/13/891/028 | BRINTELLIX TABLET FILMOMHULD 20MG | VORTIOXETINE-20-MG-TABLET | 1,958073 | STUK
EU/1/04/302/001 | PRIALT INFVLST 100MCG/ML FLACON 1ML | ZICONOTIDE-0.1-MG/ML-INFUUSVLOEISTOF, FLACON | 336,976362 | ML
12639 | RETROVIR CAPSULE 100MG | ZIDOVUDINE-100-MG-CAPSULE | 1,237598 | STUK
16389 | RETROVIR INFVLST CONC 10MG/ML FLACON 20ML | ZIDOVUDINE-10-MG/ML-INFUUSVLOEISTOF, FLACON | 0,668150 | ML
EU/1/98/058/001 | COMBIVIR TABLET OMHULD | ZIDOVUDINE-300-MG-TABLET-LAMIVUDINE-150-MG-TABLET | 3,762516 | STUK
107779 | LAMIVUDINE/ZIDOVUDINE MYLAN TABL FILMOMH 150/300MG | ZIDOVUDINE-300-MG-TABLET-LAMIVUDINE-150-MG-TABLET | 3,762516 | STUK
EU/1/10/663/001 | LAMIVUDINE/ZIDOVUDINE TEVA TABL FILMOMH 150/300MG | ZIDOVUDINE-300-MG-TABLET-LAMIVUDINE-150-MG-TABLET | 3,762516 | STUK
EU/1/00/156/003 | TRIZIVIR TABLET FILMOMHULD | ZIDOVUDINE-300-MG-TABLET-LAMIVUDINE-150-MG-TABLET-ABACAVIR-300-MG-TABLET | 7,909211 | STUK
EU/1/00/156/002 | TRIZIVIR TABLET FILMOMHULD | ZIDOVUDINE-300-MG-TABLET-LAMIVUDINE-150-MG-TABLET-ABACAVIR-300-MG-TABLET | 9,430031 | STUK
EU/1/00/156/004 | TRIZIVIR TABLET FILMOMHULD | ZIDOVUDINE-300-MG-TABLET-LAMIVUDINE-150-MG-TABLET-ABACAVIR-300-MG-TABLET | 9,430031 | STUK
EU/1/04/286/001 | WILZIN CAPSULE 25MG | ZINC ACETATE-25-MG-CAPSULE | 0,817818 | STUK
EU/1/04/286/002 | WILZIN CAPSULE 50MG | ZINC ACETATE-50-MG-CAPSULE | 1,491777 | STUK
109562 | ZOLEDRONINEZUUR SANDOZ INFVLST 0,04MG/ML FL 100ML | ZOLEDRONIC ACID-0.04-MG/ML-INFUUSVLOEISTOF, FLACON | 1,226138 | ML
EU/1/01/176/007 | ZOMETA INFVLST 0,04MG/ML FLACON 100ML | ZOLEDRONIC ACID-0.04-MG/ML-INFUUSVLOEISTOF, FLACON | 1,252672 | ML
EU/1/05/308/001 | ACLASTA INFUSIEVLOEISTOF 0,05MG/ML FLACON 100ML | ZOLEDRONIC ACID-0.05-MG/ML-INFUUSVLOEISTOF, FLACON | 2,365222 | ML
109892 | ZOLEDRONINEZUUR FRES K INFVLST CON 0,8MG/ML FL 5ML | ZOLEDRONIC ACID-0.8-MG/ML-INFUUSVLOEISTOF, FLACON | 24,200561 | ML
109914 | ZOLEDRONINEZUUR HIKMA INFVLST CON 0,8MG/ML FL 5ML | ZOLEDRONIC ACID-0.8-MG/ML-INFUUSVLOEISTOF, FLACON | 24,200561 | ML
EU/1/01/176/004 | ZOMETA INFVLST CONC 0,8MG/ML FLACON 5ML | ZOLEDRONIC ACID-0.8-MG/ML-INFUUSVLOEISTOF, FLACON | 24,200561 | ML
31919 | ZOMIG ZIP ORODISP TABLET 2,5MG | ZOLMITRIPTAN-2.5-MG-SMELTTABLET | 2,307341 | STUK
31917 | ZOMIG TABLET OMHULD 2,5MG | ZOLMITRIPTAN-2.5-MG-TABLET | 2,973336 | STUK
123540//13223 | STILNOCT TABLET FILMOMHULD 10MG | ZOLPIDEM-10-MG-TABLET | 0,171288 | STUK
26424 | ZOLPIDEMTARTRAAT CF TABLET FILMOMHULD 10MG | ZOLPIDEM-10-MG-TABLET | 0,171288 | STUK
25353 | ZOLPIDEMTARTRAAT PCH TABLET FILMOMHULD 10MG | ZOLPIDEM-10-MG-TABLET | 0,189061 | STUK
EU/1/04/307/004 | ZONEGRAN CAPSULE 100MG | ZONISAMIDE-100-MG-CAPSULE | 0,958660 | STUK
117191 | ZONISAMIDE SANDOZ CAPSULE 100MG | ZONISAMIDE-100-MG-CAPSULE | 0,958660 | STUK
117170 | ZONISAMIDE TEVA CAPSULE 100MG | ZONISAMIDE-100-MG-CAPSULE | 0,958660 | STUK
11063 | IMOVANE TABLET 7,5MG | ZOPICLONE-7.5-MG-TABLET | 0,194618 | STUK
22397 | ZOPICLON CF TABLET 7,5MG | ZOPICLONE-7.5-MG-TABLET | 0,194618 | STUK
25628 | ZOPICLON TEVA TABLET 7,5MG | ZOPICLONE-7.5-MG-TABLET | 0,194618 | STUK
119731//4295 | CISORDINOL TABLET 10MG | ZUCLOPENTHIXOL-10-MG-TABLET | 0,105348 | STUK
14240//4295 | CISORDINOL TABLET 10MG | ZUCLOPENTHIXOL-10-MG-TABLET | 0,105348 | STUK
4295 | CISORDINOL TABLET 10MG | ZUCLOPENTHIXOL-10-MG-TABLET | 0,117053 | STUK
122767//7288 | CISORDINOL DEPOT INJVLST 200MG/ML AMPUL 1ML (IM) | ZUCLOPENTHIXOL-200-MG/ML-INJ.VLOEISTOF AMPUL | 4,450549 | ML
114385//7288 | CISORDINOL DEPOT INJVLST 200MG/ML AMPUL 1ML (IM) | ZUCLOPENTHIXOL-200-MG/ML-INJ.VLOEISTOF AMPUL | 5,571763 | ML
115016//7288 | CISORDINOL DEPOT INJVLST 200MG/ML AMPUL 1ML (IM) | ZUCLOPENTHIXOL-200-MG/ML-INJ.VLOEISTOF AMPUL | 5,571763 | ML
7288 | CISORDINOL DEPOT INJVLST 200MG/ML AMPUL 1ML (IM) | ZUCLOPENTHIXOL-200-MG/ML-INJ.VLOEISTOF AMPUL | 6,190848 | ML
14242//7288 | CLOPIXOL DEPOT INJVLST 200MG/ML AMPUL 1ML | ZUCLOPENTHIXOL-200-MG/ML-INJ.VLOEISTOF AMPUL | 4,450549 | ML
116418//7288 | ZUCLOPENTIXOLDECANOAAT DEP FIS INJ 200MG/ML AM 1ML | ZUCLOPENTHIXOL-200-MG/ML-INJ.VLOEISTOF AMPUL | 4,450549 | ML
9287 | CISORDINOL DRUPPELS 20MG/ML | ZUCLOPENTHIXOL-20-MG/ML-OPLOSSING/SUSPENSIE, ORAAL | 0,673784 | ML
123356//4296 | CISORDINOL TABLET 25MG | ZUCLOPENTHIXOL-25-MG-TABLET | 0,206420 | STUK
4296 | CISORDINOL TABLET 25MG | ZUCLOPENTHIXOL-25-MG-TABLET | 0,229355 | STUK
121200//4296 | ZUCLOPENTHIXOL FISHER TABLET FILMOMHULD 25MG | ZUCLOPENTHIXOL-25-MG-TABLET | 0,198237 | STUK
14239//4294 | CISORDINOL TABLET 2MG | ZUCLOPENTHIXOL-2-MG-TABLET | 0,037782 | STUK
4294 | CISORDINOL TABLET 2MG | ZUCLOPENTHIXOL-2-MG-TABLET | 0,041980 | STUK
14175 | CISORDINOL ACUTARD INJVLST 50MG/ML AMPUL 1ML | ZUCLOPENTHIXOL-50-MG/ML-INJ.VLOEISTOF AMPUL | 9,475390 | ML

TOELICHTING
1.

Inleiding
Op grond van de Wet geneesmiddelenprijzen (Wgp) zijn bij ministeriële regeling maximumprijzen voor geneesmiddelen vastgesteld. Ten minste tweemaal per jaar wordt onderzocht of er aanleiding is de eerder vastgestelde maximumprijzen te wijzigen.
1
Artikel 3 Wgp.
Uit het ter zake ingestelde onderzoek is gebleken dat actualisering noodzakelijk is, omdat prijzen in de referentielanden zijn gewijzigd.
Ik blijf in het algemeen aandacht houden voor de beschikbaarheid van de meer kwetsbare geneesmiddelen aan de zogenaamde ‘onderkant van de geneesmiddelenmarkt’. Daarom behoud ik ook voor deze herijking de mitigerende maatregel van het laagdrempelig ‘piepsysteem’ voor producten met een relatief lage omzet. Dit doe ik met de Tijdelijke beleidsregel maximumprijzen geneesmiddelen 2021 (hierna: Tijdelijke beleidsregel).
Met deze wijziging van de Regeling maximumprijzen geneesmiddelen (Rmg) worden de maximumprijzen voor de 49^e maal geactualiseerd. De wijzigingsregeling treedt in werking op 1 oktober 2021.
2.

Maximumprijzen, referentieprijslijsten en valutadatums
De maximumprijzen zijn vastgesteld op het rekenkundig gemiddelde van de prijzen van geneesmiddelen in de referentielanden, mits voor ten minste twee van deze landen een prijs kon worden bepaald.
2
Artikel 2 Wgp.
Bij het bepalen van de prijzen in de referentielanden is gebruikgemaakt van algemeen aanvaarde prijslijsten uit de referentielanden. Deze lijsten zijn aangewezen bij de Regeling referentieprijslijsten geneesmiddelen (Rrg).
Bij de onderhavige actualisering van maximumprijzen zijn de volgende prijslijsten gebruikt:
- − voor België: de prijslijst genaamd ‘Tarief voor Specialiteiten’, uitgegeven door de Algemene Pharmaceutische Bond (A.P.B.), te Brussel (hierna: TvS-lijst), zoals die gold op 13 april 2021, en, wat betreft ziekenhuisgeneesmiddelen, de prijslijst genaamd ‘bijlage I van het K.B. van 21.12.2001’, uitgegeven door het Rijksinstituut voor ziekte- en invaliditeitsverzekering (RIZIV), te Brussel (hierna: RIZIV-lijst), zoals die gold op 1 april 2021;
- − voor Frankrijk: de prijslijst genaamd ‘DATASEMP’, uitgegeven door Vidal S.A., te Parijs, zoals die gold op 6 april 2021;
- − voor het Verenigd Koninkrijk: de prijslijst genaamd ‘Dictionary of Medicines and Devices’, uitgegeven door de National Health Service, te Londen, zoals die gold op 1 april 2021.
- − voor Noorwegen: de prijslijst, genaamd ‘Price- and reimbursement list’, uitgegeven door de Norwegian Medicines Agency (NoMa), te Oslo, zoals die gold op 1 april 2021.
De in de voor het Verenigd Koninkrijk aangewezen prijslijst en de in TvS-lijst opgenomen af-fabrieksprijzen en apotheekverkoopprijzen (AVP’s) zijn omgerekend tot AIP’s.
3
Artikel 2, tweede lid, Wgp.
Daarbij zijn de Engelse prijzen vermenigvuldigd met de omrekeningsfactor 1,125 (rekening houdend met een vastgestelde groothandelsmarge in het Verenigd Koninkrijk van 12,5%). Bij de omzetting van de prijzen op de voor het Verenigd Koninkrijk aangewezen prijslijst van Engelse pond in euro’s is een koers van 1,17.378 euro per 1 pond gehanteerd.
Bij de omzetting van de prijzen op de voor Noorwegen aangewezen prijslijst van Noorse kroon in euro’s is een koers van 0,9.959 euro per 1 kroon gehanteerd.
Ook de Belgische prijzen zijn omgerekend tot AIP's. De prijzen voor terugbetaalbare geneesmiddelen, opgenomen in de TvS-lijst, zijn, op basis van de Belgische margeregels, teruggerekend vanaf de prijs af-fabriek, rekening houdend met een groothandelsmarge van:
- − 0,35 euro, als de verkoopprijs af-fabriek, btw niet inbegrepen, van het geneesmiddel, lager ligt of gelijk is aan 2,33 euro;
- − 15% van de verkoopprijs af-fabriek van het geneesmiddel, btw niet inbegrepen, als deze prijs hoger is dan 2,33 euro en lager dan 13,33 euro;
- − 2,00 euro + 0,9% van het deel van de verkoopprijs af-fabriek, btw niet inbegrepen, van het geneesmiddel hoger dan 13,33 euro, als die prijs hoger ligt of gelijk is aan 13,33 euro.
De Belgische prijzen van de niet-terugbetaalbare geneesmiddelen, opgenomen in de TvS-lijst, zijn teruggerekend rekening houdend met 6% omzetbelasting en een wettelijke (maximum)marge van 31% (gelimiteerd tot ten hoogste 7,44 euro) voor de apotheker. De prijzen van de Belgische ziekenhuisgeneesmiddelen die zonder ‘DEL_ID 1’-code
4
Of een geneesmiddel een ‘DEL_ID 1’-code heeft, is af te leiden uit de informatie op de website van het RIZIV. Via deze website kunnen per geneesmiddel de gegevens worden bekeken die in de databank zijn opgenomen. Daar staat niet expliciet of het geneesmiddel wel of niet een ‘DEL_ID 1’-code heeft. Echter, als bij een geneesmiddel in de kolom ‘Aflevering’ de vermelding ‘Publiek’ voorkomt, betekent het dat het geneesmiddel een ‘DEL_ID 1’-code heeft. Als bij een geneesmiddel in de kolom ‘Aflevering’ níét de vermelding ‘Publiek’ voorkomt, heeft het geneesmiddel geen ‘DEL_ID 1’-code en wordt het dus meegerekend.
zijn vermeld in de RIZIV-lijst zijn AIP’s en worden daarom niet verhoogd met een groothandelsmarge.
3.

Berekeningsmethode
Bij de berekening van maximumprijzen voor geneesmiddelen in Nederland is per referentieland het rekenkundig gemiddelde berekend van de prijzen van vergelijkbare geneesmiddelen die in de referentieprijslijsten staan vermeld. Een vergelijkbaar geneesmiddel is gedefinieerd als: “een geneesmiddel met dezelfde werkzame bestanddelen, van dezelfde of nagenoeg dezelfde sterkte en in dezelfde farmaceutische vorm als een ander geneesmiddel”.
5
Artikel 1, eerste lid, aanhef en onder c, Wgp.
In beginsel worden de prijzen van alle geneesmiddelen die op de referentieprijslijsten staan vermeld betrokken in de berekening.
Per referentieland zijn de vergelijkbare geneesmiddelen ingedeeld in productgroepen. Vervolgens is per referentieland op basis van de naam van de vergelijkbare geneesmiddelen de verpakkingsgrootte met de laagste prijs per eenheid product geselecteerd. Als de desbetreffende verpakkingsgrootte verscheidene malen met verschillende prijzen in de prijslijst is opgenomen, wordt niet de laagste prijs per eenheid product, maar het gemiddelde van de bij die verpakkingsgrootte vermelde prijzen betrokken in de prijsberekening. Daarna is per referentieland het totaal van de aldus in een bepaalde productgroep opgenomen prijzen rekenkundig gemiddeld. De maximumprijs van een geneesmiddel is vastgesteld op het rekenkundig gemiddelde van de referentielandgemiddelden.
4.

Uniforme openbare voorbereidingsprocedure, voorhangprocedure en verzoeken op basis van de Tijdelijke beleidsregel
Op de voorbereiding van een besluit tot wijziging van de bijlage bij de Rmg is de uniforme openbare voorbereidingsprocedure
6
Bedoeld in Afdeling 3.4 van de Algemene wet bestuursrecht (Awb).
van toepassing.
7
Artikel 2, eerste lid, derde volzin, Wgp.
Daarom is een ontwerpregeling tot wijziging van de bijlage bij de Rmg, op 24 juni 2021 ter kennisgeving in de Staatscourant gepubliceerd.
8
Stcrt. 2021, 32501 Zie artikel 3:12, tweede lid, Awb.
Tevens is de ontwerpregeling op de dag na de publicatie in de Staatscourant gedurende een periode van zes weken ter inzage gelegd bij het CIBG, een uitvoeringsorganisatie van het Ministerie van Volksgezondheid, Welzijn en Sport.
9
Artikel 3:11 Awb.
Gedurende deze periode hebben belanghebbenden de gelegenheid hun zienswijze te geven over de voorgenomen maximumprijzen. Dit stelt hen niet alleen in de gelegenheid de juistheid van de voorgenomen maximumprijzen te controleren en aan de orde te stellen, maar ook om argumenten en informatie aan te dragen die aanleiding kunnen zijn om de bij de ontwerpregeling gepubliceerde maximumprijzen te wijzigen. Er zijn negen zienswijzen ontvangen.
In deze regeling zijn ook de toegekende verzoeken verwerkt die op grond van artikel 3, tweede lid, Wgp in combinatie met de Tijdelijke beleidsregel zijn ingediend tijdens de eerste vijf weken van de zienswijzeperiode. Naar aanleiding van de ontwerpregeling hebben 31 bedrijven verzoeken ingediend voor een hogere maximumprijs op grond van de Tijdelijke beleidsregel. Het betreft in totaal 511 producten (oftewel registratienummers), waarvan de verzoeken voor 373 producten zijn toegewezen en 138 zijn afgewezen.
Hieronder wordt kort ingegaan op de ontvangen zienswijzen en wordt hierop een reactie gegeven.
- a)
In een zienswijze werd gesteld dat een maximumprijs voor een product te laag zou zijn doordat de prijs voor een verpakking van twee voorgevulde spuiten van een bepaald geneesmiddel in het Verenigd Koninkrijk gelijk is aan de prijs van één voorgevulde spuit.
De belanghebbende had ten aanzien van de voorgenomen maximumprijs voor het desbetreffende product niet alleen een zienswijze ingediend maar ook een verzoek op grond van de Tijdelijke beleidsregel. Dat verzoek is toegewezen. Er wordt dus afgezien van het vaststellen van een maximumprijs voor dit product. Dat – zoals door de belanghebbende werd gesteld – de maximumprijs onredelijk laag zou uitpakken is in deze situatie dus niet van toepassing.
- b)
In een andere zienswijze werd gesteld dat een maximumprijs voor twee producten achterwege moest blijven, omdat sprake is van zelfzorggeneesmiddelen.
Deze zienswijze heeft mij aanleiding gegeven af te zien van vaststelling van een maximumprijs voor de desbetreffende producten, omdat het zelfzorggeneesmiddelen zijn in een verpakkingsgrootte die niet bestemd is voor chronisch gebruik, niet om het enkele feit dat het zelfzorggeneesmiddelen zijn. Mijn bevoegdheid tot het vaststellen van maximumprijzen strekt zich namelijk ook uit over bijvoorbeeld zelfzorggeneesmiddelen voor chronisch gebruik.
- c)
In een andere zienswijze werd gesteld dat een product niet had moeten worden betrokken in de berekening van een maximumprijs omdat het een andere sterkte had. Omdat het om een ampul gaat voor een vaste eenmalige inname, had ik de sterkte volgens de indiener van deze zienswijze moeten bepalen op basis van de totale hoeveelheid werkzame stof in de ampul, niet op basis van de concentratie (eenheden per ml).
Naar mijn oordeel moet de sterkte bij geneesmiddelen die bestemd zijn om in één keer in hun geheel te worden toegediend inderdaad worden bepaald op basis van de totale hoeveelheid werkzame stof in het product en niet op basis van de concentratie. Gelet hierop heb ik het desbetreffende product niet betrokken in de berekening van de maximumprijs voor de desbetreffende productgroep.
- d)
In een andere zienswijze werd gesteld dat ik ten onrechte een op de voor Noorwegen aangewezen prijslijst vermeld product niet had betrokken in de berekening van de maximumprijs voor een productgroep.
Ik heb geconstateerd dat het desbetreffende product op de peildatum inderdaad met een prijs was vermeld op de voor Noorwegen aangewezen prijslijst. Er was geen marktstatuscode bij vermeld waaruit zou blijken dat het product niet in de handel was. Daarom heb ik het desbetreffende product wel betrokken bij de berekening van de definitieve maximumprijs voor de desbetreffende productgroep.
- e)
In een andere zienswijze werd gesteld dat ik ten onrechte een op de RIZIV-lijst vermeld product niet had betrokken in de berekening van de maximumprijs voor een productgroep.
Ik heb geconstateerd dat ik inderdaad ten onrechte een Belgisch product niet heb betrokken in de berekening van de maximumprijs voor de desbetreffende productgroep, maar het betreft een product dat op de TvS-lijst staat, niet op de RIZIV-lijst. Daarom heb ik het desbetreffende product wel betrokken in de berekening van de definitieve maximumprijs voor de desbetreffende productgroep. De definitieve maximumprijs is lager dan de voorgenomen maximumprijs.
- f)
In een andere zienswijze wordt gesteld dat ik bij de berekening van een maximumprijs ten onrechte een op de voor Noorwegen en op de voor het Verenigd Koninkrijk aangewezen prijslijst vermelde producten buiten beschouwing heb gelaten.
Ik heb geconstateerd dat het op dit moment niet duidelijk is welke producten moeten worden betrokken in de berekening van de maximumprijs voor deze productgroep. Daarom heb ik in het kader van deze herijking besloten geen maximumprijs vast te stellen voor de desbetreffende productgroep. Ten behoeve van de volgende herijking zal ik onderzoeken weke producten ik te zijner tijd moet betrekken in de berekening van de maximumprijzen en welke productgroepen daartoe moeten worden gevormd.
- g)
In een andere zienswijze werd gesteld dat ik ten onrechte een product dat was vermeld op de voor het Verenigd Koninkrijk aangewezen prijslijst niet had betrokken in de berekening van de maximumprijs voor een productgroep.
De stelling van de indiener bleek niet juist te zijn. Het desbetreffende product was op de peildatum voor deze herijking (1 april 2021) niet met een prijs vermeld op de voor het Verenigd Koninkrijk aangewezen prijslijst. Deze zienswijze heeft mij dus geen aanleiding gegeven om de voorgenomen maximumprijs te wijzigen of af te zien van vaststelling ervan.
- h)
In een andere zienswijze wordt gesteld dat een product ten onrechte is vermeld in een productgroep.
Ik heb geconstateerd dat het desbetreffende product ten onrechte was vermeld in de desbetreffende productgroep. Daarom heb ik dat product verwijderd bij de desbetreffende productgroep.
- i)
In een andere zienswijze werd gesteld dat vaststelling van een maximumprijs voor een aantal producten in strijd is met het doel en de uitgangspunten van de Wgp.
De belanghebbende had ten aanzien van de voorgenomen maximumprijzen voor de desbetreffende producten niet alleen een zienswijze ingediend maar ook verzoeken op grond van de Tijdelijke beleidsregel. Die verzoeken zijn allemaal toegewezen. Los daarvan wordt opgemerkt dat het vaststellen van een maximumprijs voor de desbetreffende producten niet in strijd is met het doel en de uitgangspunten van de Wgp.
Naar aanleiding van de zienswijzen is voorts besloten de maximumprijs zoals die was opgenomen in de ontwerpregeling van de volgende drie productgroepen te wijzigen:
- 1.
AMPHOTERICIN LIPOSOMAAL-50-MG-POED. V. INFUSIE,FLACON;
- 2.
COLECALCIFEROL-25000-IE/ML-OPLOSSING/SUSPENSIE, ORAAL;
- 3.
SOMATROPIN-5-MG/ML-INJ.VLOEISTOF AMPUL.
Ook is naar aanleiding van de zienswijzen besloten af te zien van vaststelling van de voorgenomen maximumprijs voor:
- 1.
RVG-nummer 113512 Maagzuurremmer omeprazol cf capsule msr 10mg, uit de productgroep OMEPRAZOLE-10-MG-CAPSULE, MAAGSAPRESISTENT;
- 2.
RVG-nummer 113513 Maagzuurremmer omeprazol cf capsule msr 20mg uit de productgroep OMEPRAZOLE-20-MG-CAPSULE, MAAGSAPRESISTENT;
- 3.
de productgroep LANREOTIDE-300-MG/ML-INJ.VLOEISTOF, WWSP.
Daarnaast is naar aanleiding van een zienswijze besloten binnen de productgroep SECUKINUMAB-150-MG-INJ.VLOEISTOF, WWSP geen maximumprijs vast te stellen voor het product EU/1/14/980/010 Cosentyx injvlst 150mg/ml pen 2ml.
Daarnaast is ambtshalve naar aanleiding van interne controles besloten de voorgenomen prijs voor de volgende drie productgroepen te corrigeren:
- 1.
PEGINTERFERON BETA 1A-0.125-MG-INJ.VLOEISTOF, WWSP;
- 2.
OCRELIZUMAB-300-MG-INJECTIEVLOEISTOF, FLAC;
- 3.
ADALIMUMAB-50-MG/ML-INJ.VLOEISTOF, WWSP.
Ten slotte is naar aanleiding van interne controles ambtshalve besloten om:
- 1.
in de productgroep IOVERSOL-636-MG/ML-INJECTIEVLOEISTOF, FLAC de vermelding van RVG-nummer 15717 Optiray 300 injvlst 300mgi/ml hp wwsp 125ml te laten vervallen en dit RVG-nummer in plaats daarvan te vermelden bij de productgroep IOVERSOL-636-MG/ML-INJ.VLOEISTOF, WWSP;
- 2.
in de productgroep IOVERSOL-742-MG/ML-INJECTIEVLOEISTOF, FLAC de vermelding van RVG-nummer 15718 Optiray 350 injvlst 350mgi/ml hp wwsp 125ml te laten vervallen en dit RVG-nummer in plaats daarvan te vermelden bij de productgroep IOVERSOL-742-MG/ML-INJ.VLOEISTOF, WWSP.
Na de inwerkingtreding van de 48^e herijking van de maximumprijzen voor geneesmiddelen, op 1 april 2021, bleek dat het voor een aantal geneesmiddelen wenselijk was om geen maximumprijs vast te stellen.
10
Stcrt. 2021 11103.
Dit betrof onder andere midazolam in de dosering 5 mg/ml. Het College ter beoordeling van geneesmiddelen (CBG) merkte deze dosering aan als ‘kritisch’, in verband met de inzet bij de behandeling van COVID-19 in de extramurale setting. Ik heb toen middels een aanvullende regeling de maximumprijzen geschrapt voor de RVG-nummers met de betreffende dosering per 1 april 2021, voor zover deze niet reeds uitgezonderd waren van een wettelijke maximumprijs door een toegewezen beroep op de Tijdelijke beleidsregel maximumprijzen geneesmiddelen 2021.
11
Stcrt. 2021 15871
Aangezien de situatie rond midazolam ten opzichte van een half jaar geleden niet is veranderd, schrap ik ook in deze herijking de maximumprijzen van midazolam voor de RVG-nummers met de desbetreffende dosering, voor zover deze niet reeds uitgezonderd zijn van een maximumprijs ingevolge een besluit op grond van Tijdelijke beleidsregel.
Verder is de ontwerpregeling, in het kader van de voorhangprocedure
12
Artikel 2, eerste lid, laatste volzin, Wgp.
, op 21 juni 2021 overgelegd aan beide Kamers der Staten-Generaal
13
Kamerstukken II 2020/21, 29 477. nr. 709.
. De ontwerpregeling heeft de Kamers geen aanleiding gegeven tot het maken van opmerkingen.
5.

Inwerkingtreding
In beginsel treedt een ministeriële regeling in werking op één van de vier vaste momenten in het jaar, waaronder 1 oktober, en wordt de regeling ten minste twee maanden daarvoor gepubliceerd.
14
Aanwijzing 4.17 van de Aanwijzingen voor de regelgeving.
Hierop kunnen uitzonderingen worden gemaakt, onder meer bij voorgeschreven wettelijke termijnen. Daar is in dit geval sprake van vanwege de wettelijke termijnen voor actualisering van maximumprijzen. Binnen negentig dagen na aanvang van het onderzoek naar eventuele actualisering dient de regeling aangepast te worden.
15
Artikel 3, eerste lid, Wgp.
Bovendien moet een maximumprijs gebaseerd zijn op een prijslijst uit een referentieland die niet meer dan zes maanden daarvoor is uitgegeven.
16
Artikel 2, eerste lid, Wgp.
Gelet op de uniforme voorbereidingsprocedure en de voorhangprocedure alsmede op het gegeven dat de maximumprijzen altijd halfjaarlijks worden bijgesteld, wordt van de termijn van twee maanden tussen publicatie en inwerkingtreding afgeweken.
6.

Beroepsmogelijkheid
Degene wiens belang rechtstreeks is betrokken bij de vaststelling van een maximumprijs kan daartegen binnen zes weken na de dag waarop deze regeling tot wijziging van de Rmg in de Staatscourant is geplaatst, beroep instellen bij het College van Beroep voor het bedrijfsleven (CBb), te Den Haag.
17
Bijlage 2, artikel 4, Awb.
Het beroepschrift moet zijn ondertekend en dient ten minste te bevatten de naam en adres van de indiener, de dagtekening, de omschrijving van het besluit waartegen het beroep is gericht en de gronden waarop het beroep berust.
18
Artikel 6:5 Awb.
Van de indiener van een beroepschrift wordt griffierecht geheven. Nadere informatie over de hoogte van het griffierecht en de wijze van betalen wordt door de griffie van het CBb verstrekt.
De Staatssecretaris van Volksgezondheid, Welzijn en Sport,
P.
Blokhuis